<template>
  <path
    d="M16.06 8.5675L7.12 0L5.71 1.35125L8.09 3.63208L2.94 8.5675C2.35 9.13292 2.35 10.0433 2.94 10.5992L8.44 15.87C8.73 16.1479 9.12 16.2917 9.5 16.2917C9.88 16.2917 10.27 16.1479 10.56 15.87L16.06 10.5992C16.65 10.0433 16.65 9.13292 16.06 8.5675ZM4.71 9.58333L9.5 4.99292L14.29 9.58333H4.71ZM18.5 11.0208C18.5 11.0208 16.5 13.1004 16.5 14.375C16.5 15.4292 17.4 16.2917 18.5 16.2917C19.6 16.2917 20.5 15.4292 20.5 14.375C20.5 13.1004 18.5 11.0208 18.5 11.0208ZM1.5 19.1667H21.5V23H1.5V19.1667Z"
  />
</template>
