import { FC } from 'react'

import { SvgIcon, SvgIconProps } from '@mui/material'

const VirtualRealityImage: FC<SvgIconProps> = ({ sx, ...props }) => (
  <SvgIcon sx={{ fontSize: 200, color: 'primary.dark', ...sx }} {...props}>
    <svg
      width="200"
      height="200"
      viewBox="0 0 200 200"
      fill="none"
      xmlns="http://www.w3.org/2000/svg"
    >
      <path
        d="M152.6 97.5004C152.8 97.5004 153 97.4004 153.2 97.3004C153.4 97.1004 153.4 96.9004 153.4 96.7004C153.4 96.5004 153.3 96.3004 153.2 96.1004C153 95.9004 152.8 95.9004 152.6 95.9004C152.4 95.9004 152.2 96.0004 152 96.1004C151.8 96.3004 151.8 96.5004 151.8 96.7004C151.8 96.9004 151.9 97.1004 152 97.3004C152.1 97.4004 152.4 97.5004 152.6 97.5004Z"
        fill="currentColor"
      />
      <path
        d="M165.8 92.9004C166 92.9004 166.2 92.8004 166.3 92.7004C166.4 92.6004 166.5 92.4004 166.6 92.2004C166.6 92.0004 166.5 91.8004 166.3 91.7004C166.2 91.6004 166 91.5004 165.7 91.5004C165.4 91.5004 165.3 91.6004 165.1 91.7004C164.9 91.8004 165 92.0004 165 92.2004C165 92.4004 165.1 92.6004 165.3 92.7004C165.4 92.9004 165.6 92.9004 165.8 92.9004Z"
        fill="currentColor"
      />
      <path
        d="M170.4 78.4004C170.5 78.5004 170.6 78.5004 170.7 78.6004C170.8 78.6004 170.9 78.7004 171 78.7004C171.1 78.7004 171.2 78.7004 171.3 78.6004C171.4 78.5004 171.5 78.5004 171.6 78.4004C171.7 78.3004 171.7 78.2004 171.8 78.1004C171.8 78.0004 171.9 77.9004 171.9 77.8004C171.9 77.6004 171.8 77.4004 171.7 77.2004C171.6 77.0004 171.4 77.0004 171.1 77.0004C170.9 77.0004 170.7 77.1004 170.5 77.2004C170.3 77.3004 170.3 77.5004 170.2 77.7004C170.2 77.8004 170.2 77.9004 170.2 78.0004C170.3 78.2004 170.4 78.3004 170.4 78.4004Z"
        fill="currentColor"
      />
      <path
        d="M183.5 71.4004C183.7 71.4004 183.9 71.3004 184.1 71.2004C184.3 71.1004 184.3 70.9004 184.4 70.7004C184.4 70.5004 184.3 70.3004 184.1 70.2004C184 70.1004 183.8 70.0004 183.5 70.0004C183.3 70.0004 183.1 70.1004 182.9 70.2004C182.8 70.3004 182.7 70.5004 182.6 70.7004C182.6 70.9004 182.7 71.1004 182.9 71.2004C183.1 71.4004 183.3 71.4004 183.5 71.4004Z"
        fill="currentColor"
      />
      <path
        d="M149.3 110.8C149.5 110.8 149.7 110.7 149.9 110.6C150.1 110.5 150.1 110.3 150.1 110.1C150.1 109.9 150 109.7 149.9 109.6C149.7 109.5 149.6 109.4 149.3 109.4C149.1 109.4 148.9 109.5 148.7 109.6C148.6 109.7 148.5 109.9 148.5 110.1C148.5 110.3 148.6 110.5 148.7 110.6C148.9 110.8 149.1 110.8 149.3 110.8Z"
        fill="currentColor"
      />
      <path
        d="M135.1 104.4C134.9 104.4 134.7 104.5 134.5 104.6C134.4 104.7 134.3 104.9 134.3 105.2C134.3 105.4 134.4 105.6 134.5 105.7C134.6 105.8 134.8 105.9 135.1 105.9C135.3 105.9 135.5 105.8 135.7 105.7C135.8 105.6 135.9 105.4 135.9 105.2C135.9 105 135.8 104.8 135.7 104.6C135.5 104.5 135.3 104.4 135.1 104.4Z"
        fill="currentColor"
      />
      <path
        d="M139.3 92.0004C139.5 92.0004 139.7 91.9004 139.9 91.8004C140.1 91.7004 140.1 91.5004 140.2 91.3004C140.2 91.1004 140.1 90.9004 139.9 90.8004C139.8 90.7004 139.6 90.6004 139.3 90.6004C139.1 90.6004 138.9 90.7004 138.7 90.8004C138.6 90.9004 138.5 91.1004 138.4 91.3004C138.4 91.5004 138.5 91.7004 138.7 91.8004C138.9 91.9004 139.1 92.0004 139.3 92.0004Z"
        fill="currentColor"
      />
      <path
        d="M135.1 77.2004C135.2 77.3004 135.4 77.4004 135.6 77.4004C135.8 77.4004 136 77.3004 136.1 77.2004C136.2 77.1004 136.3 76.9004 136.4 76.7004C136.4 76.5004 136.3 76.3004 136.1 76.2004C135.9 76.1004 135.8 76.0004 135.5 76.0004C135.3 76.0004 135.1 76.1004 134.9 76.2004C134.7 76.3004 134.7 76.5004 134.6 76.7004C134.9 76.9004 135 77.0004 135.1 77.2004Z"
        fill="currentColor"
      />
      <path
        d="M120.2 69.9004C120 69.9004 119.8 70.0004 119.6 70.1004C119.5 70.2004 119.4 70.4004 119.3 70.6004C119.3 70.8004 119.4 71.0004 119.6 71.1004C119.7 71.2004 119.9 71.3004 120.2 71.3004C120.4 71.3004 120.6 71.2004 120.8 71.1004C121 71.0004 121 70.8004 121.1 70.6004C121.1 70.4004 121 70.2004 120.8 70.1004C120.6 70.0004 120.4 69.9004 120.2 69.9004Z"
        fill="currentColor"
      />
      <path
        d="M132.8 126.5C133.5 126.5 134 126.2 134.3 125.9C134.3 125.9 134.3 125.9 134.3 125.8C146.9 118.7 152.7 111.8 155.3 106.5C155.6 106.2 156.4 105.5 157.6 104.5L157.7 104.4C163.4 99.3004 177.2 85.9004 187.5 69.4004C187.6 69.2004 187.6 69.0004 187.5 68.9004C187.4 68.7004 187.2 68.5004 187.1 68.2004C187.8 67.0004 190.7 62.0004 191.5 58.4004C191.8 56.9004 191.9 55.9004 191.2 55.7004C191.1 55.7004 191 55.7004 190.9 55.7004C191 55.0004 191.1 54.4004 191.2 53.7004C191.4 50.5004 190.7 50.4004 190.4 50.4004C190.2 50.4004 190.1 50.4004 189.9 50.5004C189.9 48.5004 189.5 48.1004 189.1 48.0004C188.5 47.9004 188 48.6004 187.5 50.4004C187.3 49.0004 187 48.4004 186.4 48.4004C185.9 48.4004 185.4 48.7004 184.9 51.2004C184.7 52.2004 184.5 53.3004 184.2 54.3004C182.9 52.1004 182.3 51.7004 181.8 51.9004C181.2 52.1004 181.1 52.8004 181.6 55.6004C182.1 58.2004 180.7 61.6004 180.2 62.7004C180.1 62.7004 179.9 62.6004 179.8 62.5004C179.6 62.4004 179.4 62.5004 179.2 62.7004C175.2 68.5004 170.7 74.2004 166 79.5004C165.9 79.4004 165.9 79.4004 165.8 79.3004C165.3 78.9004 164.7 78.7004 164.2 78.7004C173.8 68.4004 169.9 59.0004 166.1 49.8004C162.2 40.2004 158.4 31.2004 168.7 21.0004C168.9 20.8004 168.9 20.5004 168.7 20.3004C168.5 20.1004 168.2 20.1004 168 20.3004C157.2 31.0004 161.3 40.7004 165.1 50.2004C169 59.7004 172.7 68.7004 162.6 78.9004L160.4 79.2004C160.4 79.2004 160.4 79.2004 160.3 79.2004H160.2C159.8 63.1004 157.7 52.9004 154.3 51.3004C153.5 50.9004 152.7 51.0004 152 51.6004C151.3 52.1004 150.9 53.0004 150.6 54.1004C148.4 48.5004 145.4 45.1004 142.8 45.5004C140.8 45.8004 139.8 48.2004 139.9 52.1004C140 55.4004 140.5 58.7004 141.3 61.9004C139.6 59.5004 138.2 58.6004 137 59.1004C134.9 60.1004 135.2 66.3004 137.7 71.5004C139.7 76.0004 142.5 80.1004 145.9 83.6004L145.8 83.7004C145.7 83.9004 145.8 84.1004 145.9 84.2004L148.5 86.8004C148.6 86.9004 148.7 86.9004 148.9 86.9004C148.9 86.9004 148.9 86.9004 149 86.9004H149.3C150.2 87.9004 150.9 88.9004 151.1 90.3004C151 90.6004 150.9 90.7004 150.9 90.7004C150.9 90.7004 150.5 90.7004 150 90.2004C149.9 90.1004 149.9 90.1004 149.8 90.1004C141 81.7004 129.7 62.9004 126.2 56.8004C126 56.5004 125.6 56.1004 124.8 55.9004C124.8 55.9004 124.8 55.9004 124.8 55.8004L124.7 55.7004C124.4 55.2004 124.3 54.5004 124.4 53.9004C124.5 53.3004 124.7 52.7004 125.1 52.2004C128.8 47.8004 128.7 46.5004 128.1 45.9004C127.2 44.9004 125.6 46.0004 123.9 47.3004C122.9 48.0004 121.8 48.8004 121.2 48.9004C120.9 48.8004 120.5 47.6004 120.4 46.6004C120.2 45.2004 119.5 40.7004 119.4 40.3004C119.1 38.0004 118.6 37.0004 117.7 37.0004C116.5 37.1004 116.4 39.5004 116.4 40.6004C116.4 41.5004 116.4 42.4004 116.4 43.1004C115.8 41.2004 115.2 39.2004 115.1 38.9004C114.4 36.7004 113.7 35.8004 112.9 35.9004C111.8 36.2004 112 38.3004 112.2 39.6004C112.4 40.9004 112.6 42.3004 112.8 43.5004C112.5 42.7004 112.2 41.9004 111.9 41.1004C111.1 39.0004 110.4 38.1004 109.6 38.3004C108.6 38.6004 108.8 40.5004 109 42.0004C109.1 42.8004 109.3 43.6004 109.5 44.3004C108.6 42.2004 107.9 41.4004 107.1 41.6004C106.1 41.9004 106.4 43.9004 106.8 45.5004C107 46.5004 107.3 47.4004 107.5 48.1004C108.1 50.2004 108.8 52.2004 109.3 54.3004C109.7 55.8004 111 59.5004 112.4 62.5004C111.9 63.5004 112.1 64.3004 112.3 64.7004C112.3 64.7004 112.3 64.8004 112.4 64.8004C112.4 64.8004 112.4 64.8004 112.4 64.9004L130 92.3004H120.3C119.7 92.2004 119.2 92.3004 118.8 92.6004C117.4 93.4004 116.9 95.9004 117.4 99.5004L91.3998 104C93.4998 99.3004 94.6998 94.4004 94.7998 89.2004C94.8998 85.4004 94.3998 81.7004 93.4998 78.0004C102.7 70.4004 109.5 62.9004 107.4 59.3004C104.9 55.0004 92.0998 59.0004 84.4998 61.8004C84.1998 61.5004 83.8998 61.1004 83.4998 60.8004C79.7998 57.1004 75.3998 54.2004 70.4998 52.3004C65.5998 50.4004 60.3998 49.5004 55.0998 49.6004C49.7998 49.8004 44.6998 51.0004 39.8998 53.2004C35.0998 55.4004 30.8998 58.6004 27.3998 62.6004C23.8998 66.6004 21.2998 71.1004 19.6998 76.1004C17.6998 82.1004 17.2998 88.5004 18.3998 94.7004C18.6998 96.2004 18.9998 97.7004 19.4998 99.1004C12.9998 104.4 2.89984 113.7 5.39984 118C6.09984 119.3 7.79984 119.9 10.3998 119.9C14.5998 119.9 20.9998 118.3 29.0998 115.2C32.3998 118.5 36.3998 121.3 40.6998 123.2C45.5998 125.4 50.9998 126.5 56.3998 126.5C57.1998 126.5 58.0998 126.5 58.8998 126.4C67.9998 133 77.4998 138.8 87.3998 144C88.9998 144.9 90.8998 145.4 92.6998 145.5C92.8998 145.5 92.9998 145.5 93.1998 145.5C94.8998 145.5 96.5998 145.2 98.0998 144.5C109.8 139.6 121 133.4 131.6 126.3C132.1 126.4 132.5 126.5 132.8 126.5ZM190.4 57.7004C190.5 57.5004 190.6 57.4004 190.7 57.2004C190.7 57.4004 190.6 57.8004 190.5 58.2004C190.3 59.0004 190 60.0004 189.6 60.9004C189.6 60.9004 189.6 60.9004 189.6 60.8004C189.6 60.6004 189.5 60.4004 189.5 60.2004C189.8 59.4004 190.1 58.6004 190.4 57.7004C190.3 57.7004 190.3 57.7004 190.4 57.7004ZM190.1 53.5004C189.9 55.2004 189.6 56.9004 189 58.5004C188.9 58.1004 188.7 57.8004 188.6 57.4004C189 56.1004 189.2 54.9004 189.4 53.6004C189.4 53.6004 189.5 53.5004 189.5 53.4004C189.7 52.5004 189.9 52.0004 190 51.6004C190.1 52.1004 190.2 52.7004 190.1 53.5004ZM188.3 50.9004C188.5 50.2004 188.6 49.7004 188.8 49.4004C188.8 49.8004 188.9 50.3004 188.8 51.1004C188.7 52.8004 188.4 54.5004 188 56.2004C187.8 55.9004 187.6 55.6004 187.4 55.3004C187.5 54.7004 187.5 54.1004 187.6 53.5004C187.8 52.7004 188 51.8004 188.3 50.9004ZM182.5 55.4004C182.3 54.2004 182.2 53.5004 182.2 53.1004C182.4 53.4004 182.9 54.0004 183.5 55.1004C183.6 55.3004 183.7 55.5004 183.8 55.7004V55.8004C184.9 58.3004 185.5 62.9004 185.5 62.9004C185.5 63.2004 185.8 63.4004 186.1 63.3004C186.4 63.3004 186.6 63.0004 186.5 62.7004C186.5 62.5004 185.9 58.1004 184.8 55.4004C185.2 54.0004 185.6 52.6004 185.8 51.2004C186 50.3004 186.1 49.8004 186.2 49.5004C186.3 49.8004 186.4 50.4004 186.5 51.4004C186.5 52.0004 186.5 52.7004 186.5 53.3004C186.5 53.6004 186.4 53.8004 186.4 54.1004C186.2 54.0004 185.9 54.0004 185.8 54.1004C185.6 54.3004 185.6 54.6004 185.8 54.8004C186.6 55.6004 187.2 56.5004 187.7 57.5004C187.7 57.6004 187.7 57.6004 187.8 57.7004C188.2 58.7004 188.5 59.7004 188.7 60.8004C188.7 61.1004 188.9 61.2004 189.2 61.2004C189.2 61.2004 189.2 61.2004 189.3 61.2004C189.4 61.2004 189.5 61.1004 189.6 61.0004C188.6 63.5004 187.2 65.9004 186.5 67.1004C185.1 65.3004 183.3 63.8004 181.2 62.9004C181.7 61.8004 183.1 58.3004 182.5 55.4004ZM166.1 81.6004L166.4 83.6004C166.5 84.2004 166.3 84.8004 166 85.2004C165.8 85.4004 165.6 85.6004 165.4 85.8004C165.2 86.0004 164.9 86.0004 164.6 86.1004L161.6 86.5004C161.3 86.5004 161 86.5004 160.8 86.5004C160.4 86.4004 160 86.2004 159.7 85.8004C159.4 85.5004 159.2 85.1004 159.2 84.7004L158.9 82.7004C158.9 82.4004 158.9 82.1004 158.9 81.8004C159 81.4004 159.2 81.0004 159.5 80.7004C159.7 80.6004 159.8 80.4004 160 80.3004C160.2 80.2004 160.4 80.2004 160.6 80.1004L162.8 79.8004C162.9 79.8004 162.9 79.8004 163 79.8004L163.5 79.7004C163.6 79.7004 163.7 79.7004 163.8 79.7004C164.3 79.7004 164.7 79.8004 165.1 80.1004C165.7 80.5004 166 81.1004 166.1 81.6004ZM153.4 82.5004C153.2 80.3004 154.3 78.7004 155.5 78.4004C156.4 78.2004 157.2 78.6004 157.9 79.6004L156.5 79.8004C155.9 79.9004 155.3 80.2004 154.8 80.6004C154.3 81.0004 154 81.6004 153.9 82.2004C153.9 82.3004 153.9 82.4004 153.9 82.4004L153.4 82.5004ZM150.5 82.9004C150.6 82.9004 150.7 82.9004 150.8 82.9004H150.5C150.4 82.9004 150.4 82.9004 150.5 82.9004ZM154.8 82.9004V82.8004C154.8 82.7004 154.8 82.6004 154.8 82.5004C154.9 82.1004 155.1 81.7004 155.5 81.4004C155.8 81.1004 156.2 80.9004 156.6 80.9004L158.4 80.6004C158.2 80.9004 158 81.3004 157.9 81.7004C157.8 82.1004 157.8 82.5004 157.8 82.9004L158.1 84.9004C158.2 85.5004 158.5 86.1004 158.9 86.6004C159 86.7004 159.2 86.9004 159.3 87.0004L157.5 87.3004C156.9 87.4004 156.3 87.2004 155.9 86.9004C155.6 86.7004 155.4 86.4004 155.2 86.0004V85.9004L154.8 82.9004ZM147.6 84.3004L151.9 83.7004C152.3 84.0004 152.7 84.1004 153 83.9004C153.2 83.8004 153.3 83.7004 153.4 83.5004L153.8 83.4004L154.1 85.3004L149.3 85.9004L147.6 84.3004ZM151.8 86.7004L154.3 86.4004C154.5 86.9004 154.8 87.3004 155.3 87.6004C155.9 88.0004 156.5 88.2004 157.2 88.2004C157.4 88.2004 157.5 88.2004 157.7 88.2004L159.5 87.9004C159.4 89.3004 158.9 90.2004 158.2 90.6004C156.7 91.5004 154.2 90.0004 154.2 90.0004C154.2 90.0004 154.1 90.0004 154.1 89.9004H154C154 89.9004 154 89.9004 153.9 89.9004C153.9 89.9004 153.9 89.9004 153.8 89.9004C153.8 89.9004 153.7 89.9004 153.7 90.0004C153.7 90.0004 153.7 90.0004 153.6 90.1004C153.6 90.1004 153.6 90.1004 153.5 90.2004V90.3004C153.5 90.3004 153.5 90.3004 153.5 90.4004V90.6004C153.5 90.6004 153.5 90.6004 153.5 90.7004C153.5 90.7004 153.5 90.8004 153.6 90.8004L155.5 93.2004V93.3004C155.1 93.3004 154.7 93.3004 154.3 93.2004C153.8 93.1004 153.3 92.8004 152.8 92.5004C152.4 92.2004 152.1 91.9004 151.7 91.6004C152.4 91.0004 152.4 89.4004 151.8 86.7004ZM152.1 93.2004C152.6 93.6004 153.3 94.0004 153.9 94.1004C154.3 94.2004 154.6 94.2004 155 94.2004C155.3 94.2004 155.7 94.2004 156 94.1004C156.3 94.0004 156.4 93.8004 156.4 93.5004C156.3 92.9004 156.3 92.3004 156.4 91.7004C156.6 91.7004 156.8 91.7004 157 91.7004C157.6 91.7004 158.1 91.6004 158.7 91.3004C159.8 90.7004 160.4 89.4004 160.5 87.6004L161.7 87.4004L164.7 87.0004C165.1 86.9004 165.5 86.8004 165.9 86.6004C166.3 86.4004 166.6 86.1004 166.8 85.8004C167.3 85.1004 167.5 84.3004 167.4 83.4004L167.1 81.4004C167 81.0004 166.9 80.6004 166.7 80.2004C171.4 74.9004 175.8 69.3004 179.8 63.5004C179.9 63.5004 180 63.6004 180.1 63.6004C180.1 63.6004 180.1 63.6004 180.2 63.6004C182.8 64.7004 185 66.5004 186.4 68.9004C176.8 84.3004 164.1 96.9004 158 102.5C158.3 99.3004 156.9 95.8004 156.9 95.7004C156.8 95.5004 156.5 95.3004 156.3 95.4004C156 95.5004 155.9 95.8004 156 96.0004C156 96.1004 159.8 109.6 135.1 124C135.9 120.7 134.4 114.2 132.6 109.2C132.6 109.1 132.6 109 132.5 109C132.2 108.3 132 107.6 131.7 107C130.8 104.8 129.1 101.4 127.1 98.3004C127.1 98.1004 127 98.0004 126.9 98.0004C125.6 96.0004 124.1 94.3004 122.8 93.2004H128.2L135.7 100.4C135.8 100.5 135.9 100.5 136 100.5C136.1 100.5 136.2 100.5 136.3 100.4C136.5 100.2 136.5 100 136.4 99.7004L114.5 65.6004C114.6 65.6004 114.7 65.6004 114.8 65.6004C114.9 65.6004 115 65.6004 115.1 65.6004C118.9 65.6004 124.8 62.0004 126.4 58.8004C126.4 58.7004 126.5 58.6004 126.5 58.6004C131.9 68.1004 143.7 87.1004 152.1 93.2004ZM93.1998 115.3C91.3998 115.6 89.4998 115.2 87.8998 114.3C86.2998 113.4 85.0998 111.9 84.4998 110.2L70.9998 73.7004C71.8998 73.5004 72.8998 73.3004 73.8998 73.1004H73.9998C74.5998 73.0004 75.0998 73.0004 75.6998 72.9004L90.2998 104.2L90.4998 104.6C90.5998 104.8 90.7998 104.9 90.9998 104.9L118.2 100.3L126.2 99.0004C128.1 101.9 129.8 105.2 130.7 107.4C130.9 107.9 131.1 108.4 131.3 108.9L93.1998 115.3ZM68.7998 73.4004C68.7998 73.4004 68.6998 73.4004 68.6998 73.5004C68.1998 73.7004 67.6998 73.9004 67.0998 74.1004C66.8998 74.2004 66.6998 74.3004 66.4998 74.4004C65.9998 74.6004 65.4998 74.9004 64.9998 75.1004C64.8998 75.2004 64.7998 75.2004 64.6998 75.3004C64.3998 75.4004 64.1998 75.6004 63.8998 75.7004C63.3998 74.4004 62.0998 71.7004 60.6998 68.8004C58.5998 64.3004 54.9998 56.9004 55.1998 56.0004C55.2998 55.9004 55.2998 55.8004 55.3998 55.8004H55.4998C56.4998 55.8004 58.7998 58.0004 60.8998 59.9004C63.1998 62.0004 65.7998 64.4004 67.8998 65.4004C71.2998 67.0004 71.9998 69.0004 72.6998 71.0004C72.8998 71.4004 72.9998 71.9004 73.1998 72.3004C72.1998 72.5004 71.1998 72.7004 70.1998 72.9004C69.7998 73.0004 69.3998 73.1004 68.9998 73.3004C68.8998 73.3004 68.7998 73.3004 68.7998 73.4004ZM113.4 39.6004C113.2 38.2004 113.3 37.4004 113.4 37.1004C113.6 37.3004 114 37.9004 114.4 39.3004C114.5 39.8004 116.4 45.6004 116.9 47.1004C116.3 47.4004 115.7 47.7004 115.1 48.0004C115 47.7004 114.8 47.4004 114.7 47.1004C114.5 46.6004 114 42.8004 113.4 39.6004ZM110.2 39.5004C110.4 39.7004 110.7 40.3004 111.2 41.6004C112.1 44.0004 113.1 46.4004 114.2 48.7004C113.7 49.1004 113.2 49.5004 112.8 49.9004C112.5 49.4004 112.2 49.0004 111.9 48.5004C111.2 46.4004 110.7 44.2004 110.3 42.0004C110 40.6004 110.1 39.8004 110.2 39.5004ZM108.8 48.0004C108.6 47.3004 108.3 46.5004 108.1 45.5004C107.7 44.1004 107.7 43.3004 107.8 42.9004C108 43.1004 108.4 43.6004 108.9 44.9004C109.8 46.9004 110.8 48.8004 112.1 50.6004C111.6 51.2004 111 51.8004 110.5 52.5004C110.3 52.7004 110.4 53.0004 110.6 53.2004C110.7 53.3004 110.8 53.3004 110.9 53.3004C111 53.3004 111.2 53.2004 111.3 53.1004C113.5 50.3004 115.4 48.5004 118.8 47.4004C119.1 47.3004 119.2 47.0004 119.1 46.8004C119 46.5004 118.7 46.4004 118.5 46.5004C118.2 46.6004 118 46.7004 117.8 46.8004C117.8 46.7004 117.7 46.6004 117.7 46.4004C117.7 46.2004 117.7 44.0004 117.7 40.7004C117.7 39.3004 117.9 38.5004 118.1 38.3004C118.3 38.6004 118.5 39.2004 118.7 40.6004C118.8 41.1004 119.5 45.6004 119.7 47.0004C119.7 47.1004 119.8 47.7004 120 48.4004C119.8 48.2004 119.5 48.2004 119.3 48.4004C118 49.7004 117 51.2004 116.4 53.0004C115.7 54.7004 115.5 56.5004 115.6 58.4004C115.6 58.7004 115.8 58.9004 116.1 58.9004C116.4 58.9004 116.6 58.7004 116.6 58.4004C116.5 56.7004 116.8 55.0004 117.4 53.4004C118 51.8004 118.9 50.4004 120.1 49.2004C120.2 49.1004 120.2 49.0004 120.2 48.9004C120.5 49.6004 121 50.3004 121.6 50.2004C122.5 50.1004 123.6 49.3004 124.8 48.4004C125.7 47.7004 127.3 46.6004 127.7 46.9004C127.7 46.9004 128.1 47.7004 124.6 51.9004C124.1 52.5004 123.8 53.3004 123.7 54.1004C123.6 54.9004 123.8 55.7004 124.1 56.4004V56.5004C124.9 58.1004 125.2 58.8004 125.4 59.1004C123.9 61.9004 118.4 65.1004 115.2 65.1004C113.6 62.6004 111.5 56.8004 110.8 54.4004C110 52.1004 109.4 50.0004 108.8 48.0004ZM93.7998 89.2004C93.6998 94.0004 92.5998 98.6004 90.7998 103L82.8998 86.0004C86.1998 83.7004 89.4998 81.2004 92.5998 78.7004C93.4998 82.1004 93.8998 85.6004 93.7998 89.2004ZM106.5 59.8004C108.1 62.5004 102.9 69.0004 93.1998 77.0004C92.8998 75.9004 92.4998 74.9004 92.0998 73.9004C90.3998 69.8004 88.0998 66.0004 85.1998 62.7004C96.9998 58.2004 105 57.2004 106.5 59.8004ZM20.6998 76.5004C22.2998 71.6004 24.7998 67.2004 28.1998 63.3004C31.5998 59.4004 35.6998 56.4004 40.2998 54.2004C44.9998 52.0004 49.9998 50.8004 55.0998 50.7004C60.1998 50.5004 65.2998 51.4004 70.0998 53.3004C74.8998 55.2004 79.1998 58.0004 82.7998 61.6004C83.1998 62.0004 83.4998 62.3004 83.8998 62.7004C83.8998 62.8004 83.9998 62.9004 84.0998 62.9004C87.0998 66.2004 89.4998 70.0004 91.1998 74.2004C91.6998 75.3004 91.9998 76.5004 92.3998 77.6004C89.4998 80.0004 86.1998 82.5004 82.4998 85.0004L76.4998 72.2004C76.3998 72.1004 76.1998 72.0004 75.9998 72.0004C75.3998 72.0004 74.7998 72.1004 74.1998 72.1004C73.9998 71.6004 73.7998 71.2004 73.5998 70.6004C72.8998 68.5004 72.0998 66.1004 68.1998 64.4004C66.1998 63.5004 63.6998 61.2004 61.3998 59.1004C58.2998 56.3004 56.2998 54.5004 54.9998 54.8004C54.5998 54.9004 54.2998 55.1004 54.0998 55.5004C53.5998 56.4004 55.1998 59.9004 59.6998 69.2004C61.1998 72.2004 62.4998 75.1004 62.9998 76.2004C62.3998 76.6004 61.8998 77.0004 61.3998 77.4004C61.1998 77.5004 61.1998 77.7004 61.1998 77.9004C63.0998 84.3004 64.7998 90.0004 66.4998 95.3004C60.7998 98.7004 55.0998 101.9 49.8998 104.6C48.5998 104.5 47.3998 104.5 46.1998 104.9C44.0998 105.4 40.6998 105.1 37.7998 104.9C33.6998 104.6 31.0998 104.4 30.0998 105.4C29.7998 105.7 29.6998 106 29.6998 106.5C29.6998 107.4 31.4998 108.6 36.6998 111.1C34.0998 112.2 31.5998 113.3 29.2998 114.2C28.3998 113.3 27.4998 112.3 26.7998 111.3C23.9998 107.8 21.8998 103.7 20.5998 99.4004C20.5998 99.3004 20.5998 99.2004 20.4998 99.2004C19.9998 97.7004 19.6998 96.2004 19.3998 94.7004C18.2998 88.6004 18.7998 82.3004 20.6998 76.5004ZM55.6998 107.3C55.1998 107.1 54.7998 106.8 54.2998 106.5C53.4998 106 52.5998 105.4 51.3998 105C56.2998 102.4 61.5998 99.5004 66.7998 96.3004C68.6998 102.3 70.4998 107.8 72.3998 113.2L57.0998 106.2C56.8998 106.1 56.6998 106.2 56.4998 106.3C56.2998 106.7 55.9998 107 55.6998 107.3ZM53.6998 109.7C53.5998 109.9 53.4998 110 53.2998 110.2C52.8998 110.7 52.5998 111.3 52.1998 111.9C52.1998 111.9 52.1998 112 52.0998 112C51.2998 113.3 50.6998 114.8 50.1998 116.2C49.3998 115.8 47.8998 115.1 45.2998 113.9C40.6998 111.8 31.0998 107.6 30.5998 106.4C30.5998 106.3 30.5998 106.2 30.6998 106.1C31.0998 105.8 31.9998 105.6 33.1998 105.6C34.4998 105.6 36.0998 105.7 37.5998 105.9C40.7998 106.2 43.9998 106.4 46.2998 105.9C47.4998 105.6 48.5998 105.5 49.7998 105.7C51.3998 105.9 52.4998 106.7 53.5998 107.4C53.9998 107.7 54.3998 107.9 54.7998 108.1C54.6998 108.2 54.5998 108.3 54.4998 108.4C54.3998 108.8 54.0998 109.2 53.6998 109.7ZM6.19984 117.6C4.69984 115 9.89984 108.3 19.7998 100.2C21.1998 104.4 23.2998 108.3 25.9998 111.8C26.6998 112.7 27.4998 113.6 28.2998 114.5C16.1998 119.1 7.79984 120.4 6.19984 117.6ZM41.0998 122.4C36.9998 120.6 33.2998 118 30.0998 114.9C32.5998 113.9 35.1998 112.8 37.8998 111.6C39.7998 112.5 42.0998 113.6 44.9998 114.8C47.0998 115.7 49.2998 116.7 49.9998 117.1C49.7998 117.8 49.5998 118.5 49.4998 119.2C49.4998 119.4 49.4998 119.6 49.6998 119.7C52.2998 121.7 54.8998 123.7 57.5998 125.6C51.8998 125.8 46.1998 124.7 41.0998 122.4ZM97.7998 143.5C96.1998 144.2 94.4998 144.5 92.7998 144.4C91.0998 144.3 89.3998 143.9 87.8998 143.1C74.7998 136.2 62.1998 128.2 50.4998 119.1C50.6998 118.4 50.7998 117.8 50.9998 117.1C50.9998 117.1 50.9998 117.1 50.9998 117C51.3998 115.8 51.7998 114.7 52.3998 113.6C52.3998 113.5 52.4998 113.4 52.4998 113.4C52.6998 113.1 52.7998 112.8 52.9998 112.5C53.0998 112.3 53.1998 112.1 53.2998 112C53.4998 111.7 53.6998 111.3 53.8998 111C54.0998 110.7 54.2998 110.4 54.4998 110.1C54.5998 110 54.6998 109.8 54.7998 109.7C54.9998 109.4 55.2998 109.1 55.4998 108.8C55.5998 108.7 55.6998 108.6 55.7998 108.5C56.1998 108.1 56.4998 107.7 56.8998 107.4L72.7998 114.6C73.7998 117.3 74.6998 120.1 75.6998 122.9C76.5998 125.5 78.3998 127.7 80.6998 129.2C82.6998 130.5 85.0998 131.2 87.4998 131.2C87.8998 131.2 88.1998 131.2 88.5998 131.2C103.8 129.8 115.8 127.6 126.5 124.2C126.8 124.1 126.9 123.8 126.8 123.6C126.7 123.3 126.4 123.2 126.2 123.3C115.6 126.6 103.6 128.8 88.4998 130.2C85.9998 130.4 83.3998 129.8 81.2998 128.4C79.1998 127 77.4998 125 76.6998 122.6C73.4998 113.7 70.6998 105.4 67.5998 95.7004C67.5998 95.6004 67.5998 95.5004 67.4998 95.5004C65.9998 90.1004 64.1998 84.4004 62.3998 78.0004C63.2998 77.2004 64.2998 76.6004 65.3998 76.0004C65.5998 75.9004 65.7998 75.8004 65.9998 75.7004C66.2998 75.5004 66.5998 75.4004 66.8998 75.2004C67.0998 75.1004 67.2998 75.0004 67.4998 74.9004C67.9998 74.7004 68.4998 74.5004 68.9998 74.3004C69.0998 74.2004 69.2998 74.2004 69.3998 74.2004C69.5998 74.1004 69.8998 74.1004 70.0998 74.0004L83.5998 110.5C84.2998 112.4 85.6998 114.1 87.4998 115.1C88.8998 115.9 90.3998 116.3 91.9998 116.3C92.4998 116.3 92.8998 116.3 93.3998 116.2L131.7 110C133.6 115.1 134.5 120.3 134.2 123.2C122.9 131.3 110.6 138.1 97.7998 143.5Z"
        fill="currentColor"
      />
      <path
        d="M61.3998 147.8L58.7998 148.3C58.3998 148.4 57.9998 148.3 57.6998 148.2C57.2998 148 56.9998 147.8 56.7998 147.4C56.6998 147.2 56.5998 147 56.4998 146.7L55.9998 144C55.9998 143.7 55.6998 143.5 55.3998 143.6C55.0998 143.6 54.8998 143.9 54.9998 144.2L55.4998 146.8C55.4998 147 55.4998 147.3 55.4998 147.5C55.3998 147.8 55.2998 148 55.1998 148.2C54.9998 148.4 54.8998 148.6 54.5998 148.7C54.3998 148.8 54.0998 148.9 53.8998 149L51.2998 149.5C50.9998 149.5 50.7998 149.8 50.8998 150.1C50.8998 150.3 51.1998 150.5 51.3998 150.5H51.4998L54.0998 150C54.3998 150 54.5998 150 54.8998 150C55.1998 150.1 55.3998 150.2 55.5998 150.3C55.7998 150.5 55.9998 150.6 56.0998 150.9C56.1998 151.1 56.2998 151.4 56.3998 151.6L56.7998 154.2C56.7998 154.4 57.0998 154.6 57.2998 154.6H57.3998C57.6998 154.6 57.8998 154.3 57.7998 154L57.2998 151.4C57.2998 151.2 57.2998 150.9 57.2998 150.7C57.3998 150.4 57.4998 150.2 57.5998 150C57.7998 149.8 57.8998 149.6 58.1998 149.5C58.3998 149.4 58.5998 149.3 58.8998 149.2L61.4998 148.7C61.7998 148.7 61.9998 148.4 61.8998 148.1C61.8998 147.9 61.5998 147.7 61.3998 147.8ZM55.9998 149.6C55.7998 149.5 55.6998 149.4 55.4998 149.3C55.5998 149.2 55.7998 149 55.8998 148.9C55.9998 148.7 56.0998 148.6 56.1998 148.4C56.4998 148.7 56.7998 148.9 57.1998 149.1C57.0998 149.2 56.8998 149.4 56.7998 149.5C56.6998 149.7 56.5998 149.8 56.4998 150C56.3998 149.8 56.1998 149.7 55.9998 149.6Z"
        fill="currentColor"
      />
      <path
        d="M90.2998 36.6004L92.1998 36.3004C92.3998 36.3004 92.4998 36.3004 92.6998 36.3004C92.8998 36.3004 92.9998 36.4004 93.1998 36.5004C93.2998 36.6004 93.4998 36.7004 93.4998 36.9004C93.5998 37.0004 93.5998 37.2004 93.6998 37.3004L93.9998 39.1004C93.9998 39.3004 94.2998 39.5004 94.4998 39.5004H94.5998C94.8998 39.5004 95.0998 39.2004 94.9998 38.9004L94.6998 37.0004C94.6998 36.8004 94.6998 36.7004 94.6998 36.5004C94.6998 36.3004 94.7998 36.2004 94.8998 36.0004C94.9998 35.9004 95.0998 35.7004 95.2998 35.7004C95.3998 35.6004 95.5998 35.6004 95.7998 35.5004L97.6998 35.2004C97.9998 35.2004 98.1998 34.9004 98.0998 34.6004C98.0998 34.3004 97.7998 34.1004 97.4998 34.2004L95.5998 34.5004C95.3998 34.5004 95.2998 34.5004 95.0998 34.5004C94.8998 34.5004 94.7998 34.4004 94.5998 34.3004C94.4998 34.2004 94.2998 34.1004 94.2998 33.9004C94.1998 33.8004 94.1998 33.6004 94.0998 33.4004L93.7998 31.6004C93.7998 31.3004 93.4998 31.1004 93.1998 31.2004C92.8998 31.2004 92.6998 31.5004 92.7998 31.8004L93.0998 33.6004C93.0998 33.8004 93.0998 33.9004 93.0998 34.1004C93.0998 34.3004 92.9998 34.4004 92.8998 34.6004C92.7998 34.7004 92.6998 34.9004 92.4998 34.9004C92.3998 35.0004 92.1998 35.0004 91.9998 35.1004L90.1998 35.4004C89.8998 35.4004 89.6998 35.7004 89.7998 36.0004C89.7998 36.5004 89.9998 36.6004 90.2998 36.6004ZM94.1998 35.5004C94.0998 35.6004 94.0998 35.6004 93.9998 35.7004C93.9998 35.8004 93.8998 35.8004 93.8998 35.9004C93.7998 35.8004 93.7998 35.8004 93.6998 35.8004C93.5998 35.8004 93.5998 35.7004 93.4998 35.7004C93.5998 35.6004 93.5998 35.6004 93.6998 35.5004C93.6998 35.4004 93.7998 35.4004 93.7998 35.3004C93.8998 35.4004 93.8998 35.4004 93.9998 35.4004C94.0998 35.4004 94.0998 35.4004 94.1998 35.5004Z"
        fill="currentColor"
      />
      <path
        d="M194.4 90.3004L189.8 91.1004C189.3 91.2004 188.8 91.2004 188.3 91.1004C187.8 91.0004 187.3 90.8004 186.9 90.5004C186.5 90.2004 186.1 89.8004 185.9 89.4004C185.6 89.0004 185.4 88.5004 185.4 88.0004L184.6 83.4004C184.6 83.1004 184.3 82.9004 184 83.0004C183.7 83.0004 183.5 83.3004 183.6 83.6004L184.4 88.2004C184.6 89.2004 184.3 90.2004 183.8 91.1004C183.2 91.9004 182.3 92.5004 181.3 92.7004L176.7 93.5004C176.4 93.5004 176.2 93.8004 176.3 94.1004C176.3 94.3004 176.6 94.5004 176.8 94.5004H176.9L181.5 93.7004C182 93.6004 182.5 93.6004 183 93.7004C183.5 93.8004 184 94.0004 184.4 94.3004C184.8 94.6004 185.2 95.0004 185.4 95.4004C185.7 95.8004 185.9 96.3004 185.9 96.8004L186.7 101.3C186.7 101.5 187 101.7 187.2 101.7H187.3C187.6 101.7 187.8 101.4 187.7 101.1L186.9 96.5004C186.7 95.5004 187 94.5004 187.5 93.6004C188.1 92.8004 189 92.2004 190 92.0004L194.6 91.2004C194.9 91.2004 195.1 90.9004 195 90.6004C195 90.4004 194.7 90.3004 194.4 90.3004ZM186.7 93.1004C186.4 93.5004 186.2 94.0004 186 94.5004C185.7 94.1004 185.3 93.7004 184.9 93.4004C184.5 93.1004 184 92.9004 183.5 92.7004C183.9 92.4004 184.3 92.0004 184.6 91.6004C184.9 91.2004 185.1 90.7004 185.3 90.2004C185.6 90.6004 186 91.0004 186.4 91.3004C186.8 91.6004 187.3 91.8004 187.8 92.0004C187.4 92.3004 187 92.7004 186.7 93.1004Z"
        fill="currentColor"
      />
      <path
        d="M166.1 137.2C165.9 136.4 165.6 135.7 165.1 135.1C164.6 134.5 163.9 134 163.2 133.7C162.5 133.4 161.6 133.3 160.8 133.3C160 133.4 159.2 133.7 158.6 134.1C157.9 134.5 157.4 135.2 157 135.9C156.6 136.6 156.4 137.4 156.4 138.2C156.4 138.7 156.5 139.1 156.6 139.6L126 152.1C125.7 152.2 125.6 152.5 125.7 152.8C125.8 153 126 153.1 126.2 153.1C126.3 153.1 126.3 153.1 126.4 153.1L154.6 141.5L117.6 162.9C117.4 163 117.3 163.3 117.4 163.6C117.5 163.9 117.8 163.9 118.1 163.8L155.1 142.4L108.1 178.9C107.9 179.1 107.8 179.4 108 179.6C108.1 179.7 108.2 179.8 108.4 179.8C108.5 179.8 108.6 179.8 108.7 179.7L157.7 141.6C157.9 141.9 158.2 142.1 158.5 142.3C159.3 142.8 160.2 143.1 161.2 143.1C162.2 143.1 163.1 142.8 163.9 142.3C164.7 141.8 165.3 141 165.7 140.1C166.1 139.2 166.2 138.2 166.1 137.2ZM164.8 139.7C164.5 140.4 164 141 163.4 141.4C162.8 141.8 162 142.1 161.2 142.1C160.4 142.1 159.7 141.9 159 141.4C158.8 141.3 158.6 141.1 158.4 140.9L161.4 138.5C161.4 138.5 161.4 138.5 161.5 138.4C161.5 138.4 161.5 138.3 161.6 138.3V137.9C161.6 137.9 161.6 137.9 161.5 137.8C161.5 137.8 161.4 137.8 161.4 137.7C161.4 137.7 161.4 137.7 161.3 137.7H161C161 137.7 161 137.7 160.9 137.7L157.3 139.2C157.2 138.9 157.2 138.5 157.2 138.2C157.2 137.6 157.4 136.9 157.7 136.4C158 135.8 158.4 135.4 159 135C159.5 134.6 160.1 134.4 160.8 134.4C160.9 134.4 161.1 134.4 161.2 134.4C161.7 134.4 162.2 134.5 162.7 134.7C163.3 134.9 163.8 135.3 164.2 135.8C164.6 136.3 164.9 136.9 165 137.5C165.2 138.2 165.1 139 164.8 139.7Z"
        fill="currentColor"
      />
      <path
        d="M167.4 36.4004C167.5 37.6004 167.9 38.8004 168.6 39.8004C169.2 40.8004 170.1 41.7004 171.1 42.4004C172.1 43.1004 173.3 43.5004 174.5 43.7004C174.9 43.7004 175.2 43.8004 175.6 43.8004C176.5 43.8004 177.3 43.7004 178.1 43.4004C179.3 43.0004 180.3 42.4004 181.2 41.6004C182.1 40.8004 182.8 39.7004 183.2 38.6004C183.7 37.5004 183.8 36.2004 183.8 35.0004C183.7 32.8004 182.7 30.8004 181 29.3004C180.2 28.6004 179.2 28.0004 178.2 27.7004C177.2 27.4004 176.1 27.2004 175 27.3004C173.4 27.4004 171.8 28.0004 170.5 29.0004C169.2 30.0004 168.2 31.3004 167.7 32.9004C167.4 34.0004 167.3 35.2004 167.4 36.4004ZM168.7 33.2004C169.2 31.8004 170 30.6004 171.2 29.8004C172.3 28.9004 173.7 28.4004 175.2 28.3004C175.4 28.3004 175.5 28.3004 175.7 28.3004C176.5 28.3004 177.3 28.4004 178 28.7004C178.9 29.0004 179.7 29.5004 180.5 30.1004C182 31.4004 182.8 33.2004 182.9 35.1004C183 36.2004 182.8 37.3004 182.4 38.2004C182 39.2004 181.4 40.1004 180.6 40.8004C179.8 41.5004 178.9 42.1004 177.8 42.4004C176.8 42.7004 175.7 42.8004 174.6 42.7004C173.5 42.6004 172.5 42.2004 171.6 41.6004C170.7 41.0004 169.9 40.2004 169.4 39.3004C168.8 38.4004 168.5 37.3004 168.4 36.3004C168.3 35.3004 168.4 34.2004 168.7 33.2004Z"
        fill="currentColor"
      />
      <path
        d="M175.1 34.2004C175.5 34.6004 175.9 35.0004 176.5 35.1004C176.8 35.2004 177 35.2004 177.3 35.2004C177.8 35.2004 178.2 35.1004 178.7 34.9004C179.4 34.5004 179.9 33.9004 180.1 33.2004C180.3 32.7004 180.3 32.1004 180.1 31.5004C179.9 31.0004 179.6 30.5004 179.2 30.1004C178.8 29.7004 178.2 29.5004 177.7 29.5004C177.1 29.4004 176.6 29.6004 176.1 29.8004C175.6 30.1004 175.2 30.5004 174.9 31.0004C174.6 31.5004 174.5 32.1004 174.6 32.6004C174.5 33.2004 174.7 33.7004 175.1 34.2004ZM175.7 31.5004C175.9 31.2004 176.1 30.9004 176.5 30.7004C176.8 30.5004 177.2 30.4004 177.6 30.5004C178 30.5004 178.3 30.7004 178.6 30.9004C178.9 31.1004 179.1 31.4004 179.2 31.8004C179.3 32.2004 179.3 32.5004 179.2 32.9004C179.1 33.4004 178.7 33.8004 178.3 34.0004C177.9 34.2004 177.4 34.3004 176.9 34.1004C176.5 34.0004 176.2 33.8004 176 33.5004C175.8 33.2004 175.6 32.9004 175.6 32.5004C175.6 32.1004 175.5 31.8004 175.7 31.5004Z"
        fill="currentColor"
      />
      <path
        d="M178.5 37.8004C178.3 37.7004 178.1 37.7004 178 37.7004C177.8 37.7004 177.6 37.8004 177.5 37.9004C177.3 38.0004 177.2 38.1004 177.1 38.3004C177 38.4004 176.9 38.6004 176.8 38.8004C176.7 39.0004 176.7 39.2004 176.8 39.3004C176.9 39.4004 176.9 39.7004 177 39.8004C177.1 40.0004 177.2 40.1004 177.4 40.2004C177.5 40.3004 177.7 40.4004 177.9 40.4004C178 40.4004 178.2 40.5004 178.3 40.5004C178.5 40.5004 178.8 40.4004 179 40.3004C179.3 40.1004 179.6 39.8004 179.7 39.5004C179.8 39.1004 179.8 38.8004 179.6 38.4004C179.2 38.2004 178.9 37.9004 178.5 37.8004ZM178.5 39.3004C178.5 39.4004 178.4 39.5004 178.3 39.5004C178.2 39.5004 178.1 39.6004 178 39.5004C177.9 39.5004 177.9 39.5004 177.9 39.4004L177.8 39.3004V39.2004C177.8 39.1004 177.8 39.1004 177.8 39.0004C177.8 38.9004 177.8 38.9004 177.9 38.9004L178 38.8004H178.2C178.3 38.8004 178.4 38.9004 178.4 39.0004C178.5 39.0004 178.5 39.1004 178.5 39.3004Z"
        fill="currentColor"
      />
      <path
        d="M171.4 39.6004C171.6 39.7004 171.8 39.7004 172 39.7004C172.1 39.7004 172.1 39.7004 172.2 39.7004C172.8 39.6004 173.3 39.4004 173.6 38.9004C173.9 38.5004 174.1 38.1004 174.1 37.6004C174.1 37.1004 174 36.7004 173.7 36.3004C173.4 35.9004 173.1 35.6004 172.6 35.5004C172.2 35.3004 171.7 35.3004 171.3 35.5004C170.9 35.6004 170.5 35.9004 170.2 36.3004C169.9 36.7004 169.8 37.1004 169.8 37.6004C169.8 38.1004 169.9 38.5004 170.2 38.9004C170.6 39.2004 170.9 39.5004 171.4 39.6004ZM171.1 36.9004C171.2 36.7004 171.5 36.6004 171.7 36.5004C171.8 36.5004 171.9 36.5004 172 36.5004C172.1 36.5004 172.3 36.5004 172.4 36.6004C172.6 36.7004 172.8 36.8004 173 37.0004C173.1 37.2004 173.2 37.4004 173.2 37.7004C173.2 37.9004 173.1 38.2004 172.9 38.4004C172.7 38.6004 172.4 38.8004 172.1 38.8004C172 38.8004 171.8 38.8004 171.7 38.8004C171.5 38.7004 171.3 38.6004 171.1 38.4004C171 38.2004 170.9 38.0004 170.9 37.7004C170.9 37.4004 170.9 37.1004 171.1 36.9004Z"
        fill="currentColor"
      />
    </svg>
  </SvgIcon>
)

export default VirtualRealityImage
