import { FC } from 'react'

import { SvgIcon, SvgIconProps } from '@mui/material'

const PageUnderConstructionImage: FC<SvgIconProps> = ({ sx, ...props }) => (
  <SvgIcon sx={{ fontSize: 200, color: 'primary.dark', ...sx }} {...props}>
    <svg
      width="200"
      height="200"
      viewBox="0 0 200 200"
      fill="none"
      xmlns="http://www.w3.org/2000/svg"
    >
      <path
        d="M73.9 64.4004C74.2 64.7004 74.5 64.9004 74.8 65.0004C75.1 65.1004 75.5 65.2004 75.9 65.2004C76.3 65.2004 76.6 65.1004 77 65.0004C77.3 64.9004 77.6 64.7004 77.9 64.4004C78.2 64.1004 78.4 63.8004 78.5 63.5004C78.6 63.2004 78.7 62.8004 78.7 62.4004C78.7 61.6004 78.4 60.9004 77.9 60.4004C77.4 59.9004 76.7 59.6004 75.9 59.6004C75.2 59.6004 74.4 59.9004 73.9 60.4004C73.4 60.9004 73.1 61.6004 73.1 62.4004C73.1 62.8004 73.2 63.1004 73.3 63.5004C73.5 63.8004 73.7 64.1004 73.9 64.4004ZM74.6 61.1004C74.9 60.8004 75.4 60.6004 75.9 60.6004C76.4 60.6004 76.8 60.8004 77.2 61.1004C77.5 61.4004 77.7 61.9004 77.7 62.4004C77.7 62.6004 77.7 62.9004 77.6 63.1004C77.5 63.3004 77.4 63.5004 77.2 63.7004C77 63.9004 76.8 64.0004 76.6 64.1004C76.4 64.2004 76.1 64.3004 75.9 64.2004C75.7 64.2004 75.4 64.2004 75.2 64.1004C75 64.0004 74.8 63.9004 74.6 63.7004C74.4 63.5004 74.3 63.3004 74.2 63.1004C74.1 62.9004 74.1 62.6004 74.1 62.4004C74.1 61.9004 74.3 61.5004 74.6 61.1004Z"
        fill="currentColor"
      />
      <path
        d="M162.3 76.9004H132.6C132.3 76.9004 132.1 77.1004 132.1 77.4004V97.9004C132.1 98.2004 132.3 98.4004 132.6 98.4004H162.3C162.6 98.4004 162.8 98.2004 162.8 97.9004V77.4004C162.8 77.1004 162.6 76.9004 162.3 76.9004ZM161.8 97.4004H133.1V77.9004H161.8V97.4004Z"
        fill="currentColor"
      />
      <path
        d="M139.9 93.3004H154.7C154.9 93.3004 155 93.2004 155.1 93.1004C155.2 92.9004 155.2 92.8004 155.1 92.6004L150.9 85.2004C150.8 85.0004 150.6 84.9004 150.5 84.9004C150.3 84.9004 150.2 85.0004 150.1 85.1004L149.1 86.9004L146.3 82.1004C146.1 81.8004 145.6 81.8004 145.4 82.1004L139.4 92.5004C139.3 92.7004 139.3 92.8004 139.4 93.0004C139.6 93.2004 139.8 93.3004 139.9 93.3004ZM149.7 88.0004L150.6 86.5004L154 92.4004H152.2L152.1 92.3004L149.7 88.0004ZM145.9 83.5004L151 92.4004H140.8L145.9 83.5004Z"
        fill="currentColor"
      />
      <path
        d="M153.7 85.5004C154.2 85.5004 154.6 85.3004 154.9 85.0004C155.2 84.7004 155.4 84.2004 155.4 83.8004C155.4 83.4004 155.2 82.9004 154.9 82.6004C154.2 81.9004 153.1 81.9004 152.4 82.6004C152.1 82.9004 151.9 83.4004 151.9 83.8004C151.9 84.2004 152.1 84.7004 152.4 85.0004C152.8 85.3004 153.2 85.5004 153.7 85.5004Z"
        fill="currentColor"
      />
      <path
        d="M194.5 170H181.6V105.7C181.7 105.7 181.7 105.6 181.8 105.6C182 105.4 182.1 105.2 182.1 104.9C182.1 104.6 182 104.4 181.8 104.2C181.6 104 181.4 103.9 181.1 103.9C180.8 103.9 180.6 104 180.4 104.2C180.2 104.4 180.1 104.6 180.1 104.9C180.1 105.2 180.2 105.4 180.4 105.6C180.5 105.7 180.5 105.7 180.6 105.7V111.6H169.7V67.2004C169.7 63.1004 168.1 59.3004 165.2 56.4004C162.3 53.5004 158.5 51.9004 154.4 51.9004H64.6C62.6 51.9004 60.6 52.3004 58.7 53.1004C56.8 53.9004 55.2 55.0004 53.7 56.4004C52.3 57.8004 51.1 59.5004 50.4 61.4004C49.6 63.3004 49.2 65.2004 49.2 67.3004V111.8H38.4V105.8C38.4 105.8 38.5 105.8 38.5 105.7C38.7 105.5 38.8 105.3 38.8 105C38.8 104.8 38.7 104.5 38.5 104.3C38.3 104.1 38.1 104 37.8 104C37.5 104 37.3 104.1 37.1 104.3C36.9 104.5 36.8 104.7 36.8 105C36.8 105.3 36.9 105.5 37.1 105.7C37.2 105.8 37.2 105.8 37.3 105.8V113L35.3 112C35.1 111.9 34.9 111.9 34.8 112C34.5 112.2 34.3 112.5 34 112.7L29.3 110C28.3 108.9 27.1 107.9 25.7 107.3C25.4 107.2 25 107.2 24.7 107.3C23.4 107.8 22 108.2 20.4 108.6C16.3 109.8 11.3 111.4 5.8 114.2C5.6 114.3 5.4 114.4 5.3 114.6C5.2 114.8 5.1 115 5 115.2C5 115.4 5 115.6 5 115.8C5.1 116 5.2 116.2 5.3 116.4C5.5 116.6 5.7 116.8 6 116.9C11.6 118.4 17.3 119.1 23.1 119.2L28.6 122.2C28.4 122.8 28.3 123.4 28.2 124C28.2 124.2 28.3 124.4 28.5 124.5L37.4 129.3V170H23C22.7 170 22.5 170.2 22.5 170.5C22.5 170.8 22.7 171 23 171H91.5C91.6 171 91.8 171 91.9 171H194.5C194.8 171 195 170.8 195 170.5C195 170.2 194.8 170 194.5 170ZM154.9 166.7H153.5L153.3 166L150.1 153.6L148.6 148C148.5 147.8 148.3 147.6 148.1 147.6H145.9C145.7 147.6 145.5 147.8 145.4 148L144.7 151.4L142.5 161.2L141.3 166.7H140C139.7 166.7 139.5 166.9 139.5 167.2V170.1H93.2C93.2 169.9 93.2 169.8 93.2 169.6C93.1 169.4 93 169.2 92.8 169C90.2 166.7 86.2 163.9 82.6 162.8L83.4 157.4C83.9 157.3 84.4 157.2 85 157.1C85.2 157.1 85.4 156.9 85.4 156.7L88.2 140.2H154.6C157.2 140.2 159.9 139.5 162.2 138.2C164.4 136.9 166.3 135.1 167.6 133H180.8V170H155.6V167.1C155.4 166.9 155.2 166.7 154.9 166.7ZM145.5 152.2L149.1 154L150.4 158.9L144.7 156L145.5 152.2ZM143.4 162L152.4 166.5L152.5 166.7H142.4L143.4 162ZM54 131.9L38.3 124.1V116.2L70 131.9H54ZM38.3 125.3L51.7 132H38.3V125.3ZM60.4 132.9H73.8L73.1 139.1H64.5C61.3 139.1 58.2 138 55.7 136.1C57.6 135.6 59.2 134.5 60.4 132.9ZM57.2 77.9004H59.8C58.7 83.0004 58.7 88.3004 59.7 93.5004C59.3 93.9004 58.3 95.2004 57.2 96.9004V77.9004ZM70.3 61.4004C70.5 61.7004 70.6 62.0004 70.6 62.4004C70.6 62.8004 70.5 63.1004 70.3 63.4004C70.2 63.5004 70.1 63.7004 69.9 63.8004C69.7 62.8004 69.4 61.9004 69 61.1004L69.6 60.9004C69.9 61.0004 70.1 61.2004 70.3 61.4004ZM66.4 69.9004C65.9 69.7004 65.4 69.4004 64.9 69.1004C64.7 69.0004 64.5 69.0004 64.3 69.2004C64.1 69.4004 64.1 69.6004 64.2 69.8004L65.3 71.8004C65.2 72.2004 65.2 72.5004 65.2 72.9004L62.3 72.4004C62.6 71.4004 62.9 70.3004 63.1 69.2004C63.2 67.8004 63.1 66.4004 62.7 65.1004C62.7 64.9004 62.5 64.8004 62.3 64.7004C61.7 64.6004 61.4 64.2004 61.4 63.9004L62.2 63.6004C62.4 63.7004 62.5 63.8004 62.7 63.8004C62.8 63.8004 62.9 63.8004 63 63.8004C63.2 63.8004 63.3 63.8004 63.4 63.7004C63.6 63.5004 63.7 63.3004 63.7 63.0004L67.8 61.4004C68.3 62.4004 68.6 63.5004 68.8 64.7004C69.1 66.6004 69 68.6004 68.3 69.5004C68 70.0004 67.5 70.2004 67 70.1004L66.4 69.9004ZM61.7 74.8004L61.8 74.4004C61.9 74.0004 62 73.7004 62.1 73.3004L65.8 73.9004C69.5 74.4004 71.3 75.3004 72.5 76.6004L73.1 77.5004C73.1 77.5004 73.1 77.6004 73.2 77.6004C73.4 77.9004 73.5 78.3004 73.7 78.7004C74.2 80.0004 74.6 81.5004 75.2 83.5004C75.7 85.4004 76.4 87.8004 77.3 90.6004C77.4 90.8004 77.6 91.0004 77.9 90.9004L91 88.8004C92.3 91.1004 93.2 95.0004 92.7 97.9004L76 101.2C74.7 101.5 73.3 101.2 72.1 100.6C70.9 99.9004 70 98.8004 69.6 97.5004L65.6 85.3004C65.5 85.0004 65.2 84.9004 65 85.0004C64.7 85.1004 64.6 85.4004 64.7 85.6004L67.2 93.1004H60.8C59.5 87.0004 59.9 80.7004 61.7 74.8004ZM93.3 89.1004C93.4 89.1004 93.5 89.1004 93.5 89.0004C95.2 88.5004 96.7 87.6004 98.1 86.5004C99.2 85.6004 99.8 85.2004 100.1 85.0004C99.9 85.4004 99.5 86.2004 98.3 87.8004C98 87.9004 97.6 87.9004 97.3 88.0004C97 88.0004 96.8 88.3004 96.9 88.6004C96.9 88.9004 97.2 89.1004 97.5 89.0004C97.9 89.0004 98.2 88.9004 98.6 88.8004C98.7 88.8004 98.8 88.8004 98.9 88.7004C101.1 88.3004 103.2 87.7004 105.3 86.8004C105.5 86.7004 105.7 86.7004 105.8 86.6004C105.7 86.7004 105.5 86.9004 105.2 87.1004C103.9 88.0004 102.5 88.7004 101 89.3004C100.7 89.4004 100.6 89.7004 100.7 90.0004C100.8 90.2004 101 90.3004 101.2 90.3004C101.3 90.3004 101.3 90.3004 101.4 90.3004C101.8 90.1004 102.2 89.9004 102.6 89.8004C104.1 89.5004 105.6 89.1004 107.1 88.6004C107.3 88.5004 107.5 88.5004 107.6 88.5004C107.5 88.6004 107.3 88.8004 107 89.0004C105.2 90.0004 103.3 90.8004 101.4 91.5004C101.1 91.6004 101 91.9004 101.1 92.1004C101.2 92.3004 101.4 92.4004 101.6 92.4004C101.7 92.4004 101.7 92.4004 101.8 92.4004C102.5 92.2004 103.1 91.9004 103.7 91.6004C103.7 91.6004 103.7 91.6004 103.8 91.6004C104.9 91.5004 106 91.3004 107.1 91.0004C107.3 90.9004 107.5 90.9004 107.6 90.9004C107.5 91.0004 107.3 91.2004 106.9 91.4004C105.2 92.0004 103.5 92.6004 101.8 92.9004C101.5 93.0004 101.4 93.2004 101.4 93.5004C101.4 93.7004 101.7 93.9004 101.9 93.9004H102C102.5 93.8004 103 93.7004 103.5 93.6004C104.2 93.6004 105 93.6004 105.8 93.5004C105.9 93.5004 105.9 93.5004 106 93.5004C105.9 93.6004 105.7 93.6004 105.5 93.7004C104.1 94.2004 102.7 94.6004 101.3 95.0004L100.7 95.2004C98.6 95.8004 95.9 96.3004 94.2 96.6004C94.3 94.2004 93.7 91.5004 92.8 89.4004C92.7 89.3004 93 89.2004 93.3 89.1004ZM92.8 88.2004C92.5 88.3004 92.2 88.3004 91.9 88.4004C91.8 88.3004 91.7 88.1004 91.7 88.0004C91.6 87.8004 91.4 87.7004 91.2 87.8004L78.2 90.1004C77.4 87.5004 76.8 85.3004 76.3 83.5004C76.1 82.7004 75.9 81.9004 75.7 81.3004L79.3 86.7004C79.4 86.8004 79.5 86.9004 79.7 86.9004H79.8L92.9 84.6004V88.2004H92.8ZM85.9 84.6004L79.9 85.6004L74.6 77.9004H85.9V84.6004ZM180.6 131.9H173.1L134.4 112.7H147.5L180.6 129.1V131.9ZM180.6 128L149.8 112.7H165.8L180.6 120.1V128ZM133.2 111.7V105.4H161.9V111.7H133.2ZM132.2 112.7L170.9 131.9H154.9L116.1 112.7H132.2ZM139.6 131.9L100.9 112.7H114L152.8 131.9H139.6ZM125.2 111.7H93.8V105.4H125.2V111.7ZM98.6 112.7L137.3 131.9H121.3L82.5 112.7H98.6ZM85.9 111.7H81.2L77.8 105.4H85.9V111.7ZM80.3 112.7L119.1 131.9H106L67.2 112.7H80.3ZM121.2 132.9H166.3C165.1 134.7 163.5 136.2 161.6 137.3C159.4 138.5 157 139.2 154.5 139.2H88.2L89 134.3C89.1 133.8 89.1 133.4 89.2 133H121.2V132.9ZM80 157.6C80.7 157.6 81.5 157.6 82.3 157.5L81.5 162.7C78.6 163.5 75.6 163.5 72.7 162.7L73.7 156.4C75.6 157.2 77.7 157.6 80 157.6ZM180.6 119L168 112.8H180.6V119ZM165.9 111.7H162.7V104.9C162.7 104.6 162.5 104.4 162.2 104.4H132.5C132.2 104.4 132 104.6 132 104.9V111.7H126.1V104.9C126.1 104.6 125.9 104.4 125.6 104.4H93.3C93 104.4 92.8 104.6 92.8 104.9V111.7H86.9V104.9C86.9 104.6 86.7 104.4 86.4 104.4H77.2L76 102.2H76.1L93.1 98.8004C93.3 98.8004 93.4 98.6004 93.5 98.4004C93.5 98.4004 93.5 98.4004 93.5 98.3004H125.6C125.7 98.3004 125.8 98.3004 125.8 98.2004C125.8 98.2004 125.8 98.2004 125.9 98.2004L126 98.1004V77.2004C126 77.2004 126 77.1004 125.9 77.1004C125.9 77.1004 125.9 77.1004 125.8 77.0004H125.6C125.6 77.0004 125.6 77.0004 125.5 77.0004H93.3C93.3 77.0004 93.3 77.0004 93.2 77.0004H93C93 77.0004 93 77.0004 92.9 77.0004C92.9 77.0004 92.8 77.0004 92.8 77.1004V83.3004L86.9 84.3004V77.3004C86.9 77.0004 86.7 76.8004 86.4 76.8004H73.9C72.5 74.5004 70.5 73.5004 66.3 72.9004C66.2 72.5004 66.2 72.1004 66.3 71.7004L66.5 70.9004L66.9 71.0004C67.5 71.1004 68 71.0004 68.4 70.8004H168.7V111.6H165.9V111.7ZM51.3 61.7004C52 60.0004 53.1 58.4004 54.4 57.1004C55.7 55.8004 57.3 54.7004 59.1 54.0004C60.8 53.3004 62.7 52.9004 64.6 52.9004H154.5C158.3 52.9004 161.9 54.4004 164.6 57.1004C167.3 59.8004 168.8 63.4004 168.8 67.2004V69.9004H69.5C70.2 68.7004 70.3 66.8004 70.1 64.9004C70.5 64.7004 70.8 64.4004 71.1 64.0004C71.4 63.5004 71.6 63.0004 71.6 62.4004C71.6 61.8004 71.4 61.3004 71.1 60.8004C71 60.6004 70.8 60.5004 70.7 60.4004L71 60.3004C71.1 60.3004 71.2 60.2004 71.3 60.1004C71.4 60.0004 71.5 59.9004 71.5 59.8004C71.6 59.7004 71.6 59.6004 71.6 59.5004C71.6 59.4004 71.6 59.3004 71.5 59.1004C71.5 59.0004 71.4 58.9004 71.3 58.8004C71.2 58.7004 71.1 58.6004 71 58.6004C70.9 58.5004 70.8 58.5004 70.7 58.5004C70.6 58.5004 70.5 58.5004 70.3 58.6004C70.2 58.6004 69.3 59.0004 68.8 59.2004C68.5 58.7004 68.2 58.2004 67.7 57.8004C67.3 57.5004 66.9 57.2004 66.4 57.0004C66.5 56.8004 66.5 56.6004 66.4 56.4004C66.4 56.2004 66.2 55.9004 66.1 55.8004C65.9 55.6004 65.7 55.5004 65.5 55.4004C64.4 55.2004 63.2 55.2004 62.1 55.6004C61 56.0004 60 56.6004 59.2 57.5004C59 57.7004 58.9 57.9004 58.9 58.1004C58.9 58.3004 58.9 58.6004 59 58.8004C59.1 59.0004 59.2 59.1004 59.3 59.3004C58.9 60.0004 58.6 60.7004 58.5 61.5004C58.4 62.5004 58.5 63.5004 59 64.4004C59.1 64.6004 59.3 64.7004 59.5 64.7004C59.6 64.7004 59.6 64.7004 59.7 64.7004L60.3 64.5004C60.6 65.4004 61 66.4004 61.4 67.3004C61.7 68.0004 62 68.7004 62.2 69.3004C62.1 69.6004 62.1 69.8004 62 70.0004H50.2V67.3004C50.2 65.3004 50.6 63.5004 51.3 61.7004ZM61.8 70.9004C61.6 71.5004 61.5 72.0004 61.3 72.6004C61.1 73.1004 61 73.6004 60.8 74.1004L60.7 74.5004C60.4 75.3004 60.2 76.1004 60 77.0004H56.6C56.3 77.0004 56.1 77.2004 56.1 77.5004V98.0004C56.1 98.2004 56.2 98.3004 56.3 98.4004C55.1 100.6 53.9 103.4 53.5 106.4C53.3 108.2 52.9 110.1 52.5 111.9H50.1V70.9004H61.8ZM64.9 112.7L103.7 131.9H87.7L49 112.7H64.9ZM46.7 112.7L85.4 131.9H72.3L38.3 115.1V112.7H46.7ZM23.9 118.6C25.7 114.3 27.1 112.4 29.1 111.1L33.3 113.4C31.3 115.4 29.9 118.1 28.9 121.3L23.9 118.6ZM38.3 132.9H43.5L47.8 135.3C49.3 136.1 51 136.6 52.7 136.6C53.3 136.6 53.9 136.5 54.5 136.4C57.3 138.8 60.8 140.1 64.5 140.1H73L71.4 154.8C71.4 155 71.5 155.2 71.6 155.3C72 155.5 72.3 155.7 72.7 155.9L71.6 163C70.9 164.9 70.5 166.9 70.4 168.9C70.4 169.2 70.4 169.4 70.5 169.6C70.5 169.7 70.6 169.8 70.7 169.9H38.3V132.9Z"
        fill="currentColor"
      />
      <path
        d="M27.3 90.5004H31.1V94.3004C31.1 94.6004 31.3 94.8004 31.6 94.8004C31.9 94.8004 32.1 94.6004 32.1 94.3004V90.5004H35.9C36.2 90.5004 36.4 90.3004 36.4 90.0004C36.4 89.7004 36.2 89.5004 35.9 89.5004H32.1V85.7004C32.1 85.4004 31.9 85.2004 31.6 85.2004C31.3 85.2004 31.1 85.4004 31.1 85.7004V89.5004H27.3C27 89.5004 26.8 89.7004 26.8 90.0004C26.8 90.3004 27 90.5004 27.3 90.5004Z"
        fill="currentColor"
      />
      <path
        d="M183.3 74.5004C183.5 74.8004 183.9 75.1004 184.2 75.3004C184.6 75.5004 185 75.6004 185.4 75.7004C185.5 75.7004 185.6 75.7004 185.7 75.7004C186 75.7004 186.4 75.6004 186.7 75.5004C187.1 75.4004 187.5 75.1004 187.8 74.8004C188.1 74.5004 188.4 74.1004 188.5 73.7004C188.7 73.3004 188.7 72.8004 188.7 72.4004C188.7 72.0004 188.6 71.6004 188.4 71.3004C188 70.6004 187.4 70.1004 186.6 69.8004C186.2 69.7004 185.8 69.6004 185.4 69.7004C185 69.7004 184.6 69.9004 184.2 70.1004C183.8 70.3004 183.5 70.6004 183.3 70.9004C183.1 71.2004 182.9 71.6004 182.8 72.0004C182.7 72.4004 182.7 72.8004 182.8 73.2004C182.9 73.8004 183.1 74.1004 183.3 74.5004ZM183.8 72.3004C183.9 72.0004 184 71.8004 184.1 71.5004C184.3 71.3004 184.5 71.1004 184.7 70.9004C184.9 70.8004 185.2 70.7004 185.5 70.6004C185.6 70.6004 185.7 70.6004 185.7 70.6004C185.9 70.6004 186.1 70.6004 186.3 70.7004C186.8 70.9004 187.2 71.2004 187.5 71.7004C187.6 71.9004 187.7 72.2004 187.7 72.4004C187.7 72.7004 187.7 73.0004 187.6 73.3004C187.5 73.6004 187.3 73.8004 187.1 74.0004C186.9 74.2004 186.6 74.4004 186.4 74.5004C186.1 74.6004 185.8 74.6004 185.5 74.6004C185.2 74.6004 185 74.5004 184.7 74.3004C184.5 74.2004 184.3 74.0004 184.1 73.7004C183.9 73.5004 183.8 73.2004 183.8 72.9004C183.7 72.9004 183.7 72.6004 183.8 72.3004Z"
        fill="currentColor"
      />
      <path
        d="M123.1 34.7004H126.2L124.4 38.7004C124.3 39.0004 124.4 39.2004 124.7 39.4004C124.8 39.4004 124.8 39.4004 124.9 39.4004C125.1 39.4004 125.3 39.3004 125.4 39.1004L127.5 34.4004C127.6 34.2004 127.6 34.1004 127.5 33.9004C127.4 33.8004 127.3 33.7004 127.1 33.7004H124L125.8 29.7004C125.9 29.4004 125.8 29.2004 125.5 29.0004C125.2 28.9004 125 29.0004 124.8 29.3004L122.7 34.0004C122.6 34.2004 122.6 34.3004 122.7 34.5004C122.8 34.6004 122.9 34.7004 123.1 34.7004Z"
        fill="currentColor"
      />
    </svg>
  </SvgIcon>
)

export default PageUnderConstructionImage
