import { FC } from 'react'

import { SvgIcon, SvgIconProps } from '@mui/material'

const ProtectPrivacyImage: FC<SvgIconProps> = ({ sx, ...props }) => (
  <SvgIcon sx={{ fontSize: 200, color: 'primary.dark', ...sx }} {...props}>
    <svg
      width="200"
      height="200"
      viewBox="0 0 200 200"
      fill="none"
      xmlns="http://www.w3.org/2000/svg"
    >
      <path
        d="M165.4 90.5998L162.9 62.3998C162.9 62.1998 162.7 61.9998 162.6 61.9998C159.4 60.8998 156.1 59.7998 152.9 58.6998L144.7 13.3998C144.7 13.2998 144.6 13.1998 144.6 13.1998L137.7 5.3998L137.6 5.2998H137.3C137.2 5.2998 137.2 5.2998 137.2 5.3998L137.1 5.4998C137.1 5.4998 137.1 5.4998 137.1 5.5998C137.1 5.5998 137.1 5.5998 137.1 5.6998L133.5 15.3998C133.5 15.4998 133.5 15.5998 133.5 15.6998L140.5 54.0998C127.4 48.9998 114.6 42.9998 102.3 36.2998C102.1 36.1998 101.9 36.1998 101.8 36.2998C84.2 49.2998 65.6 61.4998 46.6 72.2998C46.4 72.3998 46.3 72.5998 46.4 72.7998L48.9 101C50.5 117.1 55.2 132.4 62.9 146.5C59.8 145.8 56.6 145.1 53.5 144.3C53.3 144.3 53.1 144.3 53 144.5C52.4 145.3 51.9 146 51.4 146.9C49.4 146.1 47.4 145.5 45.3 145C44.5 144.8 43.7 144.6 43 144.5L42.6 144.4C42.5 144.4 42.4 144.4 42.2 144.5C40.6 145.4 38.8 146.3 36.9 147.3C35.5 148 33.9 148.8 32.3 149.7C28 152 23.9 154.7 20.1 157.7C19.9 157.9 19.7 158.1 19.6 158.4C19.5 158.6 19.5 158.8 19.5 159.1C19.5 159.3 19.6 159.5 19.7 159.7C19.8 159.9 20 160 20.2 160.2C20.4 160.3 20.6 160.4 20.8 160.4C21.1 160.4 21.4 160.4 21.7 160.5C22 160.5 22.2 160.5 22.5 160.5C24 160.6 25.5 160.6 27 160.6C30.5 160.6 34.1 160.4 37.6 160.1C38.3 160 39.1 160 39.8 159.9C42.6 159.6 45.4 159.4 48.1 159.7C48.1 160.6 48.2 161.5 48.3 162.4C48.3 162.6 48.5 162.8 48.6 162.8C59.2 166.2 68.6 169 79.7 171.5C80 171.6 80.2 171.6 80.5 171.7C91 182.9 103.1 191.1 115.6 195.3C115.7 195.3 115.7 195.3 115.8 195.3C115.9 195.3 116 195.3 116 195.2C122.1 191.8 127.8 187.6 132.8 182.6C134.2 184.8 135.7 187 137.5 189.3C137.7 189.5 137.9 189.7 138.2 189.8C138.3 189.8 138.5 189.9 138.7 189.9C138.8 189.9 139 189.9 139.1 189.8C139.4 189.7 139.6 189.5 139.8 189.3C140 189.1 140.1 188.8 140.1 188.5C140.1 188.1 140.2 187.8 140.2 187.4V186.9C140.4 182.6 140.3 178.3 140 174.6C157.9 152.2 167.9 119.3 165.4 90.5998ZM162 62.7998L164.4 90.6998C166.9 118.9 157.2 151 139.8 173C139.7 171.6 139.6 170.3 139.5 169.2C139.4 167.8 139.3 166.5 139.2 165.6C139.1 164 139.1 162.4 139.3 160.7C140.1 160.7 140.9 160.6 141.7 160.5C141.9 160.5 142 160.3 142.1 160.2L154.7 118.9C155.2 117.1 155.3 115.2 154.9 113.3C154.5 111.5 153.5 109.8 152.2 108.4C150.9 107 149.2 106.1 147.4 105.5C145.6 105 143.6 105 141.8 105.5L128.7 109L150.8 95.3998C151 95.2998 151.1 95.0998 151 94.8998C150.9 94.5998 150.9 94.3998 150.8 94.1998C150.9 94.1998 151 94.0998 151.1 94.0998L152 99.1998C152 99.2998 152.1 99.3998 152.2 99.4998C152.3 99.5998 152.4 99.5998 152.5 99.5998H152.6L156.1 98.9998C156.4 98.9998 156.6 98.6998 156.5 98.3998L155.6 93.2998C156 93.1998 156.2 93.1998 156.2 93.1998C157.1 93.0998 157.7 92.1998 157.6 91.1998C157.6 90.7998 157.4 90.3998 157.1 90.0998C157.8 89.6998 158 88.8998 157.9 88.1998C157.8 87.7998 157.6 87.3998 157.3 87.0998C158 86.6998 158.2 85.8998 158.1 85.0998C158 84.5998 157.8 84.1998 157.4 83.8998C158.1 83.4998 158.3 82.6998 158.1 81.9998C157.9 81.0998 157 80.1998 155.8 80.4998C155.5 80.5998 154.9 80.6998 154.3 80.7998C154 80.8998 153.7 80.8998 153.4 80.9998L153.2 79.6998L161.4 78.1998C161.7 78.1998 161.9 77.8998 161.8 77.5998C161.8 77.2998 161.5 77.0998 161.2 77.1998L156.5 78.0998L153.2 59.9998C156 60.7998 159 61.7998 162 62.7998ZM130.9 131.9C134.1 130.3 136.1 129 136.2 128.9C136.4 128.8 136.5 128.4 136.4 128.2C136.3 128 135.9 127.9 135.7 128C135.7 128 133.6 129.4 130.3 131C125.3 133.6 115.6 137.8 107.3 137.2C102.7 136.9 98.9 135.1 96.5 132.2C94.2 129.4 93.4 125.5 94 121.1C94.3 118.9 94.9 116.8 95.8 114.8C102.7 115.7 109.9 115.2 116.6 113.1L142 106.3C143.7 105.9 145.4 105.9 147.1 106.3C148.8 106.8 150.3 107.7 151.4 108.9C152.6 110.1 153.4 111.7 153.8 113.3C154.2 115 154.2 116.7 153.7 118.4L141.2 159.4C139.2 159.7 137.3 159.7 135.3 159.5C135.2 159.5 135.1 159.5 135 159.5C134.5 159.4 133.9 159.3 133.4 159.2C133.3 159.2 133.1 159.2 133 159.1H132.9C131.1 158.7 129.4 158.1 127.8 157.2C126.9 156.7 126 156.2 125.2 155.6L130.9 131.9ZM92.3 98.1998C92 97.4998 91.6 96.6998 91.3 96.0998C91.2 95.9998 91.1 95.8998 90.9 95.7998C90.7 95.7998 90.6 95.7998 90.5 95.9998L86.8 100.1C86.3 100.3 85.9 100.6 85.4 100.8C84.4 101.3 83.5 101.8 82.7 102.2C82.5 102.3 82.4 102.5 82.4 102.6C82.4 104.6 82.7 112.7 83.1 117.3C81.6 116.6 79 116.5 77.3 116.6C74.6 116.7 71.6 117 70.1 117.8C69.8 113.6 69.8 109.4 69.9 105.3C70.1 98.8998 70.2 96.4998 76.7 92.0998C83 87.7998 89.4 84.5998 95.6 82.5998C95.6 82.5998 95.6 82.5998 95.7 82.5998C95.7 82.5998 95.7 82.5998 95.8 82.5998C98.6 81.6998 101.3 81.0998 104 80.6998C104.6 80.5998 105.2 80.4998 105.7 80.4998C105.7 80.4998 105.7 80.4998 105.8 80.4998C105.9 80.4998 105.9 80.4998 106 80.4998C114.4 79.6998 116.2 82.5998 120.5 89.6998C121.5 91.2998 122.6 93.1998 124 95.2998L125 96.6998C125.1 96.7998 125.3 96.8998 125.4 96.8998C125.5 96.8998 125.6 96.8998 125.7 96.7998C125.9 96.5998 126 96.2998 125.8 96.0998L125.1 95.0998L142.7 82.9998C143.1 83.1998 143.5 83.4998 143.9 83.7998C144.2 83.9998 144.5 84.2998 144.8 84.5998C144.9 84.6998 145 84.6998 145.1 84.7998C145.4 85.0998 145.7 85.3998 146 85.6998C146.1 85.7998 146.1 85.8998 146.2 85.8998C146.4 86.1998 146.6 86.4998 146.8 86.7998C146.9 86.8998 147 87.0998 147.1 87.1998C147.3 87.4998 147.4 87.6998 147.6 87.9998C147.7 88.1998 147.8 88.3998 147.9 88.5998C148 88.8998 148.2 89.0998 148.3 89.3998C148.4 89.5998 148.5 89.8998 148.6 90.1998C148.7 90.3998 148.8 90.6998 148.9 90.8998C149.1 91.3998 149.3 91.8998 149.4 92.3998C149.4 92.4998 149.4 92.5998 149.5 92.5998C149.7 93.1998 149.8 93.7998 150 94.3998L128 108.2C123.2 111.2 119.5 108.4 117.7 106.5L117.6 106.4L108.8 96.1998C108.6 95.9998 108.3 95.9998 108.1 96.0998C107.9 96.1998 107.8 96.4998 108 96.7998L116.6 110.2C116.5 110.9 116.3 111.6 116.1 112.3C109.6 114.3 102.6 114.8 95.9 113.9C95.2 108.6 94.2 102.7 92.3 98.1998ZM76.6 129.6C76.3 129.5 76 129.3 75.7 129.1C75.2 128.8 74.7 128.5 74.3 128.1C74.2 128 74.1 128 74 128V127.9C74.1 126.9 74.4 125.8 74.8 124.9C75 124.9 75.2 125 75.4 125.1C76.4 125.6 77.2 127 76.6 129.6ZM73 127.6C72.1 128.1 71.2 128.6 70.2 128.9C71.1 128.2 72.1 127 72.9 125.9C73.1 125.6 73.3 125.4 73.6 125.3C73.3 126 73.1 126.8 73 127.6ZM73.4 128.5C73.4 128.6 73.4 128.7 73.5 128.8C72.8 129.5 72 130.1 71.2 130.7C70.1 131 69 131.1 67.9 131.2C67.5 131.2 67.3 131.1 67.1 131.1C67.3 131 67.6 130.9 68.2 130.7C70.1 130.1 71.8 129.4 73.4 128.5ZM71.6 131.5C71.7 131.5 71.7 131.4 71.8 131.4C72.7 130.8 73.5 130.1 74.3 129.4C74.5 129.5 74.6 129.6 74.8 129.7C74.4 130.4 73.9 131.1 73.4 131.8C72 132.7 70.4 133.4 68.8 133.9C68.4 134 68.2 134 68 134C68.2 133.8 68.6 133.4 69.5 132.9C70.2 132.5 70.9 132 71.6 131.5ZM75.6 130.2C75.9 130.3 76.1 130.5 76.4 130.6C76.2 131.4 76 132.2 75.7 132.9C74.5 134.3 73.1 135.6 71.6 136.7C71 137.1 70.7 137.2 70.5 137.2C70.5 137 70.8 136.4 71.7 135.3C73.2 133.8 74.5 132.1 75.6 130.2ZM77.5 130.5C78.4 126.9 77.3 124.9 75.9 124.3C75.5 124.1 75.1 124 74.7 124C73.7 124 72.8 124.5 72.2 125.4C70.8 127.3 69.8 128.2 69.4 128.4C69.4 128.3 69.5 128 69.6 127.6C70 126.4 70.2 125.5 70.5 124.6L70.7 123.8C70.9 123.3 71.8 122.4 72.6 121.7C73 121.4 73.3 121.1 73.5 120.9C73.7 120.7 73.9 120.4 74 120.2V120.1C74.1 119.4 74.1 118.7 74 118.1C76.1 117.8 78.3 117.8 80.4 117.9C80.5 118.4 80.6 119.3 80.8 121C81.1 123.3 81.3 125.6 81.4 127.8C81.2 129 78.1 135.2 76.1 138C75.6 138.6 75.2 139 75 139.1C75 138.9 75.1 138.3 75.5 137.2C76.2 134.9 76.9 132.7 77.5 130.5ZM100.1 76.6998C100.7 73.6998 100.2 69.9998 99.7 69.4998C98.4 68.3998 98.1 67.2998 98.3 66.5998C98.4 66.2998 98.6 65.9998 98.9 65.8998C99.2 65.7998 99.5 65.9998 99.8 66.3998C100.2 66.8998 100.7 67.4998 101.3 67.2998C101.5 67.1998 101.9 66.9998 102 66.3998C102.4 64.4998 104 62.1998 105.5 62.1998C106.7 62.1998 107.7 63.8998 108.3 67.0998C109.1 70.9998 108.8 73.5998 107.5 74.5998C105.7 75.8998 102.4 73.9998 102.4 73.9998C102.2 73.8998 101.9 73.8998 101.7 74.1998C101.6 74.3998 101.6 74.6998 101.9 74.8998C102 74.8998 103.1 75.5998 104.4 75.8998C104.2 77.1998 104.1 78.4998 104.8 79.6998C104.5 79.6998 104.2 79.7998 103.8 79.7998C102 80.0998 100.1 80.4998 98.3 80.8998C99.2 79.8998 99.8 78.3998 100.1 76.6998ZM145 83.5998C146 83.1998 147.2 82.9998 149.4 82.5998H149.5C150.1 82.4998 152.6 81.9998 153 81.9998H153.1C153.5 81.8998 154 81.7998 154.4 81.6998C155 81.5998 155.6 81.4998 155.9 81.3998C156.6 81.2998 157 81.6998 157.1 82.1998C157.2 82.4998 157.1 83.0998 156.6 83.1998C156.4 83.1998 154.8 83.5998 154.6 83.5998C154.3 83.6998 154.2 83.8998 154.2 84.1998C154.3 84.4998 154.5 84.5998 154.8 84.5998C154.9 84.5998 155.1 84.5998 155.3 84.5998C155.6 84.5998 155.8 84.5998 155.9 84.5998C156.7 84.4998 157.1 84.8998 157.2 85.3998C157.3 85.6998 157.2 86.2998 156.6 86.3998L155 86.5998C154.7 86.5998 154.5 86.8998 154.6 87.1998C154.6 87.4998 154.9 87.6998 155.2 87.5998C155.3 87.5998 155.3 87.5998 155.4 87.5998C155.5 87.5998 155.7 87.5998 155.7 87.5998C156.5 87.4998 156.9 87.9998 156.9 88.3998C157 88.7998 156.8 89.1998 156.3 89.2998C156.1 89.2998 155.8 89.3998 155.5 89.3998H155.3C155 89.3998 154.8 89.6998 154.9 89.9998C154.9 90.2998 155.2 90.4998 155.4 90.3998C156.2 90.2998 156.5 90.8998 156.6 91.2998C156.6 91.5998 156.5 92.0998 156 92.0998C156 92.0998 152.6 92.6998 150.5 93.1998C150.5 93.0998 150.4 92.9998 150.4 92.8998C150.3 92.6998 150.3 92.4998 150.2 92.2998C150.1 91.8998 149.9 91.3998 149.8 90.9998C149.7 90.7998 149.6 90.5998 149.6 90.3998C149.4 89.8998 149.2 89.3998 148.9 88.8998C148.8 88.6998 148.7 88.4998 148.6 88.3998C148.4 88.0998 148.2 87.6998 148 87.3998C147.9 87.1998 147.7 86.9998 147.6 86.7998C147.4 86.4998 147.2 86.1998 146.9 85.8998C146.8 85.6998 146.6 85.5998 146.5 85.3998C146.2 85.0998 145.9 84.6998 145.6 84.3998C145.5 84.2998 145.3 84.0998 145.2 83.9998C145.2 83.7998 145.1 83.6998 145 83.5998ZM117.8 107.9C119 108.9 120.7 110.2 123 110.4L117.2 111.9C117.6 110.7 117.8 109.3 117.8 107.9ZM151.9 58.9998L155.4 77.9998L151.2 78.7998L138.2 7.2998L143.8 13.6998L151.9 58.9998ZM137.1 7.4998L150.1 78.9998L149.3 79.0998L145.9 79.6998L141.4 54.9998L141.5 54.8998C141.6 54.6998 141.5 54.3998 141.3 54.2998L134.2 15.3998L137.1 7.4998ZM49.4 100.7L47 72.7998C65.9 61.9998 84.3 49.9998 101.8 37.0998C114.2 43.8998 127.2 49.8998 140.4 55.0998L144.9 79.9998L140.2 80.8998C139.9 80.8998 139.7 81.1998 139.8 81.4998C139.8 81.6998 140.1 81.8998 140.3 81.8998H140.4L145.6 80.9998L148.6 80.4998L148.8 81.7998C146.4 82.2998 145.1 82.5998 144 83.0998C143.6 82.7998 143.2 82.4998 142.7 82.2998C142.5 82.1998 142.3 82.1998 142.2 82.2998L124.4 94.4998C123.2 92.5998 122.1 90.8998 121.2 89.3998C116.8 82.0998 114.8 78.7998 105.9 79.6998C105 78.6998 105.2 77.5998 105.3 76.1998C106.2 76.2998 107.2 76.1998 108 75.5998C109.7 74.3998 110.1 71.4998 109.2 67.0998C109 66.2998 108.9 65.5998 108.7 64.9998C108.7 64.9998 108.7 64.9998 108.7 64.8998L106.3 56.9998C106.1 56.5998 105.8 56.1998 105.3 55.9998C104.9 55.7998 104.4 55.6998 103.9 55.7998C103.4 55.8998 103 56.0998 102.6 56.4998C102.5 56.5998 102.4 56.6998 102.3 56.7998C102.3 56.7998 102.2 56.7998 102.2 56.6998C101.9 56.4998 101.5 56.2998 101.1 56.2998C100.7 56.2998 100.3 56.2998 100 56.4998C99.6 56.6998 99.3 56.8998 99.1 57.1998C99 57.2998 99 57.3998 98.9 57.4998C98.6 57.2998 98.3 57.1998 97.9 57.0998C97.1 56.9998 96.2 57.3998 95.8 58.0998C95.7 58.2998 95.6 58.4998 95.5 58.6998C95.3 58.5998 95.2 58.5998 95 58.5998C94.7 58.4998 94.4 58.5998 94 58.5998C93.7 58.6998 93.4 58.7998 93.2 59.0998C92.8 59.4998 92.5 59.8998 92.5 60.4998C92.4 60.9998 92.6 61.5998 92.8 61.9998C95.3 66.7998 99.3 75.6998 98.3 78.8998C97.6 80.3998 96.6 81.3998 95.3 81.8998C88.9 83.8998 82.4 87.1998 76 91.4998C69.1 96.1998 69 98.8998 68.8 105.5C68.6 110.1 68.7 114.7 69 119.2C69 119.2 69 119.2 69 119.3C69 119.5 69 119.9 69.4 120.2C69.8 120.7 70.7 121 71.7 121.1C70.8 121.9 69.8 122.8 69.6 123.6L69.4 124.4C69.1 125.3 68.9 126.1 68.5 127.4C68.4 127.9 68 129.1 68.7 129.5H68.8C68.5 129.6 68.3 129.7 68 129.7C67.5 129.8 65.9 130.2 66 131.2C66.1 131.8 66.8 132.2 67.9 132.2C68.3 132.2 68.7 132.1 69.1 132.1C69.1 132.1 69.1 132.1 69 132.1C67.5 132.9 66.7 133.8 67 134.5C67.1 134.8 67.4 135 68 135C68.3 135 68.6 134.9 69.1 134.8C70.1 134.5 71 134.1 71.9 133.7C71.6 134.1 71.3 134.4 71 134.8C69.7 136.3 69.2 137.4 69.8 138C69.9 138.1 70.2 138.3 70.5 138.3C70.9 138.3 71.4 138.1 72.2 137.6C73.2 136.9 74.1 136.1 74.9 135.3C74.7 135.8 74.5 136.2 74.4 136.7C73.9 137.8 73.4 139.4 74.2 139.9C74.3 140 74.5 140 74.6 140C75.3 140 76.1 139.2 76.7 138.4C78.6 135.7 81.9 129.2 82.1 127.7C82.1 125.4 81.9 123 81.5 120.7C81.5 120.7 81.5 120.7 81.5 120.6C83.9 120.2 84.1 119 84.1 118.6C83.8 114.7 83.3 105.6 83.3 102.9C84 102.5 84.9 102.1 85.7 101.6C87.5 100.6 89.6 99.4998 91.4 98.8998C93.2 103.3 94.1 109.1 94.8 114.2C93.9 116.4 93.2 118.6 92.9 121C92.4 124.6 92.8 127.8 94 130.5C91.2 137.4 87.6 144 83.4 150.1C76.8 149.2 70.1 148 63.6 146.5C55.9 132.4 51 116.9 49.4 100.7ZM20.6 159.1C20.5 159.1 20.4 159.1 20.4 159C20.3 159 20.3 158.9 20.2 158.8C20.2 158.7 20.1 158.7 20.1 158.6C20.1 158.5 20.1 158.4 20.1 158.4C20.1 158.3 20.2 158.2 20.3 158.1C24.1 155.1 28.2 152.5 32.4 150.2C34 149.3 35.5 148.5 37 147.8C38.9 146.8 40.6 145.9 42.2 145L42.5 145.1C42.8 145.2 43.2 145.2 43.5 145.3C42.5 145.8 41.5 146.4 40.4 147C35.2 149.8 28.8 153.2 22.4 158.7C22.3 158.8 22.2 158.9 22.1 159.1C21.9 159.1 21.8 159.1 21.6 159.1C21.2 159.1 20.9 159.1 20.6 159.1ZM49.1 161.6C49 159.9 48.8 158.3 48.9 156.7C48.9 156.5 48.9 156.4 48.9 156.2C48.9 156 48.9 155.8 48.9 155.6C48.9 155.3 48.9 155.1 49 154.8C49 154.6 49.1 154.4 49.1 154.2C49.1 154 49.2 153.8 49.2 153.5C49.3 153.2 49.3 153 49.4 152.7C49.4 152.5 49.5 152.3 49.5 152.2C49.6 151.9 49.7 151.6 49.8 151.3C49.9 151.1 49.9 151 50 150.8C50.4 149.8 50.9 148.9 51.4 147.9C51.9 146.9 52.6 146 53.2 145.1C56.6 146 60 146.7 63.4 147.5C63.4 147.5 63.4 147.5 63.5 147.5C70.2 149 77 150.2 83.8 151.1C84 151.1 84.2 151 84.3 150.9C88.5 144.9 92 138.4 94.8 131.6C95.1 132.1 95.4 132.5 95.7 132.9C97.4 135 99.8 136.5 102.7 137.4C102.7 137.4 102.7 137.4 102.8 137.4L112.8 140.9C108.2 148.7 103.2 156.3 97.8 163.5C95.7 166.2 92.9 168.2 89.7 169.4C86.8 170.5 83.6 170.7 80.6 170.2C80.3 170.2 80 170.1 79.8 170C68.8 167.8 59.5 165 49.1 161.6ZM115.5 194C103.6 189.9 92 182.2 81.9 171.6C82.5 171.7 83.1 171.7 83.6 171.7C85.8 171.7 87.9 171.3 90 170.6C93.4 169.4 96.3 167.2 98.5 164.4C104.9 155.9 110.7 146.9 115.9 137.7C121.2 136.5 126.3 134.4 129.7 132.7L124.2 155.9C124.2 156.1 124.2 156.3 124.4 156.4C125.1 156.9 125.8 157.4 126.6 157.9C125.9 160 125.3 161.7 124.8 163.7L124.7 163.9C124.5 164.9 124.2 165.8 124 166.8C124 166.9 124 167 124.1 167.2C125 168.8 126 170.6 127 172.5C128.4 175.2 130.1 178.4 132.1 181.7C127.1 186.4 121.6 190.6 115.5 194ZM139 188.2C139 188.3 139 188.4 138.9 188.5C138.8 188.6 138.7 188.6 138.6 188.7C138.5 188.7 138.4 188.7 138.3 188.7C138.2 188.7 138.1 188.6 138.1 188.5C133.3 182.4 130.3 176.6 127.8 171.9C126.8 170 125.9 168.3 125 166.7C125.1 166.1 125.3 165.6 125.4 165C126.1 166.3 126.9 167.6 127.6 169.1C130.3 174.2 133.8 180.5 139.1 187V187.3C139.1 187.5 139.1 187.9 139 188.2Z"
        fill="currentColor"
      />
      <path
        d="M28 132.2C28.1 132.3 28.2 132.4 28.4 132.4C28.4 132.4 28.4 132.4 28.5 132.4C28.7 132.4 28.8 132.3 28.9 132.1L32.6 124C32.7 123.8 32.6 123.5 32.4 123.3C32.1 123.2 31.9 123.3 31.7 123.5L28.3 130.9L24.6 126.5C24.4 126.3 24.1 126.3 23.9 126.4C23.7 126.6 23.7 126.9 23.8 127.1L28 132.2Z"
        fill="currentColor"
      />
      <path
        d="M176 176.5C176 176.4 175.9 176.2 175.8 176.2C175.7 176.1 175.6 176.1 175.4 176.1L164.6 177L164.3 173.5C164.2 172.1 164.6 170.8 165.5 169.8C166.4 168.8 167.6 168.1 169 168C170.4 167.9 171.7 168.3 172.7 169.2C173.8 170.1 174.4 171.3 174.5 172.7C174.5 173 174.8 173.2 175 173.1C175.3 173.1 175.5 172.8 175.4 172.6C175.2 171 174.5 169.5 173.2 168.5C171.9 167.5 170.4 167 168.7 167.1C167.1 167.2 165.6 168 164.5 169.2C163.4 170.4 162.9 172 163.1 173.7L163.5 177.7L164 184C164.1 184.8 164.3 185.6 164.7 186.3C165.1 187 165.6 187.7 166.2 188.2C166.8 188.7 167.5 189.1 168.3 189.4C168.9 189.6 169.5 189.7 170.2 189.7C170.4 189.7 170.6 189.7 170.7 189.7C171.5 189.6 172.3 189.4 173 189C173.7 188.6 174.4 188.1 174.9 187.5C175.4 186.9 175.8 186.2 176 185.4C176.2 184.6 176.3 183.8 176.2 183L176 176.5ZM175.4 185C175.2 185.7 174.9 186.3 174.4 186.8C174 187.3 173.4 187.8 172.8 188.1C172.2 188.4 171.5 188.6 170.9 188.7C170.2 188.8 169.5 188.7 168.9 188.5C168.2 188.3 167.7 188 167.1 187.5C166.6 187.1 166.2 186.5 165.8 185.9C165.5 185.3 165.3 184.6 165.3 183.9L164.8 178.1L175.1 177.2L175.6 183C175.6 183.6 175.6 184.3 175.4 185Z"
        fill="currentColor"
      />
      <path
        d="M171.3 180.6C171 180.3 170.6 180.2 170.2 180.2C169.8 180.2 169.4 180.4 169.2 180.7C168.9 181 168.8 181.4 168.8 181.8L169 183.4C169 183.8 169.2 184.1 169.6 184.4C169.9 184.6 170.2 184.7 170.6 184.7H170.7C171.1 184.7 171.5 184.5 171.7 184.2C172 183.9 172.1 183.5 172.1 183.1L171.9 181.5C171.8 181.2 171.6 180.8 171.3 180.6Z"
        fill="currentColor"
      />
      <path
        d="M52.5 44.1998C52.9 44.4998 53.4 44.7998 53.9 44.9998C54.3 45.0998 54.7 45.1998 55.1 45.1998C55.2 45.1998 55.3 45.1998 55.4 45.1998C55.9 45.1998 56.4 44.9998 56.9 44.7998C57.4 44.5998 57.8 44.1998 58.1 43.7998C58.4 43.3998 58.7 42.8998 58.8 42.3998C59 41.8998 59 41.3998 58.9 40.7998C58.8 39.7998 58.3 38.7998 57.5 38.1998C56.7 37.4998 55.7 37.1998 54.6 37.2998C53.6 37.3998 52.6 37.8998 51.9 38.6998C51.2 39.4998 50.9 40.4998 51 41.4998C51 41.9998 51.2 42.4998 51.4 42.9998C51.8 43.3998 52.1 43.7998 52.5 44.1998ZM52.9 39.1998C53.4 38.5998 54.1 38.1998 54.9 38.1998C55 38.1998 55.1 38.1998 55.2 38.1998C55.9 38.1998 56.5 38.3998 57.1 38.8998C57.7 39.3998 58.1 40.0998 58.2 40.8998C58.2 41.2998 58.2 41.6998 58.1 42.0998C58 42.4998 57.8 42.7998 57.5 43.0998C57.2 43.3998 56.9 43.6998 56.6 43.7998C56.2 43.9998 55.9 44.0998 55.5 44.0998C55.1 44.0998 54.7 44.0998 54.3 43.9998C53.9 43.8998 53.6 43.6998 53.3 43.3998C53 43.0998 52.8 42.7998 52.6 42.4998C52.4 42.0998 52.3 41.7998 52.3 41.3998C52.1 40.5998 52.4 39.7998 52.9 39.1998Z"
        fill="currentColor"
      />
      <path
        d="M180.4 50.8998L177.1 51.1998C176.6 51.1998 176.1 51.0998 175.6 50.8998C175.1 50.5998 174.8 50.2998 174.5 49.7998C174.3 49.4998 174.2 49.1998 174.2 48.7998L173.9 45.4998C173.9 45.1998 173.6 44.9998 173.4 44.9998C173.1 44.9998 172.9 45.2998 172.9 45.4998L173.2 48.7998C173.2 49.0998 173.2 49.4998 173.1 49.7998C173 50.0998 172.8 50.3998 172.6 50.6998C172.4 50.9998 172.1 51.1998 171.8 51.2998C171.5 51.4998 171.2 51.5998 170.8 51.5998L167.5 51.8998C167.2 51.8998 167 52.1998 167 52.3998C167 52.6998 167.2 52.8998 167.5 52.8998L170.8 52.5998C171.3 52.5998 171.8 52.6998 172.3 52.8998C172.8 53.1998 173.1 53.4998 173.4 53.9998C173.6 54.2998 173.7 54.5998 173.7 54.9998L174 58.2998C174 58.5998 174.2 58.7998 174.5 58.7998C174.8 58.7998 175 58.4998 175 58.2998L174.7 54.9998C174.7 54.4998 174.8 53.9998 175 53.4998C175.3 52.9998 175.6 52.6998 176.1 52.3998C176.4 52.1998 176.7 52.0998 177.1 52.0998L180.4 51.7998C180.7 51.7998 180.9 51.4998 180.9 51.2998C180.9 51.0998 180.6 50.8998 180.4 50.8998ZM174.2 53.0998C174.2 53.1998 174.1 53.1998 174.1 53.2998C173.8 52.8998 173.4 52.4998 172.9 52.1998C172.8 52.1998 172.8 52.0998 172.7 52.0998C173 51.8998 173.2 51.6998 173.4 51.4998C173.6 51.2998 173.8 50.9998 173.9 50.6998C174.2 51.0998 174.6 51.4998 175.1 51.7998C175.2 51.7998 175.2 51.8998 175.3 51.8998C174.8 52.1998 174.4 52.5998 174.2 53.0998Z"
        fill="currentColor"
      />
    </svg>
  </SvgIcon>
)

export default ProtectPrivacyImage
