import { FC } from 'react'

import { SvgIcon, SvgIconProps } from '@mui/material'

const TrophyAwardsImage: FC<SvgIconProps> = ({ sx, ...props }) => (
  <SvgIcon sx={{ fontSize: 200, color: 'primary.dark', ...sx }} {...props}>
    <svg
      width="200"
      height="200"
      viewBox="0 0 200 200"
      fill="none"
      xmlns="http://www.w3.org/2000/svg"
    >
      <path
        d="M57.9001 55.5C56.2001 54.5 55.7001 52.9 56.3001 50.5C56.4001 50.2 56.2001 50 55.9001 49.9C55.6001 49.8 55.4001 50 55.3001 50.3C54.5001 53.1 55.2001 55.1 57.3001 56.4C57.4001 56.4 57.5001 56.5 57.6001 56.5C57.8001 56.5 57.9001 56.4 58.0001 56.3C58.2001 56 58.2001 55.7 57.9001 55.5Z"
        fill="currentColor"
      />
      <path
        d="M137.5 92.3C136.7 92.1 135.9 92.1 135.1 92.4C134.3 92.7 133.7 93.2 133.2 93.9C132.7 94.6 132.5 95.4 132.6 96.2C132.6 97 132.9 97.8 133.5 98.4C134 99 134.7 99.5 135.5 99.7C135.8 99.8 136.1 99.8 136.4 99.8C136.9 99.8 137.4 99.7 137.9 99.5C138.6 99.2 139.2 98.7 139.6 98.1C140 97.5 140.2 96.7 140.2 96C140.2 95.2 139.9 94.4 139.4 93.7C139 93 138.3 92.5 137.5 92.3ZM139.3 96C139.3 96.6 139.1 97.1 138.8 97.6C138.5 98.1 138 98.4 137.5 98.6C136.9 98.8 136.3 98.9 135.7 98.7C135.1 98.6 134.6 98.2 134.2 97.8C133.8 97.3 133.6 96.7 133.6 96.1C133.6 95.5 133.7 94.9 134.1 94.4C134.4 93.9 134.9 93.5 135.5 93.3C135.8 93.2 136.1 93.1 136.5 93.1C136.8 93.1 137.1 93.1 137.3 93.2C137.9 93.4 138.4 93.7 138.8 94.2C139.1 94.8 139.3 95.4 139.3 96Z"
        fill="currentColor"
      />
      <path
        d="M140.5 151.8C140.7 151.8 140.9 151.8 141.1 151.7C141.5 151.6 141.8 151.4 142.1 151.2C142.4 151 142.6 150.7 142.8 150.4C143 150.1 143 149.7 143 149.4C143 148.8 142.7 148.1 142.3 147.7C141.9 147.3 141.4 147 140.8 147C140.2 146.9 139.7 147.1 139.2 147.4C138.8 147.7 138.5 148 138.3 148.5C138.1 149 138.1 149.4 138.2 149.9C138.3 150.4 138.5 150.8 138.9 151.2C139.2 151.5 139.7 151.8 140.2 151.9C140.2 151.8 140.4 151.8 140.5 151.8ZM139.1 149.6C139 149.3 139.1 149 139.2 148.8C139.3 148.5 139.5 148.3 139.7 148.1C139.9 147.9 140.2 147.9 140.5 147.9H140.6C140.9 147.9 141.2 148.1 141.5 148.3C141.8 148.6 141.9 148.9 141.9 149.3C141.9 149.5 141.9 149.7 141.8 149.9C141.7 150.1 141.6 150.3 141.4 150.4C141.2 150.5 141 150.6 140.8 150.7C140.6 150.8 140.4 150.8 140.2 150.7C139.9 150.6 139.7 150.5 139.5 150.3C139.3 150.2 139.2 149.9 139.1 149.6Z"
        fill="currentColor"
      />
      <path
        d="M73.5001 33.1H76.4001V36C76.4001 36.3 76.6001 36.5 76.9001 36.5C77.2001 36.5 77.4001 36.3 77.4001 36V33.1H80.3001C80.6001 33.1 80.8001 32.9 80.8001 32.6C80.8001 32.3 80.6001 32.1 80.3001 32.1H77.4001V29.2C77.4001 28.9 77.2001 28.7 76.9001 28.7C76.6001 28.7 76.4001 28.9 76.4001 29.2V32.1H73.5001C73.2001 32.1 73.0001 32.3 73.0001 32.6C73.0001 32.9 73.2001 33.1 73.5001 33.1Z"
        fill="currentColor"
      />
      <path
        d="M61.8001 128.6C61.5001 128.5 61.3001 128.6 61.1001 128.9L58.8001 134.1C58.7001 134.3 58.7001 134.4 58.8001 134.6C58.9001 134.7 59.1001 134.8 59.2001 134.8H62.7001L60.7001 139.3C60.6001 139.6 60.7001 139.8 61.0001 140C61.1001 140 61.1001 140 61.2001 140C61.4001 140 61.6001 139.9 61.7001 139.7L64.0001 134.5C64.1001 134.3 64.1001 134.2 64.0001 134C63.9001 133.9 63.7001 133.8 63.6001 133.8H60.1001L62.1001 129.3C62.2001 129 62.1001 128.8 61.8001 128.6Z"
        fill="currentColor"
      />
      <path
        d="M64.1001 167.4C64.3001 167.3 64.3001 167.1 64.3001 166.9L63.6001 164.5L65.6001 163C65.8001 162.9 65.8001 162.7 65.8001 162.4C65.8001 162.1 65.5001 162.1 65.3001 162.1L62.8001 162L62.0001 159.6C61.9001 159.2 61.2001 159.2 61.1001 159.6L60.3001 162L57.8001 162.1C57.6001 162.1 57.4001 162.2 57.3001 162.4C57.2001 162.6 57.3001 162.8 57.5001 163L59.5001 164.5L58.8001 166.9C58.7001 167.1 58.8001 167.3 59.0001 167.4C59.1001 167.5 59.2001 167.5 59.3001 167.5C59.4001 167.5 59.5001 167.5 59.6001 167.4L61.7001 166L63.8001 167.4C63.7001 167.5 63.9001 167.5 64.1001 167.4ZM61.7001 164.9C61.6001 164.8 61.5001 164.8 61.4001 164.8C61.3001 164.8 61.2001 164.8 61.1001 164.9L59.9001 165.7L60.3001 164.3C60.4001 164.1 60.3001 163.9 60.1001 163.8L59.0001 163H60.5001C60.7001 163 60.9001 162.9 61.0001 162.7L61.5001 161.3L62.0001 162.7C62.1001 162.9 62.3001 163 62.5001 163H64.0001L62.8001 163.9C62.6001 164 62.6001 164.2 62.6001 164.4L63.0001 165.8L61.7001 164.9Z"
        fill="currentColor"
      />
      <path
        d="M173.4 194H159.1V180.5C159.1 180.2 158.9 180 158.6 180H148.3V176.8C148.3 176.5 148.1 176.3 147.8 176.3H142.9V154.6C144.9 154.1 146.8 153.1 148.2 151.7C148.3 151.7 148.4 151.7 148.5 151.7C150.4 151.7 152.2 151.2 153.9 150.3C155.7 149.3 157.2 147.9 158.2 146.1C158.3 145.9 158.3 145.8 158.2 145.6C158.1 145.4 157.9 145.4 157.8 145.4H151.4C151.5 145 151.5 144.5 151.5 144.1C151.5 143.8 151.3 143.6 151 143.6H130.3C130.2 143.6 130 143.7 129.9 143.7C129.8 143.8 129.8 143.9 129.8 144.1C129.8 144.5 129.8 145 129.9 145.4H123.5C123.3 145.4 123.2 145.5 123.1 145.6C123 145.8 123 145.9 123.1 146.1C124.1 147.9 125.6 149.3 127.4 150.3C129 151.2 130.9 151.7 132.8 151.7C132.9 151.7 132.9 151.7 133 151.7C134.4 153.2 136.3 154.2 138.3 154.6V176.3H133.4C133.1 176.3 132.9 176.5 132.9 176.8V180H120.9V175.5C120.9 175.2 120.7 175 120.4 175H112.6C112.3 174.3 111.9 173.7 111.4 173.2C110.6 172.2 109.6 171.5 108.4 170.9C107.4 170.4 106.3 170.1 105.2 170.1C104.2 165.4 103.9 160.5 104.4 155.7C105 155.5 105.7 155.3 106.3 155C106.5 154.9 106.6 154.8 106.6 154.6L110.7 90.1C111.5 87.4 112.4 85.5 113.2 83.7C114.2 81.6 115.1 79.7 115.3 77.2C118.4 75.6 122.6 73.4 125 71.2C125.1 71.1 125.2 71 125.2 70.8C125.2 70 125.1 69.2 124.9 68.3C132 64.2 139 59.7 145.7 54.8C148.6 52.7 151 52.2 153 52V66.6C153 66.9 153.2 67.1 153.5 67.1C153.8 67.1 154 66.9 154 66.6V51.9H154.1L154.7 51.8C154.8 51.8 155 51.8 155.1 51.8C156 51.8 156.6 51.1 156.7 50.2C156.7 49.8 156.6 49.3 156.3 49C156.9 48.8 157.3 48.2 157.3 47.5C157.3 47 157.1 46.5 156.8 46.2C157.2 45.9 157.4 45.3 157.4 44.8C157.4 44.3 157.1 43.7 156.7 43.4C157.1 43 157.2 42.5 157.2 42C157.2 41.2 156.5 40.2 155.3 40.3H154.6C154.4 40.3 154.2 40.3 154 40.3V5.5C154 5.2 153.8 5 153.5 5C153.2 5 153 5.2 153 5.5V8.6C145.5 6.1 137.9 7.5 130.6 8.8C123.2 10.1 115.6 11.5 108.1 8.8C107.9 8.7 107.8 8.8 107.6 8.9C107.5 9 107.4 9.1 107.4 9.3V32.3C107.4 32.5 107.5 32.7 107.7 32.8C111 34 114.2 34.4 117.5 34.4C122 34.4 126.4 33.6 130.7 32.8C138 31.5 145.5 30.1 152.9 32.7V39.4C152.5 39.3 151.9 39.2 151.2 39.1C150 39 146.7 41.2 140 45.7C133.6 50 125.6 55.3 118.2 59.2C115.2 61 112.1 62.7 108.9 64.2C107.8 64.7 107.5 64.8 107.1 64.6C106.8 64.5 106.6 64.3 106.5 64.1C106.3 63.9 106.2 63.6 106.2 63.4C106.2 63.2 106.3 63 106.3 62.8C107.5 62.9 108.3 62.3 108.7 61.8C110.2 59.9 109.6 55.8 108.3 52.6C107.5 51 105.8 48.2 103.3 47.7C102.4 47.5 101.5 47.6 100.5 48.1C100.6 47.6 100.7 47.1 100.7 46.6C100.6 45.4 100.1 44.3 99.2001 43.4C98.5001 42.8 97.7001 42.5 96.8001 42.4C95.9001 42.3 95.0001 42.5 94.3001 42.9C93.5001 43.3 92.9001 43.9 92.4001 44.7C92.0001 45.5 91.8001 46.3 91.8001 47.2C91.9001 48.1 92.2001 48.9 92.7001 49.6C93.2001 50.3 93.9001 50.8 94.8001 51.1C95.3001 51.3 95.8001 51.4 96.3001 51.4C96.6001 51.4 96.9001 51.4 97.2001 51.3C96.5001 52.5 96.2001 53.7 96.3001 55C96.6001 57.3 98.4001 59.5 101.4 61.2C101.3 63.3 100.8 64.3 99.6001 64.7C99.3001 64.8 99.0001 64.8 98.7001 64.8C95.2001 64.3 91.7001 63.5 88.4001 62.3C77.6001 58.5 66.3001 53.3 63.1001 51.8L63.0001 51.7C62.1001 51.3 61.3001 50.2 61.4001 49.6C61.5001 49.3 61.5001 49 61.6001 48.7C62.0001 47 62.2001 45.9 61.8001 45.3C61.7001 45.1 61.5001 45 61.2001 44.9C60.1001 44.7 59.4001 46 58.8001 47.2C58.4001 47.9 58.0001 48.8 57.7001 49C57.4001 49 56.7001 48.5 56.2001 48.1L54.8001 46.8C54.0001 46 53.1001 45.2 52.9001 45C51.7001 43.8 50.8001 43.4 50.2001 43.9C49.7001 44.4 49.9001 45.3 50.9001 46.5C51.2001 46.9 51.5001 47.3 51.8001 47.8C50.5001 46.9 49.2001 46 49.1001 45.9C47.7001 44.8 46.7001 44.5 46.3001 45.1C45.8001 45.6 46.1001 46.5 47.2001 47.7C47.8001 48.4 48.5001 49.1 49.2001 49.8C49.0001 49.7 48.8001 49.6 48.6001 49.5C46.9001 48.6 46.0001 48.5 45.6001 49C45.2001 49.6 45.8001 50.4 47.2001 51.5C47.8001 52 48.4001 52.4 48.8001 52.7C48.5001 52.6 48.2001 52.5 47.9001 52.4C46.1001 51.7 45.2001 51.7 44.9001 52.3C44.7001 52.7 44.7001 53.3 46.7001 54.5C47.3001 54.8 47.8001 55.2 48.4001 55.5L49.3001 56C50.4001 56.6 51.4001 57.2 52.5001 57.8C58.0001 61 71.8001 67.9 82.1001 71.9C82.0001 73.8 82.5001 75.1 83.5001 75.4C86.6001 76.5 89.7001 77.6 92.8001 78.5C93.7001 80.8 94.3001 83.2 94.7001 85.7C89.1001 88.7 81.9001 97.9 80.2001 100.1L69.8001 87.5C69.7001 87.3 69.5001 87.3 69.3001 87.3C68.8001 87.4 68.4001 87.6 67.9001 87.8L61.8001 80.6L60.1001 78.6C60.0001 78.5 59.9001 78.5 59.8001 78.4C52.8001 77.1 40.2001 76.5 35.7001 78.7C35.5001 78.8 35.4001 78.9 35.4001 79.1C35.4001 79.3 35.5001 79.4 35.6001 79.5C36.4001 80.1 37.2001 80.8 38.0001 81.3C42.1001 84.2 46.6001 86.7 51.3001 88.6C53.0001 89.1 54.5001 89.9 55.7001 91.1L58.9001 94.7C58.4001 95.3 58.0001 95.9 57.6001 96.6C57.5001 96.8 57.5001 97 57.7001 97.2L72.1001 113.6C73.7001 115.5 76.0001 116.7 78.5001 117C81.0001 117.4 83.5001 116.8 85.6001 115.5L93.8001 110.3L90.5001 154.7C90.5001 154.9 90.6001 155.1 90.8001 155.2C91.6001 155.5 92.5001 155.7 93.3001 155.9C93.4001 157.7 93.3001 159.5 92.8001 161.3C92.7001 161.6 92.6001 161.9 92.5001 162.2L92.4001 162.4V162.5C91.7001 165.1 91.9001 165.7 92.9001 166.6C93.0001 166.7 93.2001 166.9 93.4001 167.1C94.6001 168.7 95.3001 170.6 95.4001 172.6C95.5001 173.5 95.9001 174.4 96.6001 175H81.7001C81.4001 175 81.2001 175.2 81.2001 175.5V184.5H66.7001L66.3001 181.9V181.8C66.2001 181.7 66.1001 181.6 66.0001 181.6C63.2001 180.6 62.9001 179.8 62.9001 176.9C63.0001 175.8 63.4001 174.7 64.0001 173.8C64.6001 172.9 65.2001 172 65.7001 171.1C68.7001 171 74.1001 167.5 74.1001 159.4C74.1001 159.1 73.9001 158.9 73.6001 158.9H68.6001C68.6001 158.3 68.6001 157.8 68.6001 157.2C68.6001 156.9 68.4001 156.7 68.1001 156.7H54.8001C54.5001 156.7 54.3001 156.9 54.3001 157.2C54.3001 157.8 54.3001 158.4 54.3001 158.9H49.3001C49.0001 158.9 48.8001 159.1 48.8001 159.4C48.8001 167.4 54.3001 170.9 57.3001 171.1C57.8001 171.9 58.3001 172.8 58.8001 173.6C59.5001 174.6 59.9001 175.7 60.0001 176.8C59.9001 179.8 59.6001 180.6 56.9001 181.5C56.7001 181.6 56.6001 181.7 56.6001 181.9L56.2001 184.5H43.3001C43.0001 184.5 42.8001 184.7 42.8001 185V194H26.6001C26.3001 194 26.1001 194.2 26.1001 194.5C26.1001 194.8 26.3001 195 26.6001 195H173.3C173.6 195 173.8 194.8 173.8 194.5C173.8 194.2 173.7 194 173.4 194ZM155 50.8C154.9 50.8 154.8 50.8 154.7 50.8C154.7 50.8 154.7 50.8 154.6 50.8C154.1 50.8 153.6 50.7 153 50.6C152.6 50.5 152.2 50.5 151.6 50.4C151 50.3 150.7 49.9 150.7 49.6C150.7 49.3 151 49.1 151.5 49.1C152.7 49.2 153.6 49.2 154.5 49.3H154.8C155.4 49.4 155.6 49.8 155.6 50.2C155.5 50.3 155.5 50.8 155 50.8ZM153.8 44.3V43.9C154 43.9 154.2 43.9 154.3 43.9C154.6 43.9 154.9 43.9 155.3 43.9C156 43.9 156.2 44.4 156.2 44.8C156.2 45.1 156 45.5 155.6 45.5C155 45.5 154.4 45.5 153.6 45.4C153.4 45.4 153.1 45.4 152.9 45.3C153.4 45.3 153.7 44.9 153.8 44.3ZM155.6 48.2C154.4 48.2 153.3 48.1 152.1 47.9C151.4 47.8 151.1 47.4 151.1 47.1C151.1 46.7 151.4 46.5 151.9 46.5C153.1 46.5 154 46.6 154.9 46.6H155.2C155.9 46.6 156.1 47.1 156.1 47.5C156.1 47.8 156 48.2 155.6 48.2ZM152 45.4C151.9 45.4 151.8 45.4 151.7 45.3C151.6 45.2 151.5 45.2 151.4 45.1C151.3 45 151.3 44.9 151.3 44.8V44.7C151.6 45.1 151.9 45.3 152.1 45.4C152.1 45.4 152.1 45.4 152 45.4ZM150.7 45.8C150.7 45.9 150.6 45.9 150.6 46C150.6 45.9 150.7 45.8 150.7 45.8ZM154.4 41.3H155.1C155.8 41.3 155.9 41.9 155.9 42.1C155.9 42.4 155.8 42.8 155.4 42.8C154.9 42.8 154.3 42.8 153.8 42.8C153.8 42.2 153.9 41.7 153.8 41.3C154.1 41.3 154.3 41.3 154.4 41.3ZM140.5 46.4C145.2 43.2 150.1 40 151.1 40C153 40.1 153 40.1 152.8 43.3L152.7 44.3C152.7 44.4 152.7 44.5 152.5 44.5C152.2 44.5 151.5 43.9 151.4 42C151.4 42 151.4 42 151.4 41.9C151.4 41.6 151.1 41.4 150.9 41.5C150.6 41.5 150.4 41.8 150.5 42C150.5 42 150.5 42 150.5 42.1C150.7 44.3 149.8 46.1 148.1 46.6C147.8 46.7 147.7 47 147.8 47.2C147.9 47.5 148.2 47.6 148.4 47.5C149.1 47.3 149.8 46.8 150.3 46.3C150.2 46.5 150.1 46.7 150.1 46.9C150.1 47.4 150.3 47.8 150.6 48.2C150 48.5 149.7 49 149.7 49.5C149.6 50.1 150 50.9 150.8 51.2C149.1 51.6 147.2 52.3 145 53.9C138.5 58.7 131.6 63.1 124.6 67.1C123.7 64 121.8 61.1 119.4 59.4C126.6 55.7 134.3 50.6 140.5 46.4ZM102.5 60.7C102.5 59.1 102.3 57.6 102.1 56C102.1 55.8 101.9 55.7 101.8 55.6C101.3 55.4 101 55.1 100.9 54.7C100.9 54.5 101 54.2 101.1 54.2C101.3 54.1 101.5 54.2 101.6 54.3C102.1 54.7 102.5 54.8 102.9 54.7C103.1 54.6 103.3 54.5 103.4 54C103.6 52.4 104.4 51.3 105.2 51.2C106 51.1 106.8 51.7 107.4 52.9C108.6 55.7 109.1 59.6 107.9 61.1C107.5 61.6 106.9 61.8 106.1 61.7C105.5 61.6 105 61.4 104.4 61.2C104.2 61.1 103.9 61.2 103.8 61.4C103.7 61.6 103.7 61.8 103.8 62L105.2 63.5C105.3 63.9 105.4 64.3 105.6 64.6C105.7 64.7 105.8 64.8 105.8 64.8C104.5 65.2 102.9 65.1 101.1 64.7C102.3 63.8 102.5 62.2 102.5 60.7ZM99.8001 65.5C102.6 66.4 105.1 66.4 106.9 65.6C107.4 65.7 107.8 65.6 108.4 65.4L106.3 76.6L98.6001 65.6C98.6001 65.6 98.6001 65.6 98.7001 65.6C99.0001 65.6 99.4001 65.6 99.8001 65.5ZM106.5 78.3C107.1 78.3 107.8 78.6 108.2 79C108.7 79.5 108.9 80.1 108.9 80.7C108.9 81.3 108.6 82 108.2 82.4C107.3 83.3 105.7 83.3 104.8 82.4C104.3 81.9 104.1 81.3 104.1 80.7C104.1 80.1 104.4 79.4 104.8 79C105.3 78.5 105.9 78.3 106.5 78.3ZM47.9001 46.7C47.4001 46.2 47.2001 45.8 47.1001 45.6C47.4001 45.7 47.8001 45.9 48.5001 46.4C48.8001 46.6 52.2001 49 53.4001 49.9C53.2001 50.2 53.0001 50.5 52.8001 50.8C52.4001 50.7 52.0001 50.6 51.6001 50.5C51.1001 50 49.3001 48.2 47.9001 46.7ZM46.6001 49.3C46.9001 49.4 47.3001 49.5 48.0001 49.9C49.0001 50.5 50.0001 50.9 51.1001 51.3C51.2001 51.4 51.3001 51.4 51.4001 51.4C51.7001 51.5 52.0001 51.6 52.3001 51.6C52.1001 52 51.9001 52.5 51.8001 52.9C51.6001 52.9 51.4001 52.9 51.2001 52.8C51.0001 52.6 49.9001 51.9 47.7001 50.2C47.1001 49.9 46.8001 49.6 46.6001 49.3ZM49.7001 54.8L48.8001 54.3C48.2001 54 47.7001 53.7 47.2001 53.3C46.7001 53 46.4001 52.8 46.2001 52.6C46.5001 52.7 46.9001 52.8 47.5001 53C48.6001 53.4 49.8001 53.7 51.0001 53.9C51.2001 53.9 51.5001 53.9 51.7001 54C51.7001 54.1 51.7001 54.2 51.7001 54.3C51.7001 54.6 51.9001 54.8 52.1001 54.9C52.1001 54.9 52.1001 54.9 52.2001 54.9C52.4001 54.9 52.7001 54.7 52.7001 54.5C53.0001 52.5 53.9001 50.7 55.4001 49.3C55.6001 49.1 55.6001 48.8 55.4001 48.6C55.2001 48.4 54.9001 48.4 54.7001 48.6C54.5001 48.8 54.3001 49 54.1001 49.2C54.0001 49.1 53.9001 49 53.8001 49C53.3001 47.9 52.6001 46.8 51.8001 45.8C51.4001 45.3 51.2001 44.9 51.1001 44.7C51.3001 44.8 51.7001 45.1 52.3001 45.6C52.4001 45.7 53.3001 46.6 54.2001 47.4L55.6001 48.7C55.6001 48.7 57.4001 50.3 58.2001 49.7C58.8001 49.3 59.3001 48.4 59.7001 47.5C60.1001 46.8 60.6001 45.6 60.9001 45.6C61.1001 45.9 60.8001 47.4 60.6001 48.2C60.5001 48.5 60.5001 48.9 60.4001 49.2C60.2001 50.4 61.3001 51.9 62.5001 52.4L62.6001 52.5C65.9001 54 77.3001 59.2 88.1001 63C89.1001 63.4 89.1001 65.6 88.2001 68.3C87.7001 69.7 87.1001 71 86.4001 72C76.0001 68.6 59.1001 60.2 52.9001 56.5C51.9001 56 50.8001 55.4 49.7001 54.8ZM89.2001 68.6C89.8001 66.8 90.1001 64.9 89.7001 63.5C92.2001 64.3 94.7001 64.9 97.2001 65.3L105.7 77.4C105.1 77.6 104.6 77.8 104.1 78.3C103.5 78.9 103.1 79.8 103.1 80.7C103.1 81.6 103.5 82.5 104.1 83.1C104.7 83.7 105.6 84.1 106.5 84.1C107.4 84.1 108.3 83.7 108.9 83.1C109.5 82.5 109.9 81.6 109.9 80.7C109.9 79.8 109.5 78.9 108.9 78.3C108.4 77.8 107.8 77.5 107.1 77.4L109.5 65C112.5 63.5 115.5 61.9 118.4 60.2C121.5 62.1 124 66.6 124.1 70.6C121.9 72.6 118.1 74.6 115.2 76.1C115.2 75.2 115.2 74.4 115.1 73.5C115.1 73.2 114.8 73 114.5 73.1C114.2 73.1 114 73.4 114.1 73.7C114.2 74.8 114.3 75.8 114.2 76.9C114 79.4 113.2 81.1 112.2 83.3C111.4 85 110.5 86.9 109.7 89.6C106.6 91.2 98.9001 88.6 95.8001 85.4C95.5001 83.6 95.1001 81.8 94.5001 80L95.5001 78.6C95.6001 78.5 95.6001 78.3 95.6001 78.1C95.5001 77.9 95.4001 77.8 95.3001 77.8L94.8001 77.7C94.3001 77.6 93.9001 77.5 93.4001 77.3C90.7001 76.5 88.1001 75.7 85.5001 74.7C86.9001 73.7 88.3001 71.2 89.2001 68.6ZM65.6001 90.1L76.8001 103.3C77.9001 104.7 78.9001 105.3 80.0001 105.3C81.0001 105.3 82.0001 104.6 83.0001 103.3C88.8001 95.7 93.6001 90.5 97.3001 87.9C97.4001 88 97.6001 88.1 97.7001 88.1C92.3001 92 86.2001 99.9 82.9001 104.4C82.6001 104.8 82.1001 105.2 81.7001 105.5C81.2001 105.8 80.7001 105.9 80.1001 105.9C79.6001 105.9 79.0001 105.8 78.5001 105.6C78.0001 105.4 77.5001 105 77.2001 104.6L64.9001 90.5C65.1001 90.4 65.3001 90.3 65.6001 90.1ZM79.8001 100.9C79.9001 101 80.0001 101.1 80.2001 101.1C80.4001 101.1 80.5001 101 80.6001 100.9C80.7001 100.8 89.1001 89.6 95.2001 86.2C95.6001 86.6 96.0001 86.9 96.5001 87.3C92.8001 90 88.0001 95.2 82.3001 102.7C81.5001 103.8 80.7001 104.3 80.1001 104.3C79.3001 104.3 78.6001 103.8 77.7001 102.6L66.7001 89.6C67.6001 89.1 68.5001 88.7 69.5001 88.4L79.8001 100.9ZM59.4001 79.4L60.1001 80.3C53.4001 79.3 42.8001 78.8 38.3001 80.4C37.8001 80 37.3001 79.7 36.8001 79.3C41.3001 77.8 52.0001 78.1 59.4001 79.4ZM85.0001 114.7C83.1001 115.9 80.8001 116.4 78.6001 116.1C76.4001 115.8 74.3001 114.7 72.8001 113L58.6001 96.8C59.0001 96.2 59.4001 95.7 59.8001 95.1H59.9001C60.0001 95.1 60.0001 95 60.0001 94.9C61.2001 93.4 62.5001 92.2 64.0001 91.1L76.3001 105.3C76.8001 105.8 77.3001 106.3 78.0001 106.5C78.6001 106.8 79.2001 106.9 79.9001 106.9C80.0001 106.9 80.0001 106.9 80.1001 106.9C80.8001 106.9 81.5001 106.7 82.1001 106.4C82.7001 106.1 83.3001 105.6 83.7001 105C87.0001 100.5 93.3001 92.4 98.7001 88.7C101.4 90.1 104.6 91.1 107.2 91.1C108.1 91.1 108.9 91 109.5 90.8L105.4 154.3C102.4 155.5 99.3001 155.9 96.2001 155.6L99.6001 108.1L103.8 104.1C104 103.9 104 103.6 103.8 103.4C103.6 103.2 103.4 103.1 103.1 103.3L85.0001 114.7ZM94.6001 112.7L98.6001 108.9L95.3001 155.3C94.0001 155.1 92.8001 154.8 91.6001 154.4L94.6001 112.7ZM96.4001 172.5C96.3001 170.3 95.5001 168.2 94.2001 166.5C94.0001 166.3 93.8001 166.1 93.6001 165.9C93.1001 165.4 92.8001 165.1 93.2001 163.5C93.4001 163.7 93.7001 163.9 94.0001 164.1C94.1001 164.2 94.1001 164.2 94.2001 164.3C94.5001 164.6 94.9001 164.9 95.0001 165C95.2001 165.2 95.3001 165.4 95.4001 165.7C95.5001 165.9 95.7001 166.1 95.8001 166.3C95.9001 166.5 96.0001 166.7 96.0001 166.8C96.1001 167.1 96.3001 167.3 96.4001 167.6C96.7001 168.5 96.9001 169.5 97.0001 170.5C97.1001 171.4 97.5001 172.3 98.2001 172.9C98.9001 173.5 99.8001 173.9 100.7 173.9H110.6C110.9 174.2 111.1 174.5 111.3 174.9H99.1001C98.4001 174.9 97.8001 174.6 97.3001 174.2C96.7001 173.8 96.4001 173.2 96.4001 172.5ZM65.7001 184.4H57.3001L57.6001 182.5H65.4001L65.7001 184.4ZM73.0001 159.8C72.8001 166.6 68.5001 169.4 66.2001 169.9C67.5001 167.3 68.3001 164.4 68.5001 159.8H73.0001ZM49.9001 159.9H54.4001C54.6001 164.5 55.5001 167.4 56.8001 170C54.5001 169.4 50.1001 166.7 49.9001 159.9ZM61.0001 176.8C60.9001 175.5 60.4001 174.2 59.7001 173.1C57.0001 168.7 55.4001 165.8 55.3001 157.7H67.5001C67.4001 166 65.8001 169.2 63.0001 173.3C62.3001 174.4 61.9001 175.6 61.8001 176.9C61.8001 179.3 62.1001 180.6 63.5001 181.6H59.2001C60.8001 180.5 61.0001 179.1 61.0001 176.8ZM156.8 146.4C155.9 147.7 154.7 148.7 153.4 149.5C152.1 150.2 150.6 150.6 149.1 150.7C150.1 149.4 150.8 148 151.1 146.4H156.8ZM124.3 146.4H129.9C130.2 148 130.9 149.4 131.9 150.7C130.4 150.6 129 150.2 127.7 149.5C126.4 148.7 125.2 147.6 124.3 146.4ZM138.7 153.7C136.4 153.3 134.4 152.1 132.9 150.3C131.5 148.7 130.7 146.6 130.6 144.5H150.3C150.2 146.6 149.4 148.7 148 150.3C146.5 152.1 144.5 153.3 142.2 153.7C142 153.7 141.8 153.9 141.8 154.2V176.3H139V154.2C139.1 154 139 153.8 138.7 153.7ZM147.3 177.4V180.1H133.6V177.4H147.3ZM158.2 181V194H120.8V181H158.2ZM82.2001 176H119.6V194H82.2001V176ZM43.8001 185.5H81.2001V194H43.8001V185.5Z"
        fill="currentColor"
      />
    </svg>
  </SvgIcon>
)

export default TrophyAwardsImage
