import { FC } from 'react'

import { SvgIcon, SvgIconProps } from '@mui/material'

const SuccessImage: FC<SvgIconProps> = ({ sx, ...props }) => (
  <SvgIcon sx={{ fontSize: 200, color: 'primary.dark', ...sx }} {...props}>
    <svg
      width="200"
      height="200"
      viewBox="0 0 200 200"
      fill="none"
      xmlns="http://www.w3.org/2000/svg"
    >
      <path
        d="M53.5999 40.8L55.8999 45.8L51.9999 49.7C51.7999 49.8 51.7999 50.1 51.8999 50.3C51.9999 50.5 52.1999 50.6 52.3999 50.6L57.8999 50L60.3999 54.9C60.4999 55.1 60.6999 55.2 60.7999 55.2C60.7999 55.2 60.7999 55.2 60.8999 55.2C61.0999 55.2 61.2999 55 61.2999 54.8L62.3999 49.4L67.8999 48.6C68.0999 48.6 68.2999 48.4 68.2999 48.2C68.2999 48 68.1999 47.8 68.0999 47.7L67.7999 47.5L63.2999 45L64.1999 39.6C64.1999 39.4 64.0999 39.2 63.8999 39.1C63.6999 39 63.4999 39 63.2999 39.2L61.8999 40.5L59.2999 42.9L54.3999 40.4C54.1999 40.3 53.9999 40.3 53.7999 40.5C53.6999 40.6 53.6999 40.7 53.6999 40.8C53.4999 40.6 53.4999 40.7 53.5999 40.8ZM62.8999 40.6L62.0999 45C62.0999 45.1 62.0999 45.2 62.0999 45.3C62.0999 45.4 62.1999 45.5 62.2999 45.5L66.0999 47.7L61.6999 48.4C61.5999 48.4 61.4999 48.5 61.3999 48.5C61.3999 48.5 61.3999 48.6 61.2999 48.6C61.2999 48.7 61.1999 48.7 61.1999 48.8L60.2999 53.1L58.2999 49.2C58.1999 49 57.9999 48.9 57.8999 48.9C57.8999 48.9 57.8999 48.9 57.7999 48.9L53.3999 49.4L56.4999 46.3C56.5999 46.2 56.5999 46.1 56.5999 46C56.5999 45.9 56.5999 45.8 56.5999 45.7L54.7999 41.7L58.6999 43.7C58.8999 43.8 59.0999 43.8 59.2999 43.6L62.1999 41L62.8999 40.6Z"
        fill="currentColor"
      />
      <path
        d="M45.3999 143.5C44.6999 143.5 43.9999 143.6 43.2999 143.7C43.1999 143.3 43.0999 142.9 42.9999 142.5C42.6999 141.8 42.2999 141.2 41.6999 140.6C41.1999 140.1 40.4999 139.7 39.7999 139.4C39.0999 139.1 38.3999 139 37.5999 139C36.0999 139 34.6999 139.6 33.5999 140.7C32.4999 141.8 31.9999 143.2 31.9999 144.7C31.9999 146.2 32.5999 147.6 33.5999 148.7C33.9999 149.1 34.4999 149.5 35.0999 149.8C34.1999 151.4 33.6999 153.3 33.6999 155.2C33.6999 161.6 38.8999 166.9 45.3999 166.9C51.7999 166.9 57.0999 161.7 57.0999 155.2C57.0999 148.7 51.7999 143.5 45.3999 143.5ZM45.3999 165.8C39.4999 165.8 34.6999 161 34.6999 155.1C34.6999 153.3 35.1999 151.5 35.9999 150C36.4999 150.2 36.9999 150.3 37.5999 150.3C38.3999 150.3 39.0999 150.2 39.7999 149.9C40.4999 149.6 41.0999 149.2 41.6999 148.7C42.1999 148.2 42.6999 147.5 42.9999 146.8C43.2999 146.1 43.3999 145.4 43.3999 144.7C44.0999 144.6 44.6999 144.5 45.4999 144.5C51.3999 144.5 56.1999 149.3 56.1999 155.2C56.1999 161.1 51.2999 165.8 45.3999 165.8Z"
        fill="currentColor"
      />
      <path
        d="M167.1 44.9C168.2 44.9 169.1 44.5 169.9 43.7C170.6 43 171 42 171 41C171 40 170.6 38.9 169.8 38.2C168.3 36.7 165.7 36.7 164.2 38.2C163.5 38.9 163 39.9 163 41C163 42 163.4 43.1 164.2 43.8C165 44.5 166 44.9 167.1 44.9ZM165 38.9C165.6 38.3 166.3 38 167.1 38C167.9 38 168.6 38.3 169.2 38.9C169.7 39.4 170.1 40.2 170.1 41C170.1 41.8 169.8 42.5 169.2 43.1C168.1 44.2 166.2 44.2 165 43.1C164.5 42.6 164.1 41.8 164.1 41C164.1 40.2 164.4 39.4 165 38.9Z"
        fill="currentColor"
      />
      <path
        d="M34.2999 102C34.5999 101.9 34.7999 101.7 34.9999 101.5C35.1999 101.3 35.3999 101 35.4999 100.8C35.5999 100.5 35.6999 100.2 35.6999 99.9C35.6999 99.6 35.5999 99.3 35.4999 99C35.3999 98.7 35.1999 98.5 34.9999 98.3C34.7999 98.1 34.4999 97.9 34.2999 97.8C33.4999 97.5 32.4999 97.7 31.7999 98.3C31.3999 98.7 31.0999 99.3 31.0999 99.9C31.0999 100.5 31.2999 101.1 31.7999 101.5C32.1999 101.9 32.7999 102.2 33.3999 102.2C33.6999 102.2 33.9999 102.1 34.2999 102ZM32.1999 99.9C32.1999 99.6 32.2999 99.2 32.5999 99C32.7999 98.8 33.1999 98.6 33.4999 98.6C33.6999 98.6 33.7999 98.6 33.9999 98.7C34.1999 98.8 34.2999 98.9 34.3999 99C34.4999 99.1 34.5999 99.3 34.6999 99.4C34.7999 99.6 34.7999 99.7 34.7999 99.9C34.7999 100.1 34.7999 100.2 34.6999 100.4C34.5999 100.6 34.4999 100.7 34.3999 100.8C34.2999 100.9 34.0999 101 33.9999 101.1C33.4999 101.3 32.9999 101.2 32.5999 100.8C32.2999 100.6 32.1999 100.3 32.1999 99.9Z"
        fill="currentColor"
      />
      <path
        d="M121.7 22.9L126.3 22.1L124.7 28.4C124.6 28.7 124.8 28.9 125.1 29H125.2C125.4 29 125.6 28.8 125.7 28.6L127.5 21.6C127.5 21.4 127.5 21.3 127.4 21.1C127.3 21 127.1 20.9 126.9 20.9L122.3 21.7L123.9 15.4C124 15.1 123.8 14.9 123.5 14.8C123.2 14.7 123 14.9 122.9 15.2L121.1 22.2C121.1 22.4 121.1 22.5 121.2 22.7C121.3 22.8 121.5 22.9 121.7 22.9Z"
        fill="currentColor"
      />
      <path
        d="M147.5 137.9C147.4 137.8 147.3 137.8 147.2 137.8C146.2 137.7 145.1 137.7 144 137.8C143.8 137.3 143.6 136.8 143.3 136.4C143.2 136.3 143.1 136.2 142.9 136.2C142.6 136.2 142.2 136.2 141.8 136.1L167.5 72C167.6 71.8 167.5 71.6 167.4 71.5C167.3 71.4 167.1 71.3 166.9 71.3L122.3 79.2C123.2 76.1 124 73.2 124.6 71.2C148.1 58.1 151.4 56 153.3 52.6C154.5 50.3 154.5 49 154.5 33.2C154.5 30 154.5 26.2 154.5 21.8C154.5 21.8 154.5 21.8 154.5 21.7C154.5 21.4 154.5 21.2 154.3 20.9C154 20.4 153.4 20.1 152.6 19.9C152.6 19 152.6 18.1 152.7 17.2C152.8 14.4 152.8 11.5 152.7 9.8V9.7C152.7 9.6 152.7 9.5 152.7 9.4C152.7 8.2 151.8 7.6 150.9 7.6C150.3 7.6 149.7 7.8 149.3 8.2C149 7.3 148.2 6.8 147.4 6.8C146.8 6.8 146.2 7.1 145.7 7.6C145.3 7 144.6 6.7 143.9 6.7C143.2 6.7 142.5 7.1 142.1 7.7C141.7 7.2 141 7 140.4 7C139.4 7 138.3 7.8 138.3 9.2C138.3 9.6 138.3 9.9 138.3 10.2C138.3 10.5 138.3 10.7 138.3 11C137.1 11.3 136.8 12.1 136.7 14.3C136.5 17.1 136.5 17.7 138.2 18.8C139.2 19.4 139.8 20 140.2 20.5C139.4 20.8 139 21.3 139 21.9C139 27 139 38.5 138.7 44.1C136.6 45.4 125.5 50.9 120.7 53.1C116.3 55.1 112.8 54.7 111.1 52.1C109.2 49 111.7 44 113.6 40.3C114 39.5 114.4 38.8 114.7 38.1C115.7 35.9 114.8 35 114.5 34.8C113.9 34.4 113.2 34.5 112.5 34.9C112.3 34.5 112 34.3 111.5 34.1C110.9 33.9 110.3 34.1 109.8 34.5C109.6 34.2 109.3 34 108.9 34C108.2 33.9 107.4 34 106.7 34.7C106.5 34.5 106.2 34.4 105.8 34.3C105.1 34.2 104.1 34.5 103.4 35.2C103.2 35.1 103 35 102.7 35C101.8 35 100.7 35.8 100.5 37.2C100.4 37.8 100.3 38.4 100.2 38.9L96.6999 5.4C96.6999 5.2 96.4999 5 96.2999 5C96.0999 5 95.8999 5.1 95.7999 5.3L79.2999 46.4L76.2999 44.8C76.9999 43.7 77.5999 42.5 78.2999 41.2C78.3999 41 78.2999 40.7 78.0999 40.5L54.4999 27.7C54.2999 27.6 53.9999 27.7 53.7999 27.9C53.0999 29.1 52.4999 30.3 51.8999 31.6L42.5999 26.5C42.3999 26.4 42.0999 26.5 41.8999 26.7C37.4999 34.8 37.9999 41.4 39.0999 45.6C40.3999 50.4 43.2999 53.8 45.5999 55.1C45.5999 56.9 45.7999 58.4 45.8999 59.8C45.8999 60 45.8999 60.3 45.9999 60.5H45.8999C45.3999 60.2 44.8999 60.1 44.2999 60.2C43.6999 60.3 43.2999 60.6 42.8999 61.1C42.5999 61.6 42.4999 62.1 42.5999 62.7C42.5999 62.9 42.6999 63.1 42.7999 63.3H42.6999C42.1999 63.4 41.6999 63.7 41.3999 64.2C41.0999 64.7 40.9999 65.2 41.0999 65.8C41.1999 66.1 41.2999 66.3 41.3999 66.6C40.8999 66.7 40.4999 67.1 40.1999 67.5C39.8999 68 39.7999 68.5 39.8999 69C39.9999 69.3 40.0999 69.6 40.2999 69.9C39.8999 70.1 39.4999 70.3 39.2999 70.7C38.9999 71.2 38.8999 71.7 38.9999 72.2C39.0999 72.7 39.3999 73.2 39.8999 73.5C40.1999 73.7 40.4999 73.8 40.7999 73.9C39.3999 74.7 37.6999 74.8 34.9999 74.5L34.5999 74.3C34.3999 74.2 34.0999 74.2 33.9999 74.4L30.3999 79.1C30.2999 79.2 30.2999 79.4 30.2999 79.5C30.2999 79.6 30.3999 79.8 30.5999 79.8L47.7999 89.1C47.8999 89.1 47.9999 89.2 47.9999 89.2C48.0999 89.2 48.0999 89.2 48.1999 89.2C48.2999 89.1 48.3999 89 48.4999 88.9L50.4999 83.4C50.5999 83.2 50.4999 82.9 50.2999 82.8L49.8999 82.6C48.2999 80.7 47.3999 79.3 47.1999 77.8C47.6999 78.1 48.2999 78.4 48.7999 78.7C48.8999 78.8 48.9999 78.8 49.0999 78.9C48.7999 80 48.8999 81.3 49.7999 81.6C55.1999 84.9 59.2999 87.3 62.3999 89L46.8999 128C46.7999 128.2 46.8999 128.4 46.9999 128.5C47.0999 128.6 47.1999 128.7 47.3999 128.7H47.4999L62.6999 126C63.6999 130.6 67.6999 138.1 79.2999 157.3C80.3999 159.1 81.4999 160.9 82.6999 162.9C82.7999 163 82.8999 163.1 82.9999 163.1C83.8999 163.3 84.7999 163.4 85.8999 163.4C86.3999 163.4 86.8999 163.4 87.2999 163.3C85.4999 168.3 84.0999 175.4 83.7999 180.4C83.7999 180.5 83.6999 180.6 83.7999 180.7C83.7999 181.7 83.7999 182.6 83.7999 183.3C83.7999 183.5 83.8999 183.6 84.0999 183.7C84.1999 183.7 84.1999 183.8 84.2999 183.8C84.3999 183.8 84.4999 183.8 84.5999 183.7C91.8999 179.2 101 167.2 103.4 160.6C103.5 160.4 103.4 160.3 103.3 160.1C102.3 158.8 101.2 157.6 99.8999 156.6C100.2 156.2 100.4 155.7 100.6 155.2C100.6 155.1 100.6 154.9 100.6 154.8C99.6999 152.9 98.6999 151 97.7999 149.1C93.3999 140.2 89.2999 132.2 87.4999 129C90.2999 128 93.3999 126.8 96.4999 125.6C96.9999 127 97.4999 128.6 97.9999 130.2C101 139.4 104.4 149.9 108.4 151.7C110.1 152.5 111.4 153 113.7 153.4L117.6 194.5C117.6 194.7 117.8 194.9 118 194.9C118 194.9 118 194.9 118.1 194.9C118.3 194.9 118.5 194.8 118.6 194.6L134.7 154.3C135.4 154.3 136.1 154.3 136.8 154.3C138.7 154.3 140.8 154.3 143 154.3C143.1 154.3 143.2 154.3 143.3 154.2C143.7 153.9 144 153.5 144.3 152.9C147 156 153 159.8 157.7 161.1C157.8 161.1 157.8 161.1 157.9 161.1C158.4 161.2 159 161.4 159.4 161.4C159.4 161.4 159.4 161.4 159.5 161.4C159.6 161.4 159.7 161.4 159.8 161.3C159.9 161.2 160 161.1 160 160.9C159.8 151.7 151.1 140.9 147.5 137.9ZM166.2 72.4L140.8 136C137.3 135.8 133.2 135.7 129.5 135.6C125.6 135.5 122.2 135.4 120.6 135.2L119.9 132.2C118.7 126.6 117.2 119.8 116.5 116.1C121.6 112.6 126.1 103.3 118.9 90.7L119.4 88.9C120.1 86.4 121 83.2 121.9 80.2L166.2 72.4ZM149.4 10.4L149.5 9.7C149.6 8.9 150.1 8.5 150.7 8.5C151.1 8.5 151.6 8.7 151.6 9.3C151.6 10 151.5 10.7 151.4 11.6C151.3 12.2 151.3 12.8 151.2 13.5C151.1 14.4 150.5 14.8 150 14.8C149.6 14.8 149.2 14.5 149.2 13.7C149.2 12.5 149.3 11.4 149.4 10.4ZM146 9.1C146 8.2 146.6 7.8 147.2 7.8C147.6 7.8 148.2 8 148.2 8.7C148.2 9.4 148.2 10.2 148 11.3C147.9 11.8 147.9 12.4 147.8 13.2C147.7 14.2 147.1 14.6 146.6 14.6C146.2 14.6 145.7 14.3 145.7 13.4C145.7 11.8 145.8 10.7 145.8 9.5L146 9.1ZM142.6 9C142.6 8 143.3 7.7 143.8 7.7C144.2 7.7 144.8 8 144.8 8.6C144.8 9.3 144.8 10.1 144.7 11.1C144.7 11.7 144.6 12.3 144.6 13.1C144.6 13.3 144.5 13.5 144.4 13.7C144.3 13.9 144.1 14 143.9 14.1C143.7 14.2 143.5 14.2 143.3 14.1C144.2 13.6 144.5 12.9 144.5 12.3C144.5 11.6 143.9 11 143.2 11H142.5C142.5 10.7 142.5 10.5 142.5 10.2C142.5 9.8 142.6 9.4 142.6 9ZM139.2 10.2C139.2 9.9 139.2 9.6 139.2 9.2C139.2 8.3 139.8 8 140.3 8C140.6 8 141.3 8.1 141.4 8.8C141.5 9.5 141.5 10.3 141.4 11C140.5 11 139.8 10.9 139.2 10.9C139.2 10.7 139.2 10.4 139.2 10.2ZM138.6 17.9C137.4 17.1 137.4 17.1 137.6 14.3C137.8 11.7 137.8 11.7 141.8 11.9L143 12C143.2 12 143.4 12.1 143.4 12.3C143.4 12.6 143 13.1 142.1 13.4H142C141.5 13.6 140.9 13.7 140.2 13.8H140.1C139.8 13.8 139.6 14.1 139.7 14.4C139.8 14.7 140 14.9 140.2 14.8H140.3C143.2 14.5 145.4 15.7 146.2 17.9C146.3 18.2 146.6 18.3 146.8 18.2C147.1 18.1 147.2 17.8 147.1 17.6C146.7 16.3 145.8 15.3 144.6 14.6C144.7 14.5 144.8 14.4 144.9 14.3C145.2 14.9 145.9 15.3 146.4 15.3H146.5C147.1 15.3 147.7 15 148.1 14.5C148.4 15.3 149 15.7 149.7 15.8H149.8C150.4 15.8 151 15.5 151.4 14.9C151.4 15.6 151.4 16.3 151.4 17C151.4 18.9 151.3 20.8 151.3 22.4C150.2 22.7 148.5 22.9 146.1 22.9C144.1 22.9 142.7 22.8 141.7 22.6C142 21.4 141.5 19.8 138.6 17.9ZM120.9 54C126.1 51.6 137.8 45.8 139.3 44.8C139.4 44.7 139.5 44.6 139.5 44.4C139.8 39.3 139.9 28.8 139.8 23.2C140.1 23.4 140.6 23.5 141.1 23.7C141.2 23.7 141.2 23.8 141.3 23.8C141.3 23.8 141.3 23.8 141.4 23.8C142.5 24.1 144 24.2 145.7 24.2C145.9 24.2 146.1 24.2 146.3 24.2C148.7 24.2 150.7 23.9 152 23.6C152.1 23.6 152.2 23.6 152.2 23.5C152.7 23.4 153.1 23.2 153.4 23C153.4 27 153.4 30.4 153.4 33.2C153.4 48.7 153.4 50 152.3 52.1C150.5 55.4 146.9 57.6 119 73.1C118.8 73.2 118.7 73.4 118.7 73.6L118.9 75.6C119.2 79.1 119.4 82.7 119.4 85.3C119.1 86.5 118.7 87.6 118.4 88.7L117.9 90.3C108 90.4 99.3999 92.7 91.5999 97.4C91.3999 95.3 91.0999 92.9 90.7999 90.5C90.5999 89.1 90.4999 87.7 90.2999 86.3C90.2999 86.3 90.2999 86.3 90.2999 86.2C90.1999 84 89.9999 81.8 89.7999 80C89.7999 80 89.7999 80 89.7999 79.9C89.5999 78.4 89.4999 77 89.3999 76C89.3999 75.7 89.0999 75.5 88.8999 75.5C88.5999 75.5 88.3999 75.8 88.3999 76C88.4999 77 88.5999 78.3 88.7999 79.7C86.5999 82.3 81.5999 87.6 76.7999 90.8C76.1999 91 75.6999 91.2 75.0999 91.3C70.8999 92.5 67.8999 91.2 51.1999 81.2C52.6999 80.3 54.1999 77.6 55.3999 75.2C56.2999 73.4 56.8999 71.8 57.1999 70.5C57.1999 70.5 57.1999 70.5 57.1999 70.4C57.1999 70.3 57.1999 70.2 57.1999 70.2C57.2999 69.7 57.2999 69.2 57.2999 68.9C60.2999 70.6 63.9999 72.6 68.2999 74.6C68.2999 74.6 68.3999 74.6 68.3999 74.7C68.3999 74.7 68.3999 74.7 68.4999 74.7C69.5999 75.2 70.5999 75.7 71.7999 76.2L71.9999 76.3C72.0999 76.3 72.0999 76.3 72.1999 76.3C72.2999 76.3 72.2999 76.3 72.3999 76.3C77.1999 74.3 92.3999 67.5 98.8999 63.3C99.6999 63.9 100.9 64.3 102.3 64.3C103.1 64.3 103.9 64.2 104.7 64C106.3 63.6 111.8 61.7 113.8 55.1C115.9 55.7 118.3 55.3 120.9 54ZM76.0999 125.7C76.4999 126.5 77.1999 128 78.0999 130C81.2999 136.7 87.0999 148.9 90.2999 155.3C86.7999 156.8 82.7999 157.2 79.8999 156.6C64.5999 131.3 62.6999 126.4 63.3999 121.8C64.2999 116.2 69.5999 113 101.3 98.9C101.6 98.8 101.7 98.5 101.6 98.2C101.5 97.9 101.2 97.8 100.9 97.9C97.7999 99.3 94.8999 100.6 92.1999 101.8C92.0999 100.9 91.9999 99.7 91.7999 98.3C97.6999 94.7 104.1 92.5 111.3 91.6C115.2 104.9 113.4 107.2 110.2 109.2C108.2 110.4 101.2 113.5 93.7999 116.8C87.0999 119.7 80.2999 122.8 76.1999 124.8C75.9999 125.2 75.8999 125.5 76.0999 125.7ZM60.0999 63C61.4999 63.7 63.4999 64.1 65.7999 64.1C67.5999 64.1 69.5999 63.8 71.6999 63.2C72.0999 63.1 72.4999 62.9 72.8999 62.8L68.5999 73.7C63.9999 71.5 59.8999 69.3 56.8999 67.5C56.3999 67.2 55.6999 67.4 55.0999 67.9C54.8999 67.4 54.7999 66.9 54.5999 66.2C54.9999 66 55.3999 65.7 55.8999 65.5C57.0999 64.8 58.4999 64 60.0999 63ZM113 55C111.1 61.1 106.1 62.8 104.6 63.2C102.7 63.7 100.9 63.5 99.8999 62.9C100.6 62.3 101.3 61.7 101.8 60.9C101.9 60.8 101.9 60.8 101.9 60.7C103 59.1 103.7 57.2 104 55.5C105.3 54.5 106.4 53.2 107 51.7C107.1 51.5 107 51.3 106.9 51.1C106.7 51 106.5 50.9 106.3 51C105.3 51.5 104.5 51.8 103.7 52.1C103.6 52.1 103.6 52.1 103.5 52.2C102.3 52.5 101.4 52.5 100.8 52.1C100.8 52.1 100.8 52.1 100.7 52.1C99.4999 51.2 99.1999 48.3 99.9999 43C99.9999 42.9 99.9999 42.8 99.9999 42.7C102.1 42.1 104.3 41.8 106.5 41.7C106.3 42.9 106.2 44.9 107 45.2C107.7 45.4 108 44.6 108.2 44.3C108.4 44 108.6 43.7 108.8 43.7C108.9 43.7 109.1 43.8 109.2 43.9C109.4 44.2 109.4 44.9 108.8 45.7C108.5 46.3 108.4 46.9 108.5 47.6C108.6 48.2 108.8 48.8 109.1 49.3C109.1 50.5 109.3 51.7 109.9 52.7C110.8 53.8 111.8 54.6 113 55ZM101.8 59L101.3 53.3C101.9 53.5 102.6 53.4 103.4 53.3C103.2 54.9 102.8 57 101.8 59ZM95.8999 7.6L99.1999 42.7C98.3999 48.5 98.6999 51.4 100.2 52.7L100.9 60.4C100.3 61.2 99.5999 61.9 98.7999 62.5C92.5999 66.6 77.3999 73.5 72.2999 75.6C71.2999 75.1 70.2999 74.7 69.3999 74.2L74.0999 62.3C77.8999 60.6 82.3999 57.2 85.9999 50.6C86.0999 50.4 85.9999 50.1 85.7999 49.9L80.2999 46.9L95.8999 7.6ZM74.5999 60.9L79.7999 47.8L84.7999 50.5C81.6999 56.1 77.8999 59.2 74.5999 60.9ZM73.2999 61.5C72.5999 61.8 71.9999 62 71.2999 62.2C67.1999 63.5 63.2999 63.2 60.9999 62.3C64.5999 59.9 69.7999 55.4 75.7999 45.6L78.8999 47.3L73.2999 61.5ZM54.4999 28.9L77.2999 41.2C76.5999 42.5 75.8999 43.7 75.1999 44.8C68.7999 55.5 63.2999 59.8 59.6999 62.1C58.0999 63.1 56.5999 64 55.1999 64.7C54.8999 64.9 54.5999 65.1 54.1999 65.2C53.9999 63.3 53.4999 63 50.9999 61.8C49.7999 61.2 49.0999 60.9 48.3999 61H48.1999C48.1999 61 48.1999 61 48.0999 61C48.0999 61 47.9999 61 47.9999 61.1C47.8999 61.1 47.8999 61.2 47.7999 61.2L47.6999 61.3C47.5999 61.4 47.5999 61.4 47.4999 61.5C47.4999 61.5 47.4999 61.5 47.3999 61.6L46.9999 61.2C46.9999 60.8 46.8999 60.3 46.8999 59.8C46.7999 58.4 46.6999 56.8 46.5999 55C46.5999 54.9 46.5999 54.8 46.5999 54.8C46.5999 50.6 47.1999 43.7 52.4999 32.7L52.5999 32.6C52.5999 32.5 52.5999 32.5 52.6999 32.4C53.2999 31.2 53.8999 30 54.4999 28.9ZM40.0999 45.4C38.9999 41.5 38.5999 35.3 42.5999 27.7L51.4999 32.5C46.4999 42.9 45.6999 49.6 45.5999 54C43.5999 52.6 41.2999 49.5 40.0999 45.4ZM43.7999 61.7C43.9999 61.5 44.1999 61.3 44.4999 61.2C44.7999 61.1 45.0999 61.2 45.3999 61.4L46.1999 61.9C46.4999 62.1 46.6999 62.2 46.9999 62.4C46.6999 62.9 46.3999 63.6 46.0999 64.4C45.3999 64.1 44.6999 63.7 44.0999 63.2C43.8999 63 43.6999 62.8 43.5999 62.5C43.5999 62.2 43.5999 61.9 43.7999 61.7ZM42.1999 64.8C42.3999 64.6 42.5999 64.4 42.8999 64.3C43.1999 64.2 43.4999 64.3 43.7999 64.5C44.1999 64.7 44.4999 64.9 44.8999 65.1C45.0999 65.2 45.3999 65.3 45.5999 65.5L45.3999 66C45.0999 66.7 45.2999 67.5 45.9999 67.9C46.4999 68.2 47.1999 68.1 47.9999 67.6C47.9999 67.9 47.8999 68.1 47.6999 68.3C47.3999 68.6 46.8999 68.5 46.5999 68.4C45.9999 68.1 45.3999 67.8 44.9999 67.6C43.9999 67.1 43.2999 66.8 42.5999 66.3C42.3999 66.1 42.1999 65.9 42.0999 65.6C41.9999 65.3 42.0999 65 42.1999 64.8ZM40.9999 68C41.1999 67.8 41.3999 67.6 41.6999 67.5C41.9999 67.4 42.2999 67.5 42.4999 67.6L43.0999 67.9C44.0999 68.4 44.9999 68.9 46.1999 69.6C46.3999 69.7 46.4999 69.8 46.5999 69.9C46.8999 70.3 46.8999 70.7 46.7999 71C46.5999 71.4 45.9999 71.7 45.1999 71.3C44.4999 71 43.9999 70.7 43.4999 70.5C42.4999 70.1 41.7999 69.7 41.1999 69.4C40.9999 69.2 40.7999 69 40.6999 68.7C40.7999 68.5 40.8999 68.2 40.9999 68ZM39.9999 72C39.8999 71.7 39.9999 71.5 40.0999 71.2C40.1999 71 40.4999 70.8 40.6999 70.7C40.7999 70.7 40.8999 70.7 40.9999 70.7C41.1999 70.7 41.3999 70.7 41.5999 70.9L42.1999 71.2C43.0999 71.6 44.0999 72.1 45.1999 72.7C45.5999 72.9 45.7999 73.1 45.8999 73.4C45.9999 73.6 45.9999 73.9 45.8999 74.1L45.7999 74.2C45.6999 74.3 45.5999 74.4 45.4999 74.4C45.1999 74.6 44.7999 74.6 44.2999 74.4C43.5999 74.1 43.0999 73.9 42.5999 73.7C41.6999 73.3 40.9999 73 40.3999 72.7C40.1999 72.5 40.0999 72.3 39.9999 72ZM46.9999 76.6C47.0999 75.3 47.6999 73.8 48.5999 72C48.7999 72.4 49.0999 72.7 49.3999 73.1C49.4999 73.2 49.5999 73.3 49.7999 73.3C49.8999 73.3 49.9999 73.3 50.0999 73.2C50.2999 73 50.2999 72.7 50.0999 72.5C49.5999 71.9 49.1999 71.3 48.9999 70.6C48.7999 69.8 48.7999 69 48.8999 68.3C48.8999 68.1 48.9999 67.8 48.9999 67.6C48.9999 67.5 48.9999 67.5 49.0999 67.4C49.1999 67.2 49.2999 66.9 49.3999 66.7C49.3999 66.6 49.4999 66.5 49.4999 66.5C49.4999 66.4 49.5999 66.4 49.5999 66.3C49.6999 66.2 49.7999 66 49.7999 65.9C49.7999 65.9 49.7999 65.8 49.8999 65.8C49.8999 65.7 49.9999 65.7 49.9999 65.6C49.9999 65.6 49.9999 65.6 49.9999 65.5C50.0999 65.3 50.0999 65 49.7999 64.8C49.5999 64.7 49.2999 64.7 49.0999 65C49.0999 65 49.0999 65.1 48.9999 65.1C47.7999 67 46.6999 67.4 46.2999 67.2C46.0999 67.1 45.9999 66.9 46.1999 66.6L46.6999 65.5C46.6999 65.5 46.6999 65.5 46.6999 65.4C47.1999 64.2 47.5999 63.2 47.9999 62.7C47.9999 62.7 47.9999 62.7 48.0999 62.6C48.0999 62.6 48.0999 62.6 48.0999 62.5C48.2999 62.2 48.3999 62.1 48.5999 62H48.6999C48.7999 62 48.7999 62 48.8999 62C48.9999 62 48.9999 62 49.0999 62C49.0999 62 49.0999 62 49.1999 62C49.4999 62.1 49.9999 62.3 50.6999 62.7C53.1999 63.9 53.1999 63.9 53.3999 65.4C53.3999 65.6 53.3999 65.9 53.4999 66.1C53.4999 66.1 53.4999 66.1 53.4999 66.2C53.6999 67.5 53.9999 68.5 54.3999 69.2C54.8999 70.1 55.5999 70.6 56.1999 70.9C55.8999 71.9 55.3999 73.3 54.4999 75.1C53.3999 77.3 52.4999 78.7 51.7999 79.6C50.8999 79.1 50.0999 78.5 49.1999 78C48.3999 77.4 47.6999 77 46.9999 76.6ZM47.9999 127.6L63.1999 89.5C67.7999 92 70.3999 92.9 72.5999 92.9C73.4999 92.9 74.3999 92.7 75.2999 92.5C75.7999 92.4 76.2999 92.2 76.7999 92C76.8999 92 76.9999 92 77.0999 91.9C77.0999 91.9 77.1999 91.9 77.1999 91.8C81.3999 90.5 85.5999 88.8 89.5999 86.9C89.6999 88.1 89.8999 89.3 89.9999 90.5C90.5999 95.3 91.0999 99.9 91.2999 102.3C67.3999 113.1 63.2999 116.2 62.3999 121.6C62.1999 122.7 62.1999 123.7 62.2999 124.9L47.9999 127.6ZM84.6999 182.6C84.6999 182.1 84.6999 181.5 84.6999 181C88.7999 178.3 97.4999 169.9 101.8 160.2C102 160.4 102.1 160.6 102.3 160.8C99.8999 167 91.5999 177.9 84.6999 182.6ZM87.9999 162.3C87.8999 162.3 87.7999 162.3 87.7999 162.3C86.1999 162.5 84.6999 162.5 83.2999 162.1C82.2999 160.5 81.3999 159 80.5999 157.6C81.2999 157.7 82.0999 157.8 82.8999 157.8C88.0999 157.8 94.4999 155.6 97.3999 150.5C98.1999 152 98.8999 153.6 99.6999 155.1C97.9999 159 92.7999 161.7 87.9999 162.3ZM96.7999 149.5C95.6999 151.9 93.5999 153.7 91.2999 154.9C87.9999 148.5 82.1999 136.2 79.0999 129.6C78.2999 128 77.6999 126.7 77.2999 125.8C81.3999 123.8 87.9999 120.9 94.3999 118C101.9 114.7 108.9 111.6 110.9 110.3C114.9 107.8 116.2 104.3 112.5 91.7C114.4 91.5 116.3 91.4 118.3 91.4C125.2 103.6 120.9 112.3 116.1 115.5C116 115.5 116 115.6 115.9 115.6C115.8 115.7 115.7 115.7 115.6 115.8C106.7 121 93.1999 126.1 83.8999 129.4C83.5999 129.5 83.4999 129.8 83.5999 130C83.6999 130.2 83.8999 130.3 84.0999 130.3C84.1999 130.3 84.1999 130.3 84.2999 130.3C85.0999 130 85.8999 129.7 86.7999 129.4C88.1999 132.5 92.2999 140.6 96.7999 149.5ZM99.1999 130.6C101.5 127.9 107.7 121.9 109.9 119.9C112 118.9 113.9 117.9 115.7 116.8C116.4 120.6 117.8 127.1 119 132.5L119.7 135.9C119.7 136.1 119.9 136.3 120.1 136.3C121.4 136.4 125.1 136.5 129.4 136.7C131.8 136.8 134.3 136.9 136.7 137C138.9 139.7 140.1 148.6 136.3 153.5C114.5 153.4 112.7 152.9 108.7 151C105.4 149.3 102 139.1 99.1999 130.6ZM118.4 192.4L114.7 153.7C118 154.1 123.4 154.3 133.6 154.4L118.4 192.4ZM142.8 153.4C141 153.4 139.3 153.4 137.7 153.4C140.9 148.5 140.3 140.5 138.1 136.9C139.1 136.9 140.1 137 141.1 137H141.2C141.7 137 142.2 137 142.6 137.1C145.4 141.8 145.1 151.4 142.8 153.4ZM158.3 160.5C157.7 152.9 150.5 142.7 146.8 138.8C146.9 138.8 146.9 138.8 147 138.8C150.5 141.7 158.5 151.7 158.9 160.6C158.7 160.6 158.5 160.5 158.3 160.5Z"
        fill="currentColor"
      />
      <path
        d="M29.5999 55.8C29.7999 55.5 30.0999 55.2 30.4999 55C30.7999 54.8 31.1999 54.6 31.5999 54.6L35.2999 53.9C35.5999 53.9 35.7999 53.6 35.6999 53.3C35.6999 53 35.3999 52.8 35.0999 52.9L31.3999 53.6C30.9999 53.7 30.5999 53.7 30.1999 53.6C29.7999 53.5 29.3999 53.4 29.0999 53.1C28.7999 52.9 28.4999 52.6 28.2999 52.2C28.0999 51.9 27.8999 51.5 27.8999 51.1L27.1999 47.4C27.1999 47.1 26.8999 46.9 26.5999 47C26.2999 47 26.0999 47.3 26.1999 47.6L26.8999 51.3C26.9999 51.7 26.9999 52.1 26.8999 52.5C26.7999 52.9 26.6999 53.3 26.3999 53.6C26.1999 53.9 25.8999 54.2 25.4999 54.4C25.1999 54.6 24.7999 54.8 24.3999 54.8L20.6999 55.5C20.3999 55.5 20.1999 55.8 20.2999 56.1C20.2999 56.3 20.5999 56.5 20.7999 56.5H20.8999L24.5999 55.8C24.9999 55.7 25.3999 55.7 25.7999 55.8C26.1999 55.9 26.5999 56 26.8999 56.3C27.1999 56.5 27.4999 56.8 27.6999 57.2C27.8999 57.5 28.0999 57.9 28.0999 58.3L28.7999 62C28.7999 62.2 29.0999 62.4 29.2999 62.4H29.3999C29.6999 62.4 29.8999 62.1 29.7999 61.8L29.0999 58.1C28.9999 57.7 28.9999 57.3 29.0999 56.9C29.1999 56.4 29.3999 56.1 29.5999 55.8ZM28.7999 55.2C28.5999 55.5 28.3999 55.9 28.2999 56.2C28.0999 55.9 27.7999 55.6 27.4999 55.4C27.1999 55.2 26.7999 55 26.4999 54.9C26.7999 54.7 27.0999 54.4 27.2999 54.1C27.4999 53.8 27.6999 53.4 27.7999 53.1C27.9999 53.4 28.2999 53.7 28.5999 53.9C28.8999 54.1 29.2999 54.3 29.5999 54.4C29.2999 54.6 28.9999 54.9 28.7999 55.2Z"
        fill="currentColor"
      />
      <path
        d="M179.1 111.5L173.8 112.4C173.2 112.5 172.6 112.5 172 112.4C171.4 112.3 170.9 112 170.4 111.7C169.9 111.4 169.5 110.9 169.2 110.4C168.9 109.9 168.7 109.3 168.6 108.7L167.7 103.4C167.7 103.1 167.4 102.9 167.1 103C166.8 103 166.6 103.3 166.7 103.6L167.6 108.9C167.7 109.5 167.7 110.1 167.6 110.7C167.5 111.3 167.2 111.8 166.9 112.3C166.6 112.8 166.1 113.2 165.6 113.5C165.1 113.8 164.5 114 163.9 114.2L158.6 115.1C158.3 115.1 158.1 115.4 158.2 115.7C158.2 115.9 158.5 116.1 158.7 116.1H158.8L164.1 115.2C165 115 165.9 115.2 166.7 115.5C167.5 115.9 168.2 116.5 168.7 117.2C169 117.7 169.2 118.3 169.3 118.9L170.2 124.2C170.2 124.4 170.5 124.6 170.7 124.6H170.8C171.1 124.6 171.3 124.3 171.2 124L170.3 118.7C170.2 118.1 170.2 117.5 170.3 116.9C170.4 116.3 170.7 115.8 171 115.3C171.3 114.8 171.8 114.4 172.3 114.1C172.8 113.8 173.4 113.6 174 113.5L179.3 112.6C179.6 112.6 179.8 112.3 179.7 112C179.7 111.7 179.4 111.5 179.1 111.5ZM170.2 114.8C169.8 115.4 169.5 116 169.4 116.6C168.8 115.7 168 115.1 167 114.6C166.7 114.5 166.4 114.4 166.1 114.3C166.7 113.9 167.1 113.4 167.5 112.9C167.9 112.3 168.2 111.7 168.3 111.1C168.7 111.7 169.2 112.1 169.7 112.5C170.3 112.9 170.9 113.2 171.5 113.3C171.1 113.8 170.6 114.2 170.2 114.8Z"
        fill="currentColor"
      />
    </svg>
  </SvgIcon>
)

export default SuccessImage
