import { FC } from 'react'

import { SvgIcon, SvgIconProps } from '@mui/material'

const InterfaceTestingImage: FC<SvgIconProps> = ({ sx, ...props }) => (
  <SvgIcon sx={{ fontSize: 200, color: 'primary.dark', ...sx }} {...props}>
    <svg
      width="200"
      height="200"
      viewBox="0 0 200 200"
      fill="none"
      xmlns="http://www.w3.org/2000/svg"
    >
      <path
        d="M187.5 194H161.7C161.8 193.7 161.8 193.5 161.7 193.2C161.6 192.9 161.5 192.7 161.2 192.5C159.1 190.7 153.6 186.4 148.4 184.8L146.5 181.1C147.2 180.7 147.9 180.2 148.7 179.7C148.9 179.6 149 179.3 148.9 179.1C145.1 170.6 141.9 162.6 139.1 154.9C140.5 153 141.2 150.7 141.2 148.3V116.8H143.9C145.7 116.8 147.4 116.5 149 115.8C150.6 115.1 152.1 114.2 153.3 112.9C154.5 111.6 155.5 110.2 156.2 108.6C156.9 107 157.2 105.3 157.2 103.5V84.2C157.7 84.1 158.1 83.9 158.4 83.5C158.7 83.2 159 82.7 159.1 82.3H175.8C176.6 82.3 177.3 82.2 178 81.9C179.1 81.5 180 80.7 180.6 79.8C181.2 78.8 181.6 77.7 181.6 76.6V49.1C181.6 48.3 181.5 47.6 181.2 46.9C180.8 45.8 180 44.9 179.1 44.3C178.1 43.7 177 43.3 175.9 43.3H141.3C141.2 40.5 140 37.8 138 35.8C135.9 33.7 133 32.5 130 32.5H84.3C82.8 32.5 81.4 32.8 80 33.4C78.6 34 77.4 34.8 76.3 35.9C75.2 37 74.4 38.2 73.8 39.6C73.2 41 72.9 42.4 72.9 43.9V68.8H38.8C38 68.8 37.3 68.9 36.6 69.2C35.9 69.5 35.3 69.9 34.7 70.5C34.1 71.1 33.7 71.7 33.4 72.4C33.1 73.1 33 73.9 33 74.6V96.3C33 97.1 33.1 97.8 33.4 98.5C33.7 99.2 34.1 99.8 34.7 100.4C35.2 100.9 35.9 101.4 36.6 101.7C37.3 102 38.1 102.1 38.8 102.1H55.5C55.6 102.4 55.7 102.8 55.9 103C56.1 103.3 56.4 103.5 56.7 103.7C56.9 103.8 57.2 103.9 57.4 103.9C57.5 107.3 58.9 110.4 61.3 112.9C63.8 115.4 67.2 116.8 70.7 116.8H73V131.2C65.2 132.7 55.7 133.5 44.3 133.4C43.7 133.4 42.9 133.7 42.2 135.2L38.4 135.5C38 135.5 37.6 135.6 37.2 135.8C35.9 136.4 34.8 137.3 33.7 138.3C30.1 142 27.2 146.3 25.1 151C22.9 155.6 21.9 159.4 22.3 161.3C22.4 161.9 22.7 162.3 23 162.5C23.1 162.6 23.2 162.6 23.2 162.6C23.2 162.6 23.2 162.6 23.3 162.6C23.7 162.8 24.2 162.9 24.7 162.9C27.9 162.9 32.3 159 34.7 156C36.8 153.4 39.6 151.6 43.2 150.5C43.8 151.3 44.5 151.6 44.9 151.7C44.9 151.7 44.9 151.7 45 151.7C54.4 152.2 63.9 152 73.3 151.1C73.9 153.5 75.2 155.6 77.1 157.1C79.1 158.7 81.6 159.6 84.2 159.6H120.7L132.1 183.6C132.2 183.8 132.3 183.9 132.5 183.9C133.1 183.9 133.6 183.9 134.2 183.9H134.3L135.1 185.2C134.3 187.4 133.8 189.7 133.6 192.1C133.6 192.5 133.6 192.8 133.7 193.1C133.8 193.4 134 193.7 134.2 193.9H12.5C12.2 193.9 12 194.1 12 194.4C12 194.7 12.2 194.9 12.5 194.9H187.6C187.9 194.9 188.1 194.7 188.1 194.4C188.1 194.1 187.8 194 187.5 194ZM142.7 181.8C140.4 176 114.7 111.5 112.9 107.3C111.3 103.6 111.6 96.6 111.7 94.7C112.9 94.9 114.2 95.1 115.4 95.4C118.8 102.9 121.6 109.9 124.2 116.6C127.1 124.2 129.7 131.4 132.2 138.5C136.7 151.2 141.4 164.4 148 179.2C146.1 180.4 144.4 181.2 142.7 181.8ZM84.7 115.9H78.7V101.8C78.8 101.8 79 101.7 79.1 101.7C79.8 101.4 80.4 101 81 100.4C81.5 99.9 82 99.2 82.3 98.5C82.6 97.8 82.7 97 82.7 96.3V93.2C84.1 93.2 85.4 93.1 86.8 93H86.9C87 93 87 93 87.1 92.9V105C87.1 106.1 87.5 107.2 88.1 108.1C87.2 109.9 86.5 111.9 85.9 114.1L84.7 115.9ZM84 116.9L78.7 124.9V116.9H84ZM76.9 102.1C77.2 102.1 77.5 102.1 77.7 102V115.8H74V102.1H76.9ZM61.8 80.3C61 82.2 60.6 84.3 60.7 86.4C59.1 86.1 57.4 85.9 55.8 85.9C54.7 85.9 54.2 85.9 53.9 85.8C54.1 85.7 54.4 85.6 54.7 85.4C55 85.3 55.3 85.2 55.7 85.1C57.6 84.6 58.8 84.1 59.2 83.4C59.5 83.6 59.9 83.7 60.2 83.9C60.3 83.9 60.3 83.9 60.4 83.9C60.6 83.9 60.8 83.8 60.9 83.6C61 83.3 60.9 83.1 60.6 82.9C60 82.6 59.3 82.3 58.7 82C57.8 81.6 57.2 81.2 56.7 81C56.1 80.7 52.6 78.4 51.5 77.5C51.2 77.3 51 77 50.7 76.8C49.9 76.1 49.6 75.6 49.4 75.4C49.8 75.5 50.4 75.7 51.6 76.4C54.7 78.3 58.2 79.6 61.8 80.3ZM50.9 78.5C51.3 78.8 52 79.3 52.8 79.8C51.4 79.4 50 79 48.6 78.7C48.2 78.6 47.9 78.5 47.7 78.4C48.7 78.4 49.8 78.4 50.9 78.5ZM62.4 90.3C61 85.5 61.7 81.4 64.5 77.9C65.1 78 65.7 78.1 66.4 78.2H66.5C67.8 78.4 69.2 78.6 70.6 78.8C70.6 78.8 70.6 78.8 70.7 78.8C70.7 78.8 70.7 78.8 70.8 78.8C74.6 79.3 78.4 79.6 82.2 79.8C82.3 79.8 82.3 79.8 82.4 79.8H82.5C83.8 79.8 85.1 79.9 86.4 79.9C86.5 79.9 86.6 79.9 86.7 79.8C89.6 78.1 92.1 76.1 94.4 74.2C96.2 72.7 98 71.3 99.7 70.2C102.4 71.5 105.5 71.9 108.5 71.9C113.7 71.9 118.4 70.6 119.4 70.3C127.4 73.6 137.5 75.4 138.5 75C138.8 74.9 139.1 74.8 139.4 74.7C144.8 72.6 150.1 69.2 156 64C156.5 64.2 157.1 64.4 157.6 64.7C158.5 65.3 159.4 66 160.1 66.9C161.9 69.1 163.2 72 163.2 74.9C156.5 80.5 149 84.5 142.6 87.6C141.4 88.2 140 88.5 138.6 88.4C137.9 88.4 137.2 88.3 136.5 88.2C130.6 87.7 124.8 86.6 119.1 84.9C117.9 84.5 116.7 84.1 115.6 83.6C115.4 83.5 115.1 83.6 115 83.8C114.9 84 114.9 84.3 115.1 84.4L118.4 87.1C118.4 87.2 118.4 87.4 118.4 87.6C118.2 87.4 117.9 87.3 117.5 87.1C113.3 85.3 103.1 85.3 98.8 87.1C98.5 87.2 98.3 87.4 98 87.5V87.3L98.4 81.7C98.4 81.4 98.2 81.2 98 81.2C97.8 81.2 97.5 81.3 97.4 81.5L95.3 88.1C92.9 89.6 90.4 90.8 87.7 91.6C87.5 91.7 87.2 91.7 87 91.8C85.6 91.9 84.2 91.9 82.8 92C82.7 92 82.7 92 82.6 92C82.5 92 82.5 92 82.4 92C75.4 92.3 68.8 91.7 62.4 90.3ZM67.4 77.4C67.5 77.3 67.6 77.3 67.7 77.2C68 77 68.4 77 68.7 77C69.1 77.1 69.4 77.2 69.6 77.5C69.7 77.6 69.7 77.7 69.8 77.7C69 77.7 68.2 77.6 67.4 77.4ZM82.2 72.4C82 71.7 81.5 71 81 70.5C80.5 70 79.8 69.5 79.1 69.2C79 69.1 78.8 69.1 78.7 69.1V44.9C78.7 44 78.9 43.1 79.3 42.2C79.7 41.3 80.2 40.6 80.9 39.9C81.6 39.3 82.4 38.8 83.2 38.4C84.1 38.1 85 37.9 85.9 37.9H128.5C130.2 37.8 131.9 38.4 133.2 39.6C134.4 40.6 135.2 42 135.5 43.6H135.4C134.3 44 133.4 44.8 132.8 45.7C132.2 46.7 131.8 47.8 131.8 48.9V73C128.2 72.2 123.5 70.9 119.3 69.2C117.4 68.5 115.6 67.7 113.9 66.7C113.5 66.5 113.1 66.1 112.8 65.8C112.5 65.4 112.3 65 112.1 64.5C112 64.3 112 64.1 111.9 63.9V63.8C113.5 63.3 115 62.6 115.3 60.9C115.6 58.8 114 55.8 111.3 51.2C111.3 51.2 111.3 51.2 111.2 51.1C111.1 50.6 110.8 50.1 110.4 49.7C110.1 49.4 109.7 49.2 109.2 49C109.2 48.6 109.2 48.3 109.1 48C109 47.5 108.7 47 108.3 46.6C107.9 46.2 107.5 45.9 107 45.8C106.7 45.7 106.3 45.7 106 45.7C105.9 45.4 105.7 45 105.5 44.7C105.2 44.3 104.7 43.9 104.2 43.7C103.7 43.5 103.1 43.4 102.6 43.5C102.2 43.6 101.9 43.7 101.6 43.8C101.4 43.5 101.1 43.3 100.8 43.1C100.3 42.8 99.8 42.6 99.2 42.6C98.6 42.6 98.1 42.7 97.6 43C97.3 43.2 97 43.4 96.8 43.7C96.5 43.5 96.2 43.4 95.8 43.3C95.3 43.2 94.7 43.3 94.2 43.5C93.7 43.7 93.2 44 92.9 44.4C92.7 44.7 92.5 45 92.4 45.4C92 45.4 91.7 45.4 91.4 45.5C90.9 45.6 90.4 45.9 90 46.3C89.6 46.7 89.3 47.1 89.2 47.6C89.1 47.9 89.1 48.3 89.1 48.7C88.8 48.8 88.4 49 88.1 49.2C87.7 49.5 87.3 50 87.1 50.5C86.9 51 86.8 51.5 86.9 52.1C86.9 52.5 87.1 52.8 87.2 53.1C86.9 53.3 86.7 53.6 86.5 53.9C86.2 54.4 86 54.9 86 55.5C86 56.1 86.1 56.6 86.4 57.1C86.6 57.4 86.8 57.7 87.1 57.9C86.9 58.2 86.8 58.5 86.7 58.9C86.6 59.4 86.7 60 86.8 60.5C87 61 87.3 61.5 87.7 61.8C88 62 88.3 62.2 88.7 62.3C88.7 62.7 88.7 63 88.8 63.3C88.9 63.8 89.2 64.3 89.6 64.7C90 65.1 90.4 65.4 90.9 65.5C91.2 65.6 91.6 65.6 92 65.6C92.1 65.9 92.3 66.3 92.5 66.6C92.8 67 93.3 67.4 93.8 67.6C94.3 67.8 94.8 67.9 95.4 67.8C95.8 67.7 96.1 67.6 96.4 67.5C96.6 67.8 96.9 68 97.2 68.2C97.7 68.5 98.2 68.7 98.8 68.7C99.3 68.7 99.9 68.6 100.3 68.3C100.6 68.1 100.9 67.9 101.1 67.6C101.4 67.8 101.7 67.9 102 68C100.9 68.4 99.9 68.9 99 69.5C97.1 70.7 95.3 72.1 93.4 73.7C91.1 75.6 88.7 77.5 85.9 79.1C84.8 79.1 83.7 79.1 82.6 79V74.7C82.7 73.8 82.5 73.1 82.2 72.4ZM105.4 66.4C105.5 66.2 105.6 66 105.7 65.8C105.8 65.8 105.9 65.8 106 65.8C106.1 65.8 106.1 65.8 106.2 65.8C106 66 105.8 66.2 105.6 66.4C105.5 66.5 105.4 66.6 105.3 66.6C105.3 66.6 105.4 66.5 105.4 66.4ZM103.7 68.4C104.6 68.2 105.5 67.8 106.2 67.2C106.9 66.7 107.4 66 107.8 65.2C107.8 65.1 107.9 65.1 107.9 65C107.9 64.9 107.9 64.8 108 64.7C108.3 63.7 108.5 62.7 108.6 61.7C108.6 61.7 108.6 61.7 108.6 61.6C108.7 60.9 108.8 60.2 109 59.4V59.3C109.1 58.6 109.2 57.8 109.3 57C109.3 56.9 109.3 56.9 109.3 56.9V56.8C109.3 56.7 109.2 56.6 109.1 56.6C108.3 56.1 107.9 55.6 107.7 55.2C107.6 54.9 107.5 54.7 107.6 54.5C107.6 54.3 107.7 54.2 107.8 54.1C107.9 54 108.2 54.1 108.5 54.4C108.6 54.5 108.7 54.6 108.8 54.7C108.8 54.7 108.9 54.7 108.9 54.8H109C109.2 54.8 109.3 54.8 109.4 54.7C110.1 54.3 109.7 52.8 109.5 52C109.8 51.9 110.1 51.9 110.3 51.9C112.8 56.1 114.3 59 114.1 60.7C114 61.1 113 61.3 110.7 60.8L110 60.6C109.8 60.6 109.6 60.6 109.5 60.8C109.4 60.9 109.4 61.1 109.4 61.3C110 62.5 110.5 63.5 110.6 63.7C110.7 63.9 110.7 64.1 110.8 64.3C110.9 64.5 110.9 64.7 111 64.9C111.2 65.5 111.5 66.1 111.9 66.6C112.3 67.1 112.8 67.5 113.3 67.8C114.6 68.5 116 69.2 117.4 69.8C114.2 70.6 106.3 72.1 100.4 69.7C101.5 69.1 102.6 68.7 103.7 68.4ZM163.8 74.9C163.8 74.4 163.8 73.9 163.7 73.3C168.1 70.2 168.8 69.6 169.3 69.3C170.1 68.5 170.2 67.4 169.9 66.7C169.8 66.5 169.7 66.3 169.6 66.2C170.1 65.4 170.3 64.5 170.2 63.8C170.1 63.6 170 63.3 169.9 63.2C170.5 62.1 170.8 60.7 170.2 59.6C170.3 59.4 170.4 59.3 170.5 59.1H174.1V74.9H163.8ZM168.3 56.1C167.8 56.8 167.2 57.4 166.6 58H165.5C165.6 57.1 165.7 56.5 165.6 56.1H168.3ZM165.2 59.1H165.4C165.3 59.2 165.3 59.2 165.2 59.3C165.2 59.2 165.2 59.1 165.2 59.1ZM164 60.2C163.5 60.5 163 60.8 162.5 61.1C162.3 61.2 162.2 61.5 162.3 61.8C162.4 62 162.6 62 162.7 62C162.8 62 162.9 62 163 61.9C163.6 61.6 164.2 61.2 164.7 60.8C165.5 60.2 166.3 59.6 167 58.9C167.1 58.9 167.1 58.8 167.1 58.8C168 57.9 168.9 56.9 169.6 55.9C170.4 54.8 170.8 54.4 171 54.3C171.1 54.6 171 55.3 170.7 56.2C170.4 56.9 170.1 57.7 169.7 58.3C169.5 58.6 169.3 58.9 169.1 59.2C168.7 59.7 168 60.3 167.5 60.8C167.3 61 167 61.2 166.9 61.4C166.7 61.6 166.7 61.9 166.9 62.1C167 62.2 167.1 62.2 167.3 62.2C167.5 62.2 167.6 62.2 167.7 62.1C167.8 62 168 61.8 168.3 61.6C168.7 61.3 169.1 60.8 169.5 60.4C169.7 61.2 169.4 62.3 168.9 62.9L167.1 64.5C166.9 64.7 166.9 65 167.1 65.2C167.2 65.3 167.3 65.4 167.5 65.4C167.6 65.4 167.7 65.4 167.8 65.3L169.3 63.9C169.3 63.9 169.3 63.9 169.3 64C169.4 64.5 169.1 65.4 168.6 66C168.2 66.3 167.2 67.3 167.2 67.3L167.9 68C167.9 68 168.7 67.3 169.1 66.9C169.1 66.9 169.1 67 169.2 67C169.4 67.4 169.2 68.1 168.8 68.5C168.4 68.8 167.7 69.3 163.7 72.2C163.4 70.6 162.7 69.1 161.8 67.7C161.5 67.3 161.3 67 161 66.6C160.2 65.6 159.3 64.8 158.4 64.2C160.2 62.7 162.5 60.3 163.1 59C163.1 58.9 163.2 58.9 163.2 58.8V58.7C163.6 57.8 164.1 57 164.7 56.3C164.6 56.9 164.5 58.1 164 60.2ZM157.3 63.7C156.8 63.4 156.2 63.2 155.7 63.1C155.5 63.1 155.4 63.1 155.3 63.2C149.6 68.2 144.5 71.5 139.4 73.6V59.1H161.8C160.9 60.3 158.8 62.5 157.3 63.7ZM133.1 138.1C130.7 131.2 128.2 124.2 125.4 116.8H135.8V145.4C134.8 143 133.9 140.6 133.1 138.1ZM124.9 115.9C124.2 114.1 123.5 112.2 122.7 110.3C123.9 110.2 124.9 109.7 125.8 108.8C126.8 107.8 127.3 106.5 127.3 105.1V88.1C130.1 88.6 132.8 89 135.6 89.3V115.9H124.9ZM116.9 91C118.2 90.5 118.9 89.9 118.9 89.2L119 88.3C119.1 87.2 119.1 87.2 119.1 86.4V86.3C121.5 87 123.9 87.6 126.4 88.1V105C126.4 106.1 126 107.2 125.1 108C124.4 108.7 123.4 109.2 122.3 109.2C120.4 104.6 118.4 99.8 116.2 94.8L116.9 91ZM136.7 89.3C137.2 89.3 137.7 89.4 138.3 89.4C139 89.4 139.6 89.4 140.3 89.3V115.8H136.7V89.3ZM88.5 107.1C88.2 106.5 88 105.8 88 105V92.6C90.7 91.7 93.2 90.5 95.6 89C95.6 89 95.7 89 95.7 88.9C96 88.7 96.3 88.5 96.6 88.4V89C96.6 89.1 96.6 89.3 96.6 89.4C96.8 90 97.4 90.5 98.5 90.9L98.9 94.7C97.7 95.5 92.4 99.5 88.5 107.1ZM99.8 94.3L99.1 88C103.2 86.5 112.3 86.5 116.3 88L115.9 90.4V90.5L115.3 94.2C114 93.9 112.7 93.7 111.3 93.5C107.4 93.2 103.6 93.4 99.8 94.3ZM140.2 148.3C140.2 150.2 139.7 152.1 138.7 153.7C138 151.8 137.3 149.9 136.6 148C136.6 147.7 136.7 147.3 136.7 147V116.8H140.3V148.3H140.2ZM155.3 108.3C154.7 109.8 153.8 111.1 152.6 112.3C151.5 113.4 150.1 114.3 148.6 115C147.1 115.6 145.5 115.9 143.9 115.9H141.2V89.1C141.7 89 142.2 88.8 142.7 88.5C146.3 86.7 150.3 84.7 154.3 82.2C154.3 82.4 154.4 82.5 154.4 82.6C154.5 82.9 154.7 83.2 154.9 83.4C155.1 83.6 155.4 83.8 155.7 83.9C155.8 84 156 84 156.1 84V103.4C156.2 105.2 155.9 106.8 155.3 108.3ZM175.8 44.3C176.8 44.3 177.7 44.6 178.5 45.1C179.3 45.6 179.9 46.4 180.3 47.3C180.5 47.9 180.7 48.5 180.7 49.1V76.4C180.7 77.4 180.4 78.3 179.9 79.1C179.4 79.9 178.6 80.5 177.7 80.9C177.1 81.1 176.5 81.3 175.9 81.3H159.2C159.1 80.9 159 80.6 158.7 80.3C158.6 80.1 158.4 80 158.2 79.9C160 78.7 161.7 77.4 163.4 75.9H174.7C175 75.9 175.2 75.7 175.2 75.4V58.6C175.2 58.3 175 58.1 174.7 58.1H171.2C171.4 57.6 171.7 57.1 171.8 56.6C171.8 56.5 171.9 56.3 171.9 56.2H174.7C175 56.2 175.2 56 175.2 55.7V50.3C175.2 50 175 49.8 174.7 49.8H138.9C138.6 49.8 138.4 50 138.4 50.3V55.7C138.4 56 138.6 56.2 138.9 56.2H163.5C163 56.8 162.6 57.5 162.3 58.1H138.9C138.6 58.1 138.4 58.3 138.4 58.6V74C138.2 74.1 138.1 74.1 137.9 74.2C137.5 74.3 135.6 74 132.9 73.4V49.1C132.9 48.1 133.2 47.2 133.7 46.4C134.2 45.6 135 45 135.9 44.6C136.5 44.4 137.1 44.2 137.7 44.2H175.8V44.3ZM74 43.8C74 42.4 74.3 41.1 74.8 39.9C75.3 38.6 76.1 37.5 77 36.6C78 35.6 79.1 34.9 80.3 34.4C81.6 33.9 82.9 33.6 84.2 33.6H129.9C132.6 33.6 135.2 34.7 137.2 36.6C139 38.4 140.1 40.8 140.2 43.4H137.7C137.3 43.4 136.9 43.4 136.5 43.5C136.1 41.8 135.2 40.2 133.8 39C132.3 37.7 130.4 37 128.4 37.1H85.8C84.7 37.1 83.7 37.2 82.7 37.6C81.7 38 80.8 38.5 80 39.3C79.2 40 78.6 40.9 78.2 41.9C77.8 42.9 77.6 43.9 77.6 45V68.9C77.3 68.9 77.1 68.8 76.8 68.8H74V43.8ZM38.8 101.1C38.2 101.1 37.5 101 37 100.7C36.4 100.5 35.9 100.1 35.4 99.7C34.9 99.2 34.6 98.7 34.4 98.1C34.2 97.5 34 96.9 34 96.2V74.6C34 74 34.1 73.3 34.4 72.8C34.7 72.3 35 71.7 35.4 71.2C35.8 70.7 36.4 70.4 37 70.2C37.6 70 38.2 69.8 38.8 69.8H76.9C77.5 69.8 78.2 69.9 78.7 70.2C79.3 70.4 79.8 70.8 80.3 71.2C80.8 71.7 81.1 72.2 81.3 72.8C81.5 73.4 81.7 74 81.7 74.7V79C78.1 78.9 74.6 78.6 71 78.1C70.9 77.7 70.6 77.3 70.3 77C69.9 76.6 69.4 76.3 68.8 76.2C68.2 76.1 67.6 76.2 67.1 76.5C66.7 76.7 66.4 77 66.1 77.4C65.5 77.3 64.8 77.2 64.2 77.1C64 77.1 63.8 77.1 63.7 77.3C63.1 78 62.6 78.8 62.1 79.6C60.1 79.2 58.2 78.7 56.4 78L55.6 76.6C55.5 76.4 55.3 76.4 55.2 76.4C55 76.4 54.9 76.5 54.8 76.6L54.5 77.2C53.6 76.8 52.7 76.3 51.9 75.9C49.3 74.5 48.6 74.6 48.2 75.1C47.9 75.5 47.9 76.1 49.6 77.8C48.7 77.8 47.7 77.8 46.8 78C46.4 78.1 46.1 78.4 46.1 78.7C46.1 79.3 46.8 79.7 48.3 80.1C49.6 80.4 50.9 80.8 52.2 81.2L44.5 94.5C44.4 94.7 44.4 94.8 44.5 95C44.6 95.2 44.8 95.2 44.9 95.2H70.4C70.6 95.2 70.7 95.1 70.8 94.9C70.9 94.7 70.9 94.6 70.8 94.4L69.9 92.9C73.4 93.3 76.9 93.5 80.4 93.5C80.8 93.5 81.1 93.5 81.5 93.5V96.6C81.5 97.2 81.4 97.9 81.1 98.4C80.9 99 80.5 99.5 80.1 100C79.7 100.4 79.1 100.8 78.5 101C77.9 101.2 77.3 101.4 76.7 101.4H60.2C60.1 100.9 59.9 100.5 59.5 100.2C59 99.7 58.4 99.5 57.8 99.5C57.4 99.5 57.1 99.6 56.8 99.7C56.5 99.9 56.2 100.1 56 100.4C55.8 100.7 55.6 101 55.5 101.4V101.5H38.8V101.1ZM70.6 115.9C67.3 115.9 64.2 114.6 61.9 112.3C59.7 110.1 58.4 107.2 58.3 104C58.4 104 58.6 103.9 58.7 103.9C59.1 103.7 59.5 103.4 59.8 103C60 102.7 60.1 102.4 60.1 102.1H73V115.8H70.6V115.9ZM77.7 116.9V126.3L74.6 130.9C74.4 130.9 74.2 131 73.9 131V116.9H77.7ZM33.9 155.4C31.8 158 29.1 160.3 26.8 161.4C32 157.1 39.6 143.8 40.1 138.5C40.2 137.6 40.1 136.9 39.8 136.4L45.7 136C46.7 138 47.2 141.6 47.2 143.9C47.2 145.4 47 147.4 46.5 148.8C45.4 149 44.3 149.2 43.3 149.5C43.3 149.5 43.3 149.5 43.2 149.5C39.3 150.6 36.2 152.6 33.9 155.4ZM46.7 150.8C47 150.4 47.3 149.9 47.4 149.4C48 147.7 48.2 145.4 48.2 144.4C51.1 144.5 54.1 144.6 57 144.6C62.6 144.6 68.3 144.4 73.9 144C78.5 143.7 84.1 142.7 87.6 138.3C92.1 132.3 96.3 126.1 100.2 119.7L101.4 126.1C98 132 94.1 137.7 89.8 143C88.3 144.9 86.6 146.4 84.5 147.6C82.4 148.8 80.2 149.5 77.8 149.8C67.5 150.8 57 151.2 46.7 150.8ZM102.3 126.3L103.7 123.6L118.2 154.2H85.9C84.5 154.2 83.1 153.8 81.9 153C80.9 152.3 80.1 151.4 79.5 150.3C81.4 149.9 83.3 149.2 85 148.3C87.2 147.1 89.1 145.4 90.6 143.4C94.9 138.1 98.9 132.4 102.3 126.3ZM84.3 158.7C81.9 158.7 79.6 157.9 77.8 156.4C76.1 155 74.9 153.1 74.3 151C75.5 150.9 76.7 150.8 77.9 150.6C78.1 150.6 78.3 150.5 78.5 150.5C79.1 151.9 80.1 153 81.3 153.9C82.6 154.8 84.2 155.3 85.8 155.3H118.6L120.2 158.7H84.3ZM133 183L104.2 122.4C103.5 120.9 101.8 117.5 101.7 117.3C101 116.2 100.5 114.9 100.2 113.7L100 112.8C100 112.7 100 112.7 99.9 112.6C99.7 111.8 99.6 110.9 99.6 110C99.5 107.4 100.2 104.9 101.4 102.6C101.5 102.4 101.4 102.1 101.2 101.9C101 101.8 100.7 101.9 100.5 102.1C99.2 104.5 98.5 107.2 98.6 110C98.6 111.3 98.8 112.6 99.2 113.9L100 118.2C96 124.9 91.6 131.4 86.9 137.7C83.7 141.8 78.3 142.7 73.9 143C65.4 143.6 56.8 143.8 48.3 143.4C48.2 141.3 47.7 136.6 46.1 134.5C57.7 134.5 67.3 133.6 75.1 131.9C75.2 131.9 75.3 131.8 75.4 131.7L86.7 114.7L86.8 114.6C90.3 101.8 99 95.9 99.6 95.5C103.2 94.6 107 94.3 110.7 94.7C110.6 96.7 110.2 103.8 112 107.8C113.8 112 139.3 176 141.8 182.2C139 182.9 136.2 183 133 183ZM160.4 194C155.2 194 150.8 194 146.6 193.9C143.1 193.9 139.8 193.9 136.3 193.8C136.1 193.8 135.9 193.8 135.7 193.7C135.5 193.6 135.3 193.5 135.2 193.3C135.1 193.1 134.9 193 134.9 192.8C134.8 192.6 134.8 192.4 134.8 192.2C135 189.9 135.5 187.5 136.3 185.3C136.3 185.2 136.3 185 136.3 184.9L135.7 183.9C139.4 183.8 142.6 183.2 145.9 181.5L147.8 185.3C147.9 185.4 148 185.5 148.1 185.6C153.3 187.1 158.7 191.4 160.8 193.2C160.9 193.3 160.9 193.3 160.9 193.4C160.9 193.5 160.9 193.6 160.9 193.7C160.9 193.8 160.8 193.9 160.7 193.9C160.6 194 160.5 194 160.4 194Z"
        fill="currentColor"
      />
      <path
        d="M57.8 156.8C57.5 156.8 57.3 157 57.3 157.3V162.2H52.4C52.1 162.2 51.9 162.4 51.9 162.7C51.9 163 52.1 163.2 52.4 163.2H57.3V168.1C57.3 168.4 57.5 168.6 57.8 168.6C58.1 168.6 58.3 168.4 58.3 168.1V163.2H63.2C63.5 163.2 63.7 163 63.7 162.7C63.7 162.4 63.5 162.2 63.2 162.2H58.3V157.3C58.3 157 58.1 156.8 57.8 156.8Z"
        fill="currentColor"
      />
      <path
        d="M21.8 90.2C21.9 90.3 22 90.4 22.2 90.4C22.4 90.4 22.5 90.3 22.6 90.1L26.5 83.3C26.6 83.1 26.6 82.8 26.3 82.6C26.1 82.5 25.8 82.5 25.6 82.8L22.2 89L19.3 84.9C19.1 84.7 18.8 84.6 18.6 84.8C18.4 85 18.3 85.3 18.5 85.5L21.8 90.2Z"
        fill="currentColor"
      />
      <path
        d="M152.6 37.2C152.7 37.3 152.8 37.3 153 37.3C153.2 37.3 153.3 37.3 153.4 37.2L156.8 33.8L160.2 37.2C160.3 37.3 160.4 37.3 160.6 37.3C160.8 37.3 160.9 37.3 161 37.2C161.2 37 161.2 36.7 161 36.5L157.6 33.1L161 29.7C161.2 29.5 161.2 29.2 161 29C160.8 28.8 160.5 28.8 160.3 29L156.9 32.4L153.5 29C153.3 28.8 153 28.8 152.8 29C152.6 29.2 152.6 29.5 152.8 29.7L156 33L152.6 36.4C152.4 36.6 152.4 37 152.6 37.2Z"
        fill="currentColor"
      />
      <path
        d="M165 158.5L169 167.2C169.1 167.4 169.2 167.5 169.3 167.6C169.4 167.7 169.6 167.8 169.7 167.9C169.8 168 170 168 170.1 168C170.1 168 170.1 168 170.2 168C170.4 168 170.5 167.9 170.7 167.9C170.9 167.8 171 167.7 171.1 167.6C171.2 167.5 171.3 167.3 171.4 167.2C171.5 167 171.5 166.9 171.5 166.7C171.5 166.5 171.5 166.4 171.4 166.2L167.3 157.5C167.1 157.2 166.9 157 166.6 156.9C166.5 156.9 166.3 156.8 166.2 156.8L164.5 153.2C165.2 152.8 165.8 152.3 166.4 151.7C167.4 150.6 168 149.3 168.3 147.8C168.5 146.3 168.3 144.9 167.7 143.5C166.9 141.7 165.3 140.3 163.5 139.7C161.6 139 159.6 139.1 157.8 139.9C156.8 140.4 155.9 141 155.2 141.9C154.5 142.7 154 143.7 153.7 144.8C153.4 145.9 153.4 147 153.6 148.1C153.8 149.2 154.3 150.2 154.9 151.1C155.8 152.3 157 153.2 158.4 153.7C159.2 154 160.1 154.1 160.9 154.1C161.5 154.1 162.1 154 162.7 153.9C163 153.8 163.3 153.7 163.6 153.6L165.3 157.2C165.2 157.3 165.1 157.4 165.1 157.6C164.9 157.8 164.9 158.1 165 158.5ZM162.4 152.8C161.2 153.1 159.9 153 158.7 152.6C157.5 152.2 156.5 151.4 155.7 150.4C155.1 149.6 154.7 148.7 154.6 147.8C154.4 146.9 154.4 145.9 154.7 145C154.9 144.1 155.4 143.2 156 142.5C156.6 141.8 157.4 141.2 158.2 140.8C159.1 140.4 160 140.2 160.9 140.2C161.6 140.2 162.4 140.3 163.1 140.6C164.7 141.2 166 142.4 166.7 143.9C167.2 145.1 167.4 146.3 167.2 147.6C167 148.9 166.4 150 165.6 151C164.8 151.9 163.7 152.5 162.4 152.8Z"
        fill="currentColor"
      />
      <path
        d="M56.4 19.1C56.5 19.4 56.7 19.7 57 20C57.3 20.3 57.5 20.4 57.9 20.6C58.2 20.7 58.6 20.8 58.9 20.8C59 20.8 59.1 20.8 59.2 21.3C59.2 21.4 59.3 21.5 59.3 21.6V21.7C59.3 21.7 59.3 21.8 59.2 21.8C58.7 22.3 58.4 23 58.4 23.7C58.4 24.4 58.7 25.1 59.2 25.6L60.3 26.7C61.3 27.7 63.1 27.7 64.1 26.7C64.2 26.6 64.2 26.6 64.7 26.8C64.8 26.8 64.9 26.9 65 26.9C65 26.9 65.1 26.9 65.1 27V27.1C65.1 27.5 65.2 27.8 65.3 28.1C65.4 28.4 65.6 28.7 65.9 29C66.2 29.3 66.4 29.4 66.8 29.6C67.1 29.7 67.5 29.8 67.8 29.8H69.3C69.7 29.8 70 29.7 70.3 29.6C70.6 29.5 70.9 29.3 71.2 29C71.5 28.7 71.6 28.5 71.8 28.1C71.9 27.8 72 27.4 72 27.1C72 27 72 26.9 72.5 26.8C72.6 26.8 72.7 26.7 72.8 26.7H72.9C72.9 26.7 73 26.7 73 26.8C74 27.8 75.8 27.8 76.8 26.8L77.8 25.7C78.3 25.2 78.6 24.5 78.6 23.8C78.6 23.1 78.3 22.4 77.8 21.9C77.7 21.8 77.7 21.8 77.9 21.3C77.9 21.2 78 21.1 78 21C78 21 78 20.9 78.1 20.9H78.2C78.6 20.9 78.9 20.8 79.2 20.7C79.5 20.6 79.8 20.4 80.1 20.1C80.4 19.8 80.5 19.6 80.7 19.2C80.8 18.9 80.9 18.5 80.9 18.2V16.7C80.9 16 80.6 15.3 80.1 14.8C79.6 14.3 79 14 78.3 14C78 14 78 14 78 13.9C78 13.8 77.9 13.7 77.9 13.6C77.7 13.2 77.7 13.1 77.8 13C78.3 12.5 78.6 11.8 78.6 11.1C78.6 10.4 78.3 9.7 77.8 9.2L76.7 8.2C75.7 7.2 73.9 7.2 72.9 8.2C72.8 8.3 72.8 8.3 72.3 8.1C72.2 8.1 72.1 8 72 8C72 8 71.9 8 71.9 7.9V7.8C71.9 7.4 71.8 7.1 71.7 6.8C71.6 6.5 71.4 6.2 71.1 5.9C70.8 5.6 70.6 5.5 70.2 5.3C70 5.1 69.6 5 69.3 5H67.8C67.5 5 67.1 5.1 66.8 5.2C66.5 5.3 66.2 5.5 65.9 5.8C65.6 6.1 65.5 6.3 65.3 6.7C65.2 7 65.1 7.4 65.1 7.7C65.1 7.8 65.1 7.9 64.6 8C64.5 8 64.4 8.1 64.3 8.1H64.2C64.2 8.1 64.1 8.1 64.1 8C63.1 7 61.3 7 60.3 8L59.2 9.1C58.7 9.6 58.4 10.3 58.4 11C58.4 11.7 58.7 12.4 59.2 12.9C59.3 13 59.3 13 59.1 13.5C59.1 13.6 59 13.7 59 13.8C59 13.8 59 13.9 58.9 13.9H58.8C58.4 13.9 58.1 14 57.8 14.1C57.5 14.2 57.2 14.4 56.9 14.7C56.6 15 56.5 15.2 56.3 15.6C56.2 15.9 56.1 16.3 56.1 16.6V18.1C56.1 18.5 56.2 18.8 56.4 19.1ZM57.3 16C57.4 15.8 57.5 15.6 57.7 15.5C57.9 15.3 58 15.2 58.2 15.1C58.4 15 58.6 14.9 58.8 15C59.1 15 59.3 14.9 59.5 14.8C59.7 14.7 59.9 14.5 59.9 14.2C59.9 14.1 60 14 60 13.9C60.2 13.5 60.5 12.8 59.9 12.2C59.6 11.9 59.4 11.5 59.4 11C59.4 10.6 59.6 10.1 59.9 9.8L61 8.8C61.6 8.2 62.7 8.2 63.4 8.8C63.6 9 63.8 9.1 64 9.1C64.2 9.1 64.5 9.1 64.7 9C64.8 9 64.9 9 65 9C65.5 8.8 66.1 8.6 66.1 7.7C66.1 7.5 66.1 7.3 66.2 7.1C66.3 6.9 66.4 6.7 66.6 6.6C66.8 6.4 66.9 6.3 67.1 6.2C67.3 6 67.6 6 67.8 6H69.3C69.5 6 69.7 6 69.9 6.1C70.1 6.2 70.3 6.3 70.4 6.5C70.6 6.7 70.7 6.8 70.8 7C70.9 7.2 70.9 7.4 70.9 7.6C70.9 7.9 71 8.1 71.1 8.3C71.2 8.5 71.4 8.7 71.7 8.7C71.8 8.7 71.9 8.8 71.9 8.8C72.3 9 73 9.3 73.6 8.7C74.2 8.1 75.3 8.1 76 8.7L77.1 9.7C77.4 10 77.6 10.4 77.6 10.9C77.6 11.4 77.4 11.8 77.1 12.1C76.5 12.7 76.8 13.3 77 13.8C77 13.9 77.1 14 77.1 14.1C77.4 14.8 77.9 14.8 78.3 14.9C78.7 14.9 79.1 15.1 79.4 15.4C79.7 15.7 79.9 16.1 79.9 16.6V18.1C79.9 18.3 79.9 18.5 79.8 18.7C79.7 18.9 79.6 19.1 79.4 19.2C79.2 19.4 79.1 19.5 78.9 19.6C78.7 19.7 78.5 19.7 78.3 19.7C78.1 19.7 77.8 19.8 77.6 19.9C77.4 20 77.2 20.2 77.1 20.5C77.1 20.6 77 20.7 77 20.8C76.8 21.2 76.5 21.9 77.1 22.5C77.4 22.8 77.6 23.2 77.6 23.7C77.6 24.2 77.4 24.6 77.1 24.9L76.1 26C75.5 26.6 74.3 26.6 73.7 26C73.5 25.8 73.3 25.7 73.1 25.7C72.9 25.7 72.6 25.7 72.4 25.8C72.3 25.8 72.2 25.9 72.2 25.9C71.8 26.1 71.1 26.3 71.1 27.2C71.1 27.4 71.1 27.6 71 27.8C70.9 28 70.8 28.2 70.6 28.3C70.4 28.5 70.3 28.6 70.1 28.7C69.9 28.8 69.7 28.8 69.4 28.8H67.9C67.7 28.8 67.5 28.8 67.3 28.7C67.1 28.6 66.9 28.5 66.8 28.3C66.6 28.1 66.5 28 66.4 27.8C66.3 27.6 66.3 27.4 66.3 27.2C66.3 27 66.2 26.7 66.1 26.5C66 26.3 65.8 26.1 65.5 26.1C65.4 26.1 65.3 26 65.3 26C65.1 25.9 64.8 25.8 64.4 25.8C64.1 25.8 63.9 25.9 63.6 26.2C63 26.8 61.9 26.8 61.2 26.2L60.1 25.1C59.8 24.8 59.6 24.4 59.6 23.9C59.6 23.5 59.8 23 60.1 22.7C60.3 22.5 60.4 22.3 60.5 22.1C60.5 21.9 60.5 21.6 60.4 21.4C60.4 21.3 60.3 21.2 60.3 21.2C60.1 20.7 59.9 20.1 59 20.1C58.8 20.1 58.6 20.1 58.4 20C58.2 19.9 58 19.8 57.9 19.6C57.7 19.4 57.6 19.3 57.5 19.1C57.4 18.9 57.4 18.7 57.4 18.4V16.9C57.1 16.4 57.2 16.2 57.3 16Z"
        fill="currentColor"
      />
      <path
        d="M65.1 22.4C66.1 23.1 67.3 23.4 68.5 23.4C69.3 23.4 70.1 23.2 70.8 22.9C71.5 22.6 72.2 22.2 72.8 21.6C73.4 21 73.8 20.4 74.1 19.6C74.4 18.9 74.6 18.1 74.6 17.3C74.6 16.1 74.2 14.9 73.6 13.9C72.9 12.9 72 12.1 70.9 11.7C69.8 11.2 68.6 11.1 67.4 11.4C66.2 11.6 65.1 12.2 64.3 13.1C63.4 14 62.9 15 62.6 16.2C62.4 17.4 62.5 18.6 62.9 19.7C63.4 20.8 64.1 21.7 65.1 22.4ZM63.5 16.4C63.7 15.4 64.2 14.5 64.9 13.8C65.6 13.1 66.5 12.6 67.5 12.4C67.8 12.3 68.2 12.3 68.5 12.3C69.2 12.3 69.8 12.4 70.4 12.7C71.3 13.1 72.1 13.7 72.7 14.6C73.3 15.4 73.6 16.4 73.6 17.4C73.6 18.1 73.5 18.7 73.2 19.3C72.9 19.9 72.6 20.5 72.1 20.9C71.6 21.4 71.1 21.7 70.5 22C69.9 22.3 69.2 22.4 68.6 22.4C67.6 22.4 66.6 22.1 65.8 21.5C65 20.9 64.3 20.2 63.9 19.2C63.4 18.4 63.3 17.4 63.5 16.4Z"
        fill="currentColor"
      />
    </svg>
  </SvgIcon>
)

export default InterfaceTestingImage
