import { FC } from 'react'

import { SvgIcon, SvgIconProps } from '@mui/material'

const NewsletterImage: FC<SvgIconProps> = ({ sx, ...props }) => (
  <SvgIcon sx={{ fontSize: 200, color: 'primary.dark', ...sx }} {...props}>
    <svg
      width="200"
      height="200"
      viewBox="0 0 200 200"
      fill="none"
      xmlns="http://www.w3.org/2000/svg"
    >
      <path
        d="M186.6 90.7002C183.5 90.3002 177.1 90.4002 171.6 90.5002L177.7 78.4002C178.8 76.3002 179 73.8002 178.2 71.6002C178.2 71.5002 178.1 71.4002 178.1 71.2002V71.1002C178.1 71.0002 178 70.9002 178 70.8002C177.2 68.9002 175.7 67.3002 173.8 66.3002L105.2 31.6002C105.5 30.6002 105.6 29.5002 105.6 28.5002C105.6 25.2002 104.3 22.1002 102 19.8002C99.7001 17.5002 96.6001 16.2002 93.3001 16.2002C90.8001 16.2002 88.5001 16.9002 86.4001 18.3002C84.4001 19.7002 82.8001 21.6002 81.9001 23.8002C81.0001 26.1002 80.7001 28.5002 81.2001 30.9002C81.7001 33.3002 82.8001 35.5002 84.6001 37.2002C84.7001 37.3002 84.8001 37.4002 85.0001 37.5002L65.3001 76.4002C64.0001 75.0002 62.5001 73.8002 60.7001 73.1002C60.1001 72.9002 59.5001 72.7002 58.8001 72.7002C58.8001 71.7002 58.9001 70.7002 59.0001 69.7002C61.1001 70.7002 63.1001 70.1002 64.7001 67.8002C66.5001 64.9002 67.4001 61.6002 67.4001 58.3002C67.7001 58.3002 67.9001 58.2002 68.2001 58.1002C68.4001 58.0002 68.6001 57.8002 68.6001 57.6002C68.6001 57.3002 68.6001 55.1002 67.0001 53.5002C66.0001 52.5002 64.6001 51.9002 62.8001 51.9002C62.0001 50.7002 58.4001 46.0002 51.2001 49.5002C43.8001 53.1002 44.4001 66.3002 44.6001 68.6002C43.2001 69.3002 37.4001 72.5002 34.1001 77.5002C31.0001 82.2002 30.5001 87.9002 32.8001 92.3002C35.4001 97.2002 41.2001 99.9002 49.0001 100C50.7001 107.5 55.0001 114.1 61.3001 118.5C61.7001 119.6 64.6001 126.3 72.1001 129.7C76.4001 131.6 81.3001 132 86.9001 130.9C80.6001 137.4 72.7001 141.8 63.9001 143.9C54.6001 146.1 44.9001 145.4 36.0001 141.9C30.1001 139.6 24.8001 136.2 20.2001 131.7C15.6001 127.3 12.1001 122 9.60006 116.2C6.00006 107.3 5.00006 97.7002 7.00006 88.3002C8.40006 81.6002 11.2001 75.5002 15.1001 70.1002C14.2001 71.6002 13.4001 73.1002 12.6001 74.6002C12.5001 74.8002 12.5001 75.1002 12.7001 75.2002L17.3001 78.9002C17.5001 79.1002 17.8001 79.2002 18.0001 79.2002C18.1001 79.2002 18.2001 79.2002 18.3001 79.2002C18.5001 79.2002 18.6001 79.2002 18.8001 79.1002C19.1001 79.0002 19.3001 78.9002 19.5001 78.7002C19.7001 78.5002 19.8001 78.3002 19.9001 78.0002L27.2001 57.0002C27.3001 56.7002 27.3001 56.3002 27.2001 56.0002C27.1001 55.7002 26.9001 55.4002 26.6001 55.1002C26.3001 54.9002 26.0001 54.8002 25.6001 54.7002C25.2001 54.7002 24.9001 54.8002 24.6001 55.0002C18.1001 58.3002 11.8001 62.3002 6.00006 67.0002C5.80006 67.1002 5.60006 67.3002 5.40006 67.6002C5.30006 67.8002 5.20006 68.1002 5.20006 68.4002C5.20006 68.7002 5.20006 68.9002 5.40006 69.2002C5.50006 69.4002 5.70006 69.7002 5.90006 69.8002L10.2001 73.2002C10.3001 73.3002 10.4001 73.3002 10.6001 73.3002C10.7001 73.3002 10.9001 73.2002 10.9001 73.1002C12.0001 71.6002 13.3001 70.3002 14.7001 69.0002C10.4001 74.6002 7.50006 81.1002 6.00006 88.1002C4.00006 97.7002 4.90006 107.5 8.70006 116.5C11.2001 122.5 14.8001 127.8 19.5001 132.4C24.2001 136.9 29.6001 140.4 35.6001 142.8C41.2001 145 47.1001 146.1 53.1001 146.1C56.8001 146.1 60.5001 145.7 64.1001 144.8C73.6001 142.6 82.0001 137.6 88.6001 130.5C91.2001 129.9 93.9001 129 96.7001 127.8L112.9 120.8V122C113.1 130 113.4 142.1 112.8 150.2C112.8 150.4 112.9 150.6 113.2 150.7C113.4 150.8 113.7 150.8 113.9 150.9C113.9 151.6 113.8 152.4 113.7 153.2C113.7 153.2 113.7 153.2 113.7 153.3C113.6 154.5 113.4 155.6 113.2 156.7C113.1 157.6 112.9 158.5 112.8 159.3C112.5 160.7 112.6 162 112.9 163.4V163.5C113.7 165.3 114.7 166.9 116 168.4C117.6 170.3 119.5 173.1 121.3 175.9C124.6 181 126.7 184 128.2 184C128.3 184 128.4 184 128.5 183.9C129.1 183.7 129.4 183 129.5 181.6C129.9 178.1 129.4 170.5 129.1 165C129 163.9 129 162.9 128.9 162C128.7 158 128.5 154 128.7 151.1C128.8 151.1 129 151 129.1 151C129.3 150.9 129.4 150.8 129.5 150.6C130.1 146.4 131.3 137.2 131.4 127.9L140.4 132.5C141.7 133.1 143 133.5 144.4 133.5C145.3 133.5 146.3 133.3 147.2 133C149.5 132.3 151.3 130.7 152.4 128.5L163.3 106.8C163.4 106.8 163.5 106.8 163.6 106.8C164.3 107 165 107 165.7 107C166.3 107 167 106.9 167.7 106.8C169.5 106.1 171.2 105.1 172.7 103.9C174.7 102.3 177.5 100.6 180.3 98.9002C185.9 95.5002 189 93.6002 188.6 92.0002C188.8 91.2002 188.1 90.9002 186.6 90.7002ZM10.4001 72.1002L6.50006 69.0002C6.40006 68.9002 6.30006 68.8002 6.30006 68.7002C6.30006 68.6002 6.20006 68.5002 6.20006 68.4002C6.20006 68.3002 6.20006 68.2002 6.30006 68.1002C6.40006 68.0002 6.40006 67.9002 6.60006 67.8002C12.3001 63.1002 18.6001 59.2002 25.3001 56.0002C25.3001 56.0002 25.3001 56.0002 25.4001 56.0002C25.5001 55.9002 25.7001 55.9002 25.8001 55.9002C25.9001 55.9002 26.1001 56.0002 26.2001 56.0002C26.3001 56.1002 26.4001 56.2002 26.4001 56.4002C26.4001 56.5002 26.4001 56.7002 26.4001 56.8002L19.1001 77.8002C19.1001 77.9002 19.0001 78.0002 18.9001 78.1002C18.8001 78.2002 18.7001 78.2002 18.6001 78.3002C18.5001 78.3002 18.4001 78.3002 18.3001 78.3002C18.2001 78.3002 18.1001 78.2002 18.0001 78.2002L13.7001 74.8002C15.7001 71.0002 18.0001 67.4002 20.6001 64.0002C20.7001 63.9002 20.8001 63.7002 20.7001 63.6002V63.5002C20.7001 63.5002 20.7001 63.4002 20.6001 63.4002C20.4001 63.2002 20.1001 63.2002 19.9001 63.4002L19.3001 63.9002C16.0001 66.4002 12.9001 69.0002 10.4001 72.1002ZM157.7 104.5C156.9 104.4 155.7 104.3 154.7 104.2C156.8 99.9002 157.1 96.6002 156.7 91.6002C159.3 91.7002 163.4 91.7002 166.2 91.6002C164.5 95.5002 162.3 99.0002 159.7 102.3C159.5 102.6 159.2 102.9 159 103.1C158.9 103.2 158.8 103.3 158.7 103.4C158.3 103.8 158 104.2 157.7 104.5ZM127.6 105.4C122 97.0002 108.1 99.2002 102 100.7C103.4 99.7002 104.6 98.8002 105.3 98.0002C107.1 96.1002 108.4 94.3002 109.3 92.6002L118 88.9002C120.1 88.0002 122.4 87.6002 124.7 87.8002L148.3 89.6002C149 95.0002 148.2 100.4 145.8 105.3L127.6 105.4ZM73.1001 109.8C70.6001 108.4 67.6001 105.7 64.4001 102C66.7001 100.8 68.9001 99.4002 70.9001 97.6002C72.1001 96.5002 73.2001 95.3002 74.3001 94.0002C75.8001 96.0002 78.3001 98.7002 80.6001 98.6002C83.8001 98.3002 87.0001 97.5002 90.0001 96.3002C92.9001 95.2002 95.7001 93.9002 98.4001 92.3002C101.9 90.3002 102.1 85.2002 102.2 81.8002V81.3002C102.3 79.2002 102.5 78.5002 102.6 78.2002C102.8 78.4002 103 78.8002 103.3 79.6002C103.5 80.1002 103.6 80.9002 103.8 81.6002C103.9 82.2002 104.1 82.9002 104.2 83.4002V83.6002C104.6 84.8002 104.9 85.5002 105.5 85.7002C105.7 85.8002 106.1 85.8002 106.5 85.6002C106.8 85.4002 107.1 85.1002 107.2 84.7002C107.5 83.9002 107.8 82.8002 108.1 81.5002L109.9 73.6002C110 73.3002 110 73.1002 110.1 72.9002C110.1 72.8002 110.2 72.7002 110.2 72.6002C110.3 73.0002 110.4 73.7002 110.4 74.8002V75.6002C110.8 82.3002 111.1 87.0002 108.6 91.9002C108.5 92.0002 108.5 92.1002 108.5 92.2002C107.6 93.9002 106.4 95.6002 104.7 97.4002C101 101.3 86.2001 109.2 78.3001 110.8C76.5001 111 74.7001 110.7 73.1001 109.8ZM110.2 67.4002L108.8 73.4002C108.4 74.7002 108.1 76.5002 107.7 78.3002C107.2 80.7002 106.7 83.1002 106.2 84.4002C106.2 84.5002 106.1 84.7002 105.9 84.8002C105.9 84.8002 105.6 84.7002 105.2 83.4002L108.9 67.1002C108.9 67.0002 109 66.9002 109 66.9002C109.1 66.8002 109.1 66.8002 109.2 66.7002C109.3 66.7002 109.4 66.6002 109.4 66.6002C109.5 66.6002 109.6 66.6002 109.7 66.6002C109.8 66.6002 109.9 66.7002 109.9 66.7002C110 66.8002 110 66.8002 110.1 66.9002C110.1 67.0002 110.2 67.1002 110.2 67.2002C110.2 67.2002 110.2 67.3002 110.2 67.4002ZM149.3 89.6002L155.5 90.1002C156.1 96.1002 156.1 99.7002 153.1 105.2L146.9 105.3C149.2 100.3 150 94.9002 149.3 89.6002ZM173.4 67.2002C174.9 68.0002 176.2 69.2002 176.9 70.8002L120.3 79.9002L99.3001 39.3002C101 38.4002 102.4 37.0002 103.5 35.4002C104.1 34.5002 104.5 33.6002 104.9 32.6002L173.4 67.2002ZM82.1001 30.7002C81.7001 28.5002 81.9001 26.2002 82.7001 24.1002C83.6001 22.0002 85.0001 20.3002 86.9001 19.0002C88.8001 17.7002 91.0001 17.1002 93.2001 17.1002C96.2001 17.1002 99.1001 18.3002 101.2 20.4002C103.3 22.5002 104.5 25.4002 104.5 28.4002C104.5 29.4002 104.4 30.5002 104.1 31.4002L104 31.5002C104 31.6002 103.9 31.7002 104 31.8002C103.7 32.8002 103.2 33.8002 102.6 34.7002C101.3 36.6002 99.6001 38.0002 97.5001 38.9002C95.4001 39.8002 93.1001 40.0002 90.9001 39.5002C88.7001 39.1002 86.7001 38.0002 85.1001 36.4002C83.6001 35.0002 82.5001 33.0002 82.1001 30.7002ZM85.6001 38.3002C87.1001 39.5002 88.9001 40.3002 90.8001 40.7002C91.6001 40.9002 92.4001 40.9002 93.2001 40.9002C94.8001 40.9002 96.4001 40.6002 97.9001 40.0002C98.1001 39.9002 98.2001 39.9002 98.4001 39.8002L119.5 80.8002C119.6 81.0002 119.8 81.1002 119.9 81.1002H120L177.2 71.9002V72.0002C177.9 74.0002 177.7 76.2002 176.7 78.1002L170.4 90.7002C170.3 90.7002 170.2 90.7002 170 90.7002C168.8 90.7002 167.7 90.8002 166.8 90.8002C164.1 90.8002 159.2 90.9002 156.5 90.8002C156.5 90.5002 156.4 90.1002 156.4 89.8002C156.4 89.6002 156.2 89.4002 155.9 89.4002L124.7 87.1002C122.3 86.9002 119.8 87.3002 117.5 88.3002L109.9 91.5002C112 86.7002 111.7 82.0002 111.3 75.8002V75.0002C111.1 72.2002 110.8 71.5002 110.3 71.4002L111.1 67.9002C111.2 67.7002 111.2 67.5002 111.1 67.2002C111.1 67.0002 111 66.8002 110.9 66.6002C110.8 66.4002 110.6 66.3002 110.5 66.1002C110.3 66.0002 110.1 65.9002 109.9 65.8002C109.7 65.8002 109.5 65.7002 109.2 65.8002C109 65.8002 108.8 65.9002 108.6 66.0002C108.4 66.1002 108.2 66.3002 108.1 66.5002C108 66.7002 107.9 66.9002 107.8 67.1002L104.5 81.4002C104.3 80.7002 104.2 80.0002 104 79.5002C103.7 78.5002 103.1 77.3002 102.2 77.4002C101.4 77.5002 101 78.7002 100.9 81.5002V82.0002C100.8 85.2002 100.6 89.9002 97.6001 91.7002C95.0001 93.2002 92.2001 94.5002 89.3001 95.6002C86.4001 96.7002 83.3001 97.5002 80.2001 97.8002C78.8001 97.9002 76.7001 96.2002 74.6001 93.4002C74.9001 93.0002 75.1001 92.7002 75.4001 92.3002C75.5001 92.1002 75.5001 91.9002 75.4001 91.7002C72.2001 87.5002 69.1001 83.0002 66.4001 78.4002C66.2001 78.0002 65.9001 77.7002 65.7001 77.4002L85.6001 38.3002ZM63.8001 67.1002C62.4001 69.2002 60.7001 69.6002 58.9001 68.4002C58.0001 67.8002 57.3001 67.0002 56.6001 66.2002C56.5001 66.0002 56.2001 65.9002 56.0001 66.0002C55.8001 66.1002 55.7001 66.4002 55.8001 66.6002L57.8001 71.6002C57.8001 71.9002 57.8001 72.2002 57.8001 72.6002C57.6001 72.6002 57.4001 72.6002 57.2001 72.6002C56.5001 72.8002 55.7001 72.8002 54.9001 72.7002C54.3001 72.6002 53.7001 72.3002 53.1001 71.9002C53.1001 71.8002 53.2001 71.7002 53.2001 71.6002C53.5001 70.8002 53.8001 69.9002 54.1001 69.1002C54.5001 67.9002 55.8001 64.1002 56.2001 62.6002C56.3001 62.2002 56.4001 61.8002 56.5001 61.4002C56.7001 60.6002 56.9001 59.8002 57.3001 58.7002C57.4001 58.5002 57.3001 58.3002 57.2001 58.2002C56.6001 57.6002 56.3001 56.9002 56.5001 56.3002C56.6001 55.9002 56.9001 55.6002 57.3001 55.6002C57.7001 55.6002 57.9001 55.9002 58.1001 56.1002C58.6001 57.0002 58.9001 57.1002 59.4001 57.3002L59.6001 57.4002C60.9001 57.8002 63.8001 58.6002 66.5001 58.4002C66.3001 61.4002 65.4001 64.5002 63.8001 67.1002ZM49.8001 99.3002C49.0001 95.6002 48.7001 91.8002 48.9001 88.1002C49.3001 82.8002 50.9001 78.0002 52.6001 72.9002C53.2001 73.3002 53.8001 73.5002 54.5001 73.7002C55.4001 73.9002 56.3001 73.9002 57.2001 73.7002C58.2001 73.6002 59.3001 73.7002 60.2001 74.1002C62.1001 74.9002 63.7001 76.1002 64.9001 77.7002C65.2001 78.1002 65.5001 78.5002 65.7001 78.9002C68.4001 83.4002 71.4001 87.8002 74.6001 92.0002C74.3001 92.4002 74.1001 92.7002 73.8001 93.0002C72.7001 94.4002 71.5001 95.7002 70.2001 96.9002C67.9001 99.0002 65.4001 100.6 62.6001 101.8C60.9001 99.7002 59.2001 97.5002 57.7001 95.3002C57.7001 95.3002 57.7001 95.2002 57.6001 95.2002C57.6001 95.2002 57.6001 95.2002 57.5001 95.2002H57.1001C57.1001 95.2002 57.1001 95.2002 57.0001 95.2002C57.0001 95.2002 57.0001 95.2002 56.9001 95.3002C56.9001 95.3002 56.9001 95.3002 56.9001 95.4002V95.8002C56.9001 95.8002 56.9001 95.8002 56.9001 95.9002C56.9001 96.0002 61.9001 107 70.5001 111.7C67.7001 113.8 64.8001 115.8 61.9001 117.6C55.6001 113.1 51.4001 106.7 49.8001 99.3002ZM96.3001 126.8C93.5001 128 90.8001 128.9 88.2001 129.5C82.3001 130.9 77.0001 130.6 72.6001 128.6C65.9001 125.7 63.0001 119.8 62.4001 118.2C65.5001 116.2 68.6001 114.1 71.5001 111.9C71.6001 111.9 71.7001 111.8 71.7001 111.7C72.1001 111.4 72.6001 111 73.0001 110.7C74.2001 111.3 75.6001 111.7 76.9001 111.7C77.4001 111.7 77.9001 111.7 78.4001 111.6C84.2001 110.4 93.1001 106.3 99.3001 102.4C99.5001 102.3 120.3 95.7002 126.9 106.1C129.5 110.2 130.5 117.9 130.4 126.7C130.4 132.1 130 138 129.3 143.6C124.2 144.2 119.1 144.1 114 143.3C114.1 138.8 114 133.8 114 129.2L118.7 117.8C118.8 117.6 118.7 117.4 118.6 117.3C118.5 117.2 118.2 117.1 118 117.2C118 117.2 115.9 118.1 113 119.4L96.3001 126.8ZM128.3 182.8C127.4 183.1 124.3 178.3 122.2 175.2C120.4 172.4 118.5 169.6 116.8 167.6C115.6 166.2 114.6 164.7 113.8 163C113.7 162.3 113.6 161.7 113.6 161C113.6 161.1 113.7 161.2 113.8 161.2C114.1 161.7 114.4 162.1 114.7 162.6C114.8 162.8 114.9 162.9 115.1 163.1C115.5 163.6 115.9 164.1 116.3 164.6C116.5 164.9 116.8 165.1 117 165.4C118.7 167.5 120.5 170.3 122.3 173C123.1 174.2 123.9 175.4 124.7 176.5C124.8 176.6 124.9 176.8 125 176.9C125.1 177.1 125.3 177.3 125.4 177.4C125.6 177.6 125.7 177.9 125.9 178.1C126 178.2 126.1 178.4 126.2 178.5C126.4 178.7 126.5 179 126.7 179.2C126.8 179.3 126.9 179.4 127 179.5C127.2 179.7 127.3 179.9 127.5 180.1C127.6 180.2 127.7 180.3 127.8 180.4C128 180.6 128.1 180.7 128.3 180.9C128.4 181 128.5 181.1 128.5 181.1C128.6 181.2 128.7 181.3 128.8 181.4C128.5 182.7 128.3 182.8 128.3 182.8ZM128 161C123.2 159.1 118.7 156.4 114.8 153C114.9 152.3 114.9 151.6 115 151C117.2 151.5 119.4 151.8 121.5 151.8C123.6 151.8 125.7 151.5 127.8 151.1C127.6 153.8 127.8 157.4 128 161ZM128.6 149.9C123.7 151.2 118.7 151.2 113.8 149.8C113.9 148.2 114 146.4 114 144.5C116.9 144.9 119.8 145.2 122.7 145.2C124.9 145.2 127.1 145.1 129.2 144.8C129.1 146.5 128.9 148.2 128.6 149.9ZM151.7 127.8C150.7 129.7 149.1 131.1 147.1 131.8C145.1 132.5 142.9 132.3 141 131.3L131.5 126.5C131.5 118.7 130.8 111 128.2 106.3L146.1 106.1L153.4 106C153.6 106 153.7 105.9 153.8 105.7C153.9 105.5 154.1 105.2 154.2 105C155.2 105.1 156.9 105.3 157.8 105.4C158.9 105.6 160 105.8 161.1 106C161.6 106.1 162 106.2 162.5 106.3L151.7 127.8ZM180.1 97.9002C177.3 99.6002 174.4 101.4 172.3 103C170.9 104.2 169.3 105.1 167.6 105.8C166.9 105.9 166.2 106 165.5 105.9C165.7 105.8 165.9 105.7 166.1 105.6C166.4 105.4 166.7 105.2 167 105.1C167.3 104.9 167.6 104.7 167.9 104.5C168.1 104.3 168.4 104.1 168.6 104C168.8 103.8 169.1 103.7 169.3 103.5C171.5 101.7 174.8 99.7002 177.9 97.8002C180.8 96.0002 183.6 94.4002 185.4 92.9002L185.5 92.8002C185.7 92.6002 185.9 92.4002 186.1 92.3002C186.2 92.2002 186.3 92.1002 186.3 92.1002C186.4 92.0002 186.5 91.9002 186.6 91.8002C187.5 92.0002 187.8 92.2002 187.8 92.1002C188.1 93.0002 183.3 95.9002 180.1 97.9002Z"
        fill="currentColor"
      />
      <path
        d="M144.1 26.3002L146.3 26.5002C147.4 28.3002 149.4 29.3002 151.5 29.3002C151.6 29.3002 151.6 29.3002 151.7 29.3002C153.7 29.2002 155.5 28.2002 156.3 26.4002C156.9 25.0002 156.9 23.5002 156.4 22.1002C155.9 20.7002 154.8 19.6002 153.4 19.0002C151.4 18.0002 149 18.1002 147.3 19.4002C145.8 20.5002 145.1 22.2002 145.3 24.0002L143.7 25.5002C143.6 25.6002 143.5 25.8002 143.6 26.0002C143.7 26.2002 143.9 26.3002 144.1 26.3002ZM146.2 24.6002C146.3 24.5002 146.4 24.3002 146.4 24.2002C146.2 22.6002 146.7 21.2002 148 20.3002C149.4 19.3002 151.4 19.1002 153.1 20.0002C154.2 20.5002 155.1 21.4002 155.5 22.6002C155.9 23.8002 155.9 25.0002 155.4 26.1002C154.7 27.5002 153.3 28.3002 151.6 28.4002C149.7 28.5002 147.9 27.5002 146.9 25.9002C146.8 25.8002 146.7 25.7002 146.5 25.7002L145.2 25.6002L146.2 24.6002Z"
        fill="currentColor"
      />
      <path
        d="M177.5 129.6C177 129.1 176.5 128.6 175.9 128.3C174.6 127.6 173.2 127.5 171.8 127.9C171.1 128.1 170.5 128.5 170 128.9C169.5 129.4 169 129.9 168.7 130.5C167.5 132.8 165 136.4 163.3 136.3C163.1 136.3 162.8 136.4 162.8 136.7C162.7 136.9 162.8 137.2 163.1 137.3L167.2 139.4C167.1 139.6 167.1 139.8 167 140.1C167 140.5 167 140.9 167.1 141.3C167.2 141.7 167.4 142 167.7 142.3C168 142.6 168.3 142.8 168.6 143C169 143.2 169.3 143.3 169.7 143.3C169.8 143.3 169.9 143.3 169.9 143.3C170.2 143.3 170.5 143.3 170.8 143.1C171.2 143 171.5 142.8 171.8 142.5C172 142.3 172.1 142.2 172.2 142L176.3 144.1C176.4 144.1 176.5 144.2 176.5 144.2C176.6 144.2 176.8 144.1 176.9 144C177 143.8 177 143.6 176.9 143.4C175.7 141.9 177.4 137.2 178.2 135.5C178.5 134.9 178.7 134.2 178.8 133.5C178.9 132.8 178.8 132.1 178.6 131.4C178.3 130.7 178 130.1 177.5 129.6ZM171.1 141.9C170.9 142.1 170.7 142.2 170.4 142.3C170.1 142.4 169.9 142.4 169.6 142.4C169.3 142.4 169.1 142.3 168.9 142.2C168.7 142.1 168.5 141.9 168.3 141.7C168.1 141.5 168 141.3 167.9 141C167.8 140.7 167.8 140.5 167.8 140.2C167.8 140.1 167.8 140 167.9 139.9L171.3 141.7C171.3 141.7 171.2 141.8 171.1 141.9ZM177.3 135.1C177 135.7 175.1 140 175.6 142.7L164.6 137C167 135.8 169.2 131.6 169.5 131C169.8 130.5 170.1 130 170.6 129.7C171 129.3 171.6 129 172.1 128.9C173.2 128.5 174.4 128.6 175.5 129.2C176 129.5 176.5 129.8 176.8 130.3C177.2 130.7 177.5 131.2 177.6 131.8C177.8 132.4 177.8 132.9 177.8 133.5C177.7 134 177.6 134.6 177.3 135.1Z"
        fill="currentColor"
      />
      <path
        d="M194.7 63.9002L189.1 62.3002L190.7 56.7002C190.8 56.4002 190.6 56.2002 190.4 56.1002C190.1 56.0002 189.9 56.2002 189.8 56.4002L188.2 62.0002L182.6 60.4002C182.3 60.3002 182.1 60.5002 182 60.7002C181.9 61.0002 182.1 61.2002 182.3 61.3002L187.9 62.9002L186.3 68.5002C186.2 68.8002 186.4 69.0002 186.6 69.1002H186.7C186.9 69.1002 187.1 69.0002 187.2 68.7002L188.8 63.1002L194.4 64.7002H194.5C194.7 64.7002 194.9 64.6002 195 64.3002C195.1 64.2002 194.9 63.9002 194.7 63.9002Z"
        fill="currentColor"
      />
      <path
        d="M93.3001 145C91.6001 144.2 89.8001 144 88.0001 144.3C86.2001 144.6 84.5001 145.4 83.2001 146.7C81.4001 148.4 80.4001 150.7 80.3001 153.2C80.3001 153.7 80.3001 154.1 80.4001 154.6C79.9001 154.8 79.5001 155.1 79.2001 155.4C78.7001 155.9 78.3001 156.6 78.2001 157.4C78.1001 158.1 78.1001 158.9 78.4001 159.6C78.7001 160.3 79.2001 160.9 79.8001 161.3C80.4001 161.7 81.1001 161.9 81.9001 161.9C82.7001 161.9 83.4001 161.7 84.0001 161.2C84.1001 161.1 84.2001 161.1 84.2001 161C85.2001 161.7 86.3001 162.2 87.4001 162.5C88.1001 162.7 88.8001 162.7 89.5001 162.7C90.6001 162.7 91.7001 162.5 92.8001 162.1C94.5001 161.5 96.0001 160.3 97.1001 158.8C98.2001 157.3 98.8001 155.5 98.8001 153.7C98.9001 151.9 98.4001 150.1 97.4001 148.5C96.4001 146.9 95.0001 145.7 93.3001 145ZM96.2001 158.2C95.2001 159.5 93.9001 160.5 92.4001 161.1C90.9001 161.7 89.2001 161.8 87.6001 161.4C86.6001 161.2 85.7001 160.7 84.8001 160.2C85.0001 160 85.1001 159.7 85.2001 159.4C85.5001 158.7 85.6001 157.9 85.4001 157.2C85.3001 156.7 85.1001 156.2 84.8001 155.8C84.5001 155.4 84.2001 155 83.7001 154.8C83.3001 154.5 82.8001 154.3 82.3001 154.2C81.9001 154.1 81.5001 154.1 81.1001 154.2C81.1001 153.8 81.0001 153.5 81.1001 153.1C81.2001 150.9 82.1001 148.8 83.7001 147.3C84.9001 146.2 86.4001 145.4 88.0001 145.2C89.6001 144.9 91.3001 145.2 92.8001 145.8C94.3001 146.5 95.5001 147.6 96.4001 149C97.3001 150.4 97.7001 152 97.6001 153.6C97.7001 155.3 97.1001 156.9 96.2001 158.2Z"
        fill="currentColor"
      />
    </svg>
  </SvgIcon>
)

export default NewsletterImage
