import { FC } from 'react'

import { SvgIcon, SvgIconProps } from '@mui/material'

const MarketingTargetImage: FC<SvgIconProps> = ({ sx, ...props }) => (
  <SvgIcon sx={{ fontSize: 200, color: 'primary.dark', ...sx }} {...props}>
    <svg
      width="200"
      height="200"
      viewBox="0 0 200 200"
      fill="none"
      xmlns="http://www.w3.org/2000/svg"
    >
      <path
        d="M82.9999 80.8002C82.7999 80.8002 82.4999 80.9002 82.3999 81.1002C82.1999 81.3002 82.1999 81.5002 82.1999 81.8002C82.1999 81.9002 82.1999 82.0002 82.2999 82.2002C82.3999 82.3002 82.3999 82.4002 82.4999 82.5002C82.5999 82.6002 82.6999 82.6002 82.7999 82.7002C82.8999 82.7002 82.9999 82.8002 83.1999 82.7002C83.2999 82.7002 83.3999 82.7002 83.5999 82.6002C83.6999 82.5002 83.7999 82.5002 83.8999 82.4002C83.9999 82.3002 83.9999 82.2002 84.0999 82.1002C84.0999 82.0002 84.0999 81.9002 84.0999 81.7002C84.0999 81.5002 83.9999 81.2002 83.7999 81.1002C83.4999 80.8002 83.2999 80.7002 82.9999 80.8002Z"
        fill="currentColor"
      />
      <path
        d="M139.6 68.5002C139.4 68.5002 139.1 68.6002 139 68.8002C138.8 69.0002 138.8 69.2002 138.8 69.5002C138.8 69.6002 138.8 69.7002 138.9 69.9002C139 70.0002 139 70.1002 139.1 70.2002C139.2 70.3002 139.3 70.3002 139.4 70.4002C139.5 70.4002 139.6 70.5002 139.8 70.4002C139.9 70.4002 140 70.4002 140.2 70.3002C140.3 70.2002 140.4 70.2002 140.5 70.1002C140.6 70.0002 140.6 69.9002 140.7 69.8002C140.7 69.7002 140.7 69.6002 140.7 69.4002C140.7 69.2002 140.5 68.9002 140.4 68.8002C140.1 68.6002 139.8 68.5002 139.6 68.5002Z"
        fill="currentColor"
      />
      <path
        d="M122.7 178.1L117.7 178.5L117.3 173.6C117.3 173.3 117 173.1 116.8 173.1C116.5 173.1 116.3 173.4 116.3 173.6L116.7 178.5L111.7 178.9C111.4 178.9 111.2 179.2 111.2 179.4C111.2 179.7 111.4 179.9 111.7 179.9L116.7 179.5L117.1 184.5C117.1 184.8 117.3 185 117.6 185C117.9 185 118.1 184.7 118.1 184.5L117.7 179.5L122.7 179.1C123 179.1 123.2 178.8 123.2 178.6C123.2 178.3 123 178.1 122.7 178.1Z"
        fill="currentColor"
      />
      <path
        d="M19.9999 91.9002C19.7999 91.5002 19.4999 91.2002 19.1999 90.9002C18.8999 90.6002 18.4999 90.4002 18.0999 90.3002C17.6999 90.2002 17.1999 90.1002 16.7999 90.2002C16.0999 90.3002 15.4999 90.5002 14.9999 90.9002C14.4999 91.3002 14.0999 91.9002 13.8999 92.5002C13.6999 93.1002 13.6999 93.8002 13.8999 94.4002C14.0999 95.0002 14.3999 95.6002 14.9999 96.0002C15.4999 96.4002 16.0999 96.7002 16.7999 96.8002C16.8999 96.8002 16.9999 96.8002 17.1999 96.8002C17.6999 96.8002 18.2999 96.7002 18.6999 96.4002C19.2999 96.1002 19.7999 95.6002 20.0999 95.1002C20.3999 94.6002 20.5999 93.9002 20.4999 93.2002C20.3999 92.7002 20.1999 92.3002 19.9999 91.9002ZM19.3999 93.2002C19.3999 93.7002 19.2999 94.1002 19.0999 94.5002C18.8999 94.9002 18.4999 95.2002 18.0999 95.4002C17.6999 95.6002 17.1999 95.7002 16.7999 95.6002C16.2999 95.6002 15.8999 95.4002 15.5999 95.1002C15.1999 94.8002 14.9999 94.4002 14.8999 94.0002C14.7999 93.6002 14.7999 93.1002 14.8999 92.7002C14.9999 92.3002 15.2999 91.9002 15.6999 91.6002C16.0999 91.3002 16.4999 91.1002 16.8999 91.1002C16.9999 91.1002 16.9999 91.1002 17.0999 91.1002C17.2999 91.1002 17.5999 91.1002 17.7999 91.2002C18.0999 91.3002 18.3999 91.4002 18.5999 91.6002C18.7999 91.8002 18.9999 92.0002 19.1999 92.3002C19.2999 92.6002 19.3999 92.9002 19.3999 93.2002Z"
        fill="currentColor"
      />
      <path
        d="M77.5999 23.1002C77.6999 23.2002 77.7999 23.3002 77.9999 23.3002C77.9999 23.3002 77.9999 23.3002 78.0999 23.3002C78.2999 23.3002 78.3999 23.2002 78.4999 23.0002L81.8999 15.7002C81.9999 15.4002 81.8999 15.2002 81.6999 15.0002C81.3999 14.9002 81.1999 15.0002 80.9999 15.2002L77.8999 21.8002L74.4999 18.0002C74.2999 17.8002 73.9999 17.8002 73.7999 17.9002C73.5999 18.1002 73.5999 18.4002 73.6999 18.6002L77.5999 23.1002Z"
        fill="currentColor"
      />
      <path
        d="M194.5 97.2002L190.7 97.5002C189.9 97.6002 189.1 97.3002 188.4 96.8002C187.8 96.3002 187.4 95.5002 187.3 94.7002L187 90.9002C187 90.6002 186.7 90.4002 186.5 90.4002C186.2 90.4002 186 90.7002 186 90.9002L186.3 94.7002C186.4 95.5002 186.1 96.3002 185.6 97.0002C185.1 97.6002 184.3 98.0002 183.5 98.1002L179.7 98.4002C179.4 98.4002 179.2 98.7002 179.2 98.9002C179.2 99.2002 179.4 99.4002 179.7 99.4002L183.5 99.1002C184.3 99.0002 185.1 99.3002 185.8 99.8002C186.4 100.3 186.8 101.1 186.9 101.9L187.2 105.7C187.2 106 187.4 106.2 187.7 106.2C188 106.2 188.2 105.9 188.2 105.7L187.9 101.9C187.8 101.1 188.1 100.3 188.6 99.6002C189.1 99.0002 189.9 98.6002 190.7 98.5002L194.5 98.2002C194.8 98.2002 195 97.9002 195 97.7002C195 97.4002 194.7 97.2002 194.5 97.2002ZM187.9 99.0002C187.6 99.3002 187.4 99.6002 187.3 100C187.1 99.7002 186.8 99.4002 186.5 99.1002C186.2 98.8002 185.9 98.6002 185.5 98.5002C185.8 98.3002 186.1 98.0002 186.4 97.7002C186.7 97.4002 186.9 97.1002 187 96.7002C187.2 97.0002 187.5 97.3002 187.8 97.6002C188.1 97.9002 188.4 98.1002 188.8 98.2002C188.4 98.4002 188.1 98.7002 187.9 99.0002Z"
        fill="currentColor"
      />
      <path
        d="M179 154.3C179 154.2 179 154.1 178.9 154.1L169.1 138.4C169 138.2 168.7 138.1 168.5 138.2C168.3 138.3 168.1 138.5 168.1 138.7V146.1L154.7 136.1C158.2 130 160.8 123.4 162.2 116.4C165 102.6 163 88.0002 156.8 75.4002C157 75.1002 157.1 74.7002 157 74.3002C156.9 73.8002 156.7 73.3002 156.2 73.0002C156.9 72.6002 157.2 71.8002 157.1 71.1002C157 70.8002 156.9 70.4002 156.7 70.1002L158.3 69.9002L158.4 70.8002C158.4 71.0002 158.5 71.1002 158.7 71.2002C158.8 71.2002 158.9 71.3002 158.9 71.3002C159 71.3002 159.1 71.3002 159.1 71.2002L162.2 69.5002C162.4 69.4002 162.5 69.2002 162.5 69.0002C162.5 68.8002 162.4 68.6002 162.2 68.6002L158.8 67.3002C158.6 67.2002 158.5 67.3002 158.3 67.4002C158.2 67.5002 158.1 67.7002 158.1 67.8002L158.2 68.9002L156.5 69.1002C156.7 68.7002 156.7 68.3002 156.6 67.9002C156.5 67.3002 156.1 66.7002 155.5 66.4002C155.9 65.9002 156 65.3002 155.8 64.8002C155.6 63.9002 154.8 63.0002 153.4 63.3002L152.9 63.4002C152.5 63.5002 152.2 63.5002 151.8 63.6002C151.7 63.4002 151.6 63.2002 151.5 63.1002C148.9 56.9002 145.1 50.0002 142.1 44.0002C140.4 40.7002 139 37.3002 137.7 33.8002C136.5 30.3002 135.6 26.8002 135.1 23.2002C135.1 23.0002 135 22.9002 135 22.8002C134.9 22.7002 134.8 22.5002 134.7 22.5002C134.5 22.4002 134.3 22.3002 134.1 22.3002C133.9 22.3002 133.6 22.3002 133.4 22.5002C133.2 22.6002 133 22.8002 132.9 23.0002C132.8 23.2002 132.8 23.4002 132.8 23.7002C133.1 25.6002 133.6 27.4002 134.1 29.3002C134.6 30.8002 135.1 32.4002 135.6 33.9002L122.7 44.7002C118.4 43.0002 113.8 41.8002 109.1 41.0002C93.6999 38.6002 78.0999 41.9002 64.9999 50.3002C60.4999 53.2002 56.4999 56.5002 52.8999 60.3002L51.1999 59.1002L45.6999 42.5002C45.6999 42.4002 45.5999 42.3002 45.4999 42.3002L27.1999 28.0002C27.0999 27.9002 27.0999 27.9002 26.9999 27.8002L17.9999 21.1002C17.7999 21.0002 17.5999 21.0002 17.3999 21.1002C17.1999 21.2002 17.0999 21.5002 17.1999 21.7002L22.5999 37.9002L5.49992 37.3002C5.29992 37.3002 5.09992 37.4002 4.99992 37.6002C4.89992 37.8002 4.99992 38.0002 5.19992 38.2002L32.9999 58.9002C33.0999 59.0002 33.1999 59.0002 33.2999 59.0002L50.9999 59.7002L52.3999 60.7002C45.7999 67.9002 40.9999 76.5002 38.1999 86.0002C33.8999 100.8 35.0999 116.6 41.5999 130.5C38.0999 132.2 34.6999 134.1 31.5999 136.3C31.3999 136.4 31.3999 136.6 31.3999 136.8C31.3999 137 31.5999 137.1 31.7999 137.2C33.0999 137.5 34.5999 137.8 36.2999 138C39.0999 138.4 42.3999 138.6 46.1999 138.8C49.7999 144.3 54.1999 149.2 59.3999 153.4C69.4999 161.6 81.7999 166.5 94.7999 167.5C96.4999 167.6 98.1999 167.7 99.7999 167.7C110.9 167.7 121.8 164.8 131.6 159.2C131.7 159.3 131.8 159.4 131.9 159.5C133 160.8 134.1 162.2 135.4 163.6C138.6 167.3 142.2 170.6 146.1 173.6C146.2 173.7 146.3 173.7 146.4 173.7C146.5 173.7 146.6 173.7 146.6 173.6C146.8 173.5 146.9 173.3 146.9 173.1C146.4 167.2 144.9 162.1 143 156C142.8 155.4 142.6 154.8 142.4 154.1C142.2 153.4 141.9 152.6 141.7 151.9C146.7 147.5 151 142.4 154.4 136.7L167.8 146.7L160.2 149.3C160 149.4 159.9 149.6 159.9 149.8C159.9 150 160.1 150.2 160.3 150.3L178.5 154.7H178.8L178.9 154.6C178.9 154.6 178.9 154.6 179 154.5C179 154.5 179 154.4 179 154.3ZM160.9 69.0002L159.4 69.8002L159.3 68.4002L160.9 69.0002ZM16.2999 45.2002L32.1999 45.6002L40.2999 51.6002L24.2999 51.1002L16.2999 45.2002ZM32.7999 44.8002L27.7999 29.7002L35.8999 35.7002L40.8999 50.8002L32.7999 44.8002ZM18.5999 22.9002L26.2999 28.7002L31.2999 43.8002L23.6999 38.1002L18.5999 22.9002ZM33.4999 58.0002L25.6999 52.2002L41.6999 52.7002L49.5999 58.5002L33.4999 58.0002ZM149.7 98.7002C149.4 100.2 149 101.9 148.7 103.5L146.9 102.8C146.8 101.8 146.5 100.9 146.2 100C145.6 98.6002 144.7 97.3002 143.6 96.3002C142.5 95.3002 141.1 94.5002 139.6 94.1002C139.5 94.1002 139.4 94.1002 139.4 94.0002C138.3 89.7002 136.6 85.6002 134.2 81.9002L144.3 80.1002C144.5 80.1002 144.7 79.9002 144.7 79.7002C144.8 79.2002 144.8 78.7002 144.9 78.2002C146.1 78.0002 147.4 77.8002 148.7 77.6002C150.5 77.3002 152.3 77.1002 153.7 76.8002C153 83.4002 151.1 91.9002 149.7 98.7002ZM146 104.4C145.4 119.6 143.6 135 142.3 145.3C141.1 145.6 139.8 145.8 138.6 145.9C138.4 145.9 138.2 145.9 138.1 145.9C137.7 145.9 137.3 145.9 137 146C136.7 146 136.5 146 136.2 146C136 146 135.7 146 135.5 146V145.4C135.5 145.1 135.3 144.9 135 144.9C134.7 144.9 134.5 145.1 134.5 145.4V146C134.3 146 134.1 146 133.9 145.9C133.7 145.9 133.5 145.9 133.3 145.8C132.9 145.8 132.6 145.7 132.2 145.6C132.1 145.6 132 145.6 131.9 145.5C131.1 145.4 130.3 145.2 129.5 145C128.7 144.8 127.9 144.6 127.2 144.3C127.4 140.6 127.6 136.9 127.7 133.5C127.8 132.1 127.8 130.7 127.9 129.3C128.1 125.1 128.3 121.1 128.5 117.8L128.6 117.7C129.6 117.3 130.4 117 131.1 116.7C131.4 116.6 131.5 116.3 131.4 116C131.3 115.7 131 115.6 130.7 115.7C130 116 129.2 116.3 128.2 116.7L127.8 116.9C119.6 120.1 112.6 122.1 106.8 123C98.0999 124.3 92.4999 122.8 89.3999 118.4C85.6999 113.1 86.9999 104.9 89.5999 101.8L95.2999 101L95.5999 103.7C95.5999 104 95.7999 104.2 96.0999 104.2C96.3999 104.2 96.5999 103.9 96.4999 103.7L96.1999 101L109.5 99.0002V99.1002C108.3 99.4002 107.1 99.7002 105.9 100.1C105.6 100.2 105.5 100.5 105.6 100.7C105.7 100.9 105.9 101.1 106.1 101.1H106.2C107.5 100.7 108.8 100.4 110.1 100C115.8 98.5002 121.6 97.2002 127.4 96.1002L145.9 103.6C146 103.8 146 104.1 146 104.4ZM59.9999 135L63.0999 136H63.1999C63.3999 136 63.5999 135.9 63.6999 135.6C63.7999 135.3 63.5999 135.1 63.3999 135L60.3999 134C60.6999 133.2 60.9999 132.4 61.3999 131.7C61.3999 131.6 61.4999 131.5 61.4999 131.5C62.3999 129.7 63.5999 128.1 65.0999 126.5L85.7999 133.6C85.8999 133.6 86.0999 133.6 86.1999 133.6C86.2999 133.5 86.3999 133.4 86.3999 133.3L88.9999 120C90.9999 122.4 93.4999 123.6 96.2999 124.2L97.3999 124.5L96.7999 127C96.6999 127.3 96.8999 127.5 97.1999 127.6H97.2999C97.4999 127.6 97.6999 127.4 97.7999 127.2L98.3999 124.7L106.8 126.7L101.7 146.8C101.3 148.2 100.7 149.5 99.7999 150.6C98.8999 151.7 97.7999 152.6 96.4999 153.3C95.1999 154 93.7999 154.4 92.3999 154.4C90.9999 154.5 89.4999 154.3 88.1999 153.8L58.7999 142.6C58.8999 139.7 59.2999 137.2 59.9999 135ZM75.8999 72.8002C78.6999 76.1002 79.7999 80.3002 79.1999 85.4002L64.1999 90.0002C63.8999 90.1002 63.7999 90.4002 63.8999 90.6002C63.9999 90.8002 64.2999 91.0002 64.4999 90.9002L79.7999 86.2002H79.8999L86.0999 84.3002C86.2999 84.2002 86.3999 84.1002 86.3999 83.9002C86.4999 83.2002 86.5999 82.6002 86.5999 81.9002C88.0999 81.8002 90.0999 81.6002 91.7999 81.5002L102.6 85.8002C103.3 89.9002 103.5 94.0002 103.6 98.6002L95.4999 99.8002C95.4999 99.8002 95.4999 99.8002 95.3999 99.8002L89.3999 100.7L88.2999 96.0002L89.2999 90.6002C89.2999 90.4002 89.2999 90.3002 89.1999 90.2002C89.0999 90.1002 88.9999 90.0002 88.7999 90.0002L86.4999 90.2002L61.9999 92.2002C60.9999 92.3002 60.0999 92.2002 59.0999 91.9002C58.1999 91.6002 57.2999 91.1002 56.5999 90.5002C55.8999 89.9002 55.1999 89.1002 54.7999 88.2002C54.2999 87.3002 54.0999 86.4002 53.9999 85.4002C53.5999 80.7002 57.2999 78.4002 60.4999 77.4002L75.8999 72.8002ZM151.6 66.9002L151.8 68.1002C151.8 68.2002 151.8 68.4002 151.6 68.5002C151.2 68.6002 150.3 68.0002 149.7 65.9002V65.8002C149.6 65.5002 149.3 65.4002 149.1 65.5002C148.8 65.6002 148.7 65.9002 148.8 66.1002V66.2002C149.2 67.6002 149.1 68.8002 148.7 69.9002L143.8 70.4002C143.6 69.8002 143.4 69.1002 143.1 68.5002C144.2 68.0002 145.1 66.9002 145.9 65.0002C146.4 63.8002 146.4 63.8002 148.9 63.5002C151.1 63.3002 151.1 63.3002 151.6 66.9002ZM149.3 74.8002C149.4 75.4002 149.7 75.9002 150.3 76.2002C149.7 76.3002 149.1 76.4002 148.5 76.5002C147.2 76.7002 146 76.9002 144.9 77.1002C144.9 75.2002 144.7 73.3002 144.1 71.3002L148 70.9002C147.7 71.3002 147.3 71.6002 146.8 71.9002C146.6 72.0002 146.5 72.3002 146.6 72.6002C146.7 72.8002 146.9 72.9002 147 72.9002C147.1 72.9002 147.2 72.9002 147.2 72.8002C148.1 72.3002 148.8 71.6002 149.2 70.8002H149.3C149.1 71.1002 149 71.5002 149.1 71.9002C149.2 72.4002 149.5 73.0002 150 73.3002C149.5 73.6002 149.3 74.2002 149.3 74.8002ZM104.5 98.6002C104.4 94.3002 104.2 90.3002 103.6 86.4002L109.1 88.6002C109.1 88.9002 109.1 89.2002 109.1 89.6002C109.1 89.7002 109.1 89.7002 109.1 89.8002C109.2 91.8002 109.2 94.6002 109.3 98.0002L104.5 98.6002ZM116.2 97.3002C114.9 94.1002 112.9 91.4002 110.1 89.4002C110.1 89.3002 110.1 89.1002 110.1 89.0002L125.7 95.3002C122.5 95.9002 119.4 96.6002 116.2 97.3002ZM110.1 87.9002C110.1 87.1002 110.1 86.5002 110.1 86.1002L111 86.0002L116.7 85.0002L133 82.0002C135.4 85.6002 137.1 89.5002 138.2 93.7002C137.1 93.5002 136 93.5002 135 93.7002C132.5 94.1002 130 94.5002 127.5 95.0002L110.1 87.9002ZM116.6 83.9002L109.6 82.8002C109.5 82.8002 109.3 82.8002 109.2 82.9002C109.1 83.0002 109 83.1002 109 83.3002L109.1 85.7002C109.1 85.8002 109.1 86.4002 109.1 87.5002L103.5 85.2002C103 82.2002 102.2 79.1002 101.1 75.9002L136.8 72.1002C137.6 74.7002 137.9 77.4002 137.6 80.2002L116.6 83.9002ZM85.3999 83.5002L80.1999 85.1002C80.6999 80.1002 79.5999 75.9002 76.8999 72.5002L82.2999 70.9002C84.4999 74.1002 85.5999 77.8002 85.4999 81.6002C85.5999 82.2002 85.4999 82.9002 85.3999 83.5002ZM84.7999 73.1002C85.6999 72.5002 86.3999 71.7002 86.7999 70.7002C87.2999 69.7002 87.2999 69.7002 89.5999 69.7002C91.3999 69.7002 91.4999 69.8002 91.5999 70.8002C91.5999 70.9002 91.5999 70.9002 91.6999 71.0002C91.6999 71.0002 91.6999 71.0002 91.6999 71.1002C91.6999 71.1002 91.6999 71.1002 91.7999 71.1002C91.7999 71.1002 91.7999 71.1002 91.8999 71.1002C91.8999 71.1002 91.9999 71.1002 91.9999 71.2002H92.0999C92.0999 71.2002 92.0999 71.2002 92.1999 71.2002C92.7999 71.1002 93.2999 71.1002 93.7999 71.0002H93.9999C94.5999 70.9002 94.8999 71.4002 94.8999 71.8002C94.8999 71.9002 94.9999 72.5002 94.3999 72.6002H94.1999C94.0999 72.6002 94.0999 72.6002 93.9999 72.6002C93.6999 72.6002 93.4999 72.9002 93.5999 73.2002C93.5999 73.5002 93.8999 73.7002 94.1999 73.6002C94.2999 73.6002 94.4999 73.6002 94.5999 73.6002C95.1999 73.7002 95.3999 74.1002 95.3999 74.5002C95.3999 74.7002 95.3999 75.2002 94.7999 75.2002C94.4999 75.2002 94.2999 75.3002 93.9999 75.3002C93.6999 75.3002 93.4999 75.5002 93.4999 75.8002C93.4999 76.1002 93.6999 76.3002 93.9999 76.3002C93.9999 76.3002 94.2999 76.3002 94.3999 76.3002C95.0999 76.3002 95.3999 76.7002 95.3999 77.1002C95.3999 77.2002 95.3999 77.7002 94.7999 77.8002C94.5999 77.8002 94.0999 77.9002 94.0999 77.9002C93.7999 77.9002 93.5999 78.1002 93.5999 78.4002C93.5999 78.7002 93.7999 78.9002 94.0999 78.9002C94.7999 78.9002 94.9999 79.3002 94.9999 79.7002C94.9999 79.8002 94.9999 80.3002 94.3999 80.4002C94.1999 80.4002 89.5999 80.8002 86.5999 81.0002C86.5999 78.2002 85.9999 75.5002 84.7999 73.1002ZM95.3999 68.4002C95.4999 68.5002 95.4999 68.4002 95.3999 68.4002L97.8999 70.5002C97.9999 70.8002 98.0999 71.0002 98.1999 71.3002C98.4999 72.0002 98.8999 72.6002 99.4999 73.1002C98.9999 73.4002 98.5999 73.6002 97.9999 73.8002C97.3999 74.0002 96.6999 74.0002 95.9999 74.0002C95.8999 73.6002 95.6999 73.2002 95.2999 73.0002C95.5999 72.7002 95.6999 72.2002 95.5999 71.7002C95.4999 70.8002 94.7999 70.0002 93.5999 70.1002H93.4999L95.3999 68.4002ZM135.2 68.5002C135.6 69.4002 136 70.2002 136.3 71.1002L100.6 74.9002C100.5 74.5002 100.3 74.2002 100.2 73.8002C100.3 73.8002 100.3 73.7002 100.4 73.6002C101.1 73.9002 101.9 74.1002 102.7 74.0002C105.8 73.9002 124.9 70.4002 135.2 68.5002ZM142.7 70.4002L137.3 71.0002C137 70.1002 136.6 69.2002 136.2 68.3002C138.7 67.8002 140.6 67.5002 141.4 67.3002C142 68.4002 142.4 69.4002 142.7 70.4002ZM96.0999 75.0002C96.2999 75.0002 96.3999 75.0002 96.5999 75.0002C97.1999 75.0002 97.7999 74.9002 98.3999 74.8002C98.7999 74.7002 99.0999 74.6002 99.3999 74.4002C99.4999 74.6002 99.5999 74.9002 99.6999 75.1002L95.9999 75.5002C95.9999 75.3002 96.0999 75.1002 96.0999 75.0002ZM102.7 73.2002C102 73.3002 101.3 73.1002 100.7 72.8002C100.7 72.8002 100.6 72.8002 100.6 72.7002C99.9999 72.3002 99.4999 71.7002 99.1999 71.0002C98.8999 70.3002 98.5999 69.5002 98.4999 68.8002C99.7999 68.6002 100.8 68.1002 101.3 67.2002C101.8 66.4002 101.9 65.3002 101.7 64.0002C108.5 64.4002 115.1 66.5002 120.9 70.1002C112.6 71.6002 104.5 73.0002 102.7 73.2002ZM100.5 66.6002C100.1 67.3002 99.1999 67.7002 97.8999 67.8002C97.3999 67.8002 96.8999 67.8002 96.3999 67.7002L100.8 64.1002C100.9 65.1002 100.8 66.0002 100.5 66.6002ZM94.4999 81.4002C95.3999 81.3002 95.9999 80.6002 95.9999 79.7002C95.9999 79.3002 95.7999 78.9002 95.5999 78.6002C96.0999 78.3002 96.2999 77.7002 96.2999 77.1002C96.2999 76.9002 96.1999 76.7002 96.0999 76.4002L99.9999 76.0002C101.1 79.1002 101.8 82.0002 102.3 84.8002L93.9999 81.4002C94.2999 81.4002 94.4999 81.4002 94.4999 81.4002ZM137.7 72.0002L143 71.4002C143.8 74.0002 144 76.6002 143.6 79.1002L138.5 80.0002C138.7 77.3002 138.5 74.6002 137.7 72.0002ZM153.2 72.3002C152.7 72.3002 152.2 72.4002 151.6 72.4002C150.8 72.5002 150.3 72.0002 150.2 71.6002C150.2 71.2002 150.4 70.8002 151.1 70.7002C152.3 70.5002 153.2 70.4002 154.1 70.3002L154.9 70.2002C155 70.2002 155 70.2002 155.1 70.2002C155.8 70.2002 156.1 70.7002 156.2 71.1002C156.3 71.5002 156.1 72.0002 155.6 72.1002C154.9 72.2002 154.2 72.2002 153.2 72.3002ZM144.9 64.6002C144.1 66.6002 143.3 67.3002 142.6 67.5002C142.4 67.2002 142.3 66.8002 142.1 66.5002C142 66.3002 141.8 66.2002 141.6 66.2002C141.5 66.2002 139.1 66.7002 135.6 67.3002C135.5 67.3002 135.4 67.3002 135.3 67.3002C131.7 68.0002 127.1 68.8002 122.4 69.7002C116.3 65.6002 109.3 63.3002 102 62.9002L123.1 45.3002C132.4 49.0002 140.7 54.9002 147.3 62.6002C145.9 62.9002 145.5 63.2002 144.9 64.6002ZM93.6999 68.6002C93.5999 67.7002 93.3999 66.6002 92.9999 65.3002C92.8999 65.0002 92.6999 64.8002 92.3999 64.6002C92.3999 64.6002 92.2999 64.6002 92.2999 64.5002C90.7999 63.9002 90.2999 63.1002 90.1999 62.5002C90.1999 62.2002 90.2999 61.9002 90.4999 61.8002C90.6999 61.7002 90.9999 61.7002 91.3999 61.9002C91.9999 62.3002 92.5999 62.5002 92.9999 62.3002C93.4999 62.0002 93.3999 61.4002 93.3999 61.1002C93.1999 59.2002 94.1999 56.6002 95.4999 56.2002C96.4999 55.9002 97.7999 57.1002 99.0999 59.5002C99.3999 60.0002 99.5999 60.5002 99.7999 61.0002C100.1 61.7002 100.4 62.4002 100.5 63.0002L93.6999 68.6002ZM89.4999 65.7002C90.7999 67.1002 91.8999 68.4002 92.2999 69.7002C91.8999 68.6002 90.9999 68.6002 89.4999 68.6002C87.1999 68.6002 86.6999 68.6002 85.8999 70.2002C85.5999 71.0002 84.9999 71.6002 84.2999 72.1002C83.8999 71.4002 83.4999 70.6002 82.9999 69.9002C82.8999 69.7002 82.6999 69.7002 82.4999 69.7002L75.8999 71.7002C79.8999 68.7002 84.3999 66.5002 89.1999 65.2002C89.1999 65.5002 89.3999 65.6002 89.4999 65.7002ZM62.0999 93.2002L86.0999 91.4002L86.1999 92.0002C83.1999 95.4002 81.6999 99.6002 81.6999 104.1C81.7999 108.7 83.5999 112.9 86.6999 116.2C86.9999 117.1 87.4999 118 87.9999 118.8L85.2999 132.4L66.2999 125.9C63.0999 121.1 60.9999 115.7 60.0999 110C59.1999 104.4 59.4999 98.6002 60.9999 93.2002C61.4999 93.3002 61.7999 93.3002 62.0999 93.2002ZM107.8 126.4L108.5 123.8C113.8 122.8 120.1 121 127.2 118.2C127 121.5 126.8 125.3 126.7 129.3C126.6 130.6 126.6 131.9 126.5 133.3C120.2 139.1 112.1 142.7 103.5 143.5L107.8 126.4ZM129.3 95.6002C131.3 95.3002 133.2 94.9002 135.2 94.6002C136.6 94.4002 138 94.5002 139.3 94.9002C140.6 95.3002 141.9 96.0002 142.9 96.9002C143.9 97.8002 144.8 99.0002 145.3 100.3C145.6 100.9 145.8 101.6 145.9 102.3L129.3 95.6002ZM155.5 75.2002C154.9 75.3002 154.2 75.3002 153.3 75.4002C152.8 75.4002 152.2 75.5002 151.6 75.5002C150.8 75.6002 150.4 75.1002 150.3 74.7002C150.3 74.4002 150.5 74.0002 151.2 73.9002C152.4 73.7002 153.4 73.6002 154.3 73.5002L154.9 73.4002C155 73.4002 155 73.4002 155.1 73.4002C155.8 73.4002 156.1 73.8002 156.2 74.3002C156.2 74.4002 156.2 74.7002 156 74.9002C155.8 75.1002 155.7 75.1002 155.5 75.2002ZM155.1 69.0002C154.5 69.2002 153.7 69.2002 152.8 69.3002C152.5 69.3002 152.2 69.4002 151.9 69.4002L150.9 69.5002C150.8 69.5002 150.6 69.5002 150.5 69.4002C150.3 69.3002 150.2 69.2002 150.1 69.0002C150 68.9002 150 68.7002 150 68.6002C150.6 69.3002 151.3 69.5002 151.8 69.4002C152.5 69.3002 152.9 68.6002 152.8 67.9002L152.7 67.3002C152.8 67.3002 153 67.3002 153.1 67.2002C153.5 67.1002 154 67.1002 154.4 67.0002C155.2 66.9002 155.6 67.4002 155.7 67.8002C155.8 68.4002 155.7 68.9002 155.1 69.0002ZM153.2 64.2002L153.7 64.1002C154.4 64.0002 154.8 64.4002 154.9 64.9002C155 65.2002 154.9 65.8002 154.4 65.9002C153.8 66.1002 153.1 66.2002 152.5 66.3002C152.4 65.5002 152.3 64.9002 152.2 64.4002C152.6 64.4002 152.9 64.3002 153.2 64.2002ZM136.2 34.5002C137.5 37.9002 139.1 41.3002 141 44.5002C144.1 50.3002 147.9 56.7002 150.8 62.6002C150.3 62.5002 149.6 62.5002 148.7 62.6002C148.6 62.6002 148.6 62.6002 148.5 62.6002C141.8 54.7002 133.4 48.6002 124 44.7002L136.2 34.5002ZM65.7999 50.7002C78.6999 42.5002 94.0999 39.2002 109.3 41.5002C113.7 42.2002 118 43.3002 122.1 44.9002L101.3 62.2002C101.1 61.7002 100.9 61.1002 100.7 60.5002C100.3 59.2002 99.9999 58.1002 99.6999 56.9002C98.6999 52.8002 97.8999 49.6002 94.5999 49.8002C92.0999 50.0002 88.2999 53.1002 86.5999 56.5002C85.4999 58.7002 85.4999 60.6002 86.4999 62.1002C87.0999 63.0002 87.6999 63.7002 88.2999 64.4002C82.6999 66.0002 77.4999 68.8002 73.0999 72.5002L70.9999 73.3002L53.8999 60.5002C57.3999 56.8002 61.3999 53.5002 65.7999 50.7002ZM39.1999 86.3002C41.8999 76.9002 46.7999 68.4002 53.2999 61.3002L69.8999 73.6002L60.1999 76.5002C55.0999 78.1002 52.6999 81.3002 53.0999 85.5002C53.1999 86.6002 53.4999 87.7002 53.9999 88.7002C54.4999 89.7002 55.1999 90.5002 56.0999 91.3002C56.9999 92.0002 57.8999 92.5002 58.9999 92.9002C59.3999 93.0002 59.8999 93.1002 60.2999 93.2002C58.7999 98.7002 58.4999 104.6 59.3999 110.2C60.2999 115.6 62.1999 120.8 65.0999 125.4C64.8999 125.4 64.7999 125.4 64.6999 125.5C63.8999 126.3 63.1999 127.1 62.5999 128C61.2999 127.4 59.9999 126.8 58.6999 126.3H58.5999C57.3999 125.8 56.1999 125.4 54.9999 125.1C54.8999 125.1 54.7999 125.1 54.5999 125.1C53.0999 125.8 51.3999 126.5 49.6999 127.2C48.0999 127.9 46.2999 128.5 44.4999 129.3C43.8999 129.6 43.2999 129.9 42.6999 130.1C36.0999 116.4 34.9999 100.9 39.1999 86.3002ZM44.6999 130.2C46.4999 129.4 48.1999 128.7 49.8999 128.1C51.5999 127.4 53.2999 126.7 54.6999 126.1C55.3999 126.3 56.1999 126.6 56.8999 126.8C55.7999 127.3 54.5999 127.7 53.3999 128.2C51.7999 128.9 50.0999 129.5 48.2999 130.3C43.9999 132.1 39.8999 134.4 36.0999 137C34.9999 136.9 33.9999 136.7 33.0999 136.5C36.6999 134.1 40.6999 132 44.6999 130.2ZM94.7999 166.5C81.9999 165.5 69.8999 160.7 59.9999 152.6C55.0999 148.7 50.8999 144 47.3999 138.8C47.9999 138.8 48.5999 138.8 49.1999 138.8C49.8999 138.8 50.5999 138.8 51.2999 138.8C53.5999 138.8 55.8999 138.8 58.0999 139.2C57.8999 140.3 57.7999 141.5 57.7999 142.8C57.7999 143 57.8999 143.2 58.0999 143.3L87.8999 154.6C89.1999 155.1 90.4999 155.3 91.8999 155.3C92.0999 155.3 92.2999 155.3 92.5999 155.3C94.1999 155.2 95.6999 154.8 97.0999 154.1C98.4999 153.4 99.6999 152.4 100.7 151.1C101.7 149.9 102.4 148.4 102.8 146.9L103.4 144.5C111.9 143.8 120.1 140.3 126.6 134.7C126.4 137.9 126.3 141.2 126.1 144.7C126.1 144.9 126.2 145.1 126.4 145.2C127.2 145.5 128 145.8 128.8 146C128.6 147.5 128.4 148.9 128.3 150.4V150.5C128.2 152 128.2 153.6 128.2 155.1C128.2 155.2 128.3 155.3 128.3 155.4C129.2 156.3 130.1 157.4 131 158.5C119.8 164.7 107.4 167.5 94.7999 166.5ZM136.1 163C134.8 161.6 133.7 160.2 132.6 158.9C131.4 157.4 130.2 156 129.1 154.8C129.1 153.7 129.1 152.7 129.2 151.6C129.9 152.5 130.7 153.4 131.5 154.4C132.6 155.7 133.8 157.1 135.1 158.6C138.1 162.1 141.5 165.2 145.2 168.1C145.5 169.4 145.7 170.8 145.8 172.2C142.2 169.4 139 166.4 136.1 163ZM141.3 151C140.9 149.6 140.6 148.1 140.5 146.7C141.3 146.6 142.1 146.4 142.9 146.2C143.1 146.2 143.3 146 143.3 145.8C144.6 135.4 146.5 119.8 147 104.4C147 104.2 147 104 147 103.8L148.5 104.4C148.1 106.3 147.8 108.2 147.5 109.9C146.9 113.8 147 117.8 147.7 121.7C147.7 121.8 147.8 121.9 147.9 122.1C148 122.2 148.1 122.3 148.2 122.4C148.3 122.5 148.4 122.5 148.6 122.5C148.7 122.5 148.9 122.5 149 122.5C149.2 122.4 149.5 122.3 149.6 122C149.7 121.8 149.8 121.5 149.7 121.3C148.9 117.6 148.8 113.9 149.2 110.2C149.6 106.5 150.4 102.5 151 98.9002C152.2 92.0002 153.8 83.5002 154.3 76.5002C154.7 76.4002 155.1 76.3002 155.4 76.2002C155.5 76.2002 155.6 76.2002 155.7 76.1002C155.9 76.1002 156 76.0002 156.1 76.0002C162.2 88.4002 164 102.6 161.3 116.1C158.7 129.5 151.5 141.9 141.3 151Z"
        fill="currentColor"
      />
      <path
        d="M97.2999 110.1C96.9999 109.6 96.8999 109.1 96.7999 108.6C96.7999 108.3 96.4999 108.1 96.2999 108.2C95.9999 108.2 95.7999 108.5 95.8999 108.7C95.9999 109.4 96.1999 110 96.4999 110.6C96.7999 111 97.0999 111.4 97.3999 111.8C97.4999 111.9 97.5999 111.9 97.6999 111.9C97.7999 111.9 97.9999 111.8 98.0999 111.7C98.2999 111.5 98.2999 111.2 98.0999 111C97.7999 110.8 97.4999 110.5 97.2999 110.1Z"
        fill="currentColor"
      />
      <path
        d="M104.6 111.5L101.5 112.1C101.2 112.2 101.1 112.4 101.1 112.7C101.1 112.9 101.4 113.1 101.6 113.1H101.7L104.8 112.5C105.1 112.4 105.2 112.2 105.2 111.9C105.1 111.6 104.8 111.4 104.6 111.5Z"
        fill="currentColor"
      />
      <path
        d="M126.4 107.2C126.1 107.3 126 107.5 126 107.8C126 108 126.3 108.2 126.5 108.2H126.6L129.7 107.6C130 107.5 130.1 107.3 130.1 107C130 106.7 129.8 106.6 129.5 106.6L126.4 107.2Z"
        fill="currentColor"
      />
      <path
        d="M112.9 109.9L109.8 110.5C109.5 110.6 109.4 110.8 109.4 111.1C109.4 111.3 109.7 111.5 109.9 111.5H110L113.1 110.9C113.4 110.8 113.5 110.6 113.5 110.3C113.5 110 113.2 109.8 112.9 109.9Z"
        fill="currentColor"
      />
      <path
        d="M121.3 108.2L118.2 108.8C117.9 108.9 117.8 109.1 117.8 109.4C117.8 109.6 118.1 109.8 118.3 109.8H118.4L121.5 109.2C121.8 109.1 121.9 108.9 121.9 108.6C121.8 108.4 121.5 108.2 121.3 108.2Z"
        fill="currentColor"
      />
      <path
        d="M133 107.3C133.6 107.4 134.1 107.7 134.6 108.1C134.9 108.3 135.1 108.6 135.3 108.9C135.4 109 135.6 109.1 135.7 109.1C135.8 109.1 135.9 109.1 136 109C136.2 108.8 136.3 108.5 136.1 108.3C135.8 107.9 135.5 107.6 135.2 107.3C134.6 106.8 133.9 106.5 133.2 106.4C132.9 106.3 132.7 106.5 132.6 106.8C132.6 107 132.7 107.3 133 107.3Z"
        fill="currentColor"
      />
      <path
        d="M135.3 136.3C135 136.3 134.8 136.5 134.8 136.8L134.6 140C134.6 140.3 134.8 140.5 135.1 140.5C135.4 140.5 135.6 140.3 135.6 140L135.8 136.8C135.8 136.6 135.6 136.3 135.3 136.3Z"
        fill="currentColor"
      />
      <path
        d="M135.7 127.8C135.4 127.8 135.2 128 135.2 128.3L135 131.5C135 131.8 135.2 132 135.5 132C135.8 132 136 131.8 136 131.5L136.2 128.3C136.2 128.1 136 127.8 135.7 127.8Z"
        fill="currentColor"
      />
      <path
        d="M136 111.3L135.8 114.5C135.8 114.8 136 115 136.3 115C136.6 115 136.8 114.8 136.8 114.5L137 111.3C137 111 136.8 110.8 136.5 110.8C136.2 110.8 136 111.1 136 111.3Z"
        fill="currentColor"
      />
      <path
        d="M136.1 119.3C135.8 119.3 135.6 119.5 135.6 119.8L135.4 123C135.4 123.3 135.6 123.5 135.9 123.5C136.2 123.5 136.4 123.3 136.4 123L136.6 119.8C136.6 119.6 136.4 119.4 136.1 119.3Z"
        fill="currentColor"
      />
      <path
        d="M95.2999 135.8H95.3999C95.5999 135.8 95.7999 135.6 95.8999 135.4L96.5999 132.3C96.6999 132 96.4999 131.8 96.1999 131.7C95.8999 131.6 95.6999 131.8 95.5999 132.1L94.8999 135.2C94.8999 135.5 94.9999 135.7 95.2999 135.8Z"
        fill="currentColor"
      />
      <path
        d="M92.9999 142.3C93.0999 142.3 93.2999 142.3 93.2999 142.2C93.4999 142 93.7999 141.7 93.8999 141.5C94.3999 140.8 94.6999 140.1 94.8999 139.2C94.9999 138.9 94.7999 138.7 94.4999 138.6C94.1999 138.5 93.9999 138.7 93.8999 139C93.6999 139.7 93.4999 140.3 92.9999 140.9C92.7999 141.1 92.6999 141.3 92.4999 141.5C92.2999 141.7 92.2999 142 92.4999 142.2C92.7999 142.2 92.8999 142.3 92.9999 142.3Z"
        fill="currentColor"
      />
      <path
        d="M88.6999 143.3C88.7999 143 88.5999 142.8 88.2999 142.7C88.0999 142.7 87.8999 142.6 87.6999 142.6L84.5999 141.6C84.2999 141.5 84.0999 141.7 83.9999 141.9C83.8999 142.2 84.0999 142.4 84.2999 142.5L87.2999 143.4C87.4999 143.5 87.7999 143.5 87.9999 143.6H88.0999C88.3999 143.7 88.5999 143.6 88.6999 143.3Z"
        fill="currentColor"
      />
      <path
        d="M79.5999 140.1L76.4999 139.1C76.1999 139 75.9999 139.2 75.8999 139.4C75.7999 139.7 75.9999 139.9 76.1999 140L79.2999 141H79.3999C79.5999 141 79.7999 140.9 79.8999 140.6C79.9999 140.4 79.7999 140.1 79.5999 140.1Z"
        fill="currentColor"
      />
      <path
        d="M71.4999 137.5L68.3999 136.5C68.0999 136.4 67.8999 136.6 67.7999 136.8C67.6999 137.1 67.8999 137.3 68.0999 137.4L71.1999 138.4H71.2999C71.4999 138.4 71.6999 138.3 71.7999 138C71.8999 137.9 71.6999 137.6 71.4999 137.5Z"
        fill="currentColor"
      />
    </svg>
  </SvgIcon>
)

export default MarketingTargetImage
