<template>
  <path
    fill-rule="evenodd"
    clip-rule="evenodd"
    d="M2 0C0.895431 0 0 0.895431 0 2V14C0 15.1046 0.895431 16 2 16H6.01207L6.01207 22.4845C6.01207 22.9512 6.59476 23.1635 6.89492 22.8061L12.612 16H21C22.1046 16 23 15.1046 23 14V2C23 0.895431 22.1046 0 21 0H2ZM3.6767 5.08725C3.6767 4.53497 4.12442 4.08725 4.6767 4.08725H18.0124C18.5647 4.08725 19.0124 4.53497 19.0124 5.08725V5.6432C19.0124 6.19548 18.5647 6.6432 18.0124 6.6432H4.6767C4.12442 6.6432 3.6767 6.19548 3.6767 5.6432V5.08725ZM4.6767 9.19914C4.12442 9.19914 3.6767 9.64685 3.6767 10.1991V10.7551C3.6767 11.3074 4.12442 11.7551 4.6767 11.7551H14.1785C14.7307 11.7551 15.1785 11.3074 15.1785 10.7551V10.1991C15.1785 9.64685 14.7307 9.19914 14.1785 9.19914H4.6767Z"
  />
</template>
