import { FC } from 'react'

import { SvgIcon, SvgIconProps } from '@mui/material'

const LoadingImage: FC<SvgIconProps> = ({ sx, ...props }) => (
  <SvgIcon sx={{ fontSize: 200, color: 'primary.dark', ...sx }} {...props}>
    <svg
      width="200"
      height="200"
      viewBox="0 0 200 200"
      fill="none"
      xmlns="http://www.w3.org/2000/svg"
    >
      <path
        d="M71.5001 174.9L167.4 158C167.7 158 167.9 157.7 167.8 157.4L165.9 146.8C165.9 146.7 165.8 146.6 165.7 146.5C165.6 146.4 165.5 146.4 165.3 146.4L69.4001 163.3C69.3001 163.3 69.2001 163.4 69.1001 163.5C69.0001 163.6 69.0001 163.7 69.0001 163.9L70.9001 174.5C71.0001 174.7 71.2001 174.9 71.5001 174.9ZM165.1 147.4L166.8 157.1L71.9001 173.8L70.2001 164.1L165.1 147.4Z"
        fill="currentColor"
      />
      <path
        d="M47.0001 50.7L48.3001 50.5C48.6001 52.1 49.2001 53.7 50.2001 55C51.1001 56.3 52.3001 57.5 53.6001 58.4C52.6001 59.7 51.9001 61.2 51.5001 62.8C51.1001 64.4 51.1001 66.1 51.3001 67.7L50.1001 67.9C49.8001 67.9 49.6001 68.2 49.7001 68.5C49.7001 68.7 50.0001 68.9 50.2001 68.9H50.3001L61.7001 66.9C62.0001 66.9 62.2001 66.6 62.1001 66.3C62.1001 66 61.8001 65.8 61.5001 65.9L60.3001 66.1C60.0001 64.5 59.4001 62.9 58.5001 61.6C57.6001 60.2 56.4001 59.1 55.1001 58.2C56.1001 56.9 56.7001 55.4 57.1001 53.8C57.5001 52.2 57.5001 50.5 57.3001 48.9L58.5001 48.7C58.8001 48.7 59.0001 48.4 58.9001 48.1C58.9001 47.8 58.6001 47.6 58.3001 47.7L46.9001 49.7C46.6001 49.7 46.4001 50 46.5001 50.3C46.5001 50.6 46.7001 50.7 47.0001 50.7ZM57.6001 62.2C58.4001 63.4 59.0001 64.9 59.3001 66.3L52.3001 67.5C52.1001 66 52.1001 64.5 52.5001 63C52.9001 61.5 53.5001 60.1 54.4001 58.9C55.7001 59.8 56.8001 60.9 57.6001 62.2ZM56.2001 49.1C56.4001 50.6 56.4001 52.1 56.0001 53.6C55.6001 55.1 55.0001 56.4 54.1001 57.6C52.9001 56.8 51.8001 55.7 50.9001 54.5C50.1001 53.3 49.5001 51.8 49.2001 50.4L56.2001 49.1Z"
        fill="currentColor"
      />
      <path
        d="M168.9 91.5C168.9 91.7 169.2 91.9 169.4 91.9H169.5L174.5 91C174.8 91 175 90.7 174.9 90.4C174.9 90.1 174.6 89.9 174.3 90L169.3 90.9C169 91 168.8 91.2 168.9 91.5Z"
        fill="currentColor"
      />
      <path
        d="M182.9 89C182.9 89.2 183.2 89.4 183.4 89.4H183.5L188.5 88.5C188.8 88.5 189 88.2 188.9 87.9C188.9 87.6 188.6 87.4 188.3 87.5L183.3 88.4C183 88.5 182.8 88.8 182.9 89Z"
        fill="currentColor"
      />
      <path
        d="M178.1 85.8C178.5 85.7 178.6 85.5 178.6 85.2L177.7 80.2C177.7 79.9 177.4 79.7 177.1 79.8C176.8 79.8 176.6 80.1 176.7 80.4L177.6 85.4C177.7 85.6 177.9 85.8 178.1 85.8Z"
        fill="currentColor"
      />
      <path
        d="M179.6 93.7C179.3 93.7 179.1 94 179.2 94.3L180.1 99.3C180.1 99.5 180.4 99.7 180.6 99.7H180.7C181 99.7 181.2 99.4 181.1 99.1L180.2 94.1C180.1 93.9 179.9 93.7 179.6 93.7Z"
        fill="currentColor"
      />
      <path
        d="M175.2 87.6C175.4 87.6 175.5 87.5 175.6 87.4C175.8 87.2 175.7 86.9 175.5 86.7L171.3 83.8C171.1 83.6 170.8 83.7 170.6 83.9C170.4 84.1 170.5 84.4 170.7 84.6L174.9 87.5C175 87.6 175.1 87.6 175.2 87.6Z"
        fill="currentColor"
      />
      <path
        d="M182.2 92.1C182 92.3 182.1 92.6 182.3 92.8L186.5 95.7C186.6 95.8 186.7 95.8 186.8 95.8C187 95.8 187.1 95.7 187.2 95.6C187.4 95.4 187.3 95.1 187.1 94.9L182.9 92C182.7 91.8 182.4 91.8 182.2 92.1Z"
        fill="currentColor"
      />
      <path
        d="M181.5 86.5C181.7 86.5 181.8 86.4 181.9 86.3L184.8 82.1C185 81.9 184.9 81.6 184.7 81.4C184.5 81.2 184.2 81.3 184 81.5L181.1 85.7C180.9 85.9 181 86.2 181.2 86.4C181.3 86.5 181.4 86.5 181.5 86.5Z"
        fill="currentColor"
      />
      <path
        d="M173.4 98.2C173.6 98.2 173.7 98.1 173.8 98L176.7 93.8C176.9 93.6 176.8 93.3 176.6 93.1C176.4 92.9 176.1 93 175.9 93.2L173 97.4C172.8 97.6 172.9 97.9 173.1 98.1C173.2 98.1 173.3 98.2 173.4 98.2Z"
        fill="currentColor"
      />
      <path
        d="M42.3001 159.2L47.2001 152.3C47.4001 152.1 47.3001 151.8 47.1001 151.6C46.9001 151.4 46.6001 151.5 46.4001 151.7L41.5001 158.6L34.6001 153.7C34.4001 153.5 34.1001 153.6 33.9001 153.8C33.7001 154 33.8001 154.3 34.0001 154.5L40.9001 159.4L36.0001 166.3C35.8001 166.5 35.9001 166.8 36.1001 167C36.2001 167.1 36.3001 167.1 36.4001 167.1C36.6001 167.1 36.7001 167 36.8001 166.9L41.7001 160L48.6001 164.9C48.7001 165 48.8001 165 48.9001 165C49.1001 165 49.2001 164.9 49.3001 164.8C49.5001 164.6 49.4001 164.3 49.2001 164.1L42.3001 159.2Z"
        fill="currentColor"
      />
      <path
        d="M152.7 180.3C151.8 179.7 150.8 179.4 149.8 179.4C149.4 179.4 149.1 179.4 148.7 179.5L149.6 177.9C149.7 177.7 149.7 177.4 149.4 177.2C149.2 177.1 148.9 177.1 148.7 177.4L147.2 180.1V180.4C147.2 180.4 147.2 180.5 147.3 180.5C147.3 180.5 147.3 180.5 147.4 180.6L150.1 182.1C150.2 182.1 150.3 182.2 150.3 182.2C150.5 182.2 150.6 182.1 150.7 181.9C150.8 181.7 150.8 181.4 150.5 181.2L148.7 180.2C149 180.1 149.4 180.1 149.7 180.1C150.5 180.1 151.4 180.3 152.1 180.8C152.8 181.3 153.4 181.9 153.7 182.7C154 183.5 154.1 184.3 153.9 185.2C153.7 186 153.3 186.8 152.7 187.4C152.3 187.8 151.7 188.2 151.1 188.4C150.5 188.6 149.9 188.7 149.2 188.6C148.6 188.5 148 188.3 147.4 188C146.9 187.7 146.4 187.2 146 186.7C145.5 186 145.3 185.2 145.3 184.3C145.3 184 145.1 183.8 144.8 183.8C144.5 183.8 144.3 184 144.3 184.3C144.3 185.3 144.6 186.4 145.2 187.2C145.6 187.8 146.2 188.4 146.9 188.8C147.6 189.2 148.3 189.4 149.1 189.5C149.3 189.5 149.4 189.5 149.6 189.5C150.2 189.5 150.8 189.4 151.4 189.2C152.1 188.9 152.8 188.5 153.4 188C154.1 187.3 154.6 186.3 154.8 185.3C155 184.3 154.9 183.2 154.5 182.2C154.3 181.7 153.6 180.8 152.7 180.3Z"
        fill="currentColor"
      />
      <path
        d="M194.7 117.4C190.9 115.6 186.5 115.1 181.7 114.6C177.6 114.1 173.4 113.6 169.5 112.3C170.3 110.7 170.3 109.3 170.1 108.4C170 107.9 169.7 107.6 169.4 107.5C165.1 104.1 153.9 96 145.6 90.3C145.9 87.7 146.1 85 146.2 82.4C154.1 80 161.8 77.7 166.7 76.4C167 76.3 167.3 76.2 167.5 75.9C168.1 75.1 168.4 73.6 168.2 71.7C170.6 71.4 173.1 71.3 175.6 71.4C175.8 71.4 176 71.3 176.1 71C179.3 59.8 180.2 46.9 180.4 41.9C180.4 41.7 180.3 41.5 180.1 41.4C179.9 41.3 179.7 41.3 179.6 41.4C174.9 44.6 172.6 48.7 170.6 52.4C169.1 55 167.8 57.4 165.8 59.2C165.2 57.3 164.2 56.3 163.3 56.3C163.2 56.3 163.1 56.3 163.1 56.3C155.1 58.5 148.7 60.3 143.5 61.8C142.5 58.1 141.1 54.5 139.5 51C144 48.6 147.1 43.8 147.1 38.4C147.1 30.5 140.7 24.1 132.8 24.1C128.9 24.1 125.3 25.7 122.7 28.3C114.2 20.7 104 15.2 93.0001 12.4C81.0001 9.19998 68.2001 9.29998 56.2001 12.8C44.2001 16.2 33.3001 22.8 24.6001 31.8C16.0001 40.8 9.90012 52 7.00012 64.1C4.00012 76.2 4.40012 89 7.90012 100.9C11.5001 112.9 18.2001 123.7 27.3001 132.2C36.3001 140.6 47.4001 146.6 59.4001 149.4C59.3001 149.9 59.4001 150.5 59.5001 151L60.6001 157.3C60.6001 157.3 60.6001 157.3 60.6001 157.4C60.6001 157.4 60.6001 157.4 60.6001 157.5L64.4001 179C64.7001 180.6 65.6001 182 67.0001 183C68.1001 183.7 69.3001 184.1 70.5001 184.1C70.9001 184.1 71.2001 184.1 71.6001 184L170.7 166.6C171.9 166.4 173 165.8 173.9 165C174.8 164.1 175.4 163.1 175.7 161.9C175.9 161.1 175.9 160.3 175.7 159.5L170.8 131.6C170.6 130.4 170 129.3 169.2 128.4C168.4 127.5 167.3 126.9 166.1 126.6C165.3 126.4 164.5 126.4 163.7 126.6L122.4 133.9C129.5 127.7 135.4 119.9 139.5 111.4C147.4 116.5 157 122.7 159.5 124.2C159.5 124.2 159.5 124.2 159.6 124.2C159.8 124.3 160.1 124.4 160.4 124.4C160.5 124.4 160.6 124.4 160.8 124.4C161.8 124.2 163 123.3 164 121.9C164.5 122.4 165 122.8 165.4 123.3C166.1 124 166.8 124.8 167.8 125.5C167.9 125.6 168 125.6 168.1 125.6C174.9 125.2 188.5 121.2 194.9 118.3C195.1 118.2 195.2 118 195.2 117.8C195.2 117.6 194.9 117.4 194.7 117.4ZM166 60.3C168.5 58.4 170 55.6 171.6 52.8C173.4 49.4 175.5 45.7 179.4 42.7C179.1 47.5 178.2 59.7 175.3 70.1C172.8 70 170.3 70.1 167.8 70.4H167.6C166.5 70.5 165.4 70.7 164.2 70.9C163.8 69.7 163.5 68.1 163.2 66.2C162.9 64.5 162.8 63.1 162.7 61.9C164 61.6 165 61 166 60.3ZM162.1 57.5C161.5 59.2 161.6 62.2 162.2 66.4C162.9 71 164.1 74.2 165.3 75.5C159.7 77.1 151.4 79.6 142.7 82.2C140.6 82.8 138.5 83.5 136.5 84.1C134.4 84.7 132.3 85.4 130.4 85.9C130.3 85.9 130.2 86 130.1 86.2C129.3 87.8 128.5 89.7 127.6 91.7C122 104.2 113.6 123.2 102.7 124.5C102 124.4 101.2 124.3 100.4 124.2C102.9 123.8 104.1 123.2 104.1 122.4C104.1 121.8 103.5 121.4 102.7 121.4C101.6 121.4 100.1 121.4 98.5001 121.3C94.3001 121.2 92.3001 121.2 92.0001 121.3C91.5001 121.4 90.6001 121.8 89.6001 122.3C90.0001 120.2 90.1001 117.9 89.1001 117.6C88.5001 117.4 88.0001 117.9 87.7001 118.7C87.3001 119.6 86.9001 120.5 86.5001 121.4C84.4001 119.6 82.6001 117.5 81.1001 115.1C85.2001 110.7 86.1001 102.8 84.9001 98.7C88.4001 97.2 96.1001 93.9 99.9001 92.4C97.6001 95.3 95.0001 98.5 92.1001 102.2C91.9001 102.4 92.0001 102.7 92.2001 102.9C92.3001 103 92.4001 103 92.5001 103C92.6001 103 92.8001 102.9 92.9001 102.8C96.3001 98.5 99.2001 94.8 101.8 91.6C101.9 91.6 101.9 91.5 101.9 91.4C102.6 90.6 103.2 89.7 103.8 89C114.6 75.3 117.5 71.7 120.2 70.1C123.1 68.5 126 67.6 162.1 57.5ZM145.3 82.5C145.2 84.8 145.1 87.2 144.8 89.5C141.9 87.5 139.4 85.8 137.8 84.8C139.5 84.3 141.2 83.8 143 83.2C143.7 83 144.5 82.8 145.3 82.5ZM94.0001 126.5C95.9001 127.2 98.4001 128 100.8 128.7C101.5 128.9 102.1 129.1 102.8 129.3C102.2 129.5 100.1 129.8 95.4001 128.8C95.3001 128.7 95.1001 128.6 95.0001 128.5L94.3001 127.9C94.1001 127.7 93.8001 127.7 93.6001 128C93.4001 128.2 93.4001 128.5 93.7001 128.7L94.4001 129.3C95.6001 130.4 96.9001 131.5 98.9001 133C98.2001 132.9 96.5001 132.5 92.7001 130.5C91.2001 129.7 90.0001 131.2 88.9001 132.6L88.4001 133.2C88.1001 133.5 87.9001 133.9 87.6001 134.2C86.4001 135.8 85.4001 137.1 81.7001 137.9C78.7001 138.5 74.1001 139.4 70.5001 140.1C70.4001 140.1 70.4001 140.1 70.3001 140.2C68.6001 140.5 67.1001 140.8 66.1001 140.9C65.9001 139.8 65.7001 138.3 65.6001 136.5C65.5001 133.5 65.6001 131.5 65.9001 130C70.7001 129.8 80.1001 128.7 81.2001 128.6C81.8001 128.5 83.2001 127.6 85.7001 126.1C88.1001 124.6 91.0001 122.8 92.1001 122.6C92.5001 122.5 95.8001 122.6 98.4001 122.7C100 122.7 101.5 122.8 102.6 122.8C102.7 122.8 102.8 122.8 102.9 122.8C102.5 123.1 101.1 123.7 96.4001 123.9C95.6001 123.8 94.9001 123.6 94.3001 123.5C94.0001 123.4 93.8001 123.6 93.7001 123.9C93.6001 124.2 93.8001 124.4 94.1001 124.5C96.1001 125 99.5001 125.5 102.4 125.9C102.5 125.9 102.5 125.9 102.6 125.9C102.6 125.9 102.6 125.9 102.7 125.9C103.2 126 103.7 126 104.2 126.1C103.5 126.5 101.3 126.9 96.0001 126.4C95.4001 126.2 94.9001 126 94.4001 125.8C94.1001 125.7 93.9001 125.8 93.8001 126.1C93.6001 126.1 93.7001 126.4 94.0001 126.5ZM44.7001 85.2C46.4001 84.2 47.9001 83 49.2001 81.7C54.2001 85.8 55.4001 88.6 55.0001 89.8C54.6001 90.8 52.9001 91.2 50.3001 91C50.1001 91 49.8001 91.1 49.8001 91.4C49.7001 91.6 49.9001 91.9 50.1001 92C52.3001 93 54.5001 93.5 56.9001 93.5C57.7001 93.6 58.6001 93.7 59.5001 93.7C60.3001 93.7 61.2001 93.6 62.1001 93.6C60.8001 98.9 56.4001 103.5 49.8001 106.3C50.9001 98.3 48.1001 92.3 46.6001 90.6C46.3001 90.2 46.0001 90.1 45.7001 90.1C44.6001 90.2 43.9001 89.8 43.7001 89.4C43.7001 89.3 43.6001 89.1 43.7001 89C43.8001 88.8 44.3001 88.7 45.0001 88.8C45.7001 88.9 46.0001 88.7 46.1001 88.4C46.4001 87.7 45.6001 86.3 44.7001 85.2ZM63.1001 93.4C67.9001 92.9 73.7001 91.5 80.8001 89.9L82.8001 89.4V90.2C82.8001 90.5 83.0001 90.7 83.3001 90.7C83.6001 90.7 83.8001 90.5 83.8001 90.2V89.1C83.8001 89 83.8001 88.9 83.8001 88.8C83.8001 88.7 83.8001 88.7 83.8001 88.6C83.8001 87 83.9001 84.6 83.9001 83C84.2001 83.2 84.7001 83.5 85.2001 83.7C85.3001 83.7 85.3001 83.8 85.4001 83.8C86.7001 84.3 88.6001 84.6 91.0001 84.8C92.4001 84.9 93.6001 85 94.7001 85C95.5001 85 96.1001 85 96.7001 84.9H96.8001C97.8001 84.8 98.6001 84.6 99.2001 84.4C98.9001 87.2 98.3001 90.9 98.0001 92.1C93.9001 93.8 87.0001 96.6 84.0001 98C72.8001 92.7 70.0001 93.3 65.3001 94.2L64.4001 94.4C64.1001 94.5 63.9001 94.7 64.0001 95C64.1001 95.3 64.3001 95.5 64.6001 95.4L65.5001 95.2C70.0001 94.3 72.8001 93.8 83.6001 98.9C84.8001 102.6 83.9001 110.5 79.9001 114.7C77.7001 115.3 75.3001 115.9 73.1001 116.4C70.7001 115.9 68.4001 115.1 66.2001 114.1C66.3001 113.9 66.4001 113.7 66.5001 113.5C66.6001 113.3 66.5001 113 66.3001 112.8C66.1001 112.7 65.8001 112.8 65.6001 113C65.4001 113.3 65.3001 113.6 65.1001 114L65.0001 114.1V114.2C64.3001 115.6 63.7001 117 63.1001 118.4C63.0001 118.5 63.0001 118.5 63.0001 118.6C61.9001 121.4 60.9001 124.3 60.1001 127.2C58.5001 127.5 57.1001 127.7 56.1001 127.9C55.8001 127.9 55.6001 128.2 55.7001 128.5C55.7001 128.7 56.0001 128.9 56.2001 128.9H56.3001C57.3001 128.7 58.9001 128.5 60.6001 128.2C60.7001 128.2 60.9001 128.2 61.0001 128.1C62.7001 127.8 64.4001 127.5 65.8001 127.3C65.0001 128.6 64.4001 131.1 64.6001 136.2C64.8001 140.3 65.5001 143.2 66.6001 144.6C65.5001 144.6 64.4001 144.6 63.4001 144.6C63.2001 144.6 63.0001 144.6 62.8001 144.6C62.7001 144.6 62.6001 144.6 62.6001 144.6C53.9001 144.7 50.5001 144.6 47.7001 140.8C44.7001 136.7 46.9001 123.8 48.7001 113.5C49.1001 111.3 49.4001 109.2 49.7001 107.3C56.9001 104.4 61.8001 99.3 63.1001 93.4ZM84.9001 40.7C85.0001 39.7 85.2001 39.3 85.3001 39.1C85.4001 39.2 85.6001 39.6 85.6001 40.3L85.7001 41.1C85.8001 42.3 86.0001 44.1 86.4001 46.4C86.4001 47 86.3001 47.4 86.3001 47.8C86.3001 48.1 86.5001 48.3 86.8001 48.3C87.1001 48.3 87.3001 48.1 87.3001 47.8C87.4001 46.1 87.8001 42.1 88.3001 39.5C88.5001 38.5 88.7001 38.1 88.8001 38C88.9001 38.1 89.0001 38.5 89.0001 39.2V39.9C89.0001 41.5 89.0001 44.5 89.3001 47.1C89.3001 47.2 89.3001 47.3 89.2001 47.4C89.2001 47.7 89.3001 47.9 89.6001 48C89.9001 48 90.1001 47.9 90.2001 47.6C90.6001 45.2 91.2001 42.8 91.9001 40.4C92.2001 39.5 92.4001 39.1 92.6001 39C92.7001 39.1 92.8001 39.5 92.7001 40.3C92.7001 40.6 92.6001 40.9 92.6001 41.4C92.4001 43.2 92.1001 46.3 92.0001 48.7C91.9001 51.5 92.8001 52.2 93.6001 52.3C95.0001 52.5 96.4001 50.8 97.0001 49.1C97.4001 47.7 97.8001 47.2 98.0001 47C98.0001 47.1 98.0001 47.2 98.0001 47.3C98.1001 50.3 98.1001 51.4 97.5001 52.4C97.4001 52.6 94.6001 57.2 94.6001 60.9C94.6001 60.9 94.6001 60.9 94.6001 61C93.6001 61.5 91.4001 61.8 90.2001 61.8C90.1001 61.5 89.9001 61.1 89.8001 60.8C89.1001 59.6 88.0001 59 86.7001 59C86.1001 59 85.6001 59.2 85.2001 59.4C85.1001 58.9 84.8001 58.3 84.5001 57.4C83.8001 55.2 82.8001 52.2 82.5001 50.8C82.1001 48.3 81.9001 45.7 82.0001 43.1C82.0001 42.3 82.1001 41.8 82.2001 41.6C82.3001 41.8 82.4001 42.1 82.5001 42.6L82.6001 43C82.8001 44.1 83.1001 45.5 83.7001 48.1C83.7001 48.3 83.7001 48.6 83.7001 48.8C83.7001 49.1 83.9001 49.3 84.2001 49.3C84.5001 49.3 84.7001 49.1 84.7001 48.8C84.7001 46.1 84.7001 43.4 84.9001 40.7ZM96.1001 81.3C96.2001 82.4 96.2001 83.3 96.3001 84C95.1001 84.1 93.4001 84.1 91.1001 83.9C88.7001 83.7 87.0001 83.4 85.9001 83C85.9001 82.4 85.9001 81.4 85.9001 80.3C85.9001 80.2 85.9001 80.2 85.9001 80.1C85.9001 77.9 85.9001 75.1 85.9001 72.5C85.9001 70.9 85.9001 69.4 85.9001 68.2C86.2001 68.3 86.4001 68.3 86.7001 68.3C88.0001 68.3 89.1001 67.7 89.8001 66.6C90.0001 66.6 90.1001 66.6 90.3001 66.6C91.8001 66.6 93.4001 66.3 94.8001 65.8C95.0001 69.1 95.4001 73.5 95.7001 77.3C95.8001 78.7 95.9001 80 96.0001 81.1C96.1001 81.2 96.1001 81.3 96.1001 81.3ZM86.8001 60C86.9001 60 86.9001 60 86.8001 60C88.0001 60 88.6001 60.7 89.0001 61.3C89.2001 61.6 89.3001 62 89.4001 62.4V62.5C89.7001 63.7 89.6001 65 89.0001 66C88.7001 66.6 88.0001 67.3 86.7001 67.3C84.9001 67.3 84.1001 65.5 84.1001 63.8C84.2001 61.9 85.1001 60 86.8001 60ZM83.4001 126.1C82.3001 126.8 81.3001 127.3 81.1001 127.4C80.3001 127.5 74.6001 128.2 69.8001 128.6C69.6001 127.8 69.2001 127.1 68.7001 126.7C68.3001 126.4 68.0001 126.3 67.6001 126.3C67.5001 126.3 67.5001 126.3 67.4001 126.3C66.0001 126.5 63.6001 126.9 61.3001 127.3C62.1001 124.6 63.0001 122 64.0001 119.4C67.3001 118.8 74.2001 117.5 80.1001 115.9C81.7001 118.4 83.6001 120.6 85.9001 122.6C85.1001 123.7 84.3001 124.9 83.4001 126.1ZM88.5001 119.1C88.6001 118.9 88.6001 118.8 88.7001 118.7C88.8001 119 89.0001 120.1 88.4001 123C87.5001 123.5 86.6001 124.1 85.6001 124.7C86.8001 122.9 87.7001 121.1 88.5001 119.1ZM132.9 24.9C140.2 24.9 146.2 30.9 146.2 38.2C146.2 43.3 143.4 47.7 139.2 49.9C135.7 42.6 130.9 36 125.1 30.3C124.6 29.8 124 29.3 123.5 28.8C126 26.4 129.3 24.9 132.9 24.9ZM59.9001 147.5C59.8001 147.8 59.6001 148.2 59.6001 148.5C47.8001 145.7 36.9001 139.8 28.0001 131.5C19.0001 123.1 12.4001 112.4 8.90012 100.6C5.40012 88.9 5.00012 76.3 7.90012 64.3C10.8001 52.3 16.8001 41.3 25.4001 32.4C34.0001 23.5 44.7001 17 56.5001 13.7C68.3001 10.3 80.9001 10.1 92.8001 13.2C103.7 16 113.8 21.4 122.1 28.8C119.9 31.3 118.6 34.6 118.6 38.2C118.6 46.1 125 52.5 132.9 52.5C135 52.5 136.9 52 138.7 51.2C140.3 54.6 141.6 58.2 142.6 61.8C123.3 67.3 121.9 67.9 119.5 69.3C116.7 71 114 74.3 102.8 88.5C102.2 89.3 101.5 90.1 100.9 90.9C100.5 91 99.9001 91.3 99.2001 91.5C99.6001 89.5 100.2 85.4 100.4 83C100.5 81.9 99.1001 81 97.0001 80.7C96.9001 79.6 96.8001 78.4 96.7001 77.1C96.2001 70.7 95.6001 62.8 95.6001 60.8C95.6001 57.4 98.3001 52.9 98.4001 52.8C99.2001 51.5 99.1001 50.2 99.0001 47.1C99.0001 46 98.3001 45.8 98.1001 45.8C97.3001 45.7 96.6001 46.7 96.0001 48.7C95.6001 50.2 94.4001 51.3 93.8001 51.2C93.4001 51.1 93.0001 50.4 93.1001 48.6C93.2001 46.2 93.5001 43.2 93.6001 41.4C93.7001 40.9 93.7001 40.5 93.7001 40.2C93.9001 38.2 93.1001 37.9 92.8001 37.8C92.1001 37.7 91.4001 38.5 91.0001 40C90.7001 41.1 90.4001 42.2 90.1001 43.3C90.1001 41.9 90.0001 40.7 90.0001 39.8V39.1C90.0001 37.2 89.2001 36.9 88.8001 36.9C88.0001 36.8 87.4001 37.7 87.2001 39.3C87.0001 40.2 86.9001 41.3 86.8001 42.4C86.7001 41.8 86.7001 41.4 86.6001 41L86.5001 40.2C86.3001 38.3 85.5001 38.1 85.1001 38.1C84.3001 38.1 83.8001 39.1 83.7001 40.6C83.6001 41.5 83.6001 42.5 83.6001 43.4C83.6001 43.2 83.5001 43 83.5001 42.8L83.4001 42.4C83.1001 40.6 82.4001 40.4 82.0001 40.5C81.3001 40.6 80.9001 41.5 80.9001 43.1C80.9001 45.7 81.1001 48.4 81.5001 51C81.8001 52.4 82.8001 55.4 83.5001 57.7C83.8001 58.7 84.1001 59.7 84.3001 60.1C83.5001 61 83.1001 62.4 83.1001 63.7C83.1001 65.2 83.7001 66.8 84.9001 67.7C84.9001 69 84.9001 70.7 84.9001 72.5C84.9001 75 84.9001 77.7 84.9001 79.8C83.1001 80.3 82.9001 81.2 82.9001 81.7C82.8001 83 82.8001 86.3 82.7001 88.4L80.5001 88.9C69.6001 91.4 61.6001 93.3 56.4001 92.4C58.0001 89.8 58.8001 86.8 58.5001 83.8C58.2001 80.6 56.8001 77.5 54.4001 75.3C52.1001 73 49.0001 71.6 45.8001 71.4C42.6001 71.2 39.3001 72.1 36.7001 74C34.7001 75.5 33.1001 77.5 32.2001 79.8C31.3001 78.9 30.2001 78.3 29.0001 78C27.5001 77.6 25.9001 77.6 24.5001 78.2C23.0001 78.7 21.8001 79.7 20.9001 80.9C20.0001 82.2 19.5001 83.7 19.5001 85.2C19.5001 86.8 20.0001 88.2 20.9001 89.5C21.8001 90.8 23.0001 91.7 24.5001 92.2C25.3001 92.5 26.1001 92.6 27.0001 92.6C27.7001 92.6 28.4001 92.5 29.0001 92.3C30.2001 92 31.3001 91.3 32.2001 90.5C32.3001 90.8 32.4001 91.1 32.6001 91.3C34.1001 94.2 36.5001 96.5 39.5001 97.8C41.2001 98.5 43.0001 98.9 44.8001 98.9C46.0001 98.9 47.3001 98.7 48.4001 98.4C48.8001 100.6 49.0001 103.3 48.5001 106.3C48.5001 106.5 48.4001 106.7 48.4001 106.9C48.4001 107 48.4001 107 48.4001 107.1C48.1001 109 47.7001 111.2 47.4001 113.4C45.5001 124.5 43.4001 137.1 46.6001 141.5C49.4001 145.3 52.7001 145.7 59.7001 145.7C60.1001 145.7 60.5001 145.7 61.0001 145.7C60.7001 146.2 60.2001 146.8 59.9001 147.5ZM161.5 132.5C161.6 131.9 161.9 131.4 162.3 131C162.7 130.6 163.2 130.3 163.8 130.2C164.4 130.1 165 130.1 165.5 130.4C166 130.6 166.5 131 166.8 131.5C167.1 132 167.3 132.6 167.3 133.1C167.3 133.9 167 134.6 166.4 135.2C165.9 135.7 165.1 136.1 164.3 136.1C163.7 136.1 163.2 135.9 162.7 135.6C162.2 135.3 161.8 134.8 161.6 134.3C161.4 133.6 161.3 133 161.5 132.5ZM152.6 134C152.7 133.4 153 132.9 153.4 132.5C153.8 132.1 154.3 131.8 154.9 131.7C155.5 131.6 156.1 131.6 156.6 131.9C157.1 132.1 157.6 132.5 157.9 133C158.2 133.5 158.4 134 158.4 134.6C158.4 135.4 158.1 136.1 157.5 136.7C157 137.3 156.2 137.6 155.4 137.6C154.8 137.6 154.3 137.4 153.8 137.1C153.3 136.8 152.9 136.3 152.7 135.8C152.6 135.2 152.5 134.6 152.6 134ZM143.8 135.6C143.9 135 144.2 134.5 144.6 134.1C145 133.7 145.5 133.4 146.1 133.3C146.7 133.2 147.3 133.2 147.8 133.5C148.3 133.8 148.8 134.1 149.1 134.6C149.4 135.1 149.6 135.6 149.6 136.2C149.6 137 149.3 137.7 148.7 138.3C148.2 138.8 147.4 139.2 146.6 139.2C146 139.2 145.5 139 145 138.7C144.5 138.4 144.1 137.9 143.9 137.4C143.7 136.7 143.7 136.1 143.8 135.6ZM170.9 138.5L174.6 159.6C174.7 160.3 174.7 161 174.6 161.6C174.4 162.6 173.9 163.5 173.1 164.2C172.4 164.9 171.4 165.4 170.4 165.6L71.3001 183C69.9001 183.2 68.6001 182.9 67.4001 182.1C66.3001 181.3 65.5001 180.1 65.3001 178.8L61.6001 157.7L170.9 138.5ZM120.4 134.1L70.7001 142.9C70.9001 142.3 71.0001 141.6 71.0001 140.8C74.5001 140.1 78.9001 139.3 81.9001 138.7C85.9001 137.9 87.1001 136.4 88.4001 134.7C88.6001 134.4 88.9001 134.1 89.2001 133.7L89.7001 133.1C90.9001 131.6 91.6001 130.9 92.3001 131.3C96.9001 133.7 99.6001 134.5 100.2 133.5C100.4 133.2 100.4 132.7 99.7001 132.1C98.7001 131.3 97.8001 130.7 97.1001 130.1C98.7001 130.4 100.1 130.5 101.2 130.5C102.9 130.5 104 130.2 104.1 129.5C104.2 129.1 104 128.6 103.2 128.4C102.5 128.2 101.9 128 101.2 127.8C100.8 127.7 100.3 127.5 99.8001 127.4C99.9001 127.4 100 127.4 100.1 127.4C103.4 127.4 105.3 126.9 105.4 125.9C105.4 125.6 105.3 125.4 105.1 125.2C110.7 123.4 115.6 117.4 119.7 110.4C120.4 109.9 121.3 109.3 122.4 108.6C124.2 107.4 126.4 105.9 128.6 104.4C130.1 105.4 134 107.9 138.6 110.9C134.2 119.7 128 127.8 120.4 134.1ZM158.6 122.5C152.2 118.5 131.7 105.2 128.7 103.2C128.5 103.1 128.3 103.1 128.1 103.2C127.5 103.6 126.8 104.1 126.2 104.5C126.9 101.8 127.7 97.5 128.3 94.3C128.6 92.9 128.8 91.7 128.9 90.9C129.5 89.5 130.1 88.2 130.7 87C132.6 86.4 134.5 85.9 136.4 85.3C140.8 87.9 160.7 102.1 167.9 107.6C167 108 165.8 108.8 164.6 110.3C164.5 110.3 164.5 110.4 164.5 110.4C163.6 111.4 162.7 112.7 161.8 114.2C159.3 118.1 158.5 120.9 158.6 122.5ZM168 124.6C167.1 123.9 166.5 123.3 165.8 122.6C165.2 122 164.6 121.4 163.9 120.8C163.9 120.8 163.9 120.8 163.8 120.7C163 120 161.9 119.3 160.4 118.6C160.9 117.5 161.5 116.2 162.5 114.6C163.4 113.2 164.2 112 164.9 111.2C169.9 114.2 175.8 114.9 181.5 115.5C185.7 116 189.7 116.4 193.1 117.8C186.7 120.6 174.5 124.1 168 124.6Z"
        fill="currentColor"
      />
      <path
        d="M77.3001 171.7L76.0001 164.3L71.5001 165.1L72.8001 172.5L77.3001 171.7ZM75.1001 165.4L76.1001 170.9L73.5001 171.3L72.5001 165.8L75.1001 165.4Z"
        fill="currentColor"
      />
      <path
        d="M82.3001 170.8L81.0001 163.4L76.5001 164.2L77.8001 171.6L82.3001 170.8ZM80.2001 164.6L81.2001 170.1L78.6001 170.6L77.6001 165.1L80.2001 164.6Z"
        fill="currentColor"
      />
      <path
        d="M87.1001 170L85.8001 162.6L81.3001 163.4L82.6001 170.8L87.1001 170ZM85.0001 163.7L86.0001 169.2L83.4001 169.6L82.4001 164.1L85.0001 163.7Z"
        fill="currentColor"
      />
      <path
        d="M92.1001 169.1L90.8001 161.7L86.3001 162.5L87.6001 169.9L92.1001 169.1ZM90.0001 162.8L91.0001 168.3L88.4001 168.8L87.4001 163.3L90.0001 162.8Z"
        fill="currentColor"
      />
      <path
        d="M97.1001 168.2L95.8001 160.8L91.3001 161.6L92.6001 169L97.1001 168.2ZM95.0001 161.9L96.0001 167.4L93.4001 167.9L92.4001 162.4L95.0001 161.9Z"
        fill="currentColor"
      />
      <path
        d="M101.9 167.4L100.6 160L96.1001 160.8L97.4001 168.2L101.9 167.4ZM99.8001 161.1L100.8 166.6L98.2001 167L97.2001 161.5L99.8001 161.1Z"
        fill="currentColor"
      />
      <path
        d="M106.9 166.5L105.6 159.1L101.1 159.9L102.4 167.3L106.9 166.5ZM104.8 160.2L105.8 165.7L103.2 166.2L102.2 160.7L104.8 160.2Z"
        fill="currentColor"
      />
      <path
        d="M111.8 165.6L110.5 158.2L106 159L107.3 166.4L111.8 165.6ZM109.7 159.3L110.7 164.8L108.1 165.3L107.1 159.8L109.7 159.3Z"
        fill="currentColor"
      />
      <path
        d="M116.7 164.7L115.4 157.3L110.9 158.1L112.2 165.5L116.7 164.7ZM114.6 158.5L115.6 164L113 164.4L112 158.9L114.6 158.5Z"
        fill="currentColor"
      />
      <path
        d="M121.7 163.9L120.4 156.5L115.9 157.3L117.2 164.7L121.7 163.9ZM119.6 157.6L120.6 163.1L118 163.6L117 158.1L119.6 157.6Z"
        fill="currentColor"
      />
      <path
        d="M126.6 163L125.3 155.6L120.8 156.4L122.1 163.8L126.6 163ZM124.5 156.7L125.5 162.2L122.9 162.6L121.9 157.1L124.5 156.7Z"
        fill="currentColor"
      />
    </svg>
  </SvgIcon>
)

export default LoadingImage
