import { FC } from 'react'

import { SvgIcon, SvgIconProps } from '@mui/material'

const WorkFromHomeImage: FC<SvgIconProps> = ({ sx, ...props }) => (
  <SvgIcon sx={{ fontSize: 200, color: 'primary.dark', ...sx }} {...props}>
    <svg
      width="200"
      height="200"
      viewBox="0 0 200 200"
      fill="none"
      xmlns="http://www.w3.org/2000/svg"
    >
      <path
        d="M158.5 118.4C158.6 118.4 158.6 118.5 158.7 118.5C158.8 118.5 159 118.4 159.1 118.3C159.7 117.6 160.3 116.8 160.9 115.9C161.5 116.2 162 116.5 162.6 116.7C164.7 117.7 166.5 118.7 167.8 118.8C168 118.8 168.2 118.8 168.3 118.8C169.2 118.8 170.2 118.6 171.1 118.3C172.9 117.7 175.7 117.8 178.2 117.8C181.7 117.8 183.9 117.8 184.7 116.9C184.9 116.6 185.1 116.3 185 115.9C185 115.5 184.9 114.7 177.9 112C174.8 110.8 169.3 108.2 165.3 106.2C165.5 105.3 165.6 104.5 165.6 103.5C165.6 103.3 165.5 103.1 165.3 103C155.1 97.5002 144.3 93.2002 133.1 90.1002C131.1 89.5002 128.9 89.3002 126.8 89.5002C139 78.5002 150.7 66.6002 161.6 54.3002C161.7 54.1002 161.8 53.9002 161.7 53.7002C161.2 52.8002 160.6 51.9002 160 51.0002C160.9 49.9002 161.9 48.8002 162.9 47.7002C164.4 46.1002 165.7 44.8002 166.1 43.6002C166.4 42.5002 166.5 41.4002 166.4 40.3002C166.2 38.5002 166.8 35.7002 167.4 33.3002C168.2 29.8002 168.6 27.7002 167.9 26.7002C167.7 26.4002 167.4 26.2002 167 26.2002C166.4 26.1002 165.5 26.6002 161.7 32.4002C160 35.0002 156 40.2002 152.8 44.2002C151.7 43.6002 150.6 43.0002 149.5 42.6002C149.3 42.5002 149.1 42.6002 149 42.7002C135.1 58.5002 119.9 73.3002 103.8 86.9002C104.4 85.5002 105.1 84.0002 105.8 82.3002C106.2 81.3002 106.7 80.2002 107.2 79.0002L107.7 77.9002C108.2 77.0002 107.9 76.1002 106.8 75.0002C107.7 72.3002 108 71.3002 107.4 69.4002C107.3 69.2002 107.3 69.0002 107.2 68.8002C106.8 67.6002 106.9 67.5002 107.3 67.3002C109.3 66.1002 112.7 63.9002 112.1 62.7002C112 62.4002 111.6 62.2002 111 62.4002C110.3 62.6002 109.7 62.8002 109.2 63.0002C110.7 61.4002 112.1 59.5002 111.4 58.7002C111.2 58.4002 110.7 58.3002 110.2 58.7002C109.8 59.0002 109.3 59.4002 108.9 59.8002C110.3 57.6002 110.9 55.9002 110.3 55.4002C110 55.2002 109.6 55.2002 109.2 55.6002C108.8 56.0002 108.3 56.6002 107.8 57.1002C107.7 57.2002 107.6 57.4002 107.4 57.5002C107.7 56.7002 107.5 56.4002 107.3 56.2002C106.8 55.9002 106.2 56.2002 105.4 57.2002C105 57.7002 104.5 58.3002 103.9 59.0002C101.5 61.9002 100.6 62.9002 100.5 63.2002C100.4 63.3002 100.4 63.5002 100.4 63.6002C98.8999 62.1002 97.8999 61.7002 97.3999 62.1002C97.2999 62.2002 97.1999 62.3002 97.1999 62.5002L97.0999 61.2002C97.0999 61.2002 97.0999 61.2002 97.0999 61.1002C96.9999 60.3002 96.2999 59.6002 94.9999 59.2002C94.3999 56.3002 94.1999 54.1002 94.2999 52.7002C94.3999 50.7002 94.1999 49.9002 93.5999 49.7002C92.8999 49.5002 92.2999 50.6002 92.0999 51.3002C91.9999 51.6002 91.8999 51.9002 91.7999 52.2002C91.5999 52.9002 91.0999 54.4002 90.7999 54.7002C90.4999 54.1002 90.1999 53.5002 89.8999 53.0002V52.9002C89.3999 51.6002 88.9999 50.2002 88.6999 48.8002C88.4999 48.1002 88.0999 46.2002 87.9999 45.7002C87.6999 44.2002 87.2999 43.6002 86.7999 43.6002C86.4999 43.6002 86.1999 43.8002 85.9999 44.3002C85.7999 45.1002 85.7999 45.9002 85.7999 46.7002C84.5999 45.4002 83.8999 45.0002 83.3999 45.4002C82.9999 45.7002 82.7999 46.3002 83.8999 48.6002C85.2999 51.4002 86.8999 55.4002 87.4999 59.6002C86.0999 60.2002 85.2999 61.0002 85.3999 61.9002L86.3999 79.7002L73.2999 83.7002C73.2999 83.5002 73.2999 83.2002 73.1999 82.9002C73.6999 82.8002 74.1999 82.7002 74.5999 82.4002C75.2999 82.0002 75.7999 81.3002 75.9999 80.5002C76.1999 79.7002 76.1999 78.9002 75.7999 78.2002C75.5999 77.8002 75.3999 77.5002 75.0999 77.2002C75.4999 77.0002 75.7999 76.8002 76.0999 76.4002C76.5999 75.8002 76.9999 75.0002 76.9999 74.2002C76.9999 73.4002 76.7999 72.6002 76.2999 72.0002C75.9999 71.6002 75.5999 71.3002 75.1999 71.1002C75.3999 70.8002 75.5999 70.5002 75.7999 70.2002C76.0999 69.6002 76.0999 68.9002 75.9999 68.2002C75.7999 67.5002 75.4999 66.9002 74.9999 66.5002C74.4999 66.0002 73.8999 65.7002 73.1999 65.6002C73.2999 65.4002 73.2999 65.2002 73.3999 64.9002C73.4999 64.5002 73.3999 64.0002 73.2999 63.6002C73.1999 63.2002 72.9999 62.8002 72.6999 62.4002C72.3999 62.0002 72.0999 61.8002 71.6999 61.5002C71.2999 61.3002 70.8999 61.1002 70.4999 61.1002C70.0999 61.0002 69.6999 61.1002 69.3999 61.1002C69.3999 60.6002 69.2999 60.2002 69.0999 59.7002C68.7999 59.0002 68.1999 58.4002 67.5999 58.1002C66.8999 57.7002 66.0999 57.6002 65.3999 57.8002C64.9999 57.9002 64.5999 58.1002 64.1999 58.3002C64.0999 57.9002 63.7999 57.4002 63.4999 57.1002C62.9999 56.5002 62.1999 56.1002 61.4999 56.0002H61.2999C60.4999 55.9002 59.6999 56.1002 58.9999 56.5002C58.5999 56.7002 58.2999 57.1002 57.9999 57.4002C57.7999 57.1002 57.4999 56.8002 57.0999 56.6002C56.4999 56.2002 55.6999 56.0002 54.9999 56.1002C54.2999 56.2002 53.5999 56.5002 52.9999 57.0002C52.5999 57.4002 52.2999 57.9002 52.0999 58.4002C51.6999 58.2002 51.2999 58.1002 50.8999 58.0002C50.4999 57.9002 49.9999 58.0002 49.5999 58.1002C49.1999 58.2002 48.7999 58.4002 48.3999 58.7002C47.9999 59.0002 47.7999 59.3002 47.4999 59.7002C47.2999 60.1002 47.0999 60.5002 47.0999 60.9002C47.0999 61.1002 47.0999 61.3002 47.0999 61.5002H46.9999C46.4999 61.4002 45.8999 61.5002 45.3999 61.7002C44.8999 61.9002 44.3999 62.2002 43.9999 62.6002C43.5999 63.0002 43.3999 63.5002 43.1999 64.1002C43.0999 64.6002 43.0999 65.2002 43.1999 65.7002C43.1999 65.8002 43.2999 66.0002 43.2999 66.1002C42.7999 66.2002 42.3999 66.3002 41.9999 66.6002C41.2999 67.0002 40.7999 67.7002 40.5999 68.5002C40.3999 69.3002 40.3999 70.1002 40.7999 70.8002C40.9999 71.2002 41.1999 71.5002 41.4999 71.8002C41.0999 72.0002 40.7999 72.2002 40.4999 72.6002C39.9999 73.2002 39.6999 74.0002 39.5999 74.7002C39.5999 75.5002 39.7999 76.3002 40.2999 76.9002C40.5999 77.3002 40.9999 77.6002 41.3999 77.8002C41.2999 77.9002 41.1999 78.1002 41.0999 78.2002C40.7999 78.6002 40.6999 79.1002 40.5999 79.5002C40.4999 80.4002 40.6999 81.3002 41.1999 82.0002C41.6999 82.7002 42.4999 83.2002 43.3999 83.3002C43.2999 83.5002 43.2999 83.7002 43.1999 84.0002C43.0999 84.6002 43.1999 85.2002 43.3999 85.8002C43.5999 86.4002 43.9999 86.8002 44.4999 87.2002C44.9999 87.6002 45.5999 87.8002 46.1999 87.8002C46.4999 87.8002 46.7999 87.8002 47.0999 87.7002C47.0999 88.0002 47.0999 88.3002 47.1999 88.6002C47.2999 89.0002 47.4999 89.4002 47.7999 89.8002C48.0999 90.2002 48.3999 90.4002 48.7999 90.7002C49.1999 90.9002 49.5999 91.1002 49.9999 91.1002C50.5999 91.2002 51.1999 91.1002 51.6999 90.9002C51.8999 90.8002 52.0999 90.7002 52.2999 90.6002C52.3999 91.0002 52.6999 91.4002 52.8999 91.8002C53.3999 92.4002 54.0999 92.8002 54.8999 92.9002C55.0999 92.9002 55.2999 92.9002 55.3999 92.9002C55.9999 92.9002 56.5999 92.7002 57.1999 92.4002C57.5999 92.2002 57.8999 91.8002 58.1999 91.5002C58.2999 91.7002 58.4999 91.8002 58.5999 91.9002C58.9999 92.3002 59.4999 92.5002 59.9999 92.7002C60.4999 92.8002 61.0999 92.8002 61.5999 92.7002C61.8999 92.6002 62.1999 92.5002 62.4999 92.3002C63.0999 93.9002 63.7999 95.4002 64.6999 96.8002C70.2999 105.4 77.6999 109.5 87.7999 109.5C88.1999 109.5 88.4999 109.5 88.8999 109.5C89.4999 110.4 91.6999 113.1 96.0999 114.4C95.0999 117.6 94.5999 120.8 94.6999 124.2L52.2999 103.6C49.1999 102.1 45.7999 101.9 42.5999 103C39.3999 104.1 36.7999 106.4 35.2999 109.5L32.5999 115L29.5999 113.5C28.3999 112.9 27.0999 112.9 25.8999 113.3C24.6999 113.7 23.6999 114.6 23.0999 115.8L13.2999 136C12.6999 137.2 12.6999 138.5 13.0999 139.7C13.4999 140.9 14.3999 141.9 15.5999 142.5L115.6 191.1C115.6 191.1 115.6 191.1 115.7 191.1L122.7 194.5C123.4 194.8 124.1 195 124.8 195C125.3 195 125.9 194.9 126.4 194.7C127.6 194.3 128.6 193.4 129.2 192.2L139 172C139.6 170.8 139.6 169.5 139.2 168.3C138.8 167.1 137.9 166.1 136.7 165.5L133.7 164L136.4 158.5C137.5 156.2 137.9 153.6 137.5 151.1C144.1 148.3 149.6 143.3 152.9 136.9C156.1 130.7 157.1 123.6 155.7 116.8C156.6 117.4 157.5 117.9 158.5 118.4ZM86.1999 63.5002C86.5999 63.8002 87.1999 64.0002 87.8999 64.1002C88.7999 64.3002 89.6999 64.4002 90.4999 64.4002C92.1999 64.4002 93.7999 64.1002 95.3999 63.4002C95.6999 63.3002 95.8999 63.1002 96.0999 63.0002L96.1999 65.5002C94.6999 66.2002 92.9999 66.6002 91.2999 66.7002C89.5999 66.8002 87.8999 66.5002 86.2999 65.8002L86.1999 63.5002ZM97.1999 75.0002C98.3999 77.0002 101.8 78.6002 104.5 79.0002C104.7 79.0002 104.8 79.0002 105 79.0002H105.1C105.2 79.0002 105.3 79.0002 105.4 79.0002C105.7 79.0002 106 79.0002 106.2 78.9002C105.8 79.9002 105.4 80.8002 105 81.7002C103.3 81.7002 101.6 81.4002 99.9999 80.7002C98.3999 80.0002 96.9999 79.0002 95.8999 77.7002C96.3999 76.8002 96.7999 75.8002 97.1999 75.0002ZM104.6 59.7002C105.2 59.0002 105.7 58.4002 106.1 57.9002L106.2 57.8002C105.9 58.4002 105.5 59.3002 104.6 60.6002C104.1 61.1002 103.7 61.5002 103.4 61.8002C103.2 62.0002 103.2 62.3002 103.4 62.5002C103.6 62.7002 103.9 62.7002 104.1 62.5002C105.1 61.6002 107 59.4002 108.6 57.6002C108.8 57.3002 109.1 57.0002 109.3 56.8002C108.9 57.8002 108 59.5002 105.9 61.9002C105.5 62.2002 105.2 62.4002 104.9 62.6002C104.7 62.8002 104.6 63.1002 104.8 63.3002C105 63.5002 105.3 63.6002 105.5 63.4002C106.6 62.6002 108 61.6002 109.4 60.5002C109.8 60.2002 110.2 59.9002 110.5 59.6002C110.2 60.2002 109.4 61.4002 107.3 63.3002C107.2 63.3002 107.2 63.3002 107.1 63.3002L106.3 63.5002C106 63.6002 105.9 63.8002 105.9 64.1002C106 64.4002 106.2 64.5002 106.5 64.5002L107.3 64.3002C108.3 64.1002 109.3 63.8002 110.8 63.3002C110.3 63.8002 109.2 64.8002 106.8 66.2002C105.7 66.9002 106 67.8002 106.3 68.9002C106.4 69.1002 106.4 69.3002 106.5 69.5002C107 71.2002 106.8 71.9002 105.8 74.8002L104.8 77.6002H104.7C102.8 77.3002 100.4 76.3002 98.9999 75.1002C99.6999 73.8002 100.4 72.5002 100.5 72.4002C100.5 72.4002 100.5 72.4002 100.5 72.3002C100.7 71.8002 100.8 70.6002 100.9 68.5002C100.9 68.4002 100.9 68.4002 100.9 68.3002C101 67.0002 101 65.6002 101.2 64.5002C101.2 64.4002 101.3 64.3002 101.2 64.2002C101.3 63.8002 101.3 63.4002 101.4 63.2002C101.5 63.4002 103.4 61.2002 104.6 59.7002ZM100.1 65.0002C99.9999 65.4002 99.9999 65.9002 99.9999 66.5002C99.4999 65.4002 98.8999 64.3002 98.1999 63.3002C98.4999 63.5002 99.0999 63.9002 100.1 65.0002ZM97.2999 63.8002C98.3999 65.4002 99.1999 67.1002 99.7999 68.9002C99.6999 70.1002 99.6999 71.4002 99.5999 72.0002C98.7999 72.0002 98.0999 72.1002 97.5999 72.4002L97.1999 65.7002L96.9999 63.3002C97.0999 63.4002 97.1999 63.6002 97.2999 63.8002ZM86.4999 45.4002C86.5999 45.6002 86.5999 45.8002 86.6999 46.1002C86.7999 46.5002 87.1999 48.5002 87.3999 49.2002C87.3999 49.4002 87.4999 49.6002 87.4999 49.7002C87.1999 49.2002 86.7999 48.7002 86.4999 48.2002C86.3999 47.3002 86.3999 46.3002 86.4999 45.4002ZM83.7999 46.6002C83.9999 46.8002 84.3999 47.1002 84.9999 47.8002C86.7999 50.1002 88.3999 52.7002 89.6999 55.3002C89.8999 55.7002 89.9999 56.1002 90.1999 56.5002L90.3999 57.1002C90.4999 57.4002 90.7999 57.5002 91.0999 57.4002C91.3999 57.3002 91.4999 57.0002 91.3999 56.7002L91.1999 56.2002C91.1999 56.1002 91.0999 56.0002 91.0999 55.9002C91.6999 55.6002 92.1999 54.4002 92.6999 52.8002C92.7999 52.5002 92.8999 52.2002 92.9999 51.9002C93.0999 51.6002 93.1999 51.4002 93.2999 51.3002C93.2999 51.6002 93.3999 52.1002 93.2999 52.9002C93.1999 54.4002 93.4999 56.8002 94.0999 59.9002C94.2999 60.8002 94.4999 61.7002 94.6999 62.7002C92.7999 63.5002 90.6999 63.7002 88.5999 63.3002C88.6999 57.7002 86.4999 52.1002 84.5999 48.3002C84.0999 47.5002 83.8999 46.9002 83.7999 46.6002ZM86.2999 82.8002C86.2999 83.1002 86.4999 83.3002 86.7999 83.3002C87.0999 83.3002 87.2999 83.0002 87.2999 82.8002L86.3999 66.9002C87.7999 67.4002 89.2999 67.7002 90.8999 67.7002C91.0999 67.7002 91.1999 67.7002 91.3999 67.7002C93.0999 67.6002 94.7999 67.2002 96.2999 66.6002L96.6999 73.9002C95.6999 76.4002 92.3999 84.0002 89.5999 85.9002C87.0999 87.6002 76.6999 86.2002 71.8999 85.4002L72.6999 85.2002H72.7999L86.2999 81.1002V82.8002ZM61.1999 83.1002C60.8999 81.9002 60.2999 79.1002 59.8999 78.0002C59.7999 77.7002 59.6999 77.4002 59.5999 77.1002C59.3999 76.4002 59.1999 75.8002 58.9999 74.9002C58.9999 74.7002 58.7999 74.6002 58.5999 74.5002C57.9999 74.4002 57.5999 74.0002 57.4999 73.6002C57.3999 73.3002 57.4999 73.1002 57.6999 72.9002C57.8999 72.8002 58.0999 72.8002 58.2999 72.9002C58.7999 73.2002 59.2999 73.4002 59.6999 73.1002C59.9999 72.9002 60.0999 72.7002 60.0999 72.3002C60.1999 70.5002 60.8999 69.2002 61.8999 68.9002C62.8999 68.7002 63.9999 69.5002 64.8999 71.1002C66.4999 73.9002 67.2999 78.1002 65.8999 79.7002C65.0999 80.6002 63.6999 80.6002 61.5999 79.8002H61.1999C61.1999 79.8002 61.0999 79.8002 61.0999 79.9002C61.0999 79.9002 60.9999 79.9002 60.9999 80.0002C60.9999 80.0002 60.9999 80.0002 60.9999 80.1002C60.9999 80.1002 60.9999 80.1002 60.9999 80.2002V80.6002C60.9999 80.6002 60.9999 80.6002 61.0999 80.7002C61.0999 80.7002 61.0999 80.8002 61.1999 80.8002L63.5999 82.6002L61.1999 83.0002C61.1999 83.2002 61.1999 83.2002 61.1999 83.1002ZM65.6999 96.4002C63.5999 93.2002 62.4999 89.0002 61.3999 84.2002L64.4999 83.7002C64.7999 84.2002 65.0999 84.6002 65.3999 85.0002C64.7999 85.2002 64.1999 85.5002 63.6999 85.9002C63.4999 86.1002 63.3999 86.4002 63.5999 86.6002C63.7999 86.8002 64.0999 86.9002 64.2999 86.7002C64.8999 86.2002 65.5999 85.9002 66.2999 85.8002C66.3999 85.8002 66.3999 85.8002 66.4999 85.7002C67.7999 85.5002 69.1999 85.7002 70.6999 86.0002C71.1999 86.1002 78.6999 87.5002 84.4999 87.5002C86.8999 87.5002 88.9999 87.2002 90.0999 86.5002C91.9999 85.2002 93.9999 81.8002 95.4999 78.7002C96.6999 79.9002 98.0999 80.9002 99.6999 81.6002C101.3 82.3002 102.9 82.6002 104.6 82.7002C98.9999 95.5002 97.2999 96.7002 90.6999 97.2002C84.0999 97.8002 77.3999 97.6002 70.8999 96.6002C70.5999 96.6002 70.3999 96.7002 70.2999 97.0002C70.1999 97.3002 70.3999 97.5002 70.6999 97.6002C73.5999 98.0002 76.5999 98.3002 79.4999 98.5002L89.9999 100.8C89.7999 103.4 89.3999 106 88.8999 108.5C78.4999 108.9 71.2999 105.1 65.6999 96.4002ZM89.7999 109C90.3999 106.3 90.7999 103.5 90.9999 100.7C90.9999 100.7 90.9999 100.6 91.0999 100.6C91.0999 100.5 91.0999 100.4 91.0999 100.3C91.1999 99.6002 91.1999 98.9002 91.1999 98.2002C96.7999 97.7002 99.0999 96.2002 102.6 89.3002C119.3 75.4002 135 60.1002 149.4 43.8002C150.5 44.2002 151.6 44.8002 152.6 45.4002C153.8 46.2002 155 47.1002 156 48.1002C156.1 48.2002 156.1 48.2002 156.2 48.3002C156.6 48.7002 156.9 49.1002 157.3 49.5002C157.5 49.7002 157.7 49.9002 157.9 50.2002C158.2 50.6002 158.5 50.9002 158.7 51.3002C159.4 52.2002 160 53.1002 160.6 54.2002C149.4 66.8002 137.5 78.8002 125 90.0002C124.8 90.0002 124.6 90.1002 124.3 90.1002L102.2 95.6002C101.9 95.7002 101.8 95.9002 101.8 96.2002C101.9 96.5002 102.1 96.6002 102.4 96.6002L124.5 91.1002C127.2 90.4002 130 90.5002 132.7 91.2002C143.7 94.2002 154.4 98.5002 164.4 103.8C164.3 104.8 164.2 105.8 164 106.8C163.9 107.1 163.9 107.3 163.8 107.6C163.6 108.2 163.4 108.8 163.2 109.3C162 112.3 160.2 114.9 158.4 117.2C157.3 116.7 156.2 116.1 155.1 115.6C146.7 111.7 137.9 108.5 128.8 106.1C128.7 106.1 128.6 106.1 128.5 106.1C128.3 106.2 107.1 114.9 99.8999 114.2C93.3999 113.6 90.3999 109.9 89.7999 109ZM14.0999 139.4C13.7999 138.4 13.7999 137.4 14.2999 136.5L24.0999 116.3C24.4999 115.4 25.2999 114.7 26.2999 114.4C26.6999 114.3 27.0999 114.2 27.5999 114.2C28.1999 114.2 28.6999 114.3 29.2999 114.6L36.2999 118C37.1999 118.5 37.8999 119.2 38.1999 120.2C38.4999 121.2 38.4999 122.2 37.9999 123.1L28.1999 143.3C27.6999 144.2 26.9999 144.9 25.9999 145.2C24.9999 145.5 23.9999 145.5 23.0999 145L16.0999 141.6C15.0999 141.2 14.3999 140.4 14.0999 139.4ZM113.2 188.4C113.3 188.6 113.4 188.8 113.5 189L25.6999 146.3C25.8999 146.3 26.0999 146.2 26.2999 146.1C27.4999 145.7 28.4999 144.8 29.0999 143.6L35.9999 129.5L120.4 170.5L113.5 184.6C112.9 185.8 112.8 187.1 113.2 188.4ZM138.2 168.7C138.5 169.7 138.5 170.7 138 171.6L128.2 191.8C127.7 192.7 127 193.4 126 193.7C125 194 124 194 123.1 193.5L116.2 190.1H116.1C115.2 189.6 114.6 188.9 114.2 187.9C113.9 186.9 113.9 185.9 114.4 185L121.5 170.5C121.5 170.5 121.5 170.5 121.5 170.4L124.2 164.8C124.6 163.9 125.4 163.2 126.4 162.9C126.8 162.8 127.2 162.7 127.7 162.7C128.3 162.7 128.8 162.8 129.4 163.1L136.4 166.5C137.2 167 137.9 167.8 138.2 168.7ZM135.4 158.2L132.7 163.7L129.7 162.2C128.5 161.6 127.2 161.6 126 162C124.8 162.4 123.8 163.3 123.2 164.5L120.7 169.7L36.2999 128.7L38.7999 123.5C39.3999 122.3 39.3999 121 38.9999 119.8C38.5999 118.6 37.6999 117.6 36.4999 117L33.4999 115.5L36.1999 110C37.5999 107.2 39.9999 105.1 42.8999 104C45.8999 103 49.0999 103.2 51.8999 104.5L129.9 142.4C132.7 143.8 134.8 146.2 135.9 149.1C137 152.2 136.8 155.4 135.4 158.2ZM152 136.6C148.8 142.7 143.6 147.5 137.3 150.2C137.2 149.7 137.1 149.3 136.9 148.8C135.8 145.6 133.5 143 130.4 141.5L95.7999 124.7C95.5999 121.3 95.9999 117.9 97.0999 114.7C97.8999 114.9 98.7999 115.1 99.7999 115.2C107 115.9 126.7 108 128.8 107.1C137.6 109.4 146.2 112.5 154.5 116.4C156.1 123.3 155.2 130.4 152 136.6Z"
        fill="currentColor"
      />
      <path
        d="M187 166.4C186.9 166.2 186.8 166 186.6 165.9C186.4 165.7 186.3 165.6 186.1 165.5L175.8 161C173.7 160.1 172.1 158.4 171.2 156.3L170.3 154.3L167.3 147.3C167.2 147 166.9 146.7 166.6 146.6C166.3 146.5 165.9 146.5 165.6 146.6L157.9 149.7C157.7 149.8 157.5 150 157.3 150.2C157.2 150.4 157.1 150.7 157.1 150.9C157.1 151.1 157.1 151.2 157.2 151.4L160.1 158.4L162.5 164.1C163.1 165.6 164 166.9 165.2 168C166.4 169.1 167.7 169.9 169.2 170.4L175.7 172.7C176.7 173 177.7 173.2 178.6 173.2C179.8 173.2 181.1 173 182.2 172.5C184.3 171.6 185.9 170 186.9 167.9C187 167.7 187 167.5 187 167.3C187.1 166.8 187.1 166.6 187 166.4ZM158.2 150.8C158.2 150.7 158.2 150.7 158.3 150.6L158.4 150.5L166.1 147.4H166.3C166.4 147.4 166.4 147.5 166.5 147.6L169.3 154.1L161 157.4L158.3 150.9C158.2 150.9 158.2 150.9 158.2 150.8ZM186.1 167.3C185.3 169.1 183.8 170.6 182 171.4C180.2 172.2 178.1 172.3 176.2 171.6L169.7 169.3C168.3 168.8 167.1 168.1 166 167.1C164.9 166.1 164.1 164.9 163.6 163.6L161.4 158.4L161.7 158.3L169.7 155.1L170.4 156.7C171.4 159.1 173.2 160.9 175.6 161.9L185.9 166.4C186 166.4 186.1 166.5 186.1 166.5C186.2 166.6 186.2 166.6 186.2 166.7C186.2 166.8 186.2 166.9 186.2 166.9C186.1 167.1 186.1 167.2 186.1 167.3Z"
        fill="currentColor"
      />
      <path
        d="M168.2 67.6002L168.9 71.9002L164.6 72.6002C164.3 72.6002 164.1 72.9002 164.2 73.2002C164.2 73.4002 164.5 73.6002 164.7 73.6002H164.8L169.1 72.9002L169.8 77.2002C169.8 77.4002 170.1 77.6002 170.3 77.6002H170.4C170.7 77.6002 170.9 77.3002 170.8 77.0002L170.1 72.7002L174.4 72.0002C174.7 72.0002 174.9 71.7002 174.8 71.4002C174.8 71.1002 174.5 70.9002 174.2 71.0002L169.9 71.7002L169.2 67.4002C169.2 67.1002 168.9 66.9002 168.6 67.0002C168.3 67.0002 168.1 67.3002 168.2 67.6002Z"
        fill="currentColor"
      />
      <path
        d="M47.1999 39.1002C47.8999 39.4002 48.6999 39.5002 49.4999 39.5002C50.1999 39.5002 50.7999 39.4002 51.3999 39.2002C52.7999 38.8002 53.9999 37.9002 54.7999 36.8002C55.5999 35.7002 56.0999 34.2002 56.0999 32.8002C56.0999 31.5002 55.6999 30.2002 54.9999 29.1002C54.2999 28.0002 53.1999 27.1002 51.9999 26.6002C51.2999 26.3002 50.5999 26.2002 49.8999 26.1002C49.8999 24.6002 49.4999 23.2002 48.6999 21.9002C47.7999 20.6002 46.4999 19.5002 44.9999 18.8002C44.7999 18.7002 44.6999 18.7002 44.4999 18.8002C44.3999 18.9002 44.2999 19.0002 44.2999 19.2002C44.2999 20.8002 44.6999 22.5002 45.4999 23.9002C46.0999 24.8002 46.8999 25.6002 47.7999 26.2002C47.7999 26.2002 47.7999 26.2002 47.6999 26.2002C46.2999 26.5002 44.9999 27.3002 44.0999 28.5002C43.1999 29.6002 42.6999 31.0002 42.5999 32.4002C42.4999 33.8002 42.8999 35.3002 43.6999 36.5002C44.6999 37.7002 45.8999 38.6002 47.1999 39.1002ZM46.3999 23.4002C45.7999 22.4002 45.3999 21.2002 45.2999 20.1002C46.2999 20.7002 47.1999 21.5002 47.8999 22.4002C48.4999 23.4002 48.8999 24.5002 48.8999 25.7002C47.9999 25.2002 47.0999 24.4002 46.3999 23.4002Z"
        fill="currentColor"
      />
      <path
        d="M17.9999 93.8002C18.0999 93.8002 18.0999 93.8002 17.9999 93.8002L20.4999 93.4002C20.6999 93.4002 20.9999 93.4002 21.1999 93.4002C21.3999 93.5002 21.6999 93.5002 21.8999 93.7002C22.0999 93.8002 22.2999 94.0002 22.3999 94.2002C22.4999 94.4002 22.5999 94.6002 22.6999 94.9002L23.0999 97.3002C23.0999 97.5002 23.3999 97.7002 23.5999 97.7002H23.6999C23.9999 97.7002 24.1999 97.4002 24.0999 97.1002L23.6999 94.7002C23.6999 94.5002 23.6999 94.2002 23.6999 94.0002C23.7999 93.8002 23.7999 93.5002 23.9999 93.3002C24.0999 93.1002 24.2999 92.9002 24.4999 92.8002C24.6999 92.7002 24.8999 92.6002 25.1999 92.5002L27.5999 92.1002C27.8999 92.1002 28.0999 91.8002 27.9999 91.5002C27.8999 91.2002 27.6999 91.0002 27.3999 91.1002L24.9999 91.5002C24.7999 91.5002 24.4999 91.5002 24.2999 91.5002C24.0999 91.4002 23.7999 91.4002 23.5999 91.2002C23.3999 91.1002 23.1999 90.9002 23.0999 90.7002C22.9999 90.5002 22.8999 90.3002 22.7999 90.0002L22.3999 87.6002C22.3999 87.3002 22.0999 87.1002 21.7999 87.2002C21.4999 87.2002 21.2999 87.5002 21.3999 87.8002L21.7999 90.2002C21.7999 90.4002 21.7999 90.7002 21.7999 90.9002C21.6999 91.1002 21.6999 91.4002 21.4999 91.6002C21.3999 91.8002 21.1999 92.0002 20.9999 92.1002C20.7999 92.2002 20.5999 92.3002 20.2999 92.4002L17.8999 92.8002C17.5999 92.8002 17.3999 93.1002 17.4999 93.4002C17.5999 93.7002 17.7999 93.8002 17.9999 93.8002ZM22.9999 92.1002C23.0999 92.2002 23.2999 92.3002 23.3999 92.4002C23.2999 92.5002 23.1999 92.6002 23.0999 92.8002C22.9999 92.9002 22.8999 93.1002 22.7999 93.2002C22.6999 93.1002 22.5999 93.0002 22.3999 92.9002C22.2999 92.8002 22.0999 92.7002 21.9999 92.6002C22.0999 92.5002 22.1999 92.4002 22.2999 92.2002C22.3999 92.0002 22.4999 91.9002 22.5999 91.8002C22.6999 91.9002 22.8999 92.0002 22.9999 92.1002Z"
        fill="currentColor"
      />
      <path
        d="M117.2 60.6002C117.3 60.6002 117.3 60.6002 117.4 60.6002C117.5 60.6002 117.7 60.5002 117.8 60.5002L132.8 45.5002C132.9 45.4002 132.9 45.2002 132.9 45.1002L133.1 26.1002C133.1 26.0002 133.1 25.9002 133 25.8002L121.1 5.20017C121 5.00017 120.8 4.90017 120.6 5.00017C120.4 5.10017 120.2 5.30017 120.2 5.50017L120 24.5002C120 24.6002 120 24.7002 120.1 24.8002L124.9 33.1002L118.9 39.1002C118.8 39.2002 118.8 39.3002 118.8 39.4002L117 60.1002C116.9 60.3002 117.1 60.5002 117.2 60.6002ZM121.2 7.30017L132.1 26.2002L131.9 43.2002L121 24.3002L121.2 7.30017ZM119.7 39.5002L125.3 33.9002L131.8 45.1002L118.1 58.8002L119.7 39.5002Z"
        fill="currentColor"
      />
    </svg>
  </SvgIcon>
)

export default WorkFromHomeImage
