import { FC } from 'react'

import { SvgIcon, SvgIconProps } from '@mui/material'

const OfficeDeskImage: FC<SvgIconProps> = ({ sx, ...props }) => (
  <SvgIcon sx={{ fontSize: 200, color: 'primary.dark', ...sx }} {...props}>
    <svg
      width="200"
      height="200"
      viewBox="0 0 200 200"
      fill="none"
      xmlns="http://www.w3.org/2000/svg"
    >
      <path
        d="M107.2 84.4998C107.4 84.4998 107.6 84.3998 107.7 84.2998C107.8 84.1998 107.9 83.9998 107.9 83.7998C107.9 83.5998 107.8 83.3998 107.7 83.2998C107.6 83.1998 107.4 83.0998 107.2 83.0998C107 83.0998 106.8 83.1998 106.7 83.2998C106.6 83.3998 106.5 83.5998 106.5 83.7998C106.5 83.9998 106.6 84.1998 106.7 84.2998C106.8 84.3998 107 84.4998 107.2 84.4998Z"
        fill="currentColor"
      />
      <path
        d="M100.6 90.7998C100.8 90.7998 101 90.6998 101.1 90.5998C101.2 90.4998 101.3 90.2998 101.3 90.0998C101.3 89.8998 101.2 89.6998 101.1 89.5998C101 89.4998 100.8 89.3998 100.6 89.3998C100.4 89.3998 100.2 89.4998 100.1 89.5998C100 89.6998 99.9 89.8998 99.9 90.0998C99.9 90.2998 100 90.4998 100.1 90.5998C100.2 90.6998 100.4 90.7998 100.6 90.7998Z"
        fill="currentColor"
      />
      <path
        d="M105.7 97.8998C105.9 97.8998 106.1 97.7998 106.2 97.6998C106.3 97.5998 106.4 97.3998 106.4 97.1998C106.4 96.9998 106.3 96.7998 106.2 96.6998C106.1 96.5998 105.9 96.4998 105.7 96.4998C105.5 96.4998 105.3 96.5998 105.2 96.6998C105.1 96.7998 105 96.9998 105 97.1998C105 97.3998 105.1 97.5998 105.2 97.6998C105.4 97.8998 105.5 97.8998 105.7 97.8998Z"
        fill="currentColor"
      />
      <path
        d="M58.5 86.8998C59 87.4998 59.7 87.8998 60.5 88.0998C60.8 88.1998 61.2 88.1998 61.5 88.1998C61.9 88.1998 62.4 88.0998 62.8 87.9998C63.6 87.6998 64.2 87.2998 64.7 86.5998C65.2 85.9998 65.5 85.1998 65.5 84.3998C65.5 83.2998 65.1 82.1998 64.4 81.3998C63.6 80.5998 62.6 80.0998 61.4 79.9998C60.6 79.9998 59.8 80.1998 59.2 80.6998C58.6 81.1998 58 81.7998 57.7 82.4998C57.4 83.1998 57.3 83.9998 57.4 84.7998C57.6 85.5998 57.9 86.2998 58.5 86.8998ZM58.6 82.8998C58.8 82.3998 59.2 81.8998 59.7 81.5998C60.2 81.2998 60.8 81.0998 61.4 81.0998C62.3 81.0998 63.1 81.4998 63.6 82.0998C64.2 82.6998 64.5 83.5998 64.5 84.3998C64.4 84.9998 64.2 85.5998 63.9 85.9998C63.5 86.4998 63 86.7998 62.5 86.9998C61.9 87.1998 61.3 87.1998 60.7 87.0998C60.1 86.9998 59.6 86.5998 59.2 86.1998C58.8 85.7998 58.5 85.1998 58.4 84.5998C58.3 84.0998 58.4 83.4998 58.6 82.8998Z"
        fill="currentColor"
      />
      <path
        d="M61.6 79.9998C61.7 79.9998 61.7 79.9998 61.8 79.9998C62.6 79.9998 63.3 79.7998 63.9 79.2998C63.9 79.2998 63.9 79.2998 64 79.2998C64.6 78.6998 65 77.8998 65 77.0998C65 76.9998 65 76.7998 64.9 76.6998C64.8 76.5998 64.7 76.4998 64.5 76.4998C63.7 76.4998 62.9 76.6998 62.1 77.2998C61.5 77.8998 61.1 78.6998 61.1 79.4998C61.1 79.5998 61.1 79.7998 61.2 79.8998C61.3 79.9998 61.5 79.9998 61.6 79.9998ZM62.8 78.0998C63.1 77.8998 63.5 77.6998 63.9 77.5998C63.8 77.9998 63.6 78.2998 63.3 78.4998C63 78.6998 62.6 78.8998 62.3 78.8998C62.4 78.5998 62.6 78.2998 62.8 78.0998Z"
        fill="currentColor"
      />
      <path
        d="M57.4 52.1998H68.7C69 52.1998 69.2 51.9998 69.2 51.6998V40.4998C69.2 40.1998 69 39.9998 68.7 39.9998H65.1L66.6 36.7998C66.7 36.7998 66.7 36.7998 66.8 36.7998C67 36.7998 67.2 36.7998 67.4 36.6998C67.6 36.5998 67.8 36.4998 68 36.2998C68.2 36.0998 68.3 35.9998 68.4 35.6998C68.5 35.4998 68.5 35.2998 68.5 34.9998C68.5 34.4998 68.3 34.0998 68 33.7998C67.7 33.4998 67.2 33.2998 66.8 33.2998C66.3 33.2998 65.9 33.4998 65.6 33.7998C65.3 34.0998 65.1 34.5998 65.1 34.9998C65.1 35.1998 65.1 35.3998 65.2 35.6998C65.3 35.8998 65.4 36.0998 65.6 36.2998L65.7 36.3998L64 39.9998H57.5C57.2 39.9998 57 40.1998 57 40.4998V51.7998C56.9 51.9998 57.1 52.1998 57.4 52.1998ZM57.9 40.9998H63.5L62.6 42.8998C62.5 43.0998 62.6 43.3998 62.8 43.5998C62.9 43.5998 62.9 43.5998 63 43.5998C63.2 43.5998 63.4 43.4998 63.5 43.2998L64.6 40.9998H68.2V51.2998H57.9V40.9998Z"
        fill="currentColor"
      />
      <path
        d="M22 133.4H25.8V137.2C25.8 137.5 26 137.7 26.3 137.7C26.6 137.7 26.8 137.5 26.8 137.2V133.4H30.6C30.9 133.4 31.1 133.2 31.1 132.9C31.1 132.6 30.9 132.4 30.6 132.4H26.8V128.6C26.8 128.3 26.6 128.1 26.3 128.1C26 128.1 25.8 128.3 25.8 128.6V132.4H22C21.7 132.4 21.5 132.6 21.5 132.9C21.5 133.2 21.8 133.4 22 133.4Z"
        fill="currentColor"
      />
      <path
        d="M168.8 125C168.3 124.7 167.7 124.6 167.1 124.7C166.7 124.7 166.2 124.9 165.8 125.1C165.4 125.3 165.1 125.6 164.8 126C164.6 126.4 164.4 126.8 164.3 127.2C164.2 127.6 164.3 128.1 164.4 128.5C164.6 129.1 164.9 129.6 165.4 130C165.9 130.4 166.4 130.6 167 130.7C167.1 130.7 167.2 130.7 167.3 130.7C167.6 130.7 168 130.6 168.3 130.5C168.7 130.4 169.1 130.1 169.4 129.8C169.7 129.5 170 129.1 170.1 128.7C170.3 128.3 170.3 127.8 170.3 127.4C170.3 127 170.2 126.6 170 126.3C169.7 125.8 169.3 125.3 168.8 125ZM169.3 127.5C169.3 127.8 169.3 128.1 169.2 128.4C169.1 128.7 168.9 128.9 168.7 129.1C168.5 129.3 168.2 129.5 168 129.6C167.7 129.7 167.4 129.7 167.1 129.7C166.7 129.7 166.3 129.5 166 129.2C165.7 128.9 165.5 128.6 165.4 128.2C165.3 127.9 165.3 127.6 165.3 127.3C165.3 127 165.5 126.7 165.6 126.5C165.8 126.3 166 126 166.2 125.9C166.5 125.7 166.7 125.7 167 125.6C167.1 125.6 167.1 125.6 167.2 125.6C167.5 125.6 167.8 125.7 168.1 125.8C168.5 126 168.7 126.3 168.9 126.6C169.2 127 169.3 127.2 169.3 127.5Z"
        fill="currentColor"
      />
      <path
        d="M194.5 165.7H164.5L155.4 115.1H175C175.6 115.1 176.1 114.8 176.5 114.4C176.9 114 177.1 113.5 177.1 112.9C177.1 112.3 176.9 111.8 176.5 111.4C176.1 111 175.6 110.8 175.1 110.8H165.5V109.2C165.5 109.1 165.5 109 165.4 108.9C165.4 108.8 165.3 108.7 165.2 108.7C165.1 108.6 164.9 108.5 164.7 108.5H157.7C157.8 108.3 157.9 108 157.9 107.8C157.9 107.6 157.9 107.3 157.8 107.1C157.7 106.9 157.6 106.7 157.4 106.5C157.3 106.4 157.1 106.2 156.9 106.1L168.3 79.5998C168.4 79.5998 168.4 79.5998 168.5 79.5998C168.8 79.4998 169.1 79.3998 169.3 79.1998C169.5 78.9998 169.7 78.6998 169.9 78.4998C170 78.1998 170.1 77.8998 170.1 77.5998C170.1 77.2998 170 76.9998 169.9 76.7998C169.7 76.3998 169.5 76.0998 169.1 75.7998C168.8 75.5998 168.5 75.4998 168.2 75.4998L151.5 56.7998C151.6 56.5998 151.7 56.2998 151.7 56.0998C151.7 55.5998 151.5 55.1998 151.2 54.8998C150.9 54.5998 150.4 54.3998 150 54.3998C149.6 54.3998 149.2 54.5998 148.8 54.7998C148.8 54.7998 148.8 54.8998 148.7 54.8998L146.7 53.5998L149.6 50.5998C150 50.1998 150.2 49.5998 150.2 48.9998C150.2 48.3998 150 47.7998 149.5 47.3998C149.1 46.9998 148.5 46.6998 147.9 46.7998C147.3 46.7998 146.7 46.9998 146.3 47.4998L142.6 51.1998L133.4 53.6998C133.2 53.7998 132.9 53.8998 132.7 54.0998C132.5 54.2998 132.4 54.4998 132.3 54.7998C132.2 54.9998 132.2 55.2998 132.3 55.5998C132.4 55.7998 132.5 56.0998 132.7 56.2998L135.1 58.6998C135 58.8998 134.9 59.0998 134.8 59.3998C134.7 59.7998 134.7 60.1998 134.8 60.5998C134.9 61.0998 135.1 61.4998 135.4 61.8998C135.7 62.2998 136.1 62.4998 136.6 62.6998C136.9 62.7998 137.2 62.8998 137.6 62.8998C137.7 62.8998 137.9 62.8998 138 62.8998C138.3 62.7998 138.6 62.6998 138.9 62.5998L141 64.6998C141.1 64.7998 141.3 64.8998 141.5 64.9998C141.7 65.0998 141.9 65.0998 142.1 65.0998C142.3 65.0998 142.5 65.0998 142.7 64.9998C142.9 64.8998 143 64.7998 143.2 64.6998C143.4 64.4998 143.5 64.2998 143.6 63.9998L146 54.6998L148.1 56.0998C148.1 56.1998 148.1 56.1998 148.1 56.2998C148.1 56.6998 148.2 57.1998 148.4 57.4998C148.7 57.7998 149 58.0998 149.5 58.1998C149.6 58.1998 149.7 58.1998 149.8 58.1998C149.9 58.1998 150.1 58.1998 150.2 58.0998C150.4 58.0998 150.5 57.9998 150.7 57.8998L166.9 76.0998C166.8 76.0998 166.7 76.1998 166.6 76.1998C166.2 76.3998 166 76.7998 165.8 77.1998C165.7 77.4998 165.6 77.7998 165.6 78.0998C165.6 78.3998 165.7 78.6998 165.9 78.9998C166 79.2998 166.3 79.4998 166.5 79.6998C166.7 79.7998 166.9 79.8998 167.1 79.9998L155.8 106C155.6 106 155.4 106.1 155.2 106.2C155 106.3 154.8 106.5 154.7 106.7C154.6 106.9 154.5 107.2 154.5 107.4C154.5 107.7 154.5 107.9 154.6 108.2C154.6 108.2 154.6 108.3 154.7 108.3H147.7C147.5 108.3 147.3 108.4 147.2 108.5C147.1 108.6 147.1 108.6 147 108.7C147 108.8 146.9 108.9 146.9 109V110.6H145.2C145.2 110.5 145.3 110.3 145.3 110.2V108.3C146 108.2 146.6 107.9 147.1 107.4C147.4 107.1 147.6 106.8 147.8 106.4C148 106 148 105.6 148 105.2C148 104.8 147.9 104.4 147.8 104C147.6 103.6 147.4 103.3 147.1 103C146.6 102.5 146 102.2 145.3 102.1V100.2C145.3 99.7998 145.2 99.4998 144.9 99.1998C144.6 98.8998 144.3 98.7998 143.9 98.7998H137C136.6 98.7998 136.3 98.8998 136 99.1998C135.7 99.4998 135.6 99.7998 135.6 100.2V110.3C135.6 110.4 135.6 110.6 135.7 110.7H132.3L134.3 100.9L137.7 84.3998C137.9 83.5998 137.8 82.6998 137.4 81.9998C137 81.2998 136.5 80.5998 135.7 80.2998C135.2 80.0998 134.7 79.8998 134.1 79.8998L110 78.6998C109.8 78.5998 109.7 78.3998 109.6 78.1998C109.5 77.9998 109.4 77.7998 109.4 77.5998C109.3 76.0998 109.8 74.6998 110.8 73.4998C111.8 72.3998 113.1 71.5998 114.7 71.4998C114.9 71.3998 115.2 71.2998 115.4 71.1998C115.7 70.9998 115.9 70.5998 116.1 70.2998C116.2 69.8998 116.2 69.4998 116.1 69.1998C116 68.9998 115.9 68.6998 115.7 68.4998C115.5 68.2998 115.3 68.0998 115.1 67.9998C114.9 67.8998 114.7 67.7998 114.6 67.7998C114.6 67.6998 114.6 67.4998 114.6 67.3998C114.6 66.8998 114.4 66.4998 114.1 66.0998C113.8 65.6998 113.4 65.4998 112.9 65.4998C112.8 65.4998 112.6 65.4998 112.5 65.4998C112.5 65.3998 112.5 65.2998 112.5 65.1998C112.4 64.7998 112.2 64.3998 111.9 64.0998C111.6 63.7998 111.2 63.5998 110.7 63.5998C110.6 63.5998 110.5 63.5998 110.4 63.5998C110.4 63.1998 110.2 62.8998 110 62.5998C109.8 62.2998 109.6 62.0998 109.3 61.9998C109 61.8998 108.7 61.7998 108.4 61.7998C108.1 61.7998 107.8 61.8998 107.5 61.9998C107.2 62.1998 107 62.3998 106.8 62.5998C106.8 62.5998 106.8 62.6998 106.7 62.6998C106.1 64.3998 105.4 65.9998 104.6 67.4998C104.5 67.6998 104.3 67.8998 104 68.3998C103.3 69.6998 101.7 72.8998 102.7 74.5998C103.1 75.1998 103.7 75.5998 104.5 75.6998C104.4 76.5998 104 77.3998 103.4 77.9998C102.7 78.6998 101.9 79.0998 101 79.3998C96.4 80.6998 93.1 87.3998 90.1 93.2998C89 95.3998 88 97.4998 87 98.9998L69.1 101.9L67.1 102.2L66.8 99.4998H79.2C79.3 99.4998 79.3 99.4998 79.4 99.4998H80.4C81.4 99.4998 82.4 99.0998 83.1 98.3998C83.8 97.6998 84.2 96.6998 84.2 95.6998V71.6998C84.2 70.6998 83.8 69.6998 83.1 68.9998C82.4 68.2998 81.4 67.8998 80.4 67.8998H46.5C46 67.8998 45.5 67.9998 45.1 68.1998C44.6 68.3998 44.2 68.6998 43.9 68.9998C43.5 69.3998 43.3 69.7998 43.1 70.1998C42.9 70.6998 42.8 71.1998 42.8 71.5998V95.4998C42.8 96.4998 43.2 97.4998 43.9 98.1998C44.6 98.8998 45.6 99.2998 46.6 99.2998H57.9L57.5 103.3C56.1 102.7 54.6 101.9 53.3 101.1C53.3 101.1 53.3 101.1 53.2 101.1C51.6 100.2 50.8 99.9998 50.4 100.5C50 100.9 50.3 101.6 51.3 102.7C50.6 102.7 49.9 102.7 49.2 102.7C48.8 102.8 48.6 103 48.6 103.4C48.6 104.1 49.5 104.4 50.4 104.7C50.8 104.8 51.2 104.9 51.5 105C48.6 105.3 44.5 106.5 43.5 110.7H28C27.4 110.7 26.9 110.9 26.5 111.3C26.1 111.7 25.9 112.2 25.9 112.8C25.9 113.4 26.1 113.9 26.5 114.3C26.9 114.7 27.4 114.9 28 114.9H47.5L38.4 165.5H5.5C5.2 165.5 5 165.7 5 166C5 166.3 5.2 166.5 5.5 166.5H194.5C194.8 166.5 195 166.3 195 166C195 165.7 194.8 165.7 194.5 165.7ZM137.9 61.4998C137.6 61.4998 137.3 61.4998 137 61.3998C136.7 61.2998 136.5 61.0998 136.3 60.8998C136.1 60.6998 136 60.3998 135.9 60.0998C135.8 59.8998 135.9 59.5998 135.9 59.2998C135.9 59.1998 135.9 59.1998 136 59.0998L138.3 61.2998C138.1 61.3998 138 61.4998 137.9 61.4998ZM150 56.6998C149.9 56.6998 149.8 56.6998 149.7 56.6998C149.5 56.6998 149.4 56.5998 149.3 56.3998C149.2 56.2998 149.1 56.0998 149.2 55.8998C149.2 55.7998 149.2 55.7998 149.3 55.6998V55.5998C149.3 55.4998 149.4 55.4998 149.4 55.3998C149.5 55.2998 149.7 55.1998 149.9 55.1998C150.1 55.1998 150.3 55.2998 150.4 55.3998C150.5 55.4998 150.6 55.6998 150.6 55.8998C150.6 55.9998 150.6 56.0998 150.5 56.1998C150.5 56.2998 150.4 56.3998 150.3 56.4998C150.2 56.5998 150.1 56.6998 150 56.6998ZM166.6 77.5998C166.6 77.3998 166.6 77.2998 166.7 77.0998C166.8 76.8998 166.9 76.6998 167.1 76.5998C167.3 76.4998 167.5 76.3998 167.7 76.3998C167.9 76.3998 168.2 76.4998 168.3 76.5998C168.5 76.6998 168.6 76.8998 168.7 77.0998C168.8 77.1998 168.8 77.3998 168.8 77.4998C168.8 77.6998 168.8 77.7998 168.7 77.9998C168.6 78.1998 168.5 78.2998 168.4 78.3998C168.3 78.4998 168.1 78.5998 167.9 78.5998C167.7 78.5998 167.6 78.5998 167.4 78.5998C167.2 78.5998 167.1 78.4998 166.9 78.3998C166.8 78.2998 166.6 78.1998 166.6 77.9998C166.7 77.8998 166.7 77.7998 166.6 77.5998ZM155.6 108.2C155.5 108.1 155.5 108 155.4 107.9C155.4 107.8 155.4 107.7 155.4 107.6C155.4 107.5 155.4 107.4 155.5 107.3C155.6 107.2 155.6 107.1 155.7 107.1C155.8 107 156 107 156.1 107C156.1 107 156.1 107 156.2 107C156.4 107 156.5 107.1 156.6 107.2C156.7 107.3 156.7 107.3 156.8 107.4C156.8 107.5 156.9 107.6 156.9 107.7C156.9 107.8 156.9 107.9 156.8 108C156.8 108.1 156.7 108.2 156.6 108.3C156.5 108.4 156.4 108.4 156.3 108.4H156C155.8 108.4 155.7 108.3 155.6 108.2ZM147.8 109.4H155.9C156 109.4 156 109.4 156.1 109.4C156.2 109.4 156.2 109.4 156.3 109.4H164.5V110.8H147.8V109.4ZM42.7 165.7L51.8 115.1H76.8L59.8 150.5C59.7 150.7 59.8 150.9 59.9 151.1C60.6 151.8 61.4 152.3 62.2 152.9L59.8 157.8C55.4 159.3 51.5 162.1 48.5 165.7H42.7ZM93 107.7C93 107.6 93.1 107.6 93.1 107.5C93.3 107.3 93.5 107 93.7 106.8C93.9 106.6 93.8 106.3 93.6 106.1C93.4 105.9 93.1 106 92.9 106.2C92.7 106.4 92.5 106.7 92.3 106.9C90.4 107.7 89.2 108 88.6 108.1L89.3 107.7C90.7 107 92.1 106.2 93.2 105.5C93.4 105.4 93.5 105 93.4 104.8C93.3 104.6 92.9 104.5 92.7 104.6C92.4 104.8 92.1 105 91.8 105.2C89.4 105.9 87.8 106.1 86.8 106.1C87.1 106 87.4 105.9 87.7 105.8C89.7 105.2 91.9 104.5 93 104C93.3 103.9 93.4 103.6 93.3 103.3C93.2 103 92.9 102.9 92.6 103C92.2 103.2 91.7 103.3 91.2 103.5C90.4 103.6 89.6 103.7 88.9 103.7C89.4 103.6 89.9 103.4 90.4 103.3C92 102.8 94.5 102.2 94.8 102.1C95 102.1 95.3 102.2 95.8 102.3C96.9 102.6 98.6 103.3 100 103.8C100.4 104 100.8 104.1 101.1 104.2C101.6 106.3 101.7 109.1 101.1 110.1C101 110.3 100.9 110.3 100.8 110.3H100.7C100.2 110.4 99.6 109.8 98.9 109.1C98.6 108.8 98.2 108.4 97.8 108.1C97.6 108 97.5 107.8 97.4 107.7C96.7 107.1 96 106.5 95 107.1C93.3 108.3 92.1 108.9 91.4 109.2C92 108.9 92.5 108.3 93 107.7ZM95.5 99.8998C96 100.7 96.5 101.4 97.1 102.1C96.7 102 96.4 101.9 96.1 101.8C95.7 100.9 95.5 100.3 95.5 99.8998ZM104 78.9998C104.1 79.0998 104.3 79.0998 104.5 79.1998L103.8 79.5998L104 78.9998ZM108.7 79.1998L108.5 80.3998L107.3 79.4998C107.8 79.3998 108.2 79.2998 108.7 79.1998ZM106.3 79.7998L108.6 81.6998C108.7 81.7998 108.8 81.7998 108.9 81.7998C109 81.7998 109 81.7998 109.1 81.7998C109.3 81.6998 109.4 81.5998 109.4 81.3998L109.6 79.6998C109.6 79.6998 109.6 79.6998 109.7 79.6998C109.9 79.8998 110.2 79.9998 110.5 80.0998C113.5 81.1998 116.2 82.7998 118.6 84.8998C121.1 87.1998 123.6 95.7998 124.8 102.8C125 104.1 124.8 105.5 124 106.7C123.3 107.8 122.1 108.7 120.8 109C117.1 110 113.3 110.7 109.4 110.9H106.1C106.8 107 106.4 103.8 105.1 101.4C107.5 101.2 109.9 100.9 112.2 100.6H112.3C112.4 100.6 112.5 100.6 112.6 100.5C113 100.4 113.3 100.4 113.7 100.3C113.8 100.3 113.8 100.3 113.9 100.3C114 100.3 114.1 100.3 114.1 100.2C114.8 100.1 115.4 99.9998 116.1 99.8998C116.4 99.7998 116.5 99.5998 116.5 99.2998C116.4 98.9998 116.2 98.8998 115.9 98.8998C115.4 98.9998 114.8 99.0998 114.3 99.1998C114 96.4998 113.6 93.7998 112.9 91.0998C112.8 90.8998 112.6 90.6998 112.4 90.6998C112.2 90.6998 112 90.8998 112 91.1998V99.5998C109.5 99.9998 107 100.3 104.5 100.5C104.4 100.5 104.3 100.5 104.2 100.5C103.9 100.5 103.6 100.5 103.3 100.6C103.3 91.7998 104.3 84.9998 106.3 79.7998ZM127.8 127.6C127.7 127.9 127.5 128.2 127.3 128.4C127 128.6 126.7 128.7 126.4 128.8L106.2 130.5V127.3L109.4 127L126.1 125.6L128.1 125.7L127.8 127.6ZM93.6 165.6C90.1 165.6 86.9 165.6 83.5 165.6C79.8 165.6 76 165.6 71.2 165.7C71.7 165.3 72.3 164.8 73 164.2H93.5C93.6 164.7 93.6 165.1 93.6 165.6ZM69.8 165.7C65.7 165.7 61.8 165.7 57.3 165.7H49.9C50.3 165.2 50.8 164.7 51.3 164.2H71.4C70.8 164.8 70.2 165.3 69.8 165.7ZM97.1 109.4C97.4 109.7 97.8 110 98 110.3C98.2 110.5 98.3 110.6 98.5 110.8H95.5C96.2 110.4 96.7 109.9 97.1 109.4ZM81.9 143.5L75.3 155.7C74.5 155.7 73.7 155.7 72.9 155.6C72.8 155.6 72.7 155.6 72.6 155.6C71.8 155.5 70.9 155.4 70.1 155.2L84.3 131.5L81.9 143.5ZM74.8 156.7C75.1 156.7 75.3 156.7 75.6 156.7C75.8 156.7 75.9 156.6 76 156.4L81.3 146.8L79.9 154C79.9 154.2 80 154.5 80.2 154.5C81 154.9 81.8 155.2 82.7 155.5L82.1 157.9C79.2 158.8 75.9 160.9 73.4 162.7C73.2 161.2 72.8 159.7 72.3 158.3L73 156.6C73.6 156.7 74.2 156.7 74.8 156.7ZM92.5 157.9C89.4 158.7 86.2 158.7 83.1 157.9L83.6 155.8C85.8 156.5 88.1 157 90.5 157.2H90.6C91.3 157.3 91.9 157.3 92.6 157.3L92.5 157.9ZM80.9 153.8L82.9 143.8C82.9 143.8 82.9 143.8 82.9 143.7L85.8 128.8C85.8 128.7 85.8 128.7 85.8 128.6L87.1 121.8C87.5 120 88.4 118.3 89.7 117C90.6 116.1 91.6 115.5 92.7 115H119.3C118.9 116.9 118 118.4 116.6 119.4C112.7 122.1 105.8 121.1 102 120.3C101.5 120.2 100.9 120.2 100.3 120.3C99.7 120.4 99.2 120.6 98.8 120.9C98.3 121.2 97.9 121.6 97.6 122.1C97.3 122.6 97.1 123.1 96.9 123.6L90 156.2C87 156 83.8 155.1 80.9 153.8ZM90.7 115.1C90.1 115.5 89.6 115.9 89.1 116.4C87.6 117.9 86.6 119.7 86.2 121.8L84.9 128.6L69.2 155C66.2 154.2 63.4 152.7 61 150.6L78 115.1H90.7ZM72 156.5L71.4 157.9C68 158.7 64.4 158.7 61 157.8L63.1 153.4C65.8 155.1 68.8 156.1 72 156.5ZM93.3 156.4C93.2 156.4 93.1 156.4 93.1 156.4C92.5 156.4 91.8 156.4 91.2 156.3L98.1 123.8C98.2 123.4 98.4 123 98.6 122.6C98.8 122.2 99.2 121.9 99.5 121.7C99.9 121.5 100.3 121.3 100.7 121.2C101.1 121.1 101.5 121.1 102 121.2C105.9 122.1 113.2 123.1 117.4 120.2C119.1 119 120.2 117.2 120.6 114.9H124.8C124.9 115.6 125.1 116.4 125.1 117.1C125.2 118.6 124.9 120.1 124.3 121.4C123.7 122.7 122.8 123.9 121.6 124.8L109.8 125.8L104.4 123.9C104.3 123.9 104.1 123.9 104 123.9C103.9 124 103.8 124.1 103.8 124.2L103.3 126.1C102.9 127.6 102.6 128.9 102.3 130.2C97.4 149.8 96.2 154.7 95.9 156C94.8 156.4 94.1 156.4 93.3 156.4ZM103.8 127L105.2 127.2V130.4L103 130.2C103.3 129.1 103.6 128 103.8 127ZM128.4 124.7L123.5 124.3C124.1 123.6 124.6 122.8 125 121.9C125.7 120.4 126 118.7 125.9 117.1C125.8 116.4 125.7 115.6 125.6 114.9H130.4L128.4 124.7ZM117.2 110.8C118.5 110.5 119.8 110.2 121.1 109.9C121.6 109.8 122 109.6 122.4 109.4C122.7 109.9 122.9 110.3 123.1 110.8H117.2ZM104 101.4C105.4 103.7 105.8 106.9 105.1 110.8H101.9C102.8 108.8 102 103.9 101.2 102.2C101.1 101.9 100.9 101.7 100.8 101.6C101.9 101.5 102.9 101.5 104 101.4ZM95.4 108.4C95.7 108.2 95.7 108.2 96.3 108.7C95.6 109.5 94.7 110.1 93.7 110.5C93.5 110.6 93.2 110.7 93 110.7H91.2C92.4 110.4 94.1 109.4 95.4 108.4ZM56.8 109.9C56.6 109.9 56.4 109.9 56.1 109.8C55.6 109.8 55.2 109.7 54.9 109.7C55 109.7 55.1 109.6 55.2 109.6C55.4 109.5 55.7 109.5 55.9 109.4C56.2 109.3 56.5 109.3 56.8 109.2V109.9ZM94.6 163.8C94.6 163.6 94.6 163.6 94.6 163.5C94.4 161.7 94.1 160 93.5 158.3L93.7 157.4C94.5 157.4 95.3 157.3 96.1 157.3C96.4 157.3 96.5 157.2 96.5 156.9C96.6 156.5 99.7 144.1 102.9 131.2L105.3 131.5L103.1 165.8H94.7C94.6 165.1 94.6 164.4 94.6 163.8ZM106.2 131.4L126.5 129.7C126.9 129.7 127.3 129.5 127.6 129.3L132.8 165.6H104L106.2 131.4ZM128.5 128.5C128.6 128.3 128.7 128.1 128.8 127.8L131.4 115.1H151.1L160.2 165.7H133.8L128.5 128.5ZM146.2 103.8C146.4 104 146.6 104.2 146.7 104.5C146.8 104.8 146.9 105.1 146.9 105.3C146.9 105.5 146.8 105.9 146.7 106.1C146.6 106.3 146.4 106.6 146.2 106.8C145.9 107.1 145.5 107.3 145.1 107.4V103.1C145.6 103.3 146 103.5 146.2 103.8ZM124.3 110.8C124 110.1 123.7 109.5 123.3 108.8C123.9 108.3 124.5 107.8 124.9 107.1C125.8 105.7 126.1 104.1 125.8 102.5C125.7 102 125.6 101.4 125.5 100.8L133.2 101.4L131.3 110.8H124.3ZM135.3 81.1998C135.8 81.4998 136.3 81.8998 136.5 82.4998C136.8 82.9998 136.8 83.6998 136.7 84.2998L133.4 100.5L125.2 99.8998C124 94.2998 121.9 86.5998 119.2 84.1998C117.2 82.4998 114.9 80.9998 112.5 79.9998L134.1 80.9998C134.5 80.8998 134.9 80.9998 135.3 81.1998ZM103.6 73.9998C102.9 72.4998 105 68.7998 105.4 68.1998L105.5 68.0998C105.9 67.5998 106.6 66.7998 107.2 66.9998C108 67.2998 108.5 68.8998 108.5 70.0998C108.5 70.5998 108.7 70.8998 108.9 70.9998C109.3 71.1998 109.8 70.8998 110.2 70.6998C110.4 70.5998 110.6 70.4998 110.7 70.5998C110.8 70.5998 110.9 70.7998 110.8 70.9998C110.8 71.3998 110.4 71.9998 109.5 72.3998C109.3 72.4998 109.1 72.6998 108.8 73.4998C108.4 74.5998 108.1 76.6998 108.6 78.2998C106.9 78.7998 105.6 78.7998 104.6 78.2998C104.9 77.8998 105.1 77.4998 105.3 76.9998L107 75.3998C107.2 75.1998 107.2 74.9998 107.1 74.7998C107 74.5998 106.8 74.4998 106.5 74.5998C106.1 74.6998 105.6 74.7998 105.1 74.7998C104 74.6998 103.7 74.0998 103.6 73.9998ZM87.5 99.8998C87.6 99.8998 87.8 99.7998 87.8 99.6998C88.8 98.0998 89.9 95.9998 91 93.7998C93.7 88.3998 97.2 81.5998 101.3 80.3998C101.7 80.2998 102.2 80.0998 102.6 79.8998L102.3 80.4998C102.2 80.6998 102.3 80.8998 102.4 81.0998C102.6 81.1998 102.8 81.2998 103 81.1998L105.2 80.0998C103.3 85.3998 102.4 92.0998 102.3 100.6C101.3 100.7 100.4 100.7 99.4 100.7H99.3C98.9 100.7 98.5 101 98.1 101.7C98 101.6 97.9 101.5 97.8 101.3C96.9 97.3998 96.9 93.3998 97.7 89.4998C97.8 89.1998 97.6 88.9998 97.3 88.8998C97 88.7998 96.8 88.9998 96.7 89.2998C96 92.6998 95.9 96.0998 96.5 99.4998C96.4 99.3998 96.3 99.1998 96.2 99.0998C95.9 98.4998 95.3 98.2998 94.9 98.4998C94.3 98.7998 94.3 99.7998 94.9 101.4C94.8 101.4 94.7 101.4 94.6 101.4C94.3 101.4 93.2 101.7 90 102.6C89.3 102.8 88.6 103 88.1 103.1C87 103.4 86.5 103.8 86.5 104.3C86.6 104.7 86.9 104.8 87.2 104.9C86.5 105.1 85.8 105.3 85.3 105.5C84.8 105.7 84.6 106.1 84.7 106.4C84.8 106.9 85.6 107.1 86.8 107.1C87.3 107.1 87.9 107 88.5 107L87.5 107.5C86.9 107.8 86.9 108.2 87 108.6C87.2 109 87.6 109.1 88.2 109.1C89 109.1 90.1 108.8 91.1 108.5C90.8 108.8 90.5 109.2 90.1 109.6C89.7 110 89.8 110.4 90 110.7L90.1 110.8H72.6C72.5 110.7 72.4 110.6 72.3 110.6C72.2 110.5 72 110.5 71.9 110.5H71.6C71.9 107.8 71.4 105.1 70.1 102.8L87.5 99.8998ZM68.9 102.9C70.3 105.2 70.9 107.8 70.5 110.5H69.3C68.9 110.5 68.5 110.4 68.2 110.1C67.9 109.8 67.7 109.5 67.7 109.1L67.1 103.2L68.9 102.9ZM44.6 97.5998C44.1 97.0998 43.8 96.3998 43.8 95.5998V71.6998C43.8 71.2998 43.9 70.9998 44 70.5998C44.1 70.2998 44.3 69.9998 44.6 69.6998C44.9 69.3998 45.2 69.1998 45.5 69.0998C45.8 68.9998 46.2 68.8998 46.6 68.8998H79.3C79.9 68.8998 80.4 69.0998 80.8 69.3998C81 69.4998 81.1 69.5998 81.2 69.6998C81.7 70.1998 82 70.8998 82 71.6998V95.5998C82 96.2998 81.7 96.9998 81.2 97.5998C80.7 98.1998 80 98.3998 79.2 98.3998H46.5C45.8 98.3998 45.1 98.0998 44.6 97.5998ZM65.1 99.3998L65.5 102.9C65.5 102.9 65.5 102.9 65.5 103L66.4 110.8H57.8V110.6C57.8 110.6 57.8 110.6 57.8 110.5V110.4L58 108.7C58 108.6 58 108.6 58 108.5L58.1 107.1C58.1 107 58.1 107 58.1 106.9L58.8 99.3998H65.1ZM52.7 102.1C54.2 103 55.8 103.8 57.4 104.5L57.2 106.2C56.6 105.8 56.3 105.6 55.9 105.3C55.6 105.1 55.3 104.8 54.9 104.5C54 103.9 53.2 103.2 52.5 102.5C52.1 102.1 51.8 101.8 51.7 101.5C51.7 101.6 52.1 101.8 52.7 102.1ZM50.5 103.7C51.2 103.7 51.8 103.8 52.4 103.9C52.7 104.2 53 104.4 53.3 104.6C52.4 104.3 51.5 104 50.6 103.7C50.6 103.8 50.5 103.8 50.5 103.7ZM54.2 106C55 106.3 55.8 106.6 56.7 107L56.8 107.1C56.9 107.2 57 107.2 57.1 107.3L57 108.2C56.6 108.3 56.2 108.4 55.8 108.5C55.5 108.6 55.2 108.6 55 108.7C53.9 109 53.4 109.4 53.5 109.9C53.6 110.4 54 110.6 55.1 110.7H44.5C46 105.7 53.2 105.9 54.2 106Z"
        fill="currentColor"
      />
    </svg>
  </SvgIcon>
)

export default OfficeDeskImage
