import { FC } from 'react'

import { SvgIcon, SvgIconProps } from '@mui/material'

const ShareImage: FC<SvgIconProps> = ({ sx, ...props }) => (
  <SvgIcon sx={{ fontSize: 200, color: 'primary.dark', ...sx }} {...props}>
    <svg
      width="200"
      height="200"
      viewBox="0 0 200 200"
      fill="none"
      xmlns="http://www.w3.org/2000/svg"
    >
      <path
        d="M183 107.8C187.5 99.8996 188.5 91.7996 184.9 85.3996C181.3 78.9996 173.9 75.5996 164.8 75.3996C153.9 59.5996 143.3 49.6996 137.1 49.3996C136.6 49.1996 136 49.0996 135.4 48.9996C128.7 48.0996 120.9 47.1996 120.8 47.1996C120.7 47.1996 120.7 47.1996 120.6 47.1996C120.6 46.6996 120.7 46.2996 120.7 45.7996C121.1 43.1996 120.8 42.6996 120.3 42.4996C120.1 42.3996 119.9 42.4996 119.7 42.5996C120.2 40.3996 120 39.0996 119.3 38.8996C119.1 38.7996 118.7 38.7996 118.4 39.2996C118.3 38.0996 118.1 37.7996 117.6 37.6996C117.1 37.5996 116.7 38.0996 116.3 38.6996C116.2 38.2996 116.1 38.0996 115.8 37.9996C115.2 37.7996 114.8 38.4996 114.3 40.1996C113.9 41.3996 113.6 42.5996 113.4 43.7996C113.3 44.3996 113.2 45.0996 113.1 45.6996C113 45.4996 112.9 45.3996 112.7 45.1996C112.3 44.7996 111.9 44.8996 111.8 44.9996C110.6 45.6996 111.4 51.9996 112.1 54.4996C112.4 55.7996 113.6 56.7996 115.2 57.4996C114.8 57.5996 114.3 57.6996 113.9 57.6996H113.8C113.3 57.7996 112.9 57.8996 112.4 57.8996C110.6 58.1996 109.5 56.2996 109.1 55.3996C109.9 55.0996 110.7 54.4996 111.1 53.6996C111.9 51.9996 110.9 49.5996 108.2 46.4996C108.2 44.9996 108 43.5996 107.4 42.1996C106.8 40.7996 106 39.4996 105 38.3996C103.9 37.2996 102.7 36.3996 101.3 35.7996C99.9 35.1996 98.4 34.8996 96.9 34.8996C94.8 34.8996 92.7 35.4996 90.9 36.5996C89.3 37.5996 87.9 38.9996 87 40.6996C86.3 40.0996 85.5 39.7996 84.6 39.5996C83.5 39.3996 82.4 39.3996 81.3 39.7996C80.3 40.1996 79.3 40.8996 78.7 41.7996C78 42.6996 77.6 43.7996 77.5 44.8996C77.4 45.9996 77.6 47.0996 78.2 48.0996C78.7 49.0996 79.5 49.8996 80.5 50.3996C81.5 50.8996 82.6 51.1996 83.7 51.0996C84.6 50.9996 85.4 50.7996 86.2 50.2996C86.8 51.7996 87.7 53.1996 88.8 54.3996C90.1 55.6996 91.7 56.6996 93.5 57.1996C94.6 57.4996 95.7 57.6996 96.9 57.6996C97.6 57.6996 98.3 57.5996 99 57.4996C100.6 57.1996 102.1 56.4996 103.5 55.5996C104.2 56.8996 104.4 57.8996 104.1 58.6996C103.8 59.4996 103.1 60.1996 101.9 60.7996H101.8C101.6 60.8996 101.3 60.9996 101 61.1996C95.4 63.4996 90.1 65.2996 84.1 66.8996C78.1 64.0996 71.3 62.4996 64.7 62.4996C64.6 62.4996 64.6 62.4996 64.5 62.4996C52.5 62.4996 41.2 67.0996 32.6 75.3996C26.9 80.8996 22.8 87.6996 20.6 95.1996C20.4 95.1996 20.1 95.0996 19.9 95.0996C17.6 94.9996 15.4 95.4996 13.4 96.6996C11.4 97.8996 9.90004 99.5996 8.90004 101.6C7.90004 103.7 7.60004 106 8.00004 108.2C8.40004 110.5 9.40004 112.5 11 114.2C12.6 115.9 14.6 117 16.8 117.5C17.6 117.7 18.4 117.8 19.2 117.8C19.3 117.8 19.5 117.8 19.6 117.8C21.3 125.9 25.1 133.4 30.8 139.6C38.9 148.4 49.9 153.6 61.9 154.3C64.7 159.6 70.2 164.1 77.2 164.1C79.6 164.1 82.2 163.6 84.9 162.4L88.5 160.4L95.4 156.6L115.3 192.4C115.9 193.5 116.9 194.3 118 194.7C118.5 194.9 119.1 195 119.6 195C120.3 195 120.9 194.9 121.6 194.6C125.6 192.9 129.4 190.8 132.9 188.3C133.9 187.6 134.6 186.5 134.9 185.3C135.2 184.1 135 182.8 134.4 181.8L121 157.7C122.9 153.3 126.8 144.4 129.5 137.4L130.9 136.6L184.7 147.1H184.8C185.4 147.3 186 147.3 186.6 147.3C187.4 147.3 188.2 147.1 188.9 146.7C194.6 143.7 192.3 128.4 183 107.8ZM184.1 85.8996C187.5 91.9996 186.6 99.6996 182.2 107.3C182.1 107.4 182 107.5 182 107.7C178.1 114.3 171.7 120.7 163.3 125.8C158.8 119.8 154.2 112.8 149.9 105.2C145.6 97.5996 142 89.9996 139.2 82.9996C147.9 78.3996 156.7 76.2996 164.4 76.2996C164.5 76.2996 164.5 76.3996 164.6 76.3996H164.7C173.5 76.5996 180.6 79.7996 184.1 85.8996ZM141.3 55.2996C141.8 58.5996 139.3 61.7996 134.7 63.6996C131 65.2996 127 66.3996 123 67.0996C122.4 65.8996 121.8 64.9996 121.1 64.1996L120.9 63.8996C120.7 63.6996 120.4 63.5996 120.2 63.7996C120 63.9996 119.9 64.2996 120.1 64.4996L120.3 64.7996C122.4 67.4996 124.6 70.3996 122.5 84.5996C119.6 86.3996 114 86.7996 108.7 85.5996C108.3 83.0996 106.4 80.6996 104.6 78.4996L105.9 74.0996C106 73.8996 105.9 73.6996 105.7 73.5996C105.5 73.4996 105.3 73.3996 105.2 73.4996C102.8 74.6996 100.2 75.7996 97.4 76.8996C88.6 80.2996 77.9 83.1996 65 85.5996C65.1 85.3996 65.1 85.0996 65.2 84.8996C65.2 84.8996 65.2 84.8996 65.2 84.7996C65.3 84.2996 65.3 83.6996 65.3 82.8996C65.2 81.0996 64.9 79.1996 64.7 78.3996C64.7 78.3996 63.9 75.0996 62.5 73.3996C62.5 73.2996 62.4 73.2996 62.4 73.2996C62.4 73.1996 62.3 73.1996 62.3 73.0996C78.5 69.8996 88.7 67.4996 99.3 63.2996C105.3 68.1996 110.1 70.5996 113.8 70.5996C114.6 70.5996 115.4 70.4996 116.1 70.1996C117.6 69.6996 118.6 68.7996 119.1 67.3996C119.7 65.7996 119.6 63.6996 119 61.6996H119.1C119.2 61.6996 119.3 61.6996 119.4 61.6996H131.7C132 61.6996 132.2 61.4996 132.2 61.1996C132.2 60.8996 132 60.6996 131.7 60.6996H120.9C121.4 60.0996 121.9 59.1996 122.2 58.2996C122.6 57.2996 122.9 56.0996 123.1 54.8996C123.4 53.0996 123.3 51.0996 122.9 49.4996V49.3996C122.8 48.9996 122.6 48.5996 122.4 48.2996C125.1 48.5996 130.5 49.2996 135.4 49.8996C138.5 50.3996 141 52.5996 141.3 55.2996ZM124.4 74.2996C124.4 71.4996 124 69.4996 123.4 67.9996C124.6 67.7996 125.8 67.5996 126.9 67.2996L124.4 74.2996ZM129.4 135.3C129.3 135.4 129.3 135.4 129.3 135.5C129.1 135.9 129 136.4 128.8 136.9C128.8 136.9 128.8 137 128.7 137C126 144.1 122 153.2 120.1 157.6V157.7C119.4 159.2 119 160.1 119 160.2C118 163.2 118.2 166 118.4 169.2C118.6 172.4 118.9 175.8 118.1 180.2C115.1 174 110.6 162.1 109.5 159.2C110.2 157.8 111 156.2 111.6 154.5C112.6 151.8 118.6 129.1 118.7 128.9C118.7 128.8 118.7 128.8 118.7 128.7L116 115.2C116.3 115.2 116.6 115.2 116.9 115.2C121.5 115.2 126 114.4 130.3 113C131.2 118 131.6 123.1 131.3 128.2C131.2 129.1 131.1 130 130.8 130.8C130.6 132 130.1 133.5 129.4 135.3ZM88.4 159.5C77.4 154 71 137.8 72 129.2L79.1 125.2L94.3 132.5C95.5 133 96.8 133.3 98 133.3C99.1 133.3 100.2 133.1 101.2 132.7C103.5 131.9 105.3 130.2 106.3 128.1L112 116.4C112.4 116.5 112.7 116.6 113.1 116.6H113.2C113.4 116.6 113.6 116.5 113.7 116.3L114.2 115C114.5 115 114.8 115 115.1 115.1L117.8 128.7C117.5 129.9 115.2 138.6 113.3 145.5L88.4 159.5ZM66.5 108.4C68.1 109.3 70.5 110.3 73.7 111.1C79.4 112.5 92.5 115.3 95.1 115.8C94.9 117.5 94.8 119.2 94.7 120.9C94.7 121.2 94.9 121.4 95.2 121.4C95.5 121.4 95.7 121.2 95.7 120.9C95.8 119.1 95.9 117.3 96.1 115.5V115.4C96.3 113.9 96.5 112.3 96.7 110.8C101.2 113.1 106 114.9 110.9 116L105.3 127.5C104.4 129.4 102.7 130.9 100.7 131.6C98.7 132.3 96.5 132.3 94.5 131.4L67.4 118.3C63.5 116.6 60.6 116.8 56.8 117C54.1 117.2 50.9 117.4 46.6 116.9C53 113.5 59.6 110.5 66.5 108.4ZM114.5 114.1L120.5 98.3996C120.6 98.0996 120.5 97.8996 120.2 97.7996C119.9 97.6996 119.7 97.7996 119.6 98.0996L112.9 115.7C106.8 114.4 100.9 112.2 95.4 109.2C98 99.6996 102.4 93.5996 105.9 89.4996C106 89.3996 106 89.3996 106.1 89.2996C107 88.2996 107.8 87.3996 108.5 86.6996C110.5 87.0996 112.8 87.3996 115 87.3996C118 87.3996 120.8 86.8996 122.9 85.7996C123.9 88.2996 128.1 99.2996 132.5 111.3C126.7 113.5 120.5 114.4 114.5 114.1ZM101.6 76.2996C102.2 77.0996 102.8 77.8996 103.5 78.7996C105.3 80.9996 107.3 83.4996 107.7 85.8996C107.1 86.4996 106.4 87.2996 105.6 88.0996C103.7 84.2996 101.2 80.7996 98.4 77.5996C99.5 77.1996 100.6 76.6996 101.6 76.2996ZM50.7 80.2996C50.9 80.7996 51 81.3996 51.3 81.7996C51 81.8996 50.7 81.9996 50.5 82.0996C49.7 82.0996 46.6 82.1996 43.9 82.1996C42.9 82.1996 42.2 82.0996 41.9 81.9996C42.2 81.8996 42.7 81.6996 43.8 81.4996C44.1 81.4996 49.2 80.4996 50.7 80.2996ZM50.6 83.0996C51 82.9996 51.3 82.8996 51.7 82.7996C51.9 83.1996 52.2 83.6996 52.5 84.0996C52.1 84.2996 51.7 84.4996 51.3 84.6996C49.4 85.0996 47.4 85.2996 45.5 85.2996C44.5 85.3996 43.8 85.2996 43.5 85.1996C43.8 85.0996 44.3 84.7996 45.3 84.5996C47 84.0996 48.8 83.5996 50.6 83.0996ZM53.1 84.7996C53.5 85.2996 54 85.7996 54.5 86.3996C54.6 86.4996 54.7 86.4996 54.9 86.4996C55 86.4996 55.2 86.4996 55.3 86.3996C55.5 86.1996 55.5 85.8996 55.3 85.6996C53.2 83.4996 51.8 81.6996 51.3 78.5996C51.3 78.2996 51 78.0996 50.7 78.1996C50.4 78.1996 50.2 78.4996 50.3 78.7996C50.3 78.9996 50.4 79.1996 50.4 79.3996C50.3 79.3996 50.2 79.3996 50.1 79.4996C49.7 79.3996 47.8 79.1996 45.2 78.8996C44.2 78.7996 43.5 78.5996 43.3 78.3996C43.6 78.2996 44.2 78.1996 45.2 78.1996C45.6 78.1996 49.6 78.0996 50.8 78.0996C51 78.0996 52.1 78.0996 53 77.6996C52.9 77.8996 52.9 78.0996 53 78.1996C54 79.4996 55.2 80.4996 56.6 81.2996C58 82.0996 59.6 82.4996 61.2 82.6996C61.5 82.6996 61.7 82.4996 61.7 82.1996C61.7 81.8996 61.5 81.6996 61.2 81.6996C59.7 81.5996 58.3 81.1996 57 80.4996C55.7 79.7996 54.6 78.7996 53.7 77.6996C53.6 77.5996 53.5 77.4996 53.3 77.4996C53.5 77.2996 53.7 77.0996 53.7 76.7996C53.7 75.9996 53.1 74.8996 52.5 73.7996C52.1 72.9996 51.2 71.4996 51.5 71.2996C51.8 71.1996 52.9 71.7996 55.4 74.4996C55.9 74.9996 56.5 75.3996 57.2 75.5996C57.9 75.7996 58.6 75.6996 59.3 75.4996L59.8 75.2996C60.1 75.1996 60.6 74.9996 61.1 74.8996C61.4 74.7996 61.6 74.6996 61.8 74.6996C62.5 75.7996 63.2 77.4996 63.6 79.0996C63.8 79.8996 64.1 81.6996 64.2 83.3996C64.2 83.9996 64.2 84.4996 64.2 84.7996C61.6 85.5996 58.9 86.2996 56.2 86.6996C54.3 86.9996 52.4 87.2996 50.6 87.5996C49.9 87.6996 49.2 87.7996 48.3 87.8996C47.2 87.9996 46.6 87.9996 46.2 87.8996C46.5 87.6996 47 87.4996 47.9 87.2996C49.7 86.3996 51.5 85.6996 53.1 84.7996ZM119 40.1996C119 40.5996 119 41.2996 118.7 42.4996C118.5 43.1996 118.4 43.8996 118.3 44.4996C118.1 45.3996 117.9 46.1996 117.8 46.9996C117.6 46.7996 117.3 46.5996 117.1 46.4996C117.1 46.4996 117.1 46.4996 117 46.4996C117.4 44.7996 117.9 42.6996 118.1 42.1996C118.1 42.0996 118.2 41.9996 118.2 41.8996C118.2 41.8996 118.2 41.7996 118.3 41.6996C118.6 40.8996 118.9 40.3996 119 40.1996ZM117.4 38.9996C117.4 39.3996 117.5 40.0996 117.4 41.3996C117.4 41.4996 117.3 41.6996 117.3 41.7996C117.1 42.2996 116.6 44.2996 116.2 45.8996C116 45.7996 115.9 45.7996 115.7 45.6996C115.9 44.3996 116.1 43.0996 116.4 41.7996C116.7 40.4996 117.1 39.4996 117.4 38.9996ZM114.4 44.0996C114.6 42.8996 114.9 41.6996 115.3 40.5996C115.3 40.4996 115.4 40.2996 115.4 40.1996C115.4 40.7996 115.3 41.4996 115.2 41.9996V42.0996C114.9 43.1996 114.7 44.3996 114.6 45.4996C114.5 45.4996 114.3 45.4996 114.2 45.5996C114.3 45.0996 114.3 44.5996 114.4 44.0996ZM113.2 54.2996C112.4 51.3996 112.2 47.6996 112.4 46.2996C112.7 46.6996 112.9 47.1996 113 47.6996C113 48.4996 113 49.1996 113 49.9996C113 50.2996 113.2 50.4996 113.5 50.4996C113.8 50.4996 114 50.1996 114 49.9996C114 49.2996 114 48.4996 114 47.7996C114 47.2996 114.1 46.7996 114.1 46.2996C114.2 46.3996 114.3 46.4996 114.4 46.4996C115.2 46.5996 115.9 46.8996 116.5 47.2996C117.1 47.6996 117.7 48.2996 118.1 48.8996C118.2 48.9996 118.4 49.0996 118.5 49.0996C118.6 49.0996 118.7 49.0996 118.8 48.9996C119 48.8996 119.1 48.4996 119 48.2996C118.9 48.0996 118.8 47.9996 118.7 47.7996C118.7 47.7996 118.7 47.7996 118.7 47.6996C118.8 47.1996 118.9 46.5996 119 45.9996L119.2 45.6996C119.4 45.2996 119.6 44.7996 119.6 44.6996C119.7 44.3996 119.9 44.1996 120 43.9996C120 44.3996 119.9 44.8996 119.8 45.6996C119.7 46.2996 119.7 46.9996 119.6 47.5996C119.6 47.6996 119.6 47.7996 119.6 47.8996C119.5 49.5996 119.4 51.3996 119.3 53.0996C119.3 53.3996 119.5 53.5996 119.8 53.5996C120.1 53.5996 120.3 53.3996 120.3 53.0996C120.3 51.9996 120.4 50.8996 120.4 49.8996C120.9 50.0996 121.5 50.1996 121.9 50.1996C122.2 51.3996 122.3 52.9996 122 54.7996C121.8 55.8996 121.6 56.7996 121.3 57.6996C117.2 57.6996 113.7 56.2996 113.2 54.2996ZM105.1 59.2996C105.5 58.0996 105.2 56.7996 104.2 54.9996C104.1 54.6996 103.9 54.4996 103.8 54.1996V54.0996C103.8 53.9996 103.7 53.9996 103.7 53.8996C103.7 53.7996 103.6 53.7996 103.6 53.6996C103.4 53.4996 103.2 53.2996 102.9 53.1996H102.8C101.4 52.9996 100.7 52.3996 100.5 51.8996C100.5 51.7996 100.4 51.5996 100.4 51.4996C100.4 51.3996 100.5 51.2996 100.5 51.1996C100.6 51.0996 100.9 50.9996 101.3 51.0996C101.9 51.2996 102.5 51.3996 102.9 51.0996C103 50.9996 103 50.9996 103.1 50.7996C103.2 50.5996 103.2 50.3996 103.1 50.0996C103 49.9996 103 49.7996 103 49.6996C103 49.5996 102.9 49.4996 102.9 49.3996C102.9 49.2996 102.8 49.0996 102.8 48.9996C102.8 48.8996 102.8 48.7996 102.8 48.7996C102.8 48.5996 102.8 48.3996 102.8 48.1996C102.8 48.0996 102.8 48.0996 102.8 47.9996C102.8 47.7996 102.8 47.5996 102.8 47.2996C102.9 46.5996 103.1 45.8996 103.4 45.4996C103.5 45.3996 103.6 45.2996 103.7 45.1996C103.9 45.0996 104.1 44.9996 104.4 44.9996C104.5 44.9996 104.6 44.9996 104.7 45.0996C104.8 45.0996 104.8 45.0996 104.9 45.0996H105C105.7 45.3996 106.6 46.0996 107.6 47.2996C110 50.0996 111 52.1996 110.4 53.5996C109.7 55.1996 106.7 55.2996 106.7 55.2996C106.7 55.2996 106.7 55.2996 106.6 55.2996H106.4C106.4 55.2996 106.3 55.2996 106.3 55.3996C106.3 55.3996 106.3 55.3996 106.2 55.4996C106.2 55.4996 106.2 55.4996 106.2 55.5996V55.7996C106.2 55.7996 106.2 55.7996 106.2 55.8996V56.0996C106.2 56.0996 106.2 56.1996 106.3 56.1996C106.3 56.1996 106.4 56.1996 106.4 56.2996C106.4 56.2996 106.4 56.2996 106.5 56.2996L109.5 57.8996C110.1 58.6996 111.1 59.3996 112.3 59.3996C112.5 59.3996 112.7 59.3996 112.8 59.3996C113.2 59.2996 113.6 59.2996 114 59.1996C114.6 60.1996 116.5 63.6996 115.8 65.7996C115.6 66.3996 115.1 66.8996 114.5 67.0996C111.9 68.0996 105.9 63.9996 103.2 61.7996C104.2 60.8996 104.8 60.0996 105.1 59.2996ZM101.5 62.3996C101.7 62.2996 101.9 62.1996 102.1 62.0996C103.4 63.1996 109.5 67.9996 113.4 67.9996C113.9 67.9996 114.3 67.8996 114.7 67.7996C115.7 67.3996 116.3 66.7996 116.6 65.7996C117.4 63.4996 115.7 60.0996 114.9 58.6996C115.4 58.5996 115.9 58.4996 116.5 58.3996C116.6 58.4996 116.6 58.5996 116.7 58.6996C116.9 59.7996 117.3 60.5996 117.7 61.0996C118.4 63.1996 118.8 65.3996 118.1 67.0996C117.7 68.1996 116.9 68.8996 115.7 69.2996C112.2 70.4996 107 68.2996 100.2 62.7996C100.6 62.6996 101.1 62.4996 101.5 62.3996ZM19.7 107.4C19.8 103.7 20.4 100.1 21.3 96.5996C23.4 96.9996 25.3 98.0996 26.7 99.5996C28.5 101.5 29.5 104 29.5 106.7C29.5 108.8 28.9 110.8 27.7 112.5C26.5 114.2 24.9 115.5 23 116.3C22.2 116.6 21.3 116.9 20.4 117C19.9 113.9 19.7 110.7 19.7 107.4ZM31.6 139.1C26 133.1 22.3 125.8 20.6 117.9C21.6 117.8 22.5 117.5 23.4 117.2C25.5 116.4 27.3 114.9 28.6 113C29.9 111.1 30.5 108.9 30.5 106.6C30.5 103.7 29.4 100.9 27.4 98.7996C25.8 97.0996 23.8 95.9996 21.5 95.4996C23.7 88.2996 27.7 81.6996 33.2 76.2996C41.6 68.0996 52.7 63.5996 64.5 63.5996C64.6 63.5996 64.6 63.5996 64.7 63.5996C70.8 63.5996 77 64.8996 82.6 67.3996C76.4 68.9996 69.5 70.4996 60.6 72.1996C60.6 72.1996 60.6 72.1996 60.5 72.1996C60.4 72.1996 60.4 72.1996 60.4 72.2996C60 72.3996 59.5 72.8996 59.3 73.9996L59.1 74.0996C58.6 74.2996 58.1 74.2996 57.6 74.1996C57.1 74.0996 56.6 73.7996 56.3 73.3996C52.4 69.1996 51.5 69.7996 51.1 69.9996C50.1 70.6996 50.9 72.1996 51.8 73.8996C52.3 74.7996 52.8 75.7996 52.9 76.3996C52.6 76.5996 51.7 76.7996 50.9 76.7996C49.7 76.7996 45.7 76.8996 45.3 76.8996C43.3 76.8996 42.3 77.2996 42.2 77.9996C42.1 78.9996 44 79.3996 45.2 79.5996C45.8 79.6996 46.4 79.7996 46.9 79.7996C45.3 80.0996 43.8 80.3996 43.6 80.3996C41.6 80.6996 40.7 81.2996 40.7 81.9996C40.8 82.8996 42.4 83.0996 43.5 83.0996C43.6 83.0996 43.8 83.0996 43.9 83.0996C44.8 83.0996 45.8 82.9996 46.7 82.9996C46.2 83.0996 45.7 83.2996 45.1 83.3996C43.1 83.7996 42.2 84.3996 42.3 85.0996C42.4 85.8996 43.6 86.0996 44.8 86.0996C45 86.0996 45.3 86.0996 45.5 86.0996C46 86.0996 46.5 86.0996 47.1 85.9996C45.5 86.4996 44.8 86.9996 45 87.6996C45.1 88.2996 45.8 88.5996 47.1 88.5996C47.5 88.5996 47.9 88.5996 48.4 88.4996C49.3 88.3996 50.1 88.2996 50.7 88.1996C52.5 87.8996 54.4 87.5996 56.3 87.2996C58.3 86.9996 60.2 86.4996 62.1 85.9996C62.6 86.4996 63.1 86.7996 63.5 86.7996C63.6 86.7996 63.6 86.7996 63.7 86.7996C63.7 86.7996 63.7 86.7996 63.8 86.7996C77.2 84.3996 88.2 81.4996 97.4 77.8996C100.4 81.0996 103 84.7996 104.9 88.7996C101.3 92.8996 96.8 99.2996 94.2 109.1C94.1 109.3 94.2 109.6 94.4 109.7C94.8 109.9 95.3 110.2 95.7 110.4C95.5 111.9 95.3 113.4 95.1 114.8C92.3 114.2 79.4 111.5 73.8 110.1C69.5 109 66.6 107.4 65.3 106.5C65 106.3 64.8 106.1 64.5 105.9C64.4 105.8 64.2 105.8 64.1 105.8C55.1 107.3 46.4 110.7 38.9 115.8C38.7 115.9 38.7 116.1 38.7 116.3C38.7 116.5 38.9 116.6 39.1 116.7C40.1 116.9 41 117.2 41.9 117.3C42 117.3 42.1 117.3 42.1 117.3C43.1 117.5 44.1 117.7 45 117.8H45.1C45.1 117.8 45.1 117.8 45.2 117.8C50.3 118.5 54 118.3 57 118.1C60.6 117.9 63.4 117.7 67.1 119.3L77.9 124.5L71.2 128.3L69 129.5C58.8 135.2 57.9 145.7 61.4 153.3C50 152.6 39.5 147.6 31.6 139.1ZM84.5 161.6C74.5 166.1 66.4 160.9 62.7 153.8C62.7 153.8 62.7 153.7 62.6 153.7C59 146.5 59.6 136.1 69.5 130.5L70.8 129.8C70.2 138.7 76.5 154.3 87.2 160.1L84.5 161.6ZM133.7 182.3C134.2 183.2 134.3 184.2 134.1 185.1C133.9 186.1 133.3 186.9 132.5 187.5C129 189.9 125.3 192 121.4 193.7C120.5 194.1 119.5 194.1 118.6 193.8C117.7 193.5 116.9 192.8 116.4 192L96.5 156.1L113 146.9C112 150.4 111.2 153.3 110.9 154.1C110.3 155.8 109.5 157.5 108.8 158.9C108.5 159.6 108.1 160.2 107.9 160.7C107.3 161.9 107.3 161.9 107.3 162.2C109 171.1 112.2 179.5 116.8 187.3C116.9 187.5 117.1 187.5 117.2 187.5C117.3 187.5 117.4 187.5 117.4 187.4C117.5 187.3 117.5 187.3 117.6 187.2C120.4 179.1 120 173.6 119.7 169.1C119.5 166 119.3 163.3 120.2 160.6C120.2 160.6 120.5 160 120.9 159L133.7 182.3ZM131.2 135.6C131 135.5 130.7 135.4 130.5 135.3C131.1 133.7 131.6 132.2 132 131C132.3 130.1 132.5 129.1 132.5 128.1C132.7 122.9 132.4 117.7 131.4 112.5C132 112.3 132.6 112 133.2 111.8C133.4 111.7 133.6 111.4 133.5 111.2C128.7 97.9996 124.1 86.0996 123.6 84.7996C124 81.8996 124.3 79.4996 124.4 77.3996L128.2 66.9996C129.7 66.5996 131.2 66.1996 132.6 65.5996C133.7 70.6996 135.5 76.4996 138 82.7996C138 82.8996 138 82.8996 138.1 82.9996C138.1 82.9996 138.1 82.9996 138.1 83.0996C141 90.1996 144.7 97.8996 149 105.6C153.4 113.5 158.1 120.6 162.6 126.7C169.3 135.7 175.8 142.2 180.9 145.3L131.2 135.6Z"
        fill="currentColor"
      />
      <path
        d="M50.5 158.8C50.1 158.7 49.6 158.6 49.2 158.7C48.8 158.8 48.4 158.9 48 159.1C47.6 159.3 47.3 159.6 47 159.9C46.7 160.2 46.5 160.6 46.4 161L46.3 161.5L45.8 161.4C45 161.2 44.1 161.3 43.3 161.7C42.5 162.1 42 162.8 41.7 163.7C41.5 164.5 41.6 165.4 42 166.2C42.4 167 43.1 167.5 44 167.8L50.3 169.6H50.4C50.6 169.6 50.8 169.5 50.9 169.2L52.7 162.9C52.9 162.1 52.8 161.2 52.4 160.4C52.1 159.6 51.3 159.1 50.5 158.8ZM51.8 162.6L50.1 168.5L44.2 166.8C43.6 166.6 43.1 166.2 42.8 165.7C42.5 165.2 42.4 164.5 42.6 164C42.8 163.4 43.2 162.9 43.7 162.6C44 162.4 44.4 162.3 44.8 162.3C45 162.3 45.2 162.3 45.4 162.4L46.4 162.7C46.7 162.8 46.9 162.6 47 162.4L47.3 161.4C47.4 161.1 47.5 160.8 47.7 160.6C47.9 160.4 48.1 160.2 48.4 160C48.7 159.9 49 159.8 49.3 159.7C49.6 159.7 49.9 159.7 50.2 159.8C50.8 160 51.3 160.4 51.6 160.9C51.9 161.4 52 162 51.8 162.6Z"
        fill="currentColor"
      />
      <path
        d="M169.4 68.4996C169.5 68.4996 169.7 68.4996 169.8 68.4996C170.4 68.4996 171 68.2996 171.5 67.8996C171.8 67.6996 172 67.3996 172.2 67.0996C172.4 66.7996 172.5 66.3996 172.6 65.9996C172.6 65.5996 172.6 65.1996 172.5 64.8996C172.4 64.4996 172.2 64.1996 172 63.8996C171.8 63.5996 171.5 63.3996 171.2 63.1996C170.9 62.9996 170.5 62.8996 170.1 62.7996C169.7 62.6996 169.3 62.7996 169 62.8996C168.6 62.9996 168.3 63.1996 168 63.3996C167.4 63.8996 167 64.4996 166.9 65.2996C166.8 66.0996 167 66.7996 167.5 67.3996C168 67.9996 168.7 68.3996 169.4 68.4996ZM167.9 65.3996C168 64.8996 168.2 64.4996 168.6 64.1996C168.8 63.9996 169 63.8996 169.3 63.8996C169.5 63.8996 169.6 63.7996 169.8 63.7996C169.9 63.7996 170 63.7996 170 63.7996C170.2 63.7996 170.5 63.8996 170.7 63.9996C170.9 64.0996 171.1 64.2996 171.2 64.4996C171.4 64.6996 171.5 64.8996 171.5 65.1996C171.6 65.3996 171.6 65.6996 171.5 65.8996C171.5 66.0996 171.4 66.3996 171.3 66.5996C171.2 66.7996 171 66.9996 170.8 67.1996C170.4 67.4996 169.9 67.5996 169.4 67.5996C168.9 67.4996 168.5 67.2996 168.2 66.8996C167.9 66.4996 167.9 65.8996 167.9 65.3996Z"
        fill="currentColor"
      />
      <path
        d="M111.6 88.8996C111.4 88.7996 111.1 88.7996 110.9 89.0996C110.8 89.1996 109.4 91.3996 105.5 91.3996C105.2 91.3996 105 91.5996 105 91.8996C105 92.1996 105.2 92.3996 105.5 92.3996C109.9 92.3996 111.6 89.6996 111.7 89.5996C111.9 89.2996 111.8 88.9996 111.6 88.8996Z"
        fill="currentColor"
      />
      <path
        d="M41.5 54.4996C41.6 54.4996 41.6 54.4996 41.7 54.4996L45.8 52.5996L47.7 56.6996C47.8 56.8996 48 56.9996 48.2 56.9996C48.3 56.9996 48.3 56.9996 48.4 56.9996C48.7 56.8996 48.8 56.5996 48.6 56.2996L46.7 52.1996L50.8 50.2996C51.1 50.1996 51.2 49.8996 51 49.5996C50.8 49.2996 50.6 49.1996 50.3 49.3996L46.2 51.2996L44.3 47.1996C44.2 46.9996 43.9 46.7996 43.6 46.9996C43.3 47.0996 43.2 47.3996 43.4 47.6996L45.3 51.7996L41.2 53.6996C40.9 53.7996 40.8 54.0996 41 54.3996C41.1 54.3996 41.3 54.4996 41.5 54.4996Z"
        fill="currentColor"
      />
      <path
        d="M114.8 28.8996C116.7 31.0996 119.1 32.6996 121.9 33.4996C123.2 33.8996 124.5 34.0996 125.9 34.0996C127.4 34.0996 128.9 33.8996 130.4 33.3996C133.1 32.4996 135.5 30.8996 137.3 28.5996C138.5 27.0996 139.4 25.3996 139.9 23.5996C140.4 21.7996 140.6 19.8996 140.4 17.9996C140.2 16.0996 139.6 14.2996 138.7 12.5996C137.8 10.8996 136.5 9.49961 135 8.29961C132.7 6.49961 130 5.39961 127.2 5.19961C124.3 4.99961 121.5 5.59961 119 6.99961C116.5 8.39961 114.5 10.4996 113.2 13.0996C111.9 15.6996 111.4 18.4996 111.7 21.3996C111.7 23.9996 112.9 26.6996 114.8 28.8996ZM127.6 16.9996L126.8 15.1996L132.6 17.3996L130.5 23.2996L129.6 21.2996C129.5 21.1996 129.4 21.0996 129.3 20.9996C129.2 20.9996 129.2 20.9996 129.1 20.9996C129 20.9996 128.9 20.9996 128.9 21.0996C128.9 21.0996 125.5 22.7996 122.6 21.6996C121.6 21.2996 120.8 20.6996 120.1 19.7996C123 20.3996 127.3 17.6996 127.5 17.5996C127.6 17.4996 127.7 17.1996 127.6 16.9996Z"
        fill="currentColor"
      />
      <path
        d="M157 155.9C154.8 155.9 152.6 156.6 150.7 157.8C149.1 158.9 147.7 160.4 146.9 162.1C146 163.8 145.6 165.8 145.7 167.8C145.8 169.8 146.4 171.7 147.4 173.3C148.4 175 149.9 176.3 151.6 177.2C153.2 178.1 155.1 178.5 156.9 178.5C157 178.5 157.1 178.5 157.2 178.5C159.2 178.5 161.1 177.9 162.7 176.9C164.3 175.9 165.8 174.5 166.7 172.8C167.7 171.1 168.2 169.2 168.2 167.2C168.2 164.2 167 161.3 164.9 159.2C162.8 157 160 155.9 157 155.9Z"
        fill="currentColor"
      />
    </svg>
  </SvgIcon>
)

export default ShareImage
