import { FC } from 'react'

import { SvgIcon, SvgIconProps } from '@mui/material'

const OverworkedEmployee: FC<SvgIconProps> = ({ sx, ...props }) => (
  <SvgIcon sx={{ fontSize: 200, color: 'primary.dark', ...sx }} {...props}>
    <svg
      width="200"
      height="200"
      viewBox="0 0 200 200"
      fill="none"
      xmlns="http://www.w3.org/2000/svg"
    >
      <path
        d="M134.4 28.3996C134.3 28.3996 134.3 28.2996 134.2 28.2996C134.1 28.2996 134.1 28.2996 134 28.2996L131.4 29.2996V25.3996C131.4 25.2996 131.4 25.1996 131.3 25.0996C131.2 24.9996 131.1 24.9996 131 24.9996C130.9 24.9996 130.8 24.9996 130.7 25.0996C130.6 25.1996 130.6 25.2996 130.6 25.3996V29.7996C130.6 29.8996 130.6 29.8996 130.6 29.9996C130.6 30.0996 130.7 30.0996 130.7 30.0996C130.8 30.0996 130.8 30.1996 130.9 30.1996C131 30.1996 131 30.1996 131.1 30.1996L133.7 29.1996V33.1996C133.7 33.2996 133.7 33.3996 133.8 33.4996C133.9 33.5996 134 33.5996 134.1 33.5996C134.2 33.5996 134.3 33.5996 134.4 33.4996C134.5 33.3996 134.5 33.2996 134.5 33.1996V28.6996C134.5 28.5996 134.5 28.5996 134.5 28.4996C134.5 28.4996 134.5 28.3996 134.4 28.3996Z"
        fill="currentColor"
      />
      <path
        d="M167.6 123.2C166.4 122.5 165 122.1 163.6 122.1C162.3 122.2 161 122.6 159.9 123.3C158.8 124 157.9 125 157.4 126.2C156.8 127.4 156.6 128.7 156.7 130C156.8 131.3 157.3 132.5 158.1 133.6C158.7 134.5 159.5 135.2 160.5 135.7C161.4 136.2 162.5 136.5 163.5 136.6C163.6 136.6 163.8 136.6 163.9 136.6C164.8 136.6 165.8 136.4 166.6 136.1C167.6 135.7 168.5 135.1 169.2 134.3C170.2 133.2 170.8 131.9 171 130.5C171.2 129.1 171 127.7 170.4 126.4C169.7 125 168.8 123.9 167.6 123.2ZM169.9 130.3C169.7 131.5 169.2 132.6 168.3 133.5C167.7 134.2 166.9 134.7 166.1 135C165.3 135.3 164.3 135.5 163.4 135.4C162.5 135.3 161.6 135.1 160.8 134.7C160 134.3 159.3 133.6 158.8 132.9C158.1 132 157.7 130.9 157.6 129.8C157.5 128.7 157.7 127.6 158.2 126.5C158.7 125.4 159.4 124.6 160.4 124C161.4 123.4 162.4 123 163.6 123C163.7 123 163.8 123 163.9 123C165 123 166.2 123.3 167.1 123.9C168.2 124.5 169 125.5 169.5 126.6C169.9 127.8 170.1 129.1 169.9 130.3Z"
        fill="currentColor"
      />
      <path
        d="M167.6 127L164 128.7L162.3 125C162.2 124.7 161.9 124.6 161.6 124.8C161.3 124.9 161.2 125.2 161.4 125.5L163.3 129.6C163.4 129.8 163.6 129.9 163.8 129.9C163.9 129.9 163.9 129.9 164 129.9L168.1 128C168.4 127.9 168.5 127.6 168.3 127.3C168.2 127 167.9 126.9 167.6 127Z"
        fill="currentColor"
      />
      <path
        d="M192.7 96.1996C187.1 90.4996 176.1 83.3996 176 83.2996C175.8 83.1996 175.6 83.1996 175.5 83.2996C174.6 83.7996 173.8 84.4996 173 85.1996C171.5 84.3996 170.1 83.3996 170.1 82.9996C170 81.6996 170.6 79.8996 171.1 78.3996C171.7 76.3996 172 75.4996 171.5 74.9996C171.4 74.8996 171.1 74.6996 170.6 74.8996C169.8 75.1996 169.1 75.9996 168.6 76.6996C168.6 75.6996 168.6 74.5996 168.4 73.5996C168.3 72.0996 168.2 70.6996 167.9 69.1996C167.4 67.0996 167 66.4996 166.4 66.5996C166.2 66.5996 166 66.8996 165.8 67.1996C165.5 66.0996 165.1 65.1996 164.5 65.1996C164 65.1996 163.6 65.4996 163.4 67.6996C162 64.7996 159.5 61.6996 155.7 58.3996C155.6 58.2996 155.4 58.1996 155.2 58.2996C155 58.3996 154.9 58.4996 154.9 58.6996C154.5 60.3996 154.1 62.0996 153.7 63.7996H153.6C152.8 63.7996 152.1 64.9996 151.5 67.4996C151.5 67.5996 151.5 67.5996 151.5 67.6996C151.4 67.2996 151.2 67.0996 150.9 66.9996C150.3 66.8996 149.8 67.3996 148.8 70.1996C148.6 70.6996 148.4 71.2996 148.2 71.7996L148.1 71.6996C148.1 71.6996 148 71.6996 148 71.5996C147.9 71.5996 147.9 71.5996 147.8 71.5996C145.3 63.5996 147.1 58.3996 151.6 51.2996C152.3 50.0996 153.2 48.8996 154.1 47.6996C156.4 44.4996 158.8 41.0996 159.7 37.3996C161.2 31.3996 158 24.8996 152.5 22.8996C149.5 21.7996 145.7 22.3996 142.4 24.2996L142.3 24.1996C142 23.5996 141.5 23.1996 141 22.9996C140.4 22.7996 139.8 22.7996 139.2 23.0996L138 23.6996L136.4 20.3996C135.6 18.5996 134.1 17.2996 132.3 16.6996C130.5 15.9996 128.5 16.0996 126.7 16.9996L121.2 19.5996L110 24.7996L98.9001 30.0996L93.7001 32.5996C92.8001 32.9996 92.1001 33.5996 91.4001 34.2996C90.8001 34.9996 90.3001 35.7996 89.9001 36.6996C89.6001 37.5996 89.4001 38.5996 89.5001 39.4996C89.5001 40.4996 89.8001 41.3996 90.2001 42.2996L95.6001 53.4996C96.0001 54.3996 96.6001 55.0996 97.3001 55.7996C98.0001 56.3996 98.8001 56.8996 99.7001 57.2996C100.5 57.5996 101.3 57.6996 102.1 57.6996C102.2 57.6996 102.3 57.6996 102.5 57.6996C103.5 57.6996 104.4 57.3996 105.3 56.9996L110.5 54.4996L132.7 43.8996L138.2 41.2996C139.1 40.8996 139.8 40.2996 140.5 39.5996C141.1 38.8996 141.6 38.0996 142 37.1996C142.3 36.2996 142.5 35.2996 142.4 34.3996C142.4 33.3996 142.1 32.4996 141.7 31.5996L140.7 29.3996L141.9 28.7996C142.5 28.4996 142.9 27.9996 143.1 27.4996C143.3 26.8996 143.3 26.2996 143 25.6996L142.8 25.1996C145.8 23.3996 149.4 22.8996 152.1 23.8996C157.5 25.7996 159.8 32.2996 158.6 37.1996C157.7 40.7996 155.4 43.9996 153.2 47.1996C152.3 48.4996 151.5 49.5996 150.7 50.7996C146.2 57.8996 144.3 63.2996 146.6 71.3996C142.2 70.2996 137.9 69.0996 133.6 67.5996C130.5 66.4996 126 66.8996 123.5 69.5996C122.6 70.5996 121.8 71.9996 121.7 74.1996C115.5 70.1996 108.4 67.5996 101 66.8996C93.5001 66.0996 85.8001 67.1996 78.7001 69.8996L64.8001 55.5996C64.6001 55.3996 64.4001 55.3996 64.2001 55.4996C61.8001 56.6996 59.5001 58.1996 57.5001 59.7996L53.6001 55.3996C52.8001 53.3996 52.5001 51.4996 52.1001 49.5996C51.9001 48.3996 51.6001 47.1996 51.3001 45.9996C50.5001 43.1996 49.4001 40.4996 48.0001 37.9996C47.3001 36.7996 46.8001 36.3996 46.2001 36.3996C44.7001 36.5996 44.1001 39.8996 43.2001 45.8996C42.7001 48.8996 42.3001 51.8996 41.6001 54.0996C41.0001 56.0996 40.6001 58.0996 40.5001 60.1996V60.2996C40.8001 61.4996 41.3001 62.6996 42.0001 63.6996C42.9001 65.1996 44.1001 66.4996 45.4001 67.6996L48.6001 71.0996L60.0001 83.3996C59.0001 84.5996 58.0001 85.8996 57.1001 87.2996L46.6001 84.7996C46.4001 84.7996 46.2001 84.7996 46.1001 84.9996C44.8001 87.0996 43.7001 89.0996 42.9001 91.1996L38.0001 89.7996C36.3001 88.4996 34.9001 87.0996 33.6001 85.6996C32.8001 84.7996 32.0001 83.9996 31.1001 83.0996C29.0001 81.0996 26.6001 79.3996 24.0001 78.0996C22.8001 77.4996 22.1001 77.3996 21.7001 77.6996C20.5001 78.6996 21.8001 81.8996 24.2001 87.3996C25.4001 90.0996 26.6001 92.8996 27.2001 95.0996C27.7001 97.0996 28.5001 98.9996 29.5001 100.8C29.5001 100.8 29.5001 100.9 29.6001 100.9C30.5001 101.8 31.5001 102.5 32.7001 103H32.8001C34.4001 103.8 36.0001 104.2 37.7001 104.5L41.6001 105.6L49.5001 107.7C49.2001 109.7 49.1001 111.7 49.1001 113.7C49.1001 121.1 50.9001 128.5 54.2001 135L44.2001 133C44.0001 133 43.8001 133.1 43.7001 133.3C43.6001 133.5 43.6001 133.7 43.8001 133.9L62.1001 150.2C62.2001 150.3 62.2001 150.3 62.3001 150.3L68.1001 151.4C74.3001 156 81.7001 159.1 89.4001 160.2C91.7001 160.5 94.0001 160.7 96.2001 160.7C101.7 160.7 107.2 159.7 112.3 157.9C119.7 155.2 126.4 150.7 131.6 144.7C136.8 138.8 140.4 131.7 142.2 124.1C148.5 120.6 155.3 115.7 160.9 109L161 108.9C162.3 107.4 163.5 105.7 164.6 104C166.3 104.8 168 105.6 169.7 106.5C173.5 108.4 177.2 110.2 180.2 111C186.6 112.6 191.9 111 194.3 106.7C196 103.3 195.4 98.8996 192.7 96.1996ZM121.6 47.9996L110.8 25.3996L121 20.5996V20.6996L131.7 43.1996L121.6 47.9996ZM110 25.8996L120.8 48.4996L110.6 53.2996L99.8001 30.7996L110 25.8996ZM104.9 55.9996C104.2 56.3996 103.4 56.5996 102.5 56.5996C101.7 56.5996 100.9 56.4996 100.1 56.1996C99.3001 55.9996 98.6001 55.5996 98.0001 54.9996C97.4001 54.3996 96.9001 53.7996 96.5001 52.9996L91.1001 41.7996C90.7001 41.0996 90.5001 40.2996 90.5001 39.3996C90.5001 38.5996 90.6001 37.7996 90.9001 36.9996C91.2001 36.1996 91.6001 35.4996 92.2001 34.8996C92.8001 34.2996 93.4001 33.7996 94.2001 33.3996L98.9001 31.0996L109.6 53.6996L104.9 55.9996ZM141.3 34.3996C141.3 35.1996 141.2 35.9996 140.9 36.7996C140.6 37.5996 140.2 38.2996 139.6 38.8996C139 39.4996 138.4 39.9996 137.6 40.3996L132.5 42.7996L121.8 20.1996L126.9 17.7996C128.4 17.0996 130.1 16.9996 131.7 17.5996C133.3 18.1996 134.5 19.2996 135.3 20.7996L137 24.3996V24.4996L139.3 29.3996L140.5 31.9996C141.1 32.6996 141.3 33.4996 141.3 34.3996ZM142 27.0996C141.9 27.3996 141.6 27.6996 141.3 27.8996L140.1 28.4996L138.2 24.4996L139.4 23.8996C139.7 23.6996 140.1 23.6996 140.4 23.8996C140.7 23.9996 141 24.2996 141.2 24.5996L142 25.9996C142.1 26.3996 142.2 26.7996 142 27.0996ZM164.6 66.4996C164.9 67.1996 165.3 68.5996 165.5 70.7996C165.6 71.5996 165.7 72.2996 165.7 72.9996C165.8 74.0996 165.9 75.0996 166 75.8996C166 76.1996 166.2 76.3996 166.5 76.3996C166.8 76.3996 167 76.1996 167 75.8996C167 75.0996 166.9 74.0996 166.7 72.9996C166.6 72.4996 166.6 71.8996 166.5 71.2996C166.4 70.3996 166.5 69.1996 166.6 68.3996C166.7 68.6996 166.8 69.0996 166.9 69.5996C167.1 70.9996 167.3 72.3996 167.4 73.7996C167.7 76.0996 167.6 78.4996 167.3 80.7996C167.3 81.0996 167.4 81.2996 167.7 81.3996H167.8C168 81.3996 168.3 81.1996 168.3 80.9996C168.4 80.3996 168.5 79.7996 168.5 79.0996C168.8 78.3996 169.7 76.5996 170.7 75.9996C170.6 76.4996 170.3 77.4996 170.1 78.1996C169.6 79.7996 169 81.6996 169.1 83.1996C169.2 84.1996 171 85.3996 172.2 86.0996C170.3 88.0996 168.7 90.5996 167.5 93.3996L167.2 93.1996C161.8 89.0996 160.2 87.8996 160.4 83.8996V83.1996C160.5 81.3996 160.7 77.7996 160.6 75.0996C160.5 73.8996 160.6 73.1996 160.6 72.7996C160.7 72.9996 160.9 73.3996 161.1 73.9996C161.2 74.1996 161.5 75.2996 161.7 75.5996C161.7 75.6996 161.7 75.7996 161.7 75.9996C161.7 76.6996 161.8 77.2996 161.8 77.7996C161.8 78.0996 162 78.2996 162.3 78.2996C162.6 78.2996 162.8 77.9996 162.8 77.7996C162.7 77.1996 162.7 76.5996 162.7 75.9996C162.7 75.8996 162.7 75.7996 162.7 75.6996C162.6 74.4996 162.5 73.2996 162.3 71.6996C162.1 69.9996 162.2 69.0996 162.3 68.7996C162.5 69.0996 162.9 69.7996 163.3 71.2996C163.5 71.8996 164 74.6996 164.2 76.7996C164.2 77.0996 164.5 77.2996 164.8 77.1996C165.1 77.1996 165.3 76.8996 165.2 76.5996C165 74.5996 164.5 72.0996 164.3 71.1996C164.3 68.2996 164.4 67.0996 164.6 66.4996ZM119.5 98.6996C118.4 96.0996 116.4 91.5996 114 88.6996C122.4 92.5996 129.7 93.7996 135.5 93.7996C135.9 93.7996 136.2 93.7996 136.5 93.7996C142.8 93.5996 147.4 91.9996 149.9 90.8996C150.6 90.5996 151.3 90.1996 152 89.7996C152.8 90.4996 153.6 90.9996 154.8 90.9996C155 90.9996 155.2 90.9996 155.4 90.9996C143.2 99.8996 127.9 99.6996 119.5 98.6996ZM157.5 89.1996C154.9 90.2996 153.8 89.8996 152.9 89.1996C154.9 87.8996 156.3 86.3996 156.6 85.0996C156.7 84.8996 156.8 84.6996 156.8 84.4996C157.3 84.2996 158.4 83.6996 159.4 82.9996V83.5996C159.3 84.9996 159.5 86.0996 159.9 87.0996C159.1 87.7996 158.3 88.4996 157.5 89.1996ZM153.1 72.9996C155.3 72.4996 157.5 72.1996 159.7 72.1996C159.6 72.7996 159.6 73.5996 159.6 74.8996C159.7 76.8996 159.6 79.4996 159.5 81.2996C156.8 82.2996 155.1 82.4996 154.2 81.6996C152.9 80.7996 152.5 77.9996 153.1 72.9996ZM153.9 82.7996C154.4 83.0996 155.1 83.2996 155.8 83.2996C155.9 83.2996 155.9 83.2996 156 83.2996C156 83.5996 156 84.6996 155.3 85.1996C154.8 85.4996 153.8 85.6996 151.8 84.8996C152.2 84.6996 152.6 84.3996 153 84.0996C153.3 83.5996 153.6 83.1996 153.9 82.7996ZM152.4 67.7996C152.8 66.3996 153.1 65.5996 153.4 65.1996C152.9 67.5996 152.5 70.0996 152.1 72.4996C152.1 72.5996 152.1 72.6996 152.1 72.7996C151.7 72.7996 151.4 72.8996 151 72.9996C151.1 72.5996 151.2 72.1996 151.3 71.6996C151.3 71.5996 151.4 71.5996 151.4 71.4996V71.3996C151.5 70.8996 151.6 70.4996 151.8 69.8996C152 69.2996 152.2 68.5996 152.4 67.7996ZM150.6 68.4996C150.6 68.7996 150.6 69.1996 150.6 69.6996C150.6 69.7996 150.6 70.1996 150.6 70.6996C150.6 70.9996 150.6 71.1996 150.6 71.3996C150.4 72.1996 150.2 72.8996 150 73.5996C149.8 73.6996 149.6 73.7996 149.4 73.9996C149.2 74.1996 149.1 74.4996 149.3 74.6996C149.4 74.7996 149.6 74.8996 149.7 74.8996C149.8 74.8996 149.9 74.8996 150 74.7996C150.7 74.3996 151.4 74.0996 152.2 73.9996C151.8 78.2996 152.1 80.8996 153.3 82.2996C153 82.6996 152.7 83.0996 152.4 83.3996C150.8 85.1996 146.3 84.8996 141.8 82.4996C141.9 81.3996 142.2 80.2996 142.6 78.9996C143.3 76.9996 144.2 75.2996 145.2 74.0996C145.6 74.2996 146.4 74.4996 147.1 74.5996C146.6 75.7996 146 76.9996 145.4 78.1996C145.3 78.3996 145.4 78.6996 145.6 78.8996C145.7 78.8996 145.7 78.9996 145.8 78.9996C146 78.9996 146.2 78.8996 146.2 78.6996C147.1 76.7996 148 74.8996 148.8 72.9996C149.1 72.1996 149.4 71.4996 149.7 70.6996C150.1 69.4996 150.4 68.7996 150.6 68.4996ZM124.2 70.2996C126.4 67.8996 130.5 67.5996 133.2 68.5996C137.3 69.9996 141.4 71.1996 145.6 72.2996C145.3 72.4996 144.9 72.7996 144.6 73.1996L144.5 73.2996C143.3 74.5996 142.2 76.4996 141.5 78.6996C141 80.0996 140.7 81.4996 140.6 82.6996C140.5 83.9996 140.5 85.1996 140.8 86.0996L129.3 80.2996C129.1 80.1996 128.8 80.2996 128.6 80.4996C128.5 80.6996 128.6 80.9996 128.8 81.1996L141.9 87.7996C142 87.8996 142.1 87.8996 142.2 87.8996H142.3C142.3 87.8996 142.3 87.8996 142.4 87.8996C142.6 87.9996 142.8 87.9996 143 87.9996C144.1 87.9996 145.5 86.9996 146.7 85.1996C147.4 85.2996 148.2 85.3996 148.8 85.3996C149.4 85.3996 150 85.2996 150.5 85.1996C152 85.9996 153.3 86.2996 154.3 86.2996C154.5 86.2996 154.6 86.2996 154.8 86.2996C153.8 87.3996 152.1 88.6996 149.6 89.8996C147.2 90.9996 142.9 92.4996 136.8 92.6996C132 89.7996 125.9 84.0996 123.8 79.0996C122.1 75.3996 122.3 72.2996 124.2 70.2996ZM100.8 67.7996C108.2 68.5996 115.4 71.1996 121.6 75.2996C121.7 76.4996 122.1 77.8996 122.7 79.4996C124.7 84.2996 130 89.4996 134.8 92.6996C128.6 92.5996 120.7 90.9996 111.5 86.3996C110.5 85.7996 109.5 85.4996 108.5 85.6996C106 86.3996 104.6 90.4996 104.8 96.9996L79.4001 70.6996C86.2001 68.0996 93.6001 67.0996 100.8 67.7996ZM64.4001 56.5996L105.2 98.7996C105.2 98.7996 105.2 98.7996 105.3 98.8996L114.1 108C114.3 108.2 114.6 108.2 114.8 108C115 107.8 115 107.5 114.8 107.3L108.3 100.6L116.1 102.5C118 108 120.2 117.8 121.4 124.6C118.3 125.1 115.1 124.8 112.2 123.7C108.2 122.3 104.7 119.9 101.9 116.7L54.6001 63.9996C55.6001 62.8996 56.7001 61.8996 57.8001 60.8996C59.8001 59.1996 62.0001 57.7996 64.4001 56.5996ZM53.6001 63.5996C51.8001 65.5996 50.3001 67.6996 49.0001 69.9996L46.4001 67.2996C48.0001 63.2996 50.3001 59.6996 53.2001 56.4996L56.8001 60.5996C55.6001 61.4996 54.6001 62.4996 53.6001 63.5996ZM42.6001 54.3996C43.3001 52.0996 43.8001 48.9996 44.2001 45.9996C44.7001 42.7996 45.5001 37.4996 46.3001 37.3996C46.3001 37.3996 46.5001 37.4996 47.0001 38.2996C47.0001 38.3996 46.9001 38.4996 46.9001 38.5996C46.8001 38.6996 46.8001 38.7996 46.7001 38.9996C46.6001 39.0996 46.6001 39.2996 46.5001 39.4996C46.5001 39.6996 46.4001 39.7996 46.4001 39.9996C46.4001 40.1996 46.3001 40.2996 46.3001 40.4996C46.2001 40.6996 46.2001 40.8996 46.1001 41.0996C46.1001 41.1996 46.0001 41.3996 46.0001 41.4996C45.9001 41.7996 45.9001 41.9996 45.8001 42.2996V42.3996C45.5001 43.9996 45.2001 45.8996 44.9001 47.7996C44.4001 51.0996 43.8001 54.5996 43.1001 57.0996C42.9001 57.7996 42.7001 58.3996 42.6001 59.0996C42.5001 59.3996 42.5001 59.6996 42.4001 59.8996C42.3001 60.4996 42.2001 61.0996 42.1001 61.6996C42.1001 61.7996 42.1001 61.8996 42.0001 61.9996C41.7001 61.4996 41.5001 60.8996 41.4001 60.2996C41.6001 58.1996 42.0001 56.2996 42.6001 54.3996ZM53.9001 64.6996L101.2 117.2C104.1 120.5 107.8 123 111.9 124.5C114 125.3 116.2 125.7 118.5 125.7C119.6 125.7 120.6 125.6 121.7 125.4C122.2 128.4 122.5 130.7 122.5 131.4C115.2 133.2 108.5 130.7 104.3 128.3C102.1 127 100.1 125.4 98.3001 123.5L93.8001 118.6L49.8001 70.7996C50.9001 68.5996 52.3001 66.5996 53.9001 64.6996ZM42.0001 104.7C41.7001 102.5 41.8001 100.4 42.0001 98.1996L83.5001 108.9L91.9001 118L42.0001 104.7ZM60.7001 84.0996L65.4001 89.1996L58.1001 87.4996C58.9001 86.2996 59.7001 85.1996 60.7001 84.0996ZM46.6001 85.7996L66.6001 90.5996L82.3001 107.6L42.1001 97.1996C42.8001 93.2996 44.2001 89.4996 46.6001 85.7996ZM40.9001 104.4L38.0001 103.6C37.3001 99.3996 37.3001 95.0996 38.0001 90.7996L42.4001 92.0996C41.0001 96.1996 40.5001 100.3 40.9001 104.4ZM30.1001 100.3C29.2001 98.5996 28.4001 96.6996 27.9001 94.7996C27.3001 92.4996 26.0001 89.6996 24.8001 86.8996C23.4001 83.6996 21.4001 78.8996 22.0001 78.3996C22.0001 78.3996 22.2001 78.3996 23.0001 78.6996C23.0001 78.7996 23.0001 78.8996 23.1001 78.9996C23.1001 79.0996 23.1001 79.1996 23.1001 79.2996C23.1001 79.4996 23.2001 79.6996 23.2001 79.8996C23.2001 79.9996 23.3001 80.0996 23.3001 80.1996C23.4001 80.3996 23.4001 80.6996 23.5001 80.8996C23.5001 80.9996 23.6001 81.0996 23.6001 81.2996C23.7001 81.4996 23.8001 81.6996 23.8001 81.9996C23.9001 82.1996 23.9001 82.2996 24.0001 82.4996C24.1001 82.5996 24.1001 82.7996 24.2001 82.9996C24.8001 84.4996 25.5001 86.0996 26.2001 87.7996C27.0001 89.5996 27.7001 91.3996 28.4001 92.9996C28.9001 94.2996 29.3001 95.4996 29.6001 96.5996C29.7001 96.7996 29.7001 96.9996 29.8001 97.1996C29.9001 97.5996 30.1001 98.0996 30.2001 98.4996C30.3001 98.7996 30.4001 99.0996 30.5001 99.3996C30.7001 99.7996 30.8001 100.2 31.0001 100.6C31.1001 100.8 31.2001 101 31.3001 101.3C31.0001 101.1 30.6001 100.7 30.1001 100.3ZM130.7 144.2C125.6 150 119.1 154.4 111.8 157.1C104.6 159.7 96.9001 160.5 89.3001 159.4C82.5001 158.4 75.9001 155.8 70.2001 152L81.5001 154.2C81.6001 154.2 81.7001 154.1 81.8001 154.1L99.9001 142.2C100.1 142.1 100.2 141.9 100.1 141.7C100.1 141.5 99.9001 141.3 99.7001 141.3L78.4001 138.7C78.3001 138.7 78.2001 138.7 78.1001 138.8L70.9001 143.5L63.6001 137C63.5001 136.9 63.5001 136.9 63.4001 136.9L55.1001 135.3C51.6001 128.7 49.7001 121.2 49.7001 113.7C49.7001 111.8 49.8001 109.8 50.1001 107.9L92.9001 119.3L97.3001 124.1C99.1001 126.1 101.2 127.8 103.5 129.1C106.9 131 111.7 133 117.1 133C118.9 133 120.7 132.8 122.6 132.3H122.7C123.4 132.1 124 131.9 124.6 131.7L125.6 131.3C128.8 130.1 134.4 128.1 140.5 124.9C139 132 135.5 138.7 130.7 144.2ZM193.1 106.3C190.9 110.2 186 111.7 180.1 110.2C177.2 109.5 173.6 107.7 169.8 105.8C168 104.9 166.1 104 164.3 103.1C163.3 102.7 162.4 102.3 161.4 101.9C161.3 101.8 161.1 101.9 161 101.9C160.9 101.9 160.8 102.1 160.8 102.3L159.9 108.6C148.7 122.1 132.2 128 125.6 130.4L124.6 130.8C124.2 130.9 123.9 131.1 123.5 131.2C123.5 127 119.9 109.9 117.1 102C117.1 101.9 117.1 101.8 117 101.8C116.7 100.8 116.3 99.9996 116 99.2996C123.5 100.6 143.4 102.6 158.2 90.0996C158.9 89.4996 159.7 88.7996 160.4 88.0996C161.5 89.8996 163.5 91.3996 166.7 93.8996L167.3 94.2996C166.8 95.5996 166.5 96.8996 166.2 98.1996C166.2 98.3996 166.3 98.5996 166.5 98.6996L179.8 105.7C180 105.8 180.3 105.7 180.5 105.5C180.6 105.3 180.5 105 180.3 104.8L167.3 97.9996C168.4 92.1996 171.7 87.0996 175.9 84.3996C177.6 85.4996 187.1 91.8996 192.1 96.9996C194.4 99.2996 194.9 103.2 193.1 106.3Z"
        fill="currentColor"
      />
      <path
        d="M175.4 55.1996C177.8 59.2996 180.8 63.3996 182.2 63.7996C182.3 63.7996 182.4 63.7996 182.5 63.7996C182.7 63.7996 182.8 63.6996 182.9 63.6996C184 62.9996 182.5 59.1996 180.9 56.0996C182.5 56.2996 184 56.3996 185.3 56.3996C186.7 56.3996 187.7 56.2996 188.2 55.8996C188.5 55.6996 188.6 55.4996 188.6 55.2996C188.9 53.3996 181.4 51.6996 178.3 51.0996C175.8 46.8996 172.9 42.8996 171.5 42.4996C171.2 42.3996 171 42.4996 170.8 42.5996C169.7 43.2996 171.2 47.0996 172.8 50.1996C169.4 49.7996 166.5 49.6996 165.6 50.3996C165.3 50.5996 165.2 50.7996 165.2 50.9996C164.7 52.8996 172.2 54.5996 175.4 55.1996ZM175.7 53.7996C175.2 52.9996 174.8 52.1996 174.4 51.4996C175.2 51.5996 176.1 51.7996 176.9 51.8996C177.1 51.8996 177.3 51.9996 177.4 51.9996C177.5 52.1996 177.6 52.2996 177.7 52.4996C178.2 53.2996 178.6 54.0996 179 54.7996C178.2 54.6996 177.4 54.4996 176.5 54.3996C176.3 54.3996 176.1 54.2996 176 54.2996C175.9 54.1996 175.8 53.9996 175.7 53.7996ZM182.2 62.7996C181.4 62.3996 179.2 59.7996 176.6 55.4996C177.6 55.6996 178.6 55.7996 179.6 55.9996C181.4 59.4996 182.3 61.9996 182.2 62.7996ZM180.3 54.9996C179.7 53.7996 179.1 52.7996 178.8 52.2996C183.7 53.3996 186.8 54.5996 187.4 55.1996C186.8 55.4996 184.2 55.5996 180.3 54.9996ZM171.2 43.5996C172 43.9996 174.2 46.5996 176.8 50.8996C175.8 50.6996 174.8 50.5996 173.8 50.3996C172.1 46.8996 171.2 44.3996 171.2 43.5996ZM173.2 51.2996C173.8 52.4996 174.3 53.3996 174.7 53.9996C169.8 52.8996 166.7 51.6996 166.1 51.0996C166.7 50.8996 169.3 50.7996 173.2 51.2996Z"
        fill="currentColor"
      />
      <path
        d="M17.9001 112.8C17.6001 112.8 17.4001 112.9 17.3001 113.2L14.9001 130L5.80008 122.1C5.60008 121.9 5.30008 121.9 5.10008 122.2C4.90008 122.4 4.90008 122.7 5.20008 122.9L15.0001 131.4C15.1001 131.5 15.2001 131.5 15.3001 131.5C15.4001 131.5 15.4001 131.5 15.5001 131.5C15.7001 131.4 15.8001 131.3 15.8001 131.1L18.4001 113.4C18.4001 113.1 18.2001 112.8 17.9001 112.8Z"
        fill="currentColor"
      />
      <path
        d="M67.5001 30.9996C67.7001 31.1996 68.0001 31.3996 68.3001 31.5996C68.6001 31.6996 68.9001 31.7996 69.3001 31.7996H69.4001C69.7001 31.7996 70.0001 31.6996 70.3001 31.5996C70.6001 31.4996 70.9001 31.2996 71.2001 31.0996C71.4001 30.8996 71.6001 30.5996 71.8001 30.2996C71.9001 29.9996 72.0001 29.6996 72.0001 29.2996C72.0001 28.5996 71.8001 27.9996 71.3001 27.4996C70.8001 26.9996 70.2001 26.6996 69.5001 26.6996C68.8001 26.6996 68.2001 26.8996 67.7001 27.3996C67.2001 27.8996 66.9001 28.4996 66.9001 29.1996C66.9001 29.4996 66.9001 29.8996 67.1001 30.1996C67.1001 30.3996 67.3001 30.6996 67.5001 30.9996ZM68.3001 27.9996C68.6001 27.6996 69.0001 27.5996 69.4001 27.5996C69.4001 27.5996 69.4001 27.5996 69.5001 27.5996C69.9001 27.5996 70.3001 27.7996 70.6001 28.0996C70.9001 28.3996 71.0001 28.7996 71.0001 29.1996C71.0001 29.3996 70.9001 29.5996 70.9001 29.7996C70.8001 29.9996 70.7001 30.1996 70.5001 30.2996C70.3001 30.3996 70.2001 30.5996 70.0001 30.5996C69.8001 30.5996 69.6001 30.6996 69.4001 30.6996C69.2001 30.6996 69.0001 30.5996 68.8001 30.5996C68.6001 30.4996 68.4001 30.3996 68.3001 30.1996C68.2001 29.9996 68.0001 29.8996 68.0001 29.6996C67.9001 29.4996 67.9001 29.2996 67.9001 29.0996C67.8001 28.6996 68.0001 28.2996 68.3001 27.9996Z"
        fill="currentColor"
      />
      <path
        d="M114.3 174.6L110.3 178.3L106.6 174.3C106.4 174.1 106.1 174.1 105.9 174.3C105.7 174.5 105.7 174.8 105.9 175L109.6 179L105.6 182.7C105.4 182.9 105.4 183.2 105.6 183.4C105.7 183.5 105.8 183.6 106 183.6C106.1 183.6 106.2 183.6 106.3 183.5L110.3 179.8L114 183.8C114.1 183.9 114.2 184 114.4 184C114.5 184 114.6 184 114.7 183.9C114.9 183.7 114.9 183.4 114.7 183.2L111 179.2L115 175.5C115.2 175.3 115.2 175 115 174.8C114.8 174.4 114.5 174.4 114.3 174.6Z"
        fill="currentColor"
      />
    </svg>
  </SvgIcon>
)

export default OverworkedEmployee
