import { FC } from 'react'

import { SvgIcon, SvgIconProps } from '@mui/material'

const VideoConferenceImage: FC<SvgIconProps> = ({ sx, ...props }) => (
  <SvgIcon sx={{ fontSize: 200, color: 'primary.dark', ...sx }} {...props}>
    <svg
      width="200"
      height="200"
      viewBox="0 0 200 200"
      fill="none"
      xmlns="http://www.w3.org/2000/svg"
    >
      <path
        d="M67.2999 72.9996C67.4999 73.0996 67.6999 73.1996 67.8999 73.1996C68.0999 73.1996 68.2999 73.1996 68.4999 73.0996C68.6999 72.9996 68.7999 72.7996 68.8999 72.6996C68.9999 72.4996 68.9999 72.2996 68.9999 72.0996C68.9999 71.9996 68.8999 71.7996 68.8999 71.6996C68.8999 71.5996 68.6999 71.4996 68.5999 71.3996C68.4999 71.2996 68.3999 71.1996 68.1999 71.1996C68.0999 71.1996 67.8999 71.1996 67.7999 71.1996C67.5999 71.1996 67.3999 71.2996 67.1999 71.3996C66.9999 71.4996 66.8999 71.6996 66.8999 71.8996C66.7999 72.0996 66.7999 72.2996 66.8999 72.4996C66.9999 72.6996 67.0999 72.8996 67.2999 72.9996Z"
        fill="currentColor"
      />
      <path
        d="M60.2999 79.8996C60.1999 79.8996 59.9999 79.8996 59.8999 79.9996C59.7999 80.0996 59.6999 80.1996 59.5999 80.2996C59.4999 80.3996 59.3999 80.4996 59.3999 80.6996C59.3999 80.7996 59.2999 80.9996 59.3999 81.0996C59.3999 81.1996 59.4999 81.3996 59.4999 81.4996C59.5999 81.5996 59.6999 81.6996 59.7999 81.7996C59.8999 81.8996 59.9999 81.9996 60.1999 81.9996C60.2999 81.9996 60.4999 81.9996 60.5999 81.9996C60.8999 81.9996 61.0999 81.7996 61.2999 81.5996C61.4999 81.3996 61.4999 81.0996 61.4999 80.7996C61.4999 80.4996 61.2999 80.2996 61.0999 80.0996C60.7999 79.9996 60.5999 79.8996 60.2999 79.8996Z"
        fill="currentColor"
      />
      <path
        d="M65.8999 92.4996C65.8999 92.1996 65.6999 91.9996 65.4999 91.7996C65.2999 91.5996 64.9999 91.4996 64.6999 91.5996C64.5999 91.5996 64.3999 91.5996 64.2999 91.6996C64.1999 91.7996 64.0999 91.8996 63.9999 91.9996C63.8999 92.0996 63.7999 92.1996 63.7999 92.3996C63.7999 92.4996 63.6999 92.6996 63.7999 92.7996C63.7999 92.8996 63.8999 93.0996 63.8999 93.1996C63.8999 93.2996 64.0999 93.3996 64.1999 93.4996C64.2999 93.5996 64.3999 93.6996 64.5999 93.6996C64.6999 93.6996 64.8999 93.6996 64.9999 93.6996C65.2999 93.6996 65.4999 93.4996 65.6999 93.2996C65.8999 92.9996 65.8999 92.6996 65.8999 92.4996Z"
        fill="currentColor"
      />
      <path
        d="M54.8999 77.8996C54.7999 77.8996 54.5999 77.9996 54.4999 77.9996C54.3999 78.0996 54.2999 78.1996 54.1999 78.2996C54.0999 78.3996 53.9999 78.4996 53.9999 78.6996C53.9999 78.7996 53.8999 78.9996 53.9999 79.0996C53.9999 79.1996 54.0999 79.3996 54.0999 79.4996C54.1999 79.5996 54.2999 79.6996 54.3999 79.7996C54.4999 79.8996 54.5999 79.9996 54.7999 79.9996C54.8999 79.9996 55.0999 80.0996 55.1999 79.9996C55.4999 79.9996 55.6999 79.7996 55.8999 79.5996C56.0999 79.3996 56.1999 79.0996 56.0999 78.7996C56.0999 78.4996 55.8999 78.2996 55.6999 78.0996C55.4999 77.9996 55.1999 77.8996 54.8999 77.8996Z"
        fill="currentColor"
      />
      <path
        d="M76.1999 77.1996C76.2999 77.2996 76.3999 77.3996 76.5999 77.3996C76.6999 77.3996 76.8999 77.3996 76.9999 77.3996C77.2999 77.3996 77.4999 77.1996 77.6999 76.9996C77.8999 76.7996 77.8999 76.4996 77.8999 76.1996C77.8999 75.8996 77.6999 75.6996 77.4999 75.4996C77.2999 75.2996 76.9999 75.1996 76.6999 75.2996C76.5999 75.2996 76.3999 75.2996 76.2999 75.3996C76.1999 75.4996 76.0999 75.5996 75.9999 75.6996C75.8999 75.7996 75.7999 75.8996 75.7999 76.0996C75.7999 76.1996 75.6999 76.3996 75.7999 76.4996C75.7999 76.5996 75.8999 76.7996 75.8999 76.8996C75.9999 76.9996 76.0999 77.0996 76.1999 77.1996Z"
        fill="currentColor"
      />
      <path
        d="M70.0999 85.7996C70.1999 85.8996 70.2999 85.9996 70.4999 85.9996C70.5999 85.9996 70.7999 85.9996 70.8999 85.9996C71.1999 85.9996 71.3999 85.7996 71.5999 85.5996C71.7999 85.3996 71.7999 85.0996 71.7999 84.7996C71.7999 84.4996 71.5999 84.2996 71.3999 84.0996C71.1999 83.8996 70.8999 83.7996 70.5999 83.8996C70.4999 83.8996 70.2999 83.9996 70.1999 83.9996C70.0999 84.0996 69.9999 84.1996 69.8999 84.2996C69.7999 84.3996 69.6999 84.4996 69.6999 84.6996C69.6999 84.7996 69.5999 84.9996 69.6999 85.0996C69.6999 85.1996 69.7999 85.3996 69.7999 85.4996C69.8999 85.5996 69.9999 85.6996 70.0999 85.7996Z"
        fill="currentColor"
      />
      <path
        d="M81.0999 89.7996C81.1999 89.8996 81.2999 89.9996 81.4999 89.9996C81.5999 89.9996 81.7999 89.9996 81.8999 89.9996C82.1999 89.9996 82.3999 89.7996 82.5999 89.5996C82.7999 89.3996 82.7999 89.0996 82.7999 88.7996C82.7999 88.4996 82.5999 88.2996 82.3999 88.0996C82.1999 87.8996 81.8999 87.7996 81.5999 87.8996C81.4999 87.8996 81.2999 87.9996 81.1999 87.9996C81.0999 88.0996 80.9999 88.1996 80.8999 88.2996C80.7999 88.3996 80.6999 88.4996 80.6999 88.6996C80.6999 88.7996 80.5999 88.9996 80.6999 89.0996C80.6999 89.1996 80.7999 89.3996 80.7999 89.4996C80.8999 89.5996 80.9999 89.6996 81.0999 89.7996Z"
        fill="currentColor"
      />
      <path
        d="M85.6999 71.4996C85.8999 71.5996 86.0999 71.6996 86.2999 71.6996C86.4999 71.6996 86.6999 71.6996 86.8999 71.5996C87.0999 71.4996 87.1999 71.2996 87.2999 71.1996C87.3999 70.9996 87.3999 70.7996 87.3999 70.5996C87.3999 70.4996 87.2999 70.2996 87.2999 70.1996C87.1999 70.0996 87.0999 69.9996 86.9999 69.8996C86.8999 69.7996 86.7999 69.6996 86.5999 69.6996C86.4999 69.6996 86.2999 69.6996 86.1999 69.6996C85.9999 69.6996 85.7999 69.7996 85.5999 69.8996C85.3999 69.9996 85.2999 70.1996 85.2999 70.3996C85.1999 70.5996 85.1999 70.7996 85.2999 70.9996C85.4999 71.1996 85.5999 71.2996 85.6999 71.4996Z"
        fill="currentColor"
      />
      <path
        d="M96.1999 87.4996C96.0999 87.4996 95.8999 87.4996 95.7999 87.5996C95.6999 87.6996 95.5999 87.7996 95.4999 87.8996C95.3999 87.9996 95.2999 88.0996 95.2999 88.2996C95.2999 88.3996 95.1999 88.5996 95.2999 88.6996C95.2999 88.7996 95.3999 88.9996 95.3999 89.0996C95.4999 89.1996 95.5999 89.2996 95.6999 89.3996C95.7999 89.4996 95.8999 89.5996 96.0999 89.5996C96.1999 89.5996 96.3999 89.5996 96.4999 89.5996C96.7999 89.5996 96.9999 89.3996 97.1999 89.1996C97.3999 88.9996 97.3999 88.6996 97.3999 88.3996C97.3999 88.0996 97.1999 87.8996 96.9999 87.6996C96.6999 87.4996 96.4999 87.3996 96.1999 87.4996Z"
        fill="currentColor"
      />
      <path
        d="M95.4999 77.2996C95.5999 77.3996 95.6999 77.4996 95.8999 77.4996C95.9999 77.4996 96.1999 77.5996 96.2999 77.4996C96.3999 77.4996 96.5999 77.3996 96.6999 77.3996C96.7999 77.2996 96.8999 77.1996 96.9999 77.0996C97.0999 76.9996 97.1999 76.8996 97.1999 76.6996C97.1999 76.5996 97.2999 76.3996 97.1999 76.2996C97.1999 75.9996 96.9999 75.7996 96.7999 75.5996C96.5999 75.3996 96.2999 75.3996 95.9999 75.3996C95.6999 75.3996 95.4999 75.5996 95.2999 75.7996C95.0999 75.9996 94.9999 76.2996 94.9999 76.4996C94.9999 76.5996 95.0999 76.7996 95.0999 76.8996C95.2999 77.0996 95.2999 77.1996 95.4999 77.2996Z"
        fill="currentColor"
      />
      <path
        d="M107.3 91.6996C107.4 91.7996 107.6 91.7996 107.7 91.7996C107.8 91.7996 108 91.7996 108.1 91.7996C108.2 91.7996 108.4 91.6996 108.5 91.5996C108.6 91.4996 108.7 91.3996 108.8 91.1996C108.9 91.0996 108.9 90.8996 108.9 90.7996C108.9 90.6996 108.9 90.4996 108.8 90.3996C108.7 90.2996 108.6 90.0996 108.5 89.9996C108.4 89.8996 108.3 89.7996 108.1 89.7996C108 89.7996 107.8 89.6996 107.7 89.7996C107.5 89.7996 107.3 89.8996 107.1 89.9996C106.9 90.0996 106.8 90.2996 106.8 90.4996C106.8 90.6996 106.7 90.7996 106.8 90.9996C106.8 91.1996 106.9 91.2996 107 91.3996C107.1 91.4996 107.2 91.5996 107.3 91.6996Z"
        fill="currentColor"
      />
      <path
        d="M108.7 80.3996C108.8 80.4996 109 80.4996 109.1 80.4996C109.3 80.4996 109.4 80.4996 109.6 80.3996C109.7 80.2996 109.9 80.2996 110 80.0996C110.1 79.8996 110.2 79.8996 110.2 79.6996C110.2 79.4996 110.3 79.3996 110.3 79.1996C110.3 78.8996 110.1 78.6996 109.9 78.4996C109.7 78.2996 109.4 78.1996 109.1 78.2996C108.9 78.2996 108.7 78.3996 108.5 78.4996C108.3 78.5996 108.2 78.7996 108.2 78.9996C108.2 79.1996 108.1 79.2996 108.2 79.4996C108.2 79.6996 108.3 79.7996 108.4 79.8996C108.4 80.1996 108.5 80.2996 108.7 80.3996Z"
        fill="currentColor"
      />
      <path
        d="M117.6 75.7996C117.9 75.7996 118.1 75.5996 118.3 75.3996C118.5 75.1996 118.6 74.8996 118.5 74.5996C118.5 74.4996 118.4 74.2996 118.4 74.1996C118.3 74.0996 118.2 73.9996 118.1 73.8996C118 73.7996 117.9 73.6996 117.7 73.6996C117.6 73.6996 117.4 73.5996 117.3 73.6996C117.2 73.6996 117 73.7996 116.9 73.7996C116.8 73.8996 116.7 73.9996 116.6 74.0996C116.5 74.1996 116.4 74.2996 116.4 74.4996C116.4 74.5996 116.4 74.7996 116.4 74.8996C116.4 75.1996 116.6 75.3996 116.8 75.5996C117 75.7996 117.3 75.7996 117.6 75.7996Z"
        fill="currentColor"
      />
      <path
        d="M81.5999 107.1C81.4999 105.7 81.3999 104.6 81.1999 103.5C81.0999 102.7 80.9999 101.9 80.8999 100.9C80.8999 100.8 80.7999 100.6 80.6999 100.6C80.5999 100.5 80.4999 100.5 80.2999 100.5C77.7999 100.9 75.2999 100.9 72.7999 100.5H72.6999C72.5999 100.5 72.3999 100.6 72.2999 100.8C71.8999 101.4 71.6999 106 72.2999 107.9C72.2999 107.9 72.2999 108 72.3999 108C73.6999 109.8 75.2999 111.2 77.1999 112.3C77.2999 112.3 77.3999 112.4 77.4999 112.4C77.6999 112.4 77.7999 112.3 77.8999 112.2C78.8999 110.5 80.0999 108.9 81.4999 107.6C81.5999 107.4 81.5999 107.2 81.5999 107.1ZM77.1999 111.2C75.5999 110.2 74.2999 109 73.1999 107.5C72.6999 105.9 72.8999 102.6 73.0999 101.6C75.3999 101.9 77.6999 101.9 79.9999 101.6C80.0999 102.4 80.1999 103.1 80.1999 103.7C80.2999 104.8 80.4999 105.7 80.5999 107.1C79.2999 108.2 78.1999 109.6 77.1999 111.2Z"
        fill="currentColor"
      />
      <path
        d="M194.4 33.8996C193.8 33.6996 193.2 34.2996 192.5 35.7996C192.6 35.2996 192.7 34.7996 192.8 34.1996C193.1 32.8996 193.2 31.1996 192.3 30.9996C191.6 30.7996 191 31.5996 190.3 33.3996C190.1 33.7996 190 34.2996 189.8 34.6996C189.9 33.8996 190.1 32.9996 190.2 32.1996C190.4 31.0996 190.5 29.1996 189.6 28.9996C188.9 28.7996 188.3 29.6996 187.7 31.4996C187.6 31.6996 187.2 33.0996 186.7 34.4996C186.7 33.9996 186.7 33.4996 186.7 32.8996C186.7 31.9996 186.6 29.8996 185.5 29.7996C184.8 29.7996 184.3 30.6996 184 32.5996C184 32.8996 183.7 34.6996 183.5 36.1996L183.2 37.8996C183.1 38.5996 182.8 39.4996 182.6 39.6996C182 39.5996 181.2 38.8996 180.4 38.3996C179 37.2996 177.6 36.3996 176.8 37.2996C176.3 37.7996 176.2 38.8996 179.4 42.6996C179.7 43.0996 179.9 43.4996 180 44.0996C180.1 44.5996 179.9 45.0996 179.7 45.4996C179.7 45.4996 178.9 46.9996 178.4 47.7996C178.1 47.4996 177.8 47.2996 177.5 46.9996C177.4 46.8996 177.2 46.7996 177.1 46.8996C177 46.8996 176.8 46.9996 176.7 47.0996C176.4 47.4996 176.1 47.9996 175.8 48.3996L174.2 30.2996C174.1 28.3996 173.2 26.6996 171.8 25.4996C170.4 24.2996 168.6 23.6996 166.7 23.7996L144.5 25.6996C144.6 24.8996 144.6 24.1996 144.5 23.3996C144.5 23.0996 144.4 22.7996 144.4 22.4996C145.1 22.3996 145.8 22.1996 146.5 21.8996C147.3 21.4996 148.1 20.9996 148.7 20.2996C149.3 19.5996 149.8 18.7996 150.1 17.9996C150.4 17.0996 150.5 16.1996 150.4 15.2996C150.3 14.0996 149.9 12.9996 149.2 11.9996C148.5 10.9996 147.6 10.2996 146.5 9.79961C145.4 9.29961 144.2 9.09961 143.1 9.19961C141.9 9.29961 140.8 9.69961 139.8 10.3996C138.7 11.1996 137.8 12.3996 137.4 13.6996C137.2 13.5996 137 13.4996 136.7 13.3996C134.6 12.6996 132.3 12.5996 130.1 13.1996C127.9 13.7996 126 14.9996 124.5 16.5996C122.5 18.7996 121.4 21.6996 121.6 24.7996C121.6 24.7996 121.6 24.7996 121.6 24.8996C121.6 25.8996 121.6 26.7996 121.7 27.6996L109.3 28.9996C108.6 22.3996 102.4 17.3996 95.0999 17.5996C91.1999 17.6996 87.4999 19.2996 84.8999 21.9996C82.5999 24.3996 81.3999 27.4996 81.4999 30.6996C81.5999 33.9996 82.9999 36.9996 85.4999 39.2996C88.0999 41.6996 91.6999 42.9996 95.2999 42.9996C95.5999 42.9996 95.8999 42.9996 96.1999 42.9996C96.7999 42.9996 97.3999 42.8996 97.9999 42.7996L101.1 77.9996C98.5999 73.8996 96.6999 71.1996 94.6999 69.1996L93.2999 52.7996C93.1999 52.0996 93.0999 51.4996 92.7999 50.8996C92.4999 50.2996 92.0999 49.7996 91.5999 49.2996C91.0999 48.7996 90.4999 48.4996 89.8999 48.2996C89.2999 48.0996 88.5999 47.9996 87.8999 48.0996L82.8999 48.4996C82.7999 48.3996 82.5999 48.3996 82.3999 48.2996C82.3999 48.0996 82.3999 47.9996 82.3999 47.7996C82.3999 47.3996 82.1999 46.9996 81.8999 46.6996C81.5999 46.3996 81.1999 46.1996 80.7999 46.0996C80.5999 46.0996 80.4999 46.0996 80.2999 46.0996C80.2999 45.8996 80.1999 45.7996 80.0999 45.5996C79.8999 45.1996 79.5999 44.8996 79.1999 44.6996C78.7999 44.4996 78.2999 44.4996 77.8999 44.5996C77.7999 44.5996 77.5999 44.6996 77.4999 44.7996C77.3999 44.6996 77.2999 44.4996 77.1999 44.3996C76.8999 44.0996 76.3999 43.8996 75.9999 43.7996C75.4999 43.7996 75.0999 43.8996 74.6999 44.0996C74.5999 44.1996 74.3999 44.2996 74.2999 44.3996C74.1999 44.2996 74.0999 44.1996 73.8999 44.1996C73.4999 43.9996 73.0999 43.8996 72.5999 43.9996C72.1999 44.0996 71.7999 44.2996 71.4999 44.6996C71.3999 44.7996 71.2999 44.9996 71.1999 45.1996C70.9999 45.1996 70.8999 45.0996 70.6999 45.0996C70.2999 45.0996 69.8999 45.1996 69.4999 45.3996C69.1999 45.5996 68.8999 45.9996 68.7999 46.3996C68.6999 46.5996 68.6999 46.6996 68.6999 46.8996C68.4999 46.8996 68.3999 46.8996 68.1999 46.9996C67.7999 47.0996 67.3999 47.3996 67.1999 47.6996C66.9999 47.9996 66.7999 48.4996 66.8999 48.8996C66.8999 49.0996 66.8999 49.1996 66.9999 49.2996C66.7999 49.3996 66.6999 49.3996 66.4999 49.5996C66.3999 49.6996 66.2999 49.7996 66.1999 49.7996L41.6999 51.8996C40.2999 51.9996 39.0999 52.6996 38.1999 53.6996C37.2999 54.6996 36.8999 56.0996 36.9999 57.3996L39.5999 87.8996C39.6999 89.2996 40.3999 90.4996 41.3999 91.3996C42.2999 92.1996 43.4999 92.5996 44.6999 92.5996C44.7999 92.5996 44.9999 92.5996 45.0999 92.5996L54.9999 91.7996C55.4999 93.1996 56.0999 94.3996 56.7999 95.4996C57.8999 97.2996 59.5999 98.2996 61.5999 98.3996C61.6999 98.3996 61.6999 98.3996 61.7999 98.3996C62.0999 98.3996 62.3999 98.3996 62.6999 98.2996C60.3999 100.4 58.5999 103 57.4999 106C55.3999 111.7 48.5999 118.5 47.1999 120L35.6999 109.2C35.5999 109.2 35.5999 109.1 35.4999 109.1C35.3999 109.1 35.3999 109 35.2999 109C34.9999 108.8 34.5999 108.7 34.2999 108.6C34.0999 108.6 33.7999 108.6 33.5999 108.7C32.8999 107.9 32.1999 107 31.5999 106.3C30.2999 104.8 29.2999 103.5 28.7999 102.8C28.0999 101.9 26.5999 101.1 22.8999 102.6C15.9999 105.6 4.09992 116 4.99992 120.7C5.09992 121.3 5.39992 121.8 6.09992 122.2C6.79992 122.7 7.59992 122.9 8.49992 122.9C10.1999 122.9 12.2999 122.2 14.4999 121.4C15.5999 121 16.7999 120.6 17.8999 120.3L18.2999 120.2C20.0999 119.7 21.5999 119.3 22.9999 119.7C22.8999 120.4 23.0999 120.9 23.2999 121.2C23.3999 121.3 23.4999 121.4 23.5999 121.5L43.1999 138.5C44.5999 139.7 46.3999 140.4 48.2999 140.4C50.1999 140.4 51.9999 139.7 53.3999 138.5L70.4999 123.4C70.5999 123.4 70.6999 123.3 70.7999 123.2L72.9999 121.2C73.0999 121.3 73.1999 121.5 73.2999 121.6C75.8999 124.7 77.2999 128.7 77.1999 132.8L70.8999 150.8L68.5999 157.5C68.4999 157.7 68.5999 158 68.7999 158.1C69.1999 158.4 69.5999 158.6 70.0999 158.9C68.6999 162.2 67.1999 165.6 65.7999 168.8C65.7999 168.8 65.7999 168.8 65.7999 168.9C65.4999 169.4 65.3999 170 65.4999 170.9C65.7999 177.3 74.4999 191.9 78.9999 193.5C79.2999 193.6 79.5999 193.7 79.8999 193.7C80.2999 193.7 80.5999 193.6 80.7999 193.4C83.5999 191.4 82.0999 184.5 80.4999 180.6C77.7999 174.1 79.9999 168.7 81.4999 165.2C81.7999 164.5 81.9999 163.9 82.1999 163.3C82.7999 163.4 83.2999 163.5 83.8999 163.5C83.8999 163.5 83.8999 163.5 83.9999 163.5C84.1999 163.5 84.3999 163.4 84.4999 163.2L88.6999 151.4L148.9 146.3C150.7 146.1 152.3 145.3 153.5 143.9C154.7 142.5 155.2 140.8 155.1 139L151.6 97.7996C151.4 95.9996 150.6 94.3996 149.2 93.1996C147.8 91.9996 146.1 91.4996 144.3 91.5996L112.9 94.1996C113.9 92.1996 114.9 89.6996 116 87.1996L125.5 86.3996L172.3 82.3996C173.7 82.2996 174.9 81.7996 176 80.8996C177 80.0996 177.8 78.8996 178.2 77.6996C179.9 76.0996 181.4 73.8996 182.7 71.1996C183.9 68.6996 184.9 66.4996 185.7 64.4996C187.2 61.1996 188.5 58.2996 190.2 55.3996C190.3 55.2996 190.3 55.0996 190.2 54.9996C190.1 54.8996 190 54.6996 189.9 54.6996C189.6 54.5996 189.3 54.4996 189.1 54.3996C189.9 52.5996 192.5 46.6996 193 45.0996C193.5 43.3996 194 41.5996 194.6 39.8996C194.8 39.1996 195 38.3996 195.2 37.6996C195.2 35.2996 195.1 34.0996 194.4 33.8996ZM191.2 33.7996C191.5 32.8996 191.8 32.4996 191.9 32.1996C191.9 32.4996 191.9 33.0996 191.7 34.0996C191.4 35.8996 190.9 37.7996 190.4 39.5996C190.2 39.8996 189.9 40.2996 189.7 40.5996C189.4 40.2996 189 39.9996 188.6 39.6996C188.8 39.3996 188.9 38.9996 189.1 38.6996C189.9 37.0996 190.6 35.4996 191.2 33.7996ZM188.6 31.8996C188.9 30.9996 189.1 30.4996 189.3 30.1996C189.4 30.4996 189.4 31.0996 189.2 32.0996C188.8 34.6996 188.3 37.6996 188.2 38.3996C188.1 38.5996 188 38.8996 187.9 39.0996C187.5 38.7996 187 38.5996 186.5 38.3996C187 36.9996 188.5 32.2996 188.6 31.8996ZM166.9 24.9996C168.5 24.8996 170 25.3996 171.2 26.4996C172.4 27.5996 173.1 28.9996 173.2 30.5996L175 49.9996C172.7 53.5996 170.7 57.3996 168.8 61.1996C157.3 36.9996 154.3 37.0996 147.9 37.3996C146.8 37.3996 145.7 37.4996 144.4 37.3996C142 37.2996 139.7 36.5996 137.8 35.1996C139.9 34.2996 141.7 32.7996 143 30.8996C143.8 29.6996 144.4 28.2996 144.7 26.8996L166.9 24.9996ZM131 40.3996C131.2 39.3996 131.1 38.3996 131 37.3996C131.5 36.1996 131.8 34.9996 131.9 33.6996C131.9 33.4996 131.8 33.2996 131.6 33.1996C131.4 33.0996 131.2 33.1996 131 33.2996C130.5 33.8996 129.9 34.3996 129.4 34.8996C127.8 36.2996 126.5 36.7996 125.6 36.3996C124.4 35.8996 122.9 33.4996 122.9 25.3996C124.9 24.8996 126.9 24.5996 128.9 24.4996C129 25.0996 129.2 25.7996 129.4 26.4996C129.6 26.9996 129.9 27.0996 130.1 27.0996C130.6 27.0996 131 26.5996 131.3 26.1996C131.4 25.9996 131.7 25.7996 132 25.7996C132.3 25.8996 132.5 26.1996 132.6 26.4996C132.7 26.7996 132.7 27.6996 131.4 28.5996C131.2 28.7996 131.1 28.9996 131.3 29.2996C132.6 31.5996 134.3 33.5996 136.3 35.3996C136.3 35.3996 136.4 35.3996 136.4 35.4996C138.6 37.1996 141.3 38.2996 144.1 38.3996C140.7 41.2996 137.6 44.4996 134.8 47.9996C134.4 48.4996 133.8 48.8996 133.2 49.1996C132.6 49.3996 131.9 49.4996 131.3 49.3996C130.6 49.2996 130 49.0996 129.5 48.5996C129 48.1996 128.6 47.6996 128.3 47.0996C128.1 46.6996 127.9 46.1996 127.8 45.7996C128 45.5996 128.2 45.3996 128.4 45.1996C129.8 43.7996 130.7 42.1996 131 40.3996ZM106.5 36.2996C106.4 36.3996 106.4 36.5996 106.5 36.7996L108.4 41.2996L103.8 39.5996C103.6 39.4996 103.5 39.5996 103.3 39.6996C102 40.5996 100.5 41.2996 98.9999 41.6996L98.5999 37.0996C98.3999 35.4996 98.8999 33.9996 99.8999 32.6996C100.9 31.4996 102.3 30.6996 103.9 30.4996L108.4 30.0996C108.4 32.2996 107.7 34.4996 106.5 36.2996ZM96.1999 42.0996C92.4999 42.2996 88.7999 41.0996 86.1999 38.5996C83.8999 36.4996 82.5999 33.6996 82.4999 30.6996C82.3999 27.7996 83.4999 24.8996 85.5999 22.6996C87.9999 20.1996 91.3999 18.6996 95.0999 18.5996C95.1999 18.5996 95.3999 18.5996 95.4999 18.5996C102.2 18.5996 107.6 23.0996 108.3 29.0996L103.7 29.4996C101.8 29.6996 100.2 30.5996 98.9999 32.0996C97.7999 33.5996 97.2999 35.3996 97.4999 37.1996L97.8999 41.8996C97.3999 41.9996 96.7999 41.9996 96.1999 42.0996ZM98.9999 42.5996C100.6 42.1996 102.2 41.4996 103.6 40.5996L109 42.5996C109.2 42.6996 109.4 42.5996 109.5 42.4996C109.6 42.3996 109.7 42.0996 109.6 41.9996L107.4 36.6996C108.7 34.6996 109.3 32.3996 109.3 29.9996L121.9 28.8996C122.2 33.6996 123.3 36.4996 125.1 37.2996C126.3 37.8996 127.8 37.3996 129.5 36.0996C129.7 36.4996 129.8 36.8996 129.9 37.3996C129.9 37.4996 129.9 37.5996 129.9 37.6996C130.1 38.5996 130.1 39.3996 129.9 40.2996C129.6 41.8996 128.9 43.3996 127.7 44.4996C127.2 44.9996 126.6 45.5996 125.9 46.2996C123.3 48.7996 119.5 52.4996 117.1 58.4996C117 57.6996 116.7 56.8996 116.1 56.8996C115.5 56.8996 115 57.5996 114.4 59.7996C114.1 60.8996 112.7 64.3996 110.2 70.3996C109.8 70.3996 109.3 70.3996 108.9 70.4996C108.7 70.4996 108.5 70.6996 108.5 70.7996C107.3 74.6996 105.4 78.8996 104.3 81.3996C104.1 81.8996 103.9 82.2996 103.8 82.5996C103.3 81.6996 102.8 80.7996 102.3 79.9996L98.9999 42.5996ZM116.2 65.6996C116.4 65.8996 116.7 65.8996 116.9 65.5996C119.6 62.3996 122.7 59.5996 126.1 57.2996C127.2 56.6996 127.8 56.3996 128.1 56.3996C127.9 56.6996 127.6 57.1996 126.7 58.1996C125.9 58.9996 125.2 59.7996 124.5 60.6996L124.4 60.7996C123.6 61.8996 122.8 62.9996 122.1 64.0996C120.7 66.6996 119.4 69.4996 118.4 72.3996C116.2 71.1996 113.8 70.4996 111.4 70.3996C113.8 64.4996 115.1 61.1996 115.5 59.9996C115.8 58.9996 116 58.3996 116.2 58.0996C116.3 58.2996 116.3 58.5996 116.4 58.9996C116.4 59.1996 116.4 59.6996 116.4 60.2996C116.4 62.1996 116.4 63.5996 117.1 64.0996C116.8 64.3996 116.5 64.6996 116.3 64.9996C115.9 65.1996 115.9 65.5996 116.2 65.6996ZM126.2 63.2996C126.5 63.1996 126.7 63.1996 126.8 63.0996C127.2 62.9996 127.6 62.8996 127.8 62.7996C127.4 63.0996 126.9 63.3996 126.3 63.6996C125.6 64.0996 125 64.4996 124.4 64.8996C124.7 64.5996 125 64.1996 125.3 63.9996L125.9 63.3996L126.2 63.2996ZM125.4 62.4996C125.4 62.5996 125.4 62.5996 125.4 62.4996L124.7 63.1996C124 63.8996 123.1 64.7996 122.3 65.6996C122.5 65.2996 122.7 64.8996 122.9 64.4996C123.6 63.3996 124.3 62.2996 125.2 61.2996C125.9 60.8996 127.3 60.1996 128 59.7996C128.4 59.5996 128.7 59.4996 129 59.3996C128.6 59.7996 128.1 60.1996 127.7 60.4996C126.8 61.2996 125.9 61.9996 125.4 62.4996ZM87.8999 49.2996C88.3999 49.2996 88.9999 49.2996 89.4999 49.4996C89.9999 49.6996 90.4999 49.8996 90.8999 50.2996C91.2999 50.5996 91.6999 51.0996 91.8999 51.5996C92.0999 52.0996 92.2999 52.5996 92.2999 53.0996L93.5999 68.3996C90.3999 65.6996 86.7999 65.0996 80.4999 64.6996C80.1999 64.6996 79.9999 64.5996 79.8999 64.2996C81.6999 64.1996 82.7999 63.8996 83.1999 63.2996C83.2999 63.1996 83.2999 63.0996 83.3999 62.8996C83.7999 61.8996 83.7999 60.1996 83.0999 57.1996C83.2999 57.0996 83.4999 56.8996 83.5999 56.7996C83.8999 56.4996 83.9999 56.0996 83.9999 55.6996C83.9999 55.2996 83.8999 54.8996 83.6999 54.5996C83.6999 54.4996 83.5999 54.4996 83.5999 54.3996C83.6999 54.2996 83.7999 54.1996 83.8999 54.0996C84.1999 53.6996 84.2999 53.2996 84.2999 52.8996C84.2999 52.3996 84.0999 51.9996 83.7999 51.6996C83.6999 51.5996 83.5999 51.4996 83.3999 51.3996C83.4999 51.2996 83.4999 51.0996 83.5999 50.9996C83.6999 50.5996 83.6999 50.1996 83.4999 49.7996L87.8999 49.2996ZM75.1999 62.4996C76.2999 61.0996 77.3999 59.7996 78.4999 58.3996C78.6999 58.1996 78.5999 57.8996 78.4999 57.7996C77.6999 56.8996 77.5999 56.2996 77.6999 55.8996C77.6999 55.7996 77.7999 55.6996 77.8999 55.6996C77.9999 55.6996 78.1999 55.7996 78.4999 56.0996C78.9999 56.6996 79.4999 56.7996 79.7999 56.6996C80.3999 56.3996 80.5999 55.5996 80.3999 54.2996C80.6999 54.1996 80.9999 53.9996 81.2999 53.7996C81.5999 55.0996 81.8999 56.1996 82.0999 56.9996C82.6999 59.9996 82.8999 61.6996 82.4999 62.4996C82.4999 62.5996 82.3999 62.5996 82.3999 62.5996C82.0999 62.6996 81.2999 62.5996 78.7999 60.7996C78.5999 60.6996 78.3999 60.6996 78.1999 60.7996C77.9999 60.8996 77.8999 61.0996 77.9999 61.2996L78.0999 61.8996C78.3999 63.1996 78.6999 64.5996 79.4999 65.1996C75.0999 67.0996 72.5999 66.1996 71.5999 65.5996C72.7999 64.9996 73.8999 64.0996 75.1999 62.4996ZM45.0999 91.7996C43.9999 91.8996 42.8999 91.5996 42.0999 90.7996C41.2999 90.0996 40.6999 89.0996 40.6999 87.9996L38.0999 57.4996C37.9999 56.3996 38.2999 55.2996 39.0999 54.4996C39.7999 53.6996 40.7999 53.0996 41.8999 53.0996L65.8999 51.0996C65.8999 51.4996 65.8999 51.8996 66.0999 52.1996C66.1999 52.2996 66.1999 52.3996 66.2999 52.4996C66.1999 52.5996 66.0999 52.6996 65.9999 52.7996C65.6999 53.1996 65.5999 53.5996 65.5999 53.9996C65.5999 54.4996 65.7999 54.8996 66.0999 55.1996C66.1999 55.2996 66.3999 55.3996 66.4999 55.4996C66.3999 55.5996 66.3999 55.7996 66.2999 55.8996C66.1999 56.2996 66.1999 56.7996 66.3999 57.0996C66.5999 57.4996 66.8999 57.7996 67.1999 57.9996C67.2999 58.0996 67.4999 58.0996 67.6999 58.1996C67.6999 58.3996 67.6999 58.4996 67.6999 58.6996C67.7999 59.0996 67.8999 59.4996 68.1999 59.7996C68.4999 60.0996 68.8999 60.2996 69.2999 60.3996C69.4999 60.3996 69.5999 60.3996 69.7999 60.3996C69.7999 60.5996 69.8999 60.6996 69.9999 60.8996C70.1999 61.2996 70.4999 61.5996 70.8999 61.7996C71.2999 61.9996 71.6999 61.9996 72.1999 61.8996C72.2999 61.8996 72.4999 61.7996 72.5999 61.6996C72.5999 61.6996 72.5999 61.6996 72.5999 61.7996C72.7999 62.0996 72.9999 62.2996 73.2999 62.3996C73.3999 62.4996 73.5999 62.4996 73.6999 62.5996C72.1999 64.1996 70.8999 64.6996 68.6999 65.4996C67.6999 65.8996 66.5999 66.2996 65.1999 66.8996C63.7999 67.4996 62.6999 68.2996 61.7999 69.2996C61.6999 68.1996 61.5999 66.8996 61.5999 66.0996C61.5999 63.9996 61.3999 63.1996 60.7999 63.0996C60.0999 62.8996 59.6999 63.7996 59.2999 64.6996C59.1999 64.9996 58.9999 65.3996 58.8999 65.8996C58.6999 66.5996 58.1999 68.1996 57.8999 68.3996C57.8999 68.3996 57.8999 68.3996 57.7999 68.2996C56.3999 65.4996 54.7999 62.7996 52.7999 60.2996C51.3999 58.6996 50.5999 58.1996 49.9999 58.5996C49.5999 58.8996 49.3999 59.4996 50.5999 61.8996C50.5999 61.9996 50.6999 62.0996 50.6999 62.1996C50.5999 62.0996 50.4999 61.9996 50.4999 61.9996C49.7999 61.2996 48.6999 60.3996 48.0999 60.9996C47.7999 61.1996 47.7999 61.5996 47.9999 61.9996C48.2999 62.5996 48.7999 63.2996 49.1999 63.9996C49.2999 64.1996 49.3999 64.2996 49.4999 64.4996C48.7999 64.1996 48.2999 64.0996 47.9999 64.4996C47.7999 64.7996 47.7999 65.0996 47.9999 65.4996C48.3999 65.9996 48.9999 66.6996 49.5999 67.2996C50.2999 67.9996 50.9999 68.7996 51.3999 69.3996C52.2999 70.6996 53.0999 71.9996 53.6999 73.3996C53.6999 73.4996 53.6999 73.5996 53.7999 73.6996C53.7999 73.7996 53.7999 73.7996 53.7999 73.7996C53.8999 74.5996 53.8999 75.4996 53.8999 76.2996C53.2999 76.4996 52.8999 76.5996 52.7999 76.5996C52.5999 76.6996 52.3999 76.8996 52.4999 77.0996C52.9999 82.7996 53.7999 87.3996 54.9999 90.8996L45.0999 91.7996ZM58.4999 75.6996C57.3999 75.5996 55.9999 75.7996 54.7999 76.0996C54.6999 73.3996 54.3999 70.6996 53.7999 67.9996C53.4999 66.7996 53.0999 65.5996 52.6999 64.4996C52.2999 63.4996 51.8999 62.5996 51.3999 61.6996C50.8999 60.7996 50.6999 60.2996 50.6999 59.8996C50.9999 60.0996 51.3999 60.3996 51.9999 61.0996C54.3999 64.0996 56.2999 67.2996 57.7999 70.7996C57.8999 71.0996 58.1999 71.1996 58.4999 71.0996C58.7999 70.9996 58.8999 70.6996 58.7999 70.3996C58.6999 70.0996 58.4999 69.6996 58.2999 69.3996C58.9999 69.0996 59.3999 67.8996 59.8999 66.2996C59.9999 65.7996 60.1999 65.3996 60.2999 65.1996C60.3999 64.8996 60.4999 64.6996 60.5999 64.5996C60.5999 64.8996 60.6999 65.3996 60.6999 66.2996C60.6999 67.4996 60.7999 69.2996 60.9999 70.5996C59.7999 72.0996 58.9999 73.8996 58.4999 75.6996ZM51.7999 64.8996C52.1999 65.9996 52.5999 67.0996 52.8999 68.1996C52.9999 68.4996 52.9999 68.6996 53.0999 68.9996C52.6999 68.0996 52.1999 67.2996 51.7999 66.4996L51.4999 65.7996C51.0999 65.0996 50.5999 64.1996 49.9999 63.2996C49.7999 62.8996 49.4999 62.5996 49.2999 62.1996C49.3999 62.2996 49.5999 62.4996 49.7999 62.5996C50.0999 63.1996 51.2999 64.2996 51.7999 64.8996ZM50.4999 66.3996L50.7999 67.0996C50.8999 67.2996 50.9999 67.5996 51.1999 67.7996C50.8999 67.3996 50.4999 66.9996 50.1999 66.5996C49.8999 66.2996 49.5999 65.8996 49.2999 65.5996C49.4999 65.6996 49.5999 65.7996 49.8999 65.8996C49.9999 65.9996 50.2999 66.1996 50.4999 66.3996ZM61.7999 97.5996C60.1999 97.4996 58.6999 96.6996 57.7999 95.1996C55.4999 91.3996 54.0999 85.6996 53.3999 77.4996C54.5999 77.0996 56.8999 76.5996 58.2999 76.6996C56.8999 82.9996 58.1999 89.7996 58.2999 90.1996C58.2999 90.3996 58.5999 90.5996 58.7999 90.5996H58.8999C59.1999 90.4996 59.2999 90.2996 59.2999 89.9996C59.2999 89.7996 55.9999 72.2996 65.6999 67.9996C67.0999 67.3996 68.1999 66.9996 69.1999 66.5996C69.6999 66.3996 70.0999 66.2996 70.4999 66.0996C70.9999 66.4996 72.2999 67.3996 74.6999 67.3996C76.2999 67.3996 78.3999 66.9996 80.8999 65.6996C87.2999 66.0996 90.5999 66.5996 93.8999 69.8996C96.7999 72.6996 99.7999 77.5996 104.8 86.2996C104.9 86.4996 105.1 86.4996 105.2 86.4996C105.3 86.4996 105.4 86.4996 105.5 86.3996C105.7 86.2996 105.8 85.9996 105.7 85.6996C105.3 84.9996 104.9 84.2996 104.5 83.5996C104.7 83.1996 105 82.4996 105.3 81.6996C106.4 79.1996 108.2 75.1996 109.4 71.2996C112.8 70.9996 116.2 71.8996 119 73.7996C117.7 79.4996 114.3 87.8996 111.6 93.4996C111.1 94.4996 110.4 95.2996 109.6 95.9996C108.8 96.6996 107.7 97.0996 106.7 97.2996C105.6 97.4996 104.5 97.3996 103.5 97.0996C102.5 96.7996 101.5 96.1996 100.8 95.4996C96.9999 91.9996 93.5999 87.9996 90.5999 83.8996C90.5999 83.7996 90.4999 83.6996 90.3999 83.5996C89.4999 82.3996 88.6999 81.1996 87.8999 79.8996C87.7999 79.6996 87.6999 79.5996 87.4999 79.5996H87.2999C87.2999 79.5996 87.1999 79.5996 87.1999 79.6996C86.9999 79.7996 86.8999 80.1996 87.0999 80.3996L89.7999 88.9996C89.7999 91.2996 89.5999 93.5996 89.1999 94.6996C81.3999 96.7996 72.4999 97.1996 67.3999 95.6996C67.3999 89.3996 64.3999 77.4996 64.2999 76.9996C64.1999 76.6996 63.9999 76.5996 63.6999 76.5996C63.3999 76.6996 63.2999 76.8996 63.2999 77.1996C63.2999 77.2996 66.1999 89.0996 66.3999 95.3996C65.1999 96.7996 63.4999 97.6996 61.7999 97.5996ZM87.5999 150.4L85.7999 155.5C84.8999 155.5 84.0999 155.4 83.2999 155.2L88.8999 137.5C89.8999 134.6 90.3999 131.5 90.1999 128.4C89.3999 115.4 88.3999 105.4 86.1999 96.2996C87.1999 96.0996 88.1999 95.8996 89.1999 95.5996C92.6999 107.7 93.0999 116 93.3999 128.2C93.5999 131.6 93.0999 135 91.9999 138.2L87.5999 150.4ZM90.6999 85.6996C91.1999 86.3996 91.7999 87.0996 92.2999 87.7996C91.8999 87.8996 91.4999 87.9996 91.0999 87.9996H90.6999C90.6999 87.0996 90.6999 86.2996 90.6999 85.6996ZM89.9999 94.9996C90.4999 93.7996 90.6999 91.2996 90.6999 88.9996H91.1999C91.7999 88.9996 92.3999 88.7996 92.9999 88.5996C94.7999 90.8996 96.7999 93.0996 98.7999 95.0996L90.1999 95.7996C90.0999 95.5996 90.0999 95.2996 89.9999 94.9996ZM62.2999 100.5C62.7999 100.5 63.3999 100.6 63.8999 100.8C62.4999 102.1 61.2999 104.7 60.9999 105.5L58.4999 106.7C58.4999 106.7 58.4999 106.6 58.5999 106.6C59.2999 104.3 60.5999 102.3 62.2999 100.5ZM35.5999 121.5C35.4999 121.6 35.4999 121.6 35.4999 121.6C33.8999 123.3 31.8999 124.5 29.4999 125.3L25.4999 121.9C25.6999 121.9 25.8999 121.8 26.1999 121.8H26.2999C27.9999 121.3 29.7999 120 30.5999 119.3C33.1999 117.2 35.8999 114 36.1999 111.4L39.6999 114.7C38.6999 117.4 37.2999 119.7 35.5999 121.5ZM17.8999 119.2L17.4999 119.3C16.3999 119.6 15.1999 120 14.0999 120.4C13.3999 120.7 12.5999 120.9 11.8999 121.2C18.1999 118.1 26.7999 110.3 28.6999 105.9C28.8999 105.5 28.9999 105.2 28.9999 104.8C29.4999 105.4 30.0999 106.2 30.7999 107C32.0999 108.6 33.5999 110.5 34.8999 112.1C34.1999 114 32.2999 116.4 29.8999 118.4C28.5999 119.5 27.2999 120.3 26.1999 120.6C25.4999 119.8 24.5999 119.1 23.4999 118.7C21.6999 118.1 19.9999 118.6 17.8999 119.2ZM52.6999 137.6C51.4999 138.7 49.8999 139.3 48.2999 139.3C46.5999 139.3 45.0999 138.7 43.7999 137.6L30.3999 126C32.4999 125.2 34.2999 124.1 35.8999 122.6L43.9999 129.7C45.3999 130.9 47.1999 131.6 49.0999 131.6C50.9999 131.6 52.7999 130.9 54.1999 129.6L69.4999 116.1L69.6999 122.4L52.6999 137.6ZM73.9999 120.8C71.3999 117.6 69.6999 113.7 69.1999 109.5C69.1999 109.2 68.8999 109 68.5999 109.1C68.2999 109.1 68.0999 109.4 68.1999 109.7C68.3999 111.5 68.7999 113.3 69.4999 115L53.6999 129C52.4999 130.1 50.8999 130.7 49.1999 130.7C47.5999 130.7 45.9999 130.1 44.6999 129L36.5999 121.9C38.1999 120.1 39.4999 117.9 40.4999 115.3L49.7999 124.1C49.8999 124.2 49.9999 124.2 50.0999 124.2C50.1999 124.2 50.3999 124.1 50.4999 124C50.6999 123.8 50.6999 123.5 50.4999 123.3L47.8999 120.8C49.2999 119.4 55.0999 113.5 57.7999 108L61.4999 106.2C61.5999 106.1 61.6999 106.1 61.6999 105.9C62.1999 104.7 63.6999 101.6 64.8999 101C65.0999 100.9 65.1999 100.7 65.1999 100.6C65.1999 100.4 65.0999 100.2 64.8999 100.1C64.2999 99.7996 63.5999 99.5996 62.9999 99.3996C64.1999 98.2996 65.4999 97.2996 66.8999 96.4996C66.9999 96.4996 66.9999 96.3996 67.0999 96.3996C69.1999 96.9996 71.9999 97.2996 74.9999 97.2996C78.1999 97.2996 81.5999 96.9996 84.9999 96.2996C87.2999 105.3 88.1999 115.2 88.9999 128.2C89.1999 131.2 88.7999 134.1 87.7999 136.9L82.0999 154.8C78.3999 154.1 74.7999 152.5 71.6999 150.2L77.8999 132.5V132.4C78.1999 128.4 76.7999 124.1 73.9999 120.8ZM80.3999 164.5C78.9999 168 76.5999 173.7 79.3999 180.7C80.4999 183.4 81.1999 186.5 81.0999 188.9C79.5999 182.5 72.5999 170.6 68.4999 168.2C67.9999 167.9 67.4999 167.7 67.0999 167.7C68.2999 164.9 69.5999 162 70.7999 159.2C73.9999 160.9 77.4999 162.2 81.0999 162.9C80.8999 163.3 80.5999 163.9 80.3999 164.5ZM83.3999 162.2C78.4999 161.6 73.6999 159.9 69.4999 157.3L71.4999 151.5C74.6999 153.8 78.3999 155.4 82.2999 156.1C82.2999 156.1 82.2999 156.1 82.3999 156.1C82.4999 156.1 82.4999 156.1 82.5999 156.1C82.5999 156.1 82.5999 156.1 82.6999 156.1C83.5999 156.3 84.5999 156.4 85.4999 156.4L83.3999 162.2ZM144 92.2996C145.5 92.1996 147 92.5996 148.2 93.5996C149.4 94.5996 150.1 95.9996 150.2 97.4996L153.7 138.7C153.8 140.2 153.4 141.7 152.4 142.9C151.4 144.1 150 144.8 148.5 144.9L88.7999 149.9L92.8999 138.4C93.9999 135 94.4999 131.6 94.2999 128C94.0999 116.2 93.6999 108 90.4999 96.5996L99.6999 95.7996C99.7999 95.8996 99.8999 95.9996 99.9999 96.0996C100.9 96.9996 102 97.5996 103.2 97.9996C103.9 98.1996 104.7 98.2996 105.5 98.2996C106 98.2996 106.4 98.2996 106.9 98.1996C108.1 97.9996 109.3 97.4996 110.2 96.6996C110.9 96.1996 111.5 95.4996 112 94.7996L144 92.2996ZM120 73.7996C120 73.5996 120 73.3996 119.8 73.2996C119.6 73.1996 119.4 72.9996 119.2 72.8996C119.5 71.9996 119.9 71.0996 120.2 70.1996C120.2 70.1996 120.2 70.1996 120.3 70.0996C120.3 69.9996 120.4 69.8996 120.5 69.7996C121.6 68.5996 122.8 67.4996 124.1 66.4996C124.8 69.7996 125.6 72.9996 126.6 76.1996C126 78.6996 125.5 80.9996 125.2 82.7996C125 83.6996 124.9 84.4996 124.7 85.1996L116 85.9996C117.7 81.5996 119.3 77.1996 120 73.7996ZM127.3 76.8996C128.7 77.7996 130.7 78.1996 133 78.1996C136.5 78.1996 140.5 77.1996 143.8 75.5996C146.3 77.5996 148.3 80.0996 149.7 82.8996L125.7 84.9996C125.8 84.3996 126 83.5996 126.1 82.7996C126.4 81.1996 126.8 79.0996 127.3 76.8996ZM146.4 74.0996C150.5 75.7996 154 78.6996 156.4 82.2996L150.8 82.7996C149.4 79.7996 147.3 77.1996 144.7 75.0996C145.4 74.7996 145.9 74.4996 146.4 74.0996ZM174.9 79.7996C174 80.4996 172.9 80.9996 171.8 81.0996L157.6 82.2996C155.1 78.2996 151.4 75.0996 147 73.2996C148.5 69.7996 150.4 65.4996 152.1 61.8996L158.4 72.4996C161.3 77.6996 165.6 80.7996 170.1 80.7996C170.2 80.7996 170.3 80.7996 170.4 80.7996C172.3 80.6996 174.1 80.0996 175.8 78.9996C175.5 79.2996 175.2 79.4996 174.9 79.7996ZM184.4 63.6996C183.5 65.6996 182.6 67.8996 181.4 70.2996C180 73.0996 178.6 75.0996 177.1 76.5996C177 76.5996 177 76.6996 176.9 76.7996C174.5 79.0996 172.1 79.6996 170.3 79.7996C166.1 79.8996 162 76.9996 159.3 71.9996L152.7 60.7996C153.7 58.6996 154.6 56.9996 155.3 55.9996C155.4 55.7996 155.4 55.4996 155.1 55.2996C154.9 55.1996 154.6 55.1996 154.4 55.4996C152.3 58.6996 148.2 67.7996 146 73.1996C140.8 76.8996 131.2 78.7996 127.5 75.6996C126.5 72.3996 125.6 69.0996 124.9 65.6996C125.5 65.2996 126.2 64.8996 126.8 64.4996C127.6 63.9996 128.4 63.5996 129 63.1996C129.3 62.9996 129.5 62.5996 129.3 62.1996C129 61.6996 128.3 61.5996 127.6 61.7996C127.8 61.5996 128 61.4996 128.2 61.2996C128.9 60.6996 129.6 60.0996 130.2 59.5996C130.5 59.2996 130.5 58.8996 130.3 58.5996C129.8 57.8996 128.4 58.3996 127.5 58.8996C127.3 58.9996 127.2 59.0996 127 59.1996C127.1 59.0996 127.3 58.8996 127.4 58.7996C129.5 56.6996 129.4 55.9996 129.1 55.5996C128.6 54.9996 127.7 55.2996 125.6 56.4996C125.2 56.7996 124.8 57.0996 124.4 57.3996C124.7 55.1996 125.4 53.1996 126.6 51.2996C126.7 51.0996 126.7 50.7996 126.5 50.5996C126.3 50.4996 126 50.4996 125.8 50.6996C124.4 52.8996 123.5 55.4996 123.3 58.0996C121.3 59.5996 119.5 61.2996 117.8 63.0996C117.6 63.1996 117.5 63.2996 117.5 63.2996C117.3 63.0996 117.2 61.9996 117.2 61.0996C119.4 53.7996 123.7 49.5996 126.6 46.8996C126.8 46.6996 126.9 46.5996 127 46.4996C127.1 46.7996 127.2 47.0996 127.4 47.4996C127.7 48.2996 128.2 48.8996 128.9 49.3996C129.6 49.8996 130.3 50.1996 131.2 50.2996C131.4 50.2996 131.6 50.2996 131.9 50.2996C132.5 50.2996 133.1 50.1996 133.7 49.9996C134.5 49.6996 135.2 49.1996 135.7 48.4996C138.6 44.6996 142 41.2996 145.7 38.2996C146.5 38.2996 147.3 38.2996 147.9 38.2996C154 38.0996 156.8 37.9996 168.2 62.2996L166 67.1996C165.9 67.4996 166 67.6996 166.3 67.8996C166.4 67.8996 166.4 67.8996 166.5 67.8996C166.7 67.8996 166.9 67.7996 167 67.5996L169.2 62.5996C171.5 57.6996 174.2 52.8996 177.2 48.3996C178.9 49.9996 180.7 51.3996 182.7 52.5996C184.5 53.6996 186.2 54.4996 187.8 54.8996H187.9C188.1 54.9996 188.4 55.0996 188.6 55.0996C187 57.7996 185.8 60.5996 184.4 63.6996ZM187.7 53.6996C186.1 53.0996 184.6 52.3996 183.2 51.5996C181.9 50.7996 180.6 49.7996 179.1 48.6996C179.5 47.9996 180.4 46.2996 180.4 46.1996C180.7 45.5996 180.9 44.8996 180.8 44.1996C180.7 43.4996 180.4 42.7996 180 42.2996C177.2 38.9996 177.4 38.1996 177.4 38.1996C177.6 37.8996 179.1 38.9996 179.7 39.4996C180.7 40.1996 181.6 40.8996 182.5 40.9996C183 41.0996 183.4 40.5996 183.7 39.9996C183.7 39.9996 183.7 40.0996 183.8 40.0996C184.8 41.0996 185.6 42.2996 186.1 43.5996C186.6 44.8996 186.8 46.2996 186.7 47.6996C186.7 47.9996 186.9 48.1996 187.2 48.1996C187.5 48.1996 187.7 47.9996 187.7 47.6996C187.8 46.0996 187.5 44.5996 187 43.0996C186.4 41.5996 185.6 40.2996 184.5 39.1996C184.4 39.0996 184.2 38.9996 184 39.0996C184.1 38.5996 184.2 38.1996 184.2 38.1996L184.5 36.4996C184.7 34.9996 185 33.0996 185.1 32.7996C185.2 31.7996 185.4 31.2996 185.5 30.9996C185.6 31.2996 185.7 31.8996 185.7 32.8996C185.7 35.4996 185.7 37.2996 185.7 37.6996C185.7 37.7996 185.7 37.7996 185.6 37.8996C185.4 37.7996 185.2 37.7996 185 37.6996C184.7 37.5996 184.5 37.7996 184.4 37.9996C184.3 38.2996 184.5 38.4996 184.7 38.5996C187.6 39.4996 189.2 40.9996 191 43.3996C191.1 43.4996 191.2 43.5996 191.4 43.5996C191.5 43.5996 191.6 43.5996 191.7 43.4996L191.8 43.3996C191.7 43.6996 191.6 43.9996 191.5 44.2996C191.1 45.9996 188.4 51.9996 187.7 53.6996ZM193.7 36.9996C193.5 37.6996 193.3 38.3996 193.1 39.0996C192.7 40.3996 192.3 41.7996 191.9 43.0996C191.9 42.9996 191.9 42.8996 191.8 42.7996C191.4 42.1996 190.9 41.6996 190.5 41.1996C191.6 39.6996 192.5 38.0996 193.2 36.4996C193.6 35.6996 193.8 35.1996 194 34.9996C194 35.4996 194 36.0996 193.7 36.9996Z"
        fill="currentColor"
      />
      <path
        d="M160.7 99.8996C161.1 100.6 161.6 101.2 162.3 101.5C162.9 101.8 163.5 102 164.1 102C164.2 102 164.4 102 164.5 102C165 101.9 165.5 101.8 166 101.5C166.5 101.2 166.9 100.9 167.2 100.5C167.5 100.1 167.8 99.5996 167.9 99.0996C168 98.5996 168.1 98.0996 168 97.5996L167.5 92.3996C167.4 91.3996 166.9 90.3996 166.1 89.7996C165.3 89.0996 164.3 88.7996 163.2 88.9996C162.2 89.0996 161.2 89.5996 160.6 90.3996C159.9 91.1996 159.6 92.1996 159.7 93.2996L160.2 98.4996C160.3 98.8996 160.5 99.3996 160.7 99.8996ZM161.4 90.9996C161.9 90.3996 162.6 89.9996 163.4 89.8996C163.5 89.8996 163.6 89.8996 163.7 89.8996C164.4 89.8996 165 90.0996 165.5 90.4996C166.1 90.9996 166.5 91.6996 166.6 92.4996L167.1 97.6996C167.1 98.0996 167.1 98.4996 167 98.7996C166.9 99.1996 166.7 99.4996 166.5 99.7996C166.3 100.1 166 100.4 165.6 100.5C165.3 100.7 164.9 100.8 164.5 100.8C163.9 100.9 163.3 100.7 162.8 100.5C162.3 100.2 161.9 99.7996 161.6 99.2996C161.4 98.9996 161.3 98.5996 161.3 98.1996L160.8 92.9996C160.6 92.3996 160.9 91.5996 161.4 90.9996Z"
        fill="currentColor"
      />
      <path
        d="M170.4 94.9996C170.4 94.6996 170.1 94.4996 169.9 94.5996C169.6 94.5996 169.4 94.8996 169.5 95.0996L169.8 97.5996C170 99.0996 169.5 100.5 168.6 101.6C167.7 102.7 166.4 103.5 164.9 103.6C163.4 103.7 162 103.3 160.9 102.4C159.8 101.5 159 100.2 158.9 98.6996L158.6 96.1996C158.6 95.8996 158.3 95.6996 158.1 95.7996C157.8 95.7996 157.6 96.0996 157.7 96.2996L158 98.7996C158.2 100.5 159 102.1 160.4 103.2C161.6 104.1 163 104.7 164.5 104.7C164.6 104.7 164.6 104.7 164.7 104.7L165.1 108.5L163.1 108.7C162.8 108.7 162.6 109 162.7 109.2C162.7 109.5 162.9 109.6 163.2 109.6C163.2 109.6 163.2 109.6 163.3 109.6L168.3 109C168.6 109 168.8 108.7 168.7 108.5C168.7 108.2 168.4 108 168.2 108.1L166.2 108.3L165.8 104.5C167.3 104.2 168.7 103.4 169.7 102.2C170.8 100.9 171.3 99.1996 171.1 97.3996L170.4 94.9996Z"
        fill="currentColor"
      />
      <path
        d="M105.7 113.9C105 114 104.3 114.2 103.7 114.5C103.1 114.8 102.5 115.3 102.1 115.8C101.6 116.3 101.3 117 101.1 117.6C100.9 118.3 100.8 119 100.9 119.7L101.4 125.2C101.5 125.9 101.7 126.6 102 127.2C102.3 127.8 102.8 128.4 103.3 128.8C103.8 129.3 104.5 129.6 105.2 129.8C105.7 130 106.3 130 106.8 130C107 130 107.1 130 107.3 130L119.1 129C119.8 128.9 120.5 128.7 121.1 128.4C122.1 127.9 122.8 127.1 123.3 126.2C123.6 125.6 123.8 125 123.9 124.3L129.3 126.8C129.4 126.8 129.4 126.8 129.5 126.8C129.6 126.8 129.7 126.8 129.8 126.7C129.9 126.6 130 126.4 130 126.2L128.9 113.2C128.9 113 128.8 112.9 128.6 112.8C128.4 112.7 128.2 112.7 128.1 112.8L123.2 116.2C122.9 115.2 122.3 114.2 121.4 113.5C120.3 112.7 119 112.3 117.6 112.4L105.7 113.9ZM128.8 125.8L123.8 123.4V123.3L123.3 117.7L127.9 114.5L128.8 125.8ZM117.5 113.9C117.6 113.9 117.8 113.9 117.9 113.9C118.9 113.9 119.8 114.2 120.6 114.8C121.5 115.5 122.1 116.5 122.2 117.5L122.7 123.4C122.8 124.3 122.6 125.1 122.2 125.9C121.8 126.7 121.1 127.3 120.4 127.7C119.9 128 119.3 128.1 118.8 128.2L107 129.2C106.4 129.3 105.8 129.2 105.3 129C104.7 128.8 104.2 128.5 103.8 128.2C103.4 127.8 103 127.4 102.7 126.9C102.4 126.4 102.3 125.8 102.2 125.2L101.7 119.7C101.6 119.1 101.7 118.5 101.9 118C102.1 117.4 102.3 116.9 102.7 116.5C103.1 116.1 103.5 115.7 104 115.4C104.5 115.1 105.1 115 105.7 114.9L117.5 113.9Z"
        fill="currentColor"
      />
      <path
        d="M17.7999 87.8996L21.7999 87.4996C22.0999 87.4996 22.2999 87.1996 22.1999 86.9996C22.1999 86.6996 21.8999 86.4996 21.6999 86.5996L17.7999 86.9996C17.4999 86.9996 17.2999 87.2996 17.3999 87.4996C17.2999 87.6996 17.4999 87.8996 17.7999 87.8996Z"
        fill="currentColor"
      />
      <path
        d="M28.1999 86.2996C28.1999 86.5996 28.3999 86.7996 28.6999 86.7996C28.6999 86.7996 28.6999 86.7996 28.7999 86.7996L32.6999 86.3996C32.9999 86.3996 33.1999 86.0996 33.0999 85.8996C32.9999 85.6996 32.7999 85.3996 32.5999 85.4996L28.6999 85.8996C28.3999 85.7996 28.1999 85.9996 28.1999 86.2996Z"
        fill="currentColor"
      />
      <path
        d="M24.8999 83.5996C25.1999 83.5996 25.3999 83.2996 25.3999 83.0996L24.9999 79.0996C24.9999 78.7996 24.6999 78.5996 24.4999 78.6996C24.1999 78.6996 23.9999 78.9996 24.0999 79.1996L24.4999 83.0996C24.3999 83.3996 24.5999 83.5996 24.8999 83.5996Z"
        fill="currentColor"
      />
      <path
        d="M25.0999 90.1996L25.4999 94.0996C25.4999 94.3996 25.6999 94.5996 25.9999 94.5996C25.9999 94.5996 25.9999 94.5996 26.0999 94.5996C26.3999 94.5996 26.5999 94.2996 26.4999 94.0996L26.0999 90.1996C26.0999 89.8996 25.7999 89.6996 25.5999 89.7996C25.2999 89.5996 25.0999 89.8996 25.0999 90.1996Z"
        fill="currentColor"
      />
      <path
        d="M22.1999 84.7996C22.2999 84.8996 22.3999 84.8996 22.4999 84.8996C22.5999 84.8996 22.7999 84.7996 22.8999 84.6996C23.0999 84.4996 22.9999 84.1996 22.7999 83.9996L19.6999 81.4996C19.4999 81.2996 19.1999 81.3996 18.9999 81.5996C18.7999 81.7996 18.8999 82.0996 19.0999 82.2996L22.1999 84.7996Z"
        fill="currentColor"
      />
      <path
        d="M27.5999 88.4996C27.3999 88.6996 27.4999 88.9996 27.6999 89.1996L30.7999 91.6996C30.8999 91.7996 30.9999 91.7996 31.0999 91.7996C31.1999 91.7996 31.3999 91.6996 31.4999 91.5996C31.6999 91.3996 31.5999 91.0996 31.3999 90.8996L28.2999 88.3996C28.0999 88.2996 27.6999 88.2996 27.5999 88.4996Z"
        fill="currentColor"
      />
      <path
        d="M27.4999 84.3996C27.5999 84.3996 27.7999 84.2996 27.8999 84.1996L30.3999 81.0996C30.5999 80.8996 30.4999 80.5996 30.2999 80.3996C30.0999 80.1996 29.7999 80.2996 29.5999 80.4996L27.0999 83.5996C26.8999 83.7996 26.9999 84.0996 27.1999 84.2996C27.1999 84.3996 27.3999 84.3996 27.4999 84.3996Z"
        fill="currentColor"
      />
      <path
        d="M22.5999 88.9996L20.0999 92.0996C19.8999 92.2996 19.9999 92.5996 20.1999 92.7996C20.2999 92.8996 20.3999 92.8996 20.4999 92.8996C20.5999 92.8996 20.7999 92.7996 20.8999 92.6996L23.3999 89.5996C23.5999 89.3996 23.4999 89.0996 23.2999 88.8996C23.0999 88.7996 22.7999 88.7996 22.5999 88.9996Z"
        fill="currentColor"
      />
      <path
        d="M62.7999 40.2996C63.1999 40.4996 63.5999 40.4996 63.9999 40.4996C64.1999 40.4996 64.2999 40.4996 64.4999 40.4996C65.0999 40.3996 65.5999 40.0996 65.9999 39.6996C66.5999 39.1996 66.8999 38.3996 66.8999 37.5996C66.8999 36.7996 66.5999 36.0996 66.0999 35.4996C65.6999 35.0996 65.1999 34.7996 64.5999 34.6996C63.9999 34.5996 63.3999 34.5996 62.8999 34.7996C62.3999 34.9996 61.8999 35.3996 61.5999 35.8996C61.2999 36.3996 61.0999 36.8996 61.0999 37.4996C61.0999 38.0996 61.1999 38.6996 61.5999 39.0996C61.8999 39.5996 62.2999 39.9996 62.7999 40.2996ZM62.3999 36.4996C62.5999 36.1996 62.8999 35.8996 63.2999 35.7996C63.4999 35.6996 63.7999 35.6996 63.9999 35.6996C64.0999 35.6996 64.2999 35.6996 64.3999 35.6996C64.7999 35.7996 65.0999 35.9996 65.3999 36.2996C65.7999 36.6996 65.8999 37.1996 65.8999 37.6996C65.8999 38.1996 65.6999 38.6996 65.2999 39.0996C64.9999 39.3996 64.6999 39.4996 64.2999 39.5996C63.8999 39.6996 63.4999 39.5996 63.1999 39.4996C62.7999 39.2996 62.5999 39.0996 62.2999 38.7996C62.0999 38.4996 61.9999 38.0996 61.9999 37.6996C62.0999 37.0996 62.1999 36.7996 62.3999 36.4996Z"
        fill="currentColor"
      />
      <path
        d="M161.9 13.1996C162 13.1996 162 13.1996 161.9 13.1996L166.6 12.7996L167 17.4996C167 17.7996 167.2 17.9996 167.5 17.9996C167.8 17.9996 168 17.6996 168 17.4996L167.6 12.7996L172.3 12.3996C172.6 12.3996 172.8 12.0996 172.8 11.8996C172.8 11.5996 172.5 11.3996 172.3 11.3996L167.6 11.7996L167.2 7.09961C167.2 6.79961 166.9 6.59961 166.7 6.59961C166.4 6.59961 166.2 6.89961 166.2 7.09961L166.6 11.7996L162 12.1996C161.7 12.1996 161.5 12.4996 161.5 12.6996C161.5 12.9996 161.7 13.1996 161.9 13.1996Z"
        fill="currentColor"
      />
    </svg>
  </SvgIcon>
)

export default VideoConferenceImage
