import { FC } from 'react'

import { SvgIcon, SvgIconProps } from '@mui/material'

const InvestingTestingImage: FC<SvgIconProps> = ({ sx, ...props }) => (
  <SvgIcon sx={{ fontSize: 200, color: 'primary.dark', ...sx }} {...props}>
    <svg
      width="200"
      height="200"
      viewBox="0 0 200 200"
      fill="none"
      xmlns="http://www.w3.org/2000/svg"
    >
      <path
        d="M19.6999 52.9004L22.7999 42.8004L24.1999 45.8004C24.2999 46.0004 24.4999 46.1004 24.6999 46.1004C24.7999 46.1004 24.7999 46.1004 24.8999 46.1004C25.0999 46.0004 25.2999 45.7004 25.0999 45.4004L23.0999 41.3004C23.0999 41.1004 22.9999 41.0004 22.8999 41.0004C22.7999 41.0004 22.5999 41.0004 22.4999 41.0004L18.4999 43.4004C18.2999 43.5004 18.1999 43.8004 18.2999 44.1004C18.3999 44.3004 18.6999 44.4004 18.9999 44.3004L21.7999 42.6004L18.6999 52.4004L8.59992 55.8004C8.49992 55.8004 8.39992 55.9004 8.29992 56.1004L4.99992 62.9004C4.89992 63.1004 4.99992 63.4004 5.19992 63.6004C5.29992 63.6004 5.29992 63.6004 5.39992 63.6004C5.59992 63.6004 5.79992 63.5004 5.89992 63.3004L9.09992 56.7004L19.3999 53.3004C19.4999 53.2004 19.6999 53.1004 19.6999 52.9004Z"
        fill="currentColor"
      />
      <path
        d="M194.9 63.1004C194.8 62.9004 194.7 62.8004 194.5 62.8004C189.8 62.6004 178.2 65.5004 174.7 67.5004C174.6 67.5004 174.6 67.6004 174.5 67.7004C173.4 69.4004 172.1 71.0004 170.8 72.6004C170.4 72.3004 170 72.0004 169.5 71.7004C169.3 71.6004 169.1 71.6004 168.9 71.7004C168.3 72.1004 156.7 80.8004 151.2 89.2004C148.6 86.3004 146.4 83.1004 144.7 79.6004C141.2 72.4004 137.1 69.3004 133.7 67.8004C133.2 66.1004 132.6 64.3004 131.9 62.6004C132.5 61.9004 133 61.2004 133.4 60.3004C134.3 58.0004 134.2 55.8004 133.2 53.8004C131 49.7004 125.1 47.8004 123.1 47.3004C123.7 45.8004 125 41.8004 121 39.4004C117.6 37.4004 114.7 36.7004 112.5 37.6004C112.4 37.7004 112.2 37.7004 112.1 37.8004C103.8 31.6004 94.0999 27.9004 83.6999 27.1004C83.5999 25.9004 83.3999 24.8004 82.6999 24.0004C82.0999 23.3004 81.5999 22.8004 80.8999 22.8004C80.6999 22.8004 80.4999 22.9004 80.2999 23.0004C80.0999 22.5004 79.8999 22.0004 79.5999 21.6004C79.1999 21.0004 78.5999 20.4004 77.8999 20.0004C73.9999 17.9004 69.8999 20.7004 67.6999 23.8004L65.6999 19.9004C65.5999 19.7004 65.2999 19.6004 65.0999 19.7004L46.3999 26.4004C46.1999 26.5004 45.9999 26.7004 46.0999 27.0004L48.0999 36.1004L35.4999 31.7004C35.2999 31.6004 34.9999 31.7004 34.8999 32.0004L33.9999 33.9004C33.8999 34.1004 33.9999 34.4004 34.1999 34.5004L45.7999 40.4004C39.4999 45.6004 34.2999 52.2004 30.8999 59.6004C27.3999 67.2004 25.5999 75.6004 25.6999 83.9004C25.7999 92.7004 28.0999 101.4 32.2999 109.2C34.1999 112.7 36.4999 116 39.0999 119C38.4999 121.5 38.1999 124.1 38.3999 126.8C38.7999 129.6 39.5999 132.3 40.7999 134.8C38.6999 132.9 36.2999 131.4 33.6999 130.3C29.1999 128.7 24.3999 128.4 19.6999 129.5C19.4999 129.5 19.3999 129.7 19.2999 129.8C19.1999 130 19.2999 130.1 19.3999 130.3C22.0999 134.2 25.8999 137.3 30.2999 139.1C32.9999 140.1 35.8999 140.5 38.6999 140.5C40.4999 140.5 42.3999 140.3 44.1999 139.9C45.5999 140.8 53.3999 146.7 52.3999 160.9C52.3999 160.9 52.3999 160.9 52.3999 161C52.1999 162.6 51.9999 164.1 51.8999 165.8C51.6999 165.2 51.3999 164.7 51.0999 164.1C49.4999 161.6 47.2999 159.6 44.6999 158.3C44.5999 158.2 44.3999 158.2 44.1999 158.3C44.0999 158.4 43.9999 158.5 43.8999 158.7C43.5999 161.7 44.1999 164.6 45.6999 167.2C46.9999 169.5 48.9999 171.3 51.2999 172.6L42.2999 175C41.7999 175.1 41.3999 175.4 40.9999 175.7C40.5999 176 40.3999 176.5 40.1999 176.9C39.9999 177.4 39.9999 177.9 40.0999 178.3C40.1999 178.7 40.3999 179.2 40.6999 179.6C40.8999 179.9 41.1999 180.2 41.5999 180.4C41.8999 180.6 42.2999 180.7 42.6999 180.8C42.7999 180.8 42.9999 180.8 43.0999 180.8C43.3999 180.8 43.5999 180.8 43.8999 180.7L64.0999 175.3C64.8999 175.1 65.4999 174.6 65.8999 173.9C66.2999 173.2 66.3999 172.4 66.1999 171.6C65.9999 170.8 65.4999 170.2 64.7999 169.8C64.0999 169.4 63.2999 169.3 62.4999 169.5L52.7999 172.1C52.7999 171.1 52.7999 170.1 52.5999 169.1C52.4999 162.7 53.8999 156.7 55.1999 150.9C56.4999 145 57.7999 139.3 57.3999 133.5C57.3999 133.5 57.3999 133.5 57.3999 133.4C57.3999 133.2 57.3999 133.1 57.3999 132.9C64.5999 136.2 72.4999 138 80.3999 138C82.5999 138 84.7999 137.9 86.9999 137.6C99.9999 136 112 129.9 120.9 120.3L129.6 135.7C129.7 135.9 129.9 136 130 136H130.1C130.7 135.8 131.3 135.6 131.9 135.4L133.9 138.9C135.8 148.7 137.6 152.7 140.7 157.6C140.8 157.7 141 157.8 141.1 157.8C141.3 157.8 141.4 157.7 141.5 157.5C143.2 153.2 144.2 141.2 143.5 137.2C143.5 137.1 143.5 137 143.4 137C142.1 135.2 140.8 133.3 139.6 131.4C140.1 131.1 140.5 130.7 141 130.4C141.2 130.3 141.2 130 141.2 129.8L140.3 127.2C137.4 119.1 134.7 111.3 130.7 105C132.1 101.7 133.3 98.2004 134 94.7004C136.6 98.0004 140.1 101.4 144.6 104.7C146.2 105.9 148.2 106.5 150.1 106.5C150.4 106.5 150.7 106.5 151.1 106.4C153.4 106.2 155.6 105.1 157.1 103.3L177.7 80.1004C177.9 79.9004 177.9 79.7004 177.7 79.5004C177.4 79.1004 177 78.7004 176.7 78.3004L178.9 75.9004C187.6 71.0004 190.8 67.9004 194.4 63.5004C195 63.5004 195 63.3004 194.9 63.1004ZM62.9999 170.5C63.1999 170.5 63.2999 170.4 63.4999 170.4C63.7999 170.4 64.1999 170.5 64.4999 170.7C64.8999 171 65.2999 171.4 65.3999 171.9C65.4999 172.4 65.4999 172.9 65.1999 173.4C64.8999 173.9 64.4999 174.2 63.9999 174.3L43.7999 179.7C43.4999 179.8 43.2999 179.8 42.9999 179.8C42.6999 179.8 42.4999 179.7 42.2999 179.6C42.0999 179.5 41.8999 179.3 41.6999 179.1C41.4999 178.8 41.3999 178.5 41.2999 178.2C41.1999 177.9 41.2999 177.6 41.3999 177.2C41.4999 176.9 41.6999 176.6 41.8999 176.4C42.0999 176.2 42.3999 176 42.6999 175.9L62.9999 170.5ZM117.7 72.7004C115.5 71.7004 112.8 70.0004 110.3 68.1004L107.4 63.0004C107.3 62.9004 107.2 62.8004 107.1 62.8004C107 62.8004 106.8 62.8004 106.7 62.9004C106.2 63.3004 105.6 63.7004 105.1 64.1004C101.8 66.3004 98.3999 68.4004 94.8999 70.2004C90.7999 72.2004 88.4999 71.0004 83.7999 67.6004C80.8999 65.5004 77.3999 63.0004 74.6999 61.1004C75.3999 57.5004 77.3999 54.3004 80.2999 52.1004C83.9999 54.6004 87.5999 57.0004 91.2999 59.5004C90.4999 60.1004 89.5999 60.8004 88.7999 61.4004C88.5999 61.6004 88.4999 61.9004 88.6999 62.1004C88.7999 62.2004 88.8999 62.3004 89.0999 62.3004C89.1999 62.3004 89.2999 62.3004 89.3999 62.2004C100.2 53.7004 107.1 50.7004 110.7 52.9004C112 53.7004 113.1 55.0004 114.1 56.2004C115.1 57.4004 115.9 58.4004 116.9 58.8004C117.4 59.5004 117.9 60.3004 118.4 61.0004C119.4 62.5004 120.9 63.7004 122.6 64.4004C123.4 64.7004 124.3 64.9004 125.1 65.0004C125.7 65.5004 126.3 66.1004 126.9 66.5004C124.5 69.1004 120.7 71.4004 117.7 72.7004ZM70.8999 58.3004C71.1999 56.5004 71.8999 54.8004 72.8999 53.3004C73.8999 51.8004 75.2999 50.6004 76.7999 49.7004C77.5999 50.3004 78.4999 50.8004 79.2999 51.4004C76.4999 53.7004 74.4999 56.8004 73.6999 60.4004C72.3999 59.4004 71.3999 58.6004 70.8999 58.3004ZM58.5999 49.8004C59.8999 50.3004 61.0999 50.9004 62.2999 51.6004C62.7999 51.9004 63.2999 52.2004 63.6999 52.5004C62.3999 52.1004 61.1999 51.7004 60.0999 51.4004L59.0999 51.1004C58.9999 51.1004 58.9999 51.1004 58.8999 51.0004C58.0999 50.8004 57.0999 50.6004 56.0999 50.4004C55.3999 50.3004 54.5999 50.1004 53.8999 50.0004C54.1999 49.9004 54.5999 49.9004 55.1999 49.8004C55.8999 49.8004 57.6999 49.7004 58.5999 49.8004ZM57.9999 52.2004C58.1999 52.2004 58.4999 52.1004 58.7999 52.0004C58.7999 52.0004 58.7999 52.0004 58.8999 52.0004L59.8999 52.3004C60.2999 52.4004 60.7999 52.6004 61.2999 52.7004C60.5999 52.7004 59.6999 52.6004 58.7999 52.6004C58.0999 52.6004 57.2999 52.6004 56.6999 52.5004C56.9999 52.5004 57.3999 52.4004 57.9999 52.2004ZM62.7999 50.6004C61.4999 49.9004 60.1999 49.3004 58.8999 48.8004H58.7999C57.6999 48.4004 56.5999 48.0004 55.3999 47.6004C53.9999 47.2004 53.3999 46.9004 53.0999 46.7004C53.3999 46.6004 53.8999 46.5004 54.9999 46.5004C55.0999 46.5004 55.2999 46.5004 55.3999 46.5004C59.7999 46.9004 64.1999 47.8004 68.2999 49.3004C68.5999 49.4004 68.7999 49.3004 68.8999 49.0004C68.9999 48.7004 68.8999 48.5004 68.5999 48.4004C68.1999 48.3004 67.7999 48.1004 67.3999 48.0004C67.7999 47.2004 67.0999 45.9004 66.0999 44.2004C65.7999 43.7004 65.4999 43.2004 65.3999 43.0004C65.2999 42.8004 65.0999 42.3004 64.9999 42.0004C65.2999 42.2004 65.7999 42.6004 66.6999 43.5004C69.2999 45.8004 71.9999 47.9004 74.7999 49.8004C73.6999 50.6004 72.6999 51.7004 71.8999 52.8004C71.1999 53.9004 70.5999 55.0004 70.1999 56.3004C67.9999 54.2004 65.4999 52.3004 62.7999 50.6004ZM64.5999 43.3004C64.6999 43.6004 64.9999 44.1004 65.2999 44.7004C65.6999 45.4004 66.7999 47.2004 66.5999 47.6004C66.5999 47.6004 66.4999 47.6004 66.2999 47.6004C66.2999 47.6004 66.2999 47.6004 66.1999 47.6004C63.2999 46.7004 60.2999 46.1004 57.2999 45.7004L64.3999 43.2004C64.4999 43.2004 64.5999 43.3004 64.5999 43.3004ZM75.4999 38.7004L72.9999 33.8004L73.8999 32.9004C74.7999 34.1004 76.3999 35.6004 78.9999 37.2004C78.8999 37.5004 78.7999 37.8004 78.6999 38.2004C78.5999 38.4004 78.6999 38.6004 78.8999 38.7004C79.4999 39.2004 93.8999 49.6004 100.5 53.3004C97.9999 54.6004 95.1999 56.4004 91.9999 58.7004C88.1999 56.1004 84.2999 53.5004 80.3999 50.9004C79.2999 50.2004 78.1999 49.4004 77.0999 48.7004C76.8999 48.6004 76.6999 48.6004 76.5999 48.7004C76.2999 48.8004 76.0999 49.0004 75.7999 49.2004C72.8999 47.2004 70.0999 45.0004 67.4999 42.7004C67.2999 42.5004 67.1999 42.4004 67.0999 42.3004L75.1999 39.4004C75.2999 39.4004 75.3999 39.2004 75.4999 39.1004C75.5999 38.9004 75.5999 38.8004 75.4999 38.7004ZM85.0999 30.6004C85.4999 30.9004 86.2999 31.5004 87.4999 32.3004C85.0999 34.3004 83.2999 36.9004 82.2999 39.9004C81.0999 39.1004 80.2999 38.4004 79.7999 38.1004C80.7999 34.7004 82.5999 32.1004 85.0999 30.6004ZM109.8 42.8004C110 42.4004 110.2 41.9004 110.4 41.5004C110.6 41.5004 110.7 41.5004 110.9 41.5004C110.7 42.1004 110.6 43.0004 111.1 43.4004C111.2 43.5004 111.6 43.6004 112.1 43.1004C112.3 42.9004 112.4 42.9004 112.5 42.9004C112.5 42.9004 112.6 42.9004 112.6 43.0004C112.6 43.3004 112.4 43.8004 111.7 44.4004C111.5 44.5004 111.5 44.7004 111.5 44.9004C112.2 48.8004 113.5 52.5004 115.3 56.0004C115.2 55.9004 115.1 55.7004 115 55.6004C114 54.4004 112.8 53.0004 111.4 52.1004C111 51.8004 110.6 51.7004 110.1 51.5004C110.4 50.9004 110.7 50.3004 111 49.7004C111 49.7004 111 49.7004 111 49.6004C111.3 49.0004 111.5 48.5004 111.7 47.9004C111.8 47.7004 111.7 47.5004 111.6 47.4004C111.5 47.3004 111.3 47.2004 111.1 47.3004C109.2 47.9004 108.7 47.7004 108.5 47.6004C108.5 47.1004 108.6 46.4004 109 45.4004C109 44.6004 109.4 43.7004 109.8 42.8004ZM107.3 47.5004C107.3 47.6004 107.3 47.6004 107.3 47.7004C107.3 47.7004 107.3 47.7004 107.3 47.8004C107.3 48.0004 107.4 48.2004 107.5 48.4004C107.8 49.0004 108.5 49.4004 109.6 49.7004C109.4 50.2004 109.1 50.7004 108.8 51.2004C106.9 50.9004 104.5 51.5004 101.6 52.8004C97.2999 50.5004 88.1999 44.1004 83.0999 40.5004C84.0999 37.5004 85.8999 34.9004 88.2999 32.9004C92.9999 36.2004 101.6 42.1004 107.6 45.3004C107.4 46.2004 107.2 46.9004 107.3 47.5004ZM127.7 66.0004C127.3 65.7004 126.9 65.3004 126.5 65.0004C126.9 65.0004 127.4 64.9004 127.8 64.8004C129 64.6004 130.2 64.1004 131.1 63.3004C131.6 64.6004 132.1 65.9004 132.5 67.3004C131.2 66.8004 130 66.6004 129 66.3004C128.5 66.3004 128.1 66.2004 127.7 66.0004ZM109.5 40.7004C109.3 41.3004 109 41.8004 108.8 42.3004C108.5 43.1004 108.2 43.7004 108 44.3004C99.3999 39.6004 85.5999 29.6004 85.3999 29.5004C85.1999 29.4004 84.9999 29.4004 84.8999 29.5004C84.6999 29.6004 84.5999 29.7004 84.3999 29.8004C84.0999 29.3004 83.9999 28.7004 83.8999 28.1004C93.7999 28.9004 103.2 32.4004 111.2 38.3004C110 39.4004 109.6 40.6004 109.5 40.7004ZM80.9999 23.8004C81.1999 23.8004 81.6999 24.3004 81.9999 24.7004C82.4999 25.3004 82.5999 26.3004 82.7999 27.4004C82.8999 28.5004 83.0999 29.6004 83.5999 30.5004C81.7999 31.9004 80.3999 33.8004 79.3999 36.3004C76.8999 34.7004 75.4999 33.3004 74.6999 32.2004L74.8999 32.0004C75.1999 32.2004 75.4999 32.3004 75.7999 32.3004C76.1999 32.3004 76.5999 32.1004 76.8999 31.9004C77.1999 31.6004 77.3999 31.1004 77.2999 30.6004C77.6999 30.6004 77.9999 30.4004 78.2999 30.2004C78.3999 30.1004 78.3999 30.0004 78.4999 30.0004C78.4999 30.5004 78.5999 31.1004 78.7999 31.6004C78.8999 31.8004 79.0999 31.9004 79.2999 31.9004C79.3999 31.9004 79.3999 31.9004 79.4999 31.9004C79.7999 31.8004 79.8999 31.5004 79.7999 31.3004C79.4999 30.5004 79.4999 29.6004 79.6999 28.8004C79.8999 28.1004 80.2999 27.5004 80.7999 27.1004C80.8999 27.0004 81.0999 26.9004 81.1999 26.8004C81.3999 26.6004 81.3999 26.3004 81.2999 26.1004C81.0999 25.9004 80.7999 25.8004 80.5999 26.0004C80.3999 26.1004 80.2999 26.2004 80.0999 26.3004C79.7999 26.5004 79.5999 26.6004 79.3999 26.7004C78.7999 26.9004 78.4999 26.9004 78.3999 26.8004C78.2999 26.7004 78.3999 26.6004 78.3999 26.6004L78.7999 26.2004C78.8999 26.1004 78.9999 26.0004 78.9999 25.9004C79.5999 25.2004 80.0999 24.7004 80.4999 24.3004C80.6999 23.9004 80.7999 23.8004 80.9999 23.8004ZM79.3999 23.7004C79.0999 23.9004 78.8999 24.3004 78.4999 24.6004C78.1999 24.2004 77.8999 23.9004 77.5999 23.5004C77.4999 23.4004 77.4999 23.2004 77.4999 23.0004C77.4999 22.8004 77.5999 22.7004 77.7999 22.6004C77.8999 22.5004 78.0999 22.5004 78.2999 22.5004C78.4999 22.5004 78.5999 22.6004 78.6999 22.8004L79.3999 23.7004ZM78.5999 27.7004C78.4999 27.7004 78.3999 27.8004 78.1999 27.6004C78.2999 27.6004 78.4999 27.6004 78.5999 27.7004ZM77.2999 24.8004C77.4999 25.0004 77.6999 25.2004 77.8999 25.4004L77.5999 25.7004C77.2999 26.0004 77.1999 26.4004 77.2999 26.7004C77.1999 26.6004 77.1999 26.6004 77.0999 26.5004C76.2999 25.7004 75.5999 25.0004 75.1999 24.5004C75.0999 24.4004 75.0999 24.2004 75.0999 24.0004C75.0999 23.8004 75.1999 23.7004 75.2999 23.6004C75.3999 23.5004 75.5999 23.5004 75.7999 23.5004C75.9999 23.5004 76.0999 23.6004 76.1999 23.8004C76.4999 24.0004 76.8999 24.4004 77.2999 24.8004ZM74.8999 25.8004C75.6999 26.7004 76.5999 27.5004 77.3999 28.4004C77.7999 28.8004 77.6999 29.1004 77.4999 29.3004C77.2999 29.5004 76.9999 29.5004 76.4999 29.1004C76.0999 28.8004 75.7999 28.4004 75.4999 28.1004C74.7999 27.4004 74.1999 26.9004 73.8999 26.5004C73.7999 26.4004 73.7999 26.2004 73.7999 26.0004C73.7999 25.8004 73.8999 25.7004 73.9999 25.6004C74.0999 25.5004 74.2999 25.4004 74.4999 25.5004C74.5999 25.6004 74.7999 25.7004 74.8999 25.8004ZM73.4999 28.0004C73.6999 28.0004 73.7999 28.1004 73.8999 28.2004L74.3999 28.7004C74.8999 29.2004 75.2999 29.6004 75.8999 30.2004C76.1999 30.6004 76.1999 30.9004 75.9999 31.0004C75.7999 31.2004 75.4999 31.3004 75.0999 30.9004C74.6999 30.5004 74.3999 30.2004 74.0999 30.0004C73.8999 29.8004 73.6999 29.6004 73.4999 29.4004C73.4999 29.3004 73.3999 29.3004 73.2999 29.2004C73.1999 29.1004 72.9999 28.9004 72.8999 28.8004C72.7999 28.7004 72.7999 28.5004 72.7999 28.4004C72.7999 28.2004 72.8999 28.1004 72.9999 28.0004C73.1999 28.0004 73.2999 28.0004 73.4999 28.0004ZM77.4999 20.8004C77.7999 21.0004 78.0999 21.2004 78.3999 21.5004C77.9999 21.4004 77.4999 21.5004 77.1999 21.8004C76.8999 22.0004 76.6999 22.3004 76.5999 22.7004C76.3999 22.6004 76.1999 22.5004 75.9999 22.5004C75.5999 22.5004 75.1999 22.6004 74.7999 22.8004C74.3999 23.0004 74.1999 23.4004 74.1999 23.9004C74.1999 24.1004 74.1999 24.3004 74.1999 24.6004C73.8999 24.6004 73.5999 24.7004 73.3999 24.9004C73.0999 25.2004 72.7999 25.5004 72.7999 26.0004C72.7999 26.4004 72.7999 26.7004 72.9999 27.0004C72.7999 27.1004 72.5999 27.2004 72.3999 27.3004C72.0999 27.6004 71.8999 27.9004 71.7999 28.4004C71.7999 28.8004 71.8999 29.2004 72.1999 29.6004C72.2999 29.8004 72.4999 29.9004 72.5999 30.0004C72.5999 30.4004 72.7999 31.1004 73.2999 32.0004L72.4999 32.8004L68.2999 24.7004C70.1999 21.9004 73.9999 18.9004 77.4999 20.8004ZM65.0999 20.7004L67.1999 24.7004C67.0999 24.9004 67.1999 25.2004 67.3999 25.4004C67.4999 25.4004 67.4999 25.4004 67.5999 25.4004L71.7999 33.7004C71.7999 33.8004 71.7999 34.0004 71.8999 34.1004L71.9999 34.2004L74.2999 38.6004L66.1999 41.5004C65.1999 40.7004 64.6999 40.6004 64.3999 40.9004C63.9999 41.2004 63.9999 41.6004 64.1999 42.3004L54.9999 45.5004C52.4999 45.5004 52.0999 46.0004 51.9999 46.5004C51.9999 46.5004 51.9999 46.5004 51.9999 46.6004L51.4999 46.8004L47.2999 27.1004L65.0999 20.7004ZM35.6999 32.6004L48.3999 37.1004L49.2999 41.1004L35.1999 33.9004L35.6999 32.6004ZM40.1999 118.8C40.5999 117.2 41.1999 115.7 41.9999 114.3C44.3999 117.4 45.9999 121.1 46.5999 125C44.2999 123.1 42.1999 121 40.1999 118.8ZM30.6999 138.2C26.6999 136.5 23.2999 133.8 20.6999 130.3C24.8999 129.5 29.2999 129.8 33.3999 131.2C37.3999 132.9 40.7999 135.6 43.3999 139.1C39.0999 140 34.6999 139.6 30.6999 138.2ZM54.4999 150.8C54.0999 152.4 53.7999 154.1 53.3999 155.8C52.3999 145.3 46.4999 140.4 44.8999 139.3C46.8999 135.6 47.8999 131.4 47.7999 127.2C48.4999 127.7 49.0999 128.2 49.7999 128.6C51.9999 130.1 54.1999 131.4 56.5999 132.5C57.1999 138.5 55.8999 144.5 54.4999 150.8ZM87.2999 136.7C77.1999 137.9 66.8999 136.2 57.7999 131.9C58.4999 118.6 65.0999 110.7 66.2999 109.3C67.9999 110.2 69.8999 110.7 71.7999 110.7C72.5999 110.7 73.2999 110.6 74.0999 110.5H74.1999C74.2999 110.5 74.3999 110.4 74.4999 110.4C74.7999 110.3 75.1999 110.2 75.4999 110.1C75.6999 110 75.8999 109.9 76.1999 109.9C79.0999 108.8 81.7999 107.1 83.9999 104.8C86.4999 101.8 88.0999 98.2004 88.5999 94.4004C88.5999 94.2004 88.5999 94.1004 88.3999 94.0004C88.2999 93.9004 88.0999 93.8004 87.9999 93.9004C86.1999 94.3004 84.3999 95.0004 82.7999 95.9004C82.0999 93.8004 80.8999 91.9004 79.0999 90.4004C76.6999 88.4004 73.6999 87.5004 70.6999 87.8004C70.0999 87.9004 69.5999 88.0004 68.9999 88.1004C68.9999 86.3004 68.6999 84.4004 68.1999 82.6004C68.1999 82.4004 67.9999 82.3004 67.8999 82.3004C67.7999 82.3004 67.5999 82.3004 67.3999 82.4004C64.3999 84.8004 62.0999 88.0004 60.7999 91.7004C59.6999 95.4004 59.6999 99.4004 60.7999 103.1C61.5999 105.5 63.1999 107.6 65.3999 109C63.8999 110.7 58.2999 117.8 56.9999 129.3C56.2999 126.6 55.1999 123.8 53.3999 121.1C42.0999 103.6 41.4999 96.4004 40.8999 86.7004C42.6999 86.4004 44.2999 85.5004 45.5999 84.2004C47.2999 82.5004 48.1999 80.2004 48.1999 77.8004C48.1999 76.6004 47.9999 75.4004 47.4999 74.3004C46.9999 73.2004 46.3999 72.2004 45.4999 71.4004C43.8999 69.8004 41.7999 68.9004 39.4999 68.8004C39.0999 67.2004 38.2999 65.7004 37.0999 64.5004C35.7999 63.3004 34.0999 62.5004 32.3999 62.2004C32.1999 62.2004 32.0999 62.2004 31.9999 62.3004C31.8999 62.4004 31.7999 62.6004 31.8999 62.8004C32.2999 64.5004 33.0999 66.1004 34.3999 67.4004C35.1999 68.1004 35.9999 68.6004 36.8999 69.0004C36.4999 69.1004 36.0999 69.2004 35.6999 69.4004C34.5999 69.9004 33.5999 70.5004 32.7999 71.4004C31.9999 72.2004 31.2999 73.2004 30.7999 74.3004C30.2999 75.4004 30.0999 76.6004 30.0999 77.8004C30.0999 80.2004 30.9999 82.5004 32.6999 84.2004C34.3999 85.9004 36.6999 86.8004 39.0999 86.8004C39.2999 86.8004 39.5999 86.8004 39.7999 86.8004C40.4999 97.6004 41.4999 104.7 52.4999 121.6C54.5999 124.9 55.7999 128.2 56.2999 131.4C54.1999 130.3 52.1999 129.2 50.1999 127.8C49.2999 127.2 48.3999 126.6 47.5999 125.9C47.5999 125.8 47.5999 125.6 47.5999 125.5C46.8999 121 44.9999 116.7 42.1999 113.1C42.0999 113 41.8999 112.9 41.7999 112.9C41.5999 112.9 41.4999 113 41.3999 113.2C40.5999 114.7 39.8999 116.3 39.3999 118C36.9999 115.2 34.8999 112.1 33.0999 108.9C28.9999 101.3 26.7999 92.7004 26.5999 84.1004C26.4999 75.9004 28.1999 67.6004 31.6999 60.2004C35.1999 52.8004 40.2999 46.2004 46.6999 41.1004L49.4999 42.5004L50.5999 47.7004C50.5999 47.8004 50.6999 48.0004 50.7999 48.0004C50.8999 48.0004 50.9999 48.1004 50.9999 48.1004C51.0999 48.1004 51.0999 48.1004 51.1999 48.1004L52.3999 47.7004C52.8999 48.0004 53.6999 48.4004 55.0999 48.8004C55.3999 48.9004 55.5999 49.0004 55.8999 49.0004C55.4999 49.0004 55.1999 49.0004 55.0999 49.0004C53.2999 49.1004 52.3999 49.5004 52.3999 50.1004C52.3999 50.5004 52.5999 50.8004 52.9999 50.9004C53.7999 51.1004 54.8999 51.3004 55.8999 51.5004C56.0999 51.5004 56.3999 51.6004 56.5999 51.6004C55.5999 51.9004 55.1999 52.4004 55.1999 52.9004C55.1999 53.3004 55.4999 53.6004 55.9999 53.6004C56.7999 53.7004 57.7999 53.7004 58.7999 53.7004C59.8999 53.7004 61.0999 53.7004 61.8999 53.8004C63.6999 54.0004 65.4999 54.4004 67.1999 55.0004C67.2999 55.1004 67.4999 55.2004 67.5999 55.3004C67.6999 55.3004 67.6999 55.4004 67.7999 55.4004C68.5999 56.0004 69.3999 56.7004 70.0999 57.4004C69.9999 57.8004 69.8999 58.2004 69.8999 58.6004C69.8999 58.8004 69.9999 59.0004 70.0999 59.1004C70.0999 59.1004 71.5999 60.2004 73.6999 61.7004C73.6999 61.7004 73.7999 61.8004 73.8999 61.8004C76.5999 63.7004 80.1999 66.4004 83.1999 68.5004C87.6999 71.7004 90.4999 73.5004 95.2999 71.2004C98.6999 69.4004 102.1 67.4004 105.3 65.2004C108.5 68.2004 113.4 72.0004 117.2 73.7004C114.8 83.0004 113.3 92.5004 112.6 102C112.5 103.9 112.9 105.7 113.8 107.3L120.8 119.6C112 129 100.1 135.2 87.2999 136.7ZM68.1999 93.9004C68.6999 92.3004 68.8999 90.6004 68.9999 89.0004C69.5999 88.8004 70.1999 88.7004 70.7999 88.7004C73.5999 88.4004 76.2999 89.3004 78.4999 91.1004C80.1999 92.5004 81.2999 94.3004 81.8999 96.4004C80.4999 97.3004 79.2999 98.3004 78.1999 99.6004C75.6999 102.4 74.0999 105.9 73.5999 109.6C71.1999 110 68.6999 109.6 66.5999 108.4C64.3999 107.2 62.7999 105.2 61.8999 102.9C64.7999 100.6 66.9999 97.5004 68.1999 93.9004ZM83.1999 104.1C82.4999 104.8 81.7999 105.5 80.9999 106C82.6999 103.7 83.4999 100.9 83.1999 98.1004C83.1999 97.7004 83.0999 97.2004 82.9999 96.8004C84.3999 96.0004 85.8999 95.3004 87.3999 94.9004C86.8999 98.3004 85.3999 101.5 83.1999 104.1ZM82.2999 98.2004C82.4999 100.8 81.7999 103.3 80.2999 105.4C79.0999 107.1 77.3999 108.3 75.4999 109C75.1999 109.1 74.9999 109.2 74.6999 109.3C75.1999 105.9 76.6999 102.8 78.9999 100.2C79.9999 99.1004 81.0999 98.2004 82.1999 97.4004C82.1999 97.7004 82.1999 98.0004 82.2999 98.2004ZM39.1999 69.6004C41.2999 69.6004 43.3999 70.4004 44.8999 72.0004C45.6999 72.8004 46.1999 73.6004 46.5999 74.6004C46.9999 75.6004 47.1999 76.6004 47.1999 77.7004C47.1999 79.8004 46.3999 81.9004 44.7999 83.4004C43.1999 84.9004 41.2999 85.8004 39.0999 85.8004C36.9999 85.8004 34.8999 85.0004 33.3999 83.4004C31.8999 81.9004 30.9999 79.9004 30.9999 77.7004C30.9999 76.6004 31.1999 75.6004 31.5999 74.6004C31.9999 73.6004 32.5999 72.7004 33.2999 72.0004C34.0999 71.2004 34.8999 70.7004 35.8999 70.3004C37.0999 69.8004 38.1999 69.6004 39.1999 69.6004ZM139.9 132.9C137.8 133.8 135.9 134.9 134 136.2L133.3 135.1C135.4 134.3 137.4 133.3 139.3 132.1C139.5 132.3 139.7 132.6 139.9 132.9ZM130.5 104.1C129.8 103.1 129.1 102.1 128.3 101.2C128.7 100.5 129.1 99.7004 129.5 98.9004C130.5 97.1004 131.5 95.0004 132.5 93.0004C132.6 92.8004 132.7 92.6004 132.8 92.4004C133.1 92.9004 133.4 93.3004 133.7 93.8004C133 97.3004 132 100.8 130.5 104.1ZM156.9 102.9C155.5 104.5 153.6 105.4 151.5 105.7C149.4 105.9 147.4 105.3 145.7 104.1C140 99.8004 135.8 95.5004 133.3 91.4004C139 78.8004 136 75.3004 134.5 73.5004C134.4 73.4004 134.3 73.3004 134.2 73.2004C134 73.0004 133.7 72.9004 133.5 73.1004C133.3 73.3004 133.2 73.6004 133.4 73.8004C133.5 73.9004 133.6 74.0004 133.7 74.1004C135 75.6004 137.8 78.9004 132.2 91.2004V91.3004C132 91.7004 131.8 92.1004 131.6 92.6004C130.6 94.6004 129.5 96.7004 128.6 98.5004C127.5 100.7 126.5 102.5 125.9 103.8C125.8 104.1 125.9 104.3 126.2 104.5C126.3 104.5 126.3 104.5 126.4 104.5C126.6 104.5 126.8 104.4 126.9 104.2C127.1 103.6 127.5 103 127.8 102.2C133.2 108.8 136.3 117.6 139.8 127.7L140.6 130C140.2 130.3 139.7 130.6 139.3 131H139.2C139.1 131 139.1 131.1 139.1 131.1C138.2 131.7 137.2 132.3 136.2 132.8L127.7 116.5C127.6 116.3 127.3 116.2 127 116.3C126.8 116.4 126.7 116.7 126.8 117L135.3 133.3C133.8 134 132.3 134.6 130.7 135.1L121.8 119.5L114.6 106.8C113.8 105.3 113.4 103.7 113.5 102C114.2 92.5004 115.7 83.0004 118.1 73.7004C121.2 72.3004 125.3 69.9004 127.6 67.1004C127.9 67.2004 128.3 67.3004 128.7 67.4004C132.4 68.3004 138.6 69.7004 143.8 80.1004C145.6 83.8004 147.9 87.1004 150.6 90.1004C149.8 91.4004 149.2 92.6004 148.8 93.8004C148.7 94.1004 148.9 94.3004 149.1 94.4004C149.4 94.5004 149.6 94.3004 149.7 94.1004C152.5 85.5004 167 74.3004 169.1 72.7004C170.9 73.8004 172.5 75.1004 174 76.6004L163.8 87.1004C163.6 87.3004 163.6 87.6004 163.8 87.8004C163.9 87.9004 164 87.9004 164.1 87.9004C164.2 87.9004 164.4 87.8004 164.5 87.7004L174.7 77.2004C175.5 78.1004 176.4 78.9004 177.1 79.9004L156.9 102.9ZM175.3 76.3004C175.3 76.2004 175.2 76.2004 175.2 76.1004C175.2 76.1004 175.1 76.0004 175 76.0004C173.9 74.9004 172.8 74.0004 171.6 73.1004C171.7 73.0004 171.8 72.9004 171.8 72.8004C173.3 74.5004 175 76.0004 176.9 77.3004L176.6 77.7004C176.2 77.2004 175.7 76.8004 175.3 76.3004Z"
        fill="currentColor"
      />
      <path
        d="M36.6999 77.7004C37.0999 78.1004 37.6999 78.3004 38.2999 78.2004L38.8999 78.1004L39.0999 80.5004L36.7999 80.7004C36.4999 80.7004 36.2999 81.0004 36.2999 81.2004C36.2999 81.5004 36.4999 81.7004 36.7999 81.7004L39.0999 81.5004L39.1999 82.3004C39.1999 82.6004 39.3999 82.8004 39.6999 82.8004C39.9999 82.8004 40.1999 82.5004 40.1999 82.3004L40.0999 81.5004L40.6999 81.4004C41.2999 81.3004 41.7999 81.0004 42.0999 80.6004C42.4999 80.2004 42.5999 79.6004 42.5999 79.0004C42.5999 78.4004 42.2999 77.9004 41.8999 77.6004C41.4999 77.2004 40.8999 77.0004 40.2999 77.1004L39.6999 77.2004L39.4999 74.8004L41.7999 74.6004C42.0999 74.6004 42.2999 74.3004 42.2999 74.1004C42.2999 73.8004 41.9999 73.6004 41.7999 73.6004L39.4999 73.8004L39.2999 73.0004C39.2999 72.7004 38.9999 72.5004 38.7999 72.5004C38.4999 72.5004 38.2999 72.8004 38.2999 73.0004L38.3999 73.8004L37.7999 73.9004C37.1999 74.0004 36.6999 74.3004 36.3999 74.7004C36.0999 75.1004 35.8999 75.7004 35.8999 76.3004C35.9999 76.8004 36.1999 77.3004 36.6999 77.7004ZM40.2999 78.0004C40.5999 78.0004 40.8999 78.1004 41.0999 78.3004C41.2999 78.5004 41.4999 78.8004 41.4999 79.1004C41.4999 79.4004 41.3999 79.7004 41.1999 79.9004C40.9999 80.1004 40.6999 80.3004 40.4999 80.3004L39.9999 80.5004L39.7999 78.1004L40.2999 78.0004ZM37.1999 75.3004C37.3999 75.1004 37.6999 74.9004 37.8999 74.9004L38.4999 74.8004L38.6999 77.2004H38.1999C37.8999 77.2004 37.5999 77.1004 37.3999 76.9004C37.1999 76.7004 36.9999 76.4004 36.9999 76.1004C36.8999 75.8004 36.9999 75.5004 37.1999 75.3004Z"
        fill="currentColor"
      />
      <path
        d="M66.4999 101.6L68.9999 103L68.4999 103.9C68.3999 104.1 68.3999 104.4 68.6999 104.6C68.7999 104.6 68.8999 104.7 68.8999 104.7C69.0999 104.7 69.1999 104.6 69.2999 104.4L69.7999 103.5L70.4999 103.9C70.7999 104.1 71.0999 104.2 71.4999 104.2C71.5999 104.2 71.6999 104.2 71.7999 104.2C71.9999 104.2 72.2999 104.2 72.4999 104.1C72.7999 104 73.0999 103.9 73.3999 103.7C73.6999 103.5 73.8999 103.2 74.0999 102.9C74.2999 102.6 74.3999 102.3 74.3999 101.9C74.3999 101.6 74.3999 101.2 74.2999 100.9C74.1999 100.6 74.0999 100.3 73.7999 100C73.5999 99.7004 73.2999 99.5004 72.9999 99.3004L72.3999 99.0004L73.9999 96.3004L76.4999 97.7004C76.6999 97.8004 76.9999 97.8004 77.1999 97.5004C77.2999 97.3004 77.2999 97.0004 76.9999 96.8004L74.4999 95.4004L74.9999 94.5004C75.0999 94.3004 75.0999 94.0004 74.7999 93.8004C74.5999 93.7004 74.2999 93.7004 74.0999 94.0004L73.5999 94.9004L72.8999 94.5004C72.2999 94.2004 71.5999 94.1004 70.8999 94.3004C70.1999 94.5004 69.6999 94.9004 69.2999 95.5004C68.9999 96.1004 68.8999 96.8004 69.0999 97.5004C69.2999 98.2004 69.6999 98.7004 70.2999 99.1004L70.9999 99.5004L69.3999 102.3L66.8999 100.9C66.6999 100.8 66.3999 100.8 66.1999 101.1C65.9999 101.4 66.2999 101.5 66.4999 101.6ZM70.8999 98.1004C70.4999 97.9004 70.2999 97.6004 70.1999 97.1004C70.0999 96.7004 70.0999 96.3004 70.3999 95.9004C70.5999 95.5004 70.8999 95.3004 71.3999 95.2004C71.7999 95.1004 72.1999 95.1004 72.5999 95.4004L73.2999 95.8004L71.6999 98.5004L70.8999 98.1004ZM71.8999 99.9004L72.5999 100.3C72.7999 100.4 72.8999 100.5 73.0999 100.7C73.1999 100.9 73.2999 101.1 73.3999 101.3C73.4999 101.5 73.4999 101.7 73.3999 101.9C73.3999 102.1 73.2999 102.3 73.1999 102.5C73.0999 102.7 72.9999 102.8 72.7999 103C72.5999 103.1 72.3999 103.2 72.1999 103.3C71.9999 103.4 71.7999 103.4 71.5999 103.3C71.3999 103.3 71.1999 103.2 70.9999 103.1L70.2999 102.7L71.8999 99.9004Z"
        fill="currentColor"
      />
      <path
        d="M77.9999 152.6L65.3999 146.9C64.6999 146.6 63.8999 146.6 63.0999 146.8C62.3999 147.1 61.7999 147.6 61.3999 148.3C61.0999 149 60.9999 149.8 61.2999 150.6C61.5999 151.4 62.0999 151.9 62.7999 152.3L75.3999 158C75.7999 158.1 76.0999 158.2 76.4999 158.2C76.8999 158.2 77.1999 158.1 77.5999 158C78.2999 157.7 78.8999 157.2 79.1999 156.5C79.4999 155.8 79.5999 155 79.2999 154.3C79.2999 153.6 78.6999 153 77.9999 152.6ZM78.4999 156.1C78.2999 156.6 77.8999 156.9 77.3999 157.1C76.8999 157.3 76.3999 157.3 75.8999 157.1L63.2999 151.4C62.7999 151.2 62.4999 150.8 62.2999 150.3C62.0999 149.8 62.0999 149.3 62.3999 148.8C62.5999 148.3 62.9999 148 63.4999 147.8C63.9999 147.6 64.4999 147.6 64.9999 147.8L77.5999 153.5C78.0999 153.7 78.3999 154.1 78.5999 154.6C78.6999 155.1 78.6999 155.6 78.4999 156.1Z"
        fill="currentColor"
      />
      <path
        d="M99.5999 146.9C99.7999 146.9 99.9999 146.9 100.2 146.9C100.8 146.9 101.4 146.8 102 146.5C102.8 146.1 103.4 145.6 103.8 144.9C104.2 144.2 104.4 143.4 104.4 142.5C104.4 141.9 104.2 141.4 104 140.9C103.8 140.4 103.4 140 103 139.6C102.5 139.1 101.9 138.8 101.2 138.6C100.5 138.4 99.7999 138.4 99.1999 138.6C98.4999 138.8 97.8999 139.1 97.3999 139.6C96.8999 140.1 96.4999 140.6 96.2999 141.3C95.9999 142.1 95.9999 142.9 96.1999 143.7C96.3999 144.5 96.7999 145.2 97.4999 145.8C97.9999 146.4 98.6999 146.8 99.5999 146.9ZM97.1999 141.7C97.3999 141.2 97.6999 140.8 98.0999 140.4C98.4999 140 98.9999 139.8 99.4999 139.7C99.7999 139.6 99.9999 139.6 100.3 139.6C100.6 139.6 100.8 139.6 101.1 139.7C101.6 139.8 102.1 140.1 102.5 140.4C102.8 140.7 103.1 141 103.2 141.4C103.4 141.8 103.5 142.2 103.5 142.6C103.5 143.2 103.4 143.9 103 144.4C102.7 144.9 102.2 145.4 101.6 145.6C101 145.9 100.4 146 99.7999 145.9C99.1999 145.8 98.5999 145.5 98.0999 145.1C97.5999 144.7 97.2999 144.1 97.0999 143.5C96.8999 142.9 96.9999 142.2 97.1999 141.7Z"
        fill="currentColor"
      />
      <path
        d="M113 148.5C112.6 148.1 112.1 147.8 111.6 147.7C111.1 147.5 110.5 147.4 110 147.5C109.2 147.5 108.4 147.8 107.7 148.3C107 148.8 106.5 149.5 106.2 150.3C105.9 151.1 105.9 151.9 106.1 152.7C106.3 153.5 106.7 154.2 107.4 154.8C108 155.4 108.8 155.7 109.6 155.8C109.8 155.8 110 155.8 110.2 155.8C110.8 155.8 111.4 155.7 112 155.4C112.8 155 113.4 154.5 113.8 153.8C114.2 153.1 114.4 152.3 114.4 151.4C114.4 150.8 114.2 150.3 114 149.8C113.7 149.4 113.4 148.9 113 148.5ZM113.4 151.5C113.4 152.1 113.3 152.8 112.9 153.3C112.6 153.8 112.1 154.3 111.5 154.5C110.9 154.8 110.3 154.9 109.7 154.8C109.1 154.7 108.5 154.4 108 154C107.5 153.6 107.2 153 107 152.4C106.8 151.8 106.9 151.1 107.1 150.5C107.3 149.9 107.7 149.4 108.2 149C108.7 148.6 109.3 148.4 110 148.4C110.1 148.4 110.1 148.4 110.2 148.4C110.6 148.4 110.9 148.5 111.3 148.6C111.7 148.7 112.1 149 112.4 149.2C112.7 149.5 113 149.8 113.1 150.2C113.3 150.7 113.4 151.1 113.4 151.5Z"
        fill="currentColor"
      />
      <path
        d="M113.5 137.9C113.3 137.7 113 137.7 112.8 137.9L96.6999 155.6C96.4999 155.8 96.4999 156.1 96.6999 156.3C96.7999 156.4 96.8999 156.4 96.9999 156.4C97.0999 156.4 97.2999 156.3 97.3999 156.2L113.5 138.5C113.8 138.4 113.8 138.1 113.5 137.9Z"
        fill="currentColor"
      />
      <path
        d="M148.9 59.1004L153 58.9004L153.2 62.9004C153.2 63.2004 153.4 63.4004 153.7 63.4004C154 63.4004 154.2 63.2004 154.2 62.9004L154 58.9004L158 58.7004C158.3 58.7004 158.5 58.5004 158.5 58.2004C158.5 57.9004 158.3 57.7004 158 57.7004L154 57.9004L153.8 53.9004C153.8 53.6004 153.6 53.4004 153.3 53.4004C153 53.4004 152.8 53.6004 152.8 53.9004L153 57.9004L149 58.1004C148.7 58.1004 148.5 58.3004 148.5 58.6004C148.4 58.9004 148.6 59.1004 148.9 59.1004Z"
        fill="currentColor"
      />
    </svg>
  </SvgIcon>
)

export default InvestingTestingImage
