import { FC } from 'react'

import { SvgIcon, SvgIconProps } from '@mui/material'

const GetInspiredImage: FC<SvgIconProps> = ({ sx, ...props }) => (
  <SvgIcon sx={{ fontSize: 200, color: 'primary.dark', ...sx }} {...props}>
    <svg
      width="200"
      height="200"
      viewBox="0 0 200 200"
      fill="none"
      xmlns="http://www.w3.org/2000/svg"
    >
      <path
        d="M166.8 85.7997C166.7 85.6997 166.5 85.5996 166.4 85.5996C166.4 85.5996 166.4 85.5996 166.5 85.5996C167 85.5996 167.5 85.4996 167.6 85.0996C167.9 84.4996 167.6 83.8996 162.6 81.4996C161.2 80.7996 159.7 80.1996 158.3 79.6996C158.4 79.2996 158.4 78.9996 158.7 78.5996C159.5 77.5996 159.8 76.7997 159.4 76.3997C158.9 75.6997 157.7 76.1997 157.3 76.3997L156.9 76.5996C155.7 77.0996 153.4 78.1996 151.7 77.6996C151 77.4996 150.3 77.2996 149.7 77.1996C149.6 76.6996 149.5 76.1996 149.4 75.6996C149.4 75.4996 149.2 75.3997 149.1 75.2997C148.2 74.9997 147.2 74.5997 146.1 74.2997C146.3 72.4997 146.3 70.7996 146.3 68.9996C147.8 67.0996 148.8 64.9997 149.2 62.8997C149.6 60.2997 149 58.0996 147.3 56.7996C146.5 56.1996 145.4 55.5996 143.9 55.2996C141 46.5996 135.7 38.8996 128.6 33.0996C121.5 27.1996 112.8 23.3996 103.6 22.0996C90.6999 20.2996 78.0999 23.5996 68.0999 31.3996C58.4999 38.8996 52.3999 49.7997 51.0999 61.8997C50.6999 65.2997 50.7999 68.6996 51.0999 72.0996C50.0999 72.2996 49.1999 72.3996 48.1999 72.5996C47.9999 72.5996 47.8999 72.7997 47.7999 72.8997C47.5999 73.3997 47.4999 73.9996 47.3999 74.4996C45.2999 74.7996 40.8999 73.5996 39.9999 73.1996C39.5999 72.9996 38.4999 72.3996 37.8999 73.0996C37.4999 73.5996 37.6999 74.2997 38.4999 75.3997C38.7999 75.7997 38.7999 76.0996 38.7999 76.4996C37.2999 76.9996 35.7999 77.4996 34.3999 78.0996C29.2999 80.2996 29.0999 80.8996 29.2999 81.4996C29.3999 81.7996 29.8999 81.9996 30.3999 81.9996C30.2999 82.0996 30.0999 82.0996 29.9999 82.1996C25.1999 84.9996 25.5999 85.6996 25.7999 86.0996C25.8999 86.2996 25.9999 86.4996 26.6999 86.4996C27.1999 86.4996 27.8999 86.3996 29.0999 85.9996C28.3999 86.5996 27.8999 87.2997 28.1999 87.7997C28.2999 87.9997 28.5999 88.1996 28.9999 88.1996C29.3999 88.1996 30.0999 87.9996 30.8999 87.6996L31.0999 87.5996C30.5999 88.1996 30.1999 88.7997 30.5999 89.2997C30.7999 89.5997 31.0999 89.6996 31.4999 89.6996C31.9999 89.6996 32.6999 89.4996 33.4999 89.1996C35.2999 88.3996 37.4999 87.5996 39.4999 86.9996C44.4999 85.2996 47.3999 85.0996 48.3999 84.9996C48.5999 85.3996 48.6999 85.7997 48.8999 86.2997C48.9999 86.4997 49.1999 86.5996 49.3999 86.5996H49.4999C51.3999 86.2996 53.1999 85.9997 54.9999 85.7997C56.9999 91.9997 58.4999 96.4996 59.6999 100.5C58.3999 100.8 57.0999 101.4 55.8999 102.2C54.2999 103.3 52.9999 104.7 52.0999 106.4C51.1999 108.1 50.6999 110 50.6999 111.9C50.6999 113.8 51.1999 115.7 52.0999 117.4C55.5999 124 59.2999 130.4 63.2999 136.8C63.2999 138.2 62.9999 141.9 62.5999 145.5C62.2999 149 61.9999 152.7 61.8999 154.2C61.8999 154.5 62.0999 154.7 62.2999 154.7L77.4999 156.7C77.5999 157.2 77.6999 157.7 77.7999 158.1C78.3999 161.4 79.2999 164.7 80.2999 168L65.2999 166C64.6999 165.9 64.1999 165.9 63.5999 166C62.9999 166.1 62.4999 166.3 62.0999 166.6C61.5999 166.9 61.1999 167.3 60.8999 167.8C60.5999 168.3 60.3999 168.8 60.2999 169.4C60.1999 170 60.1999 170.5 60.3999 171.1C60.4999 171.6 60.7999 172.2 61.0999 172.6C61.3999 172.9 61.6999 173.2 61.9999 173.5C61.5999 173.7 61.2999 173.9 60.8999 174.1C60.4999 174.4 60.0999 174.9 59.7999 175.3C59.4999 175.9 59.2999 176.6 59.2999 177.3C59.2999 178 59.4999 178.7 59.7999 179.3C60.0999 179.9 60.5999 180.4 61.0999 180.8C60.6999 180.9 60.3999 181.1 60.0999 181.4C59.6999 181.7 59.2999 182.2 59.0999 182.6C58.7999 183.1 58.6999 183.6 58.5999 184.1C58.4999 184.6 58.5999 185.2 58.6999 185.7C58.8999 186.5 59.3999 187.2 59.9999 187.7C60.5999 188.2 61.3999 188.6 62.1999 188.6L107.5 194.9C107.7 194.9 107.8 194.9 108 194.9C110.3 194.9 111.8 193.1 112 191.2C112.2 189.8 111.7 188.2 110.4 187.3C111.8 186.7 112.7 185.3 112.8 183.8C112.9 182.4 112.5 180.9 111.2 180C111.8 179.7 112.4 179.3 112.8 178.8C113.7 177.6 113.9 175.8 113.3 174.4C112.7 173.1 111.5 172.3 110 172.1L85.4999 168.8C86.7999 165 87.4999 161.5 88.0999 158.4L115 162C115 162 115 162 115.1 162C115.3 162 115.5 161.8 115.6 161.6C116 159.7 116.5 156 117.1 152.2C117.8 148 118.4 143.7 118.8 141.7C127.4 138.2 135.5 133.7 143 128.1C143.1 128 143.2 127.8 143.2 127.6C143 126.5 142.8 125.5 142.5 124.5C145.2 123.2 147.1 122.9 149.8 122.3C150.5 122.2 151.2 122 152.1 121.9C157.5 121 162.8 119.4 167.8 117.4C168 117.3 168.1 117.1 168.1 116.9C168.1 116.7 168 116.5 167.8 116.4C160.9 113.3 154.8 112 149.8 111.1C148 110.7 146.3 110.4 144.9 110C144.8 110 144.7 110 144.5 110C141.8 111.4 139.3 113.1 136.9 114.9C136.1 114.2 135.3 113.5 134.3 112.8C134.1 112.7 133.9 112.7 133.7 112.8L132.6 113.5C130.4 114.9 128.1 116.3 125.8 117.7C129.1 110.4 133.6 102.9 141.6 89.6996C141.9 89.1996 142.1 88.7997 142.4 88.2997C144.1 88.5997 145.9 88.9997 147.7 89.2997C147.9 89.2997 148.2 89.1996 148.3 88.9996C148.5 88.4996 148.7 88.0996 148.8 87.5996C151.7 87.9996 154.5 88.6997 157.3 89.8997C159.7 90.7997 161.6 91.5997 163.2 92.3997C163.9 92.6997 164.6 92.9996 165.2 92.9996C165.6 92.9996 165.8 92.8996 166 92.5996C166.4 92.0996 166 91.4997 165.6 90.8997L165.8 90.9996C166.7 91.3996 167.3 91.5996 167.7 91.5996C168.1 91.5996 168.3 91.3997 168.4 91.2997C168.8 90.7997 168.3 90.0996 167.6 89.4996C168.8 89.9996 169.5 90.0996 170 90.0996C170.6 90.0996 170.7 89.8996 170.8 89.6996C171.1 89.4996 171.5 88.7997 166.8 85.7997ZM145.3 73.9996C144.2 73.6996 142.9 73.3996 141.6 73.0996C143 72.3996 144.3 71.2996 145.5 70.0996C145.4 71.4996 145.4 72.6996 145.3 73.9996ZM83.6999 68.9996C83.5999 68.9996 83.5999 68.8997 83.4999 68.8997C83.3999 68.8997 83.1999 68.8996 83.0999 68.9996C79.2999 69.0996 75.4999 69.1996 71.6999 69.4996C71.6999 68.8996 71.6999 68.2996 71.6999 67.6996C71.8999 66.2996 72.2999 64.9996 72.9999 63.7996C73.6999 62.5996 74.5999 61.5996 75.6999 60.6996C76.7999 59.8996 77.9999 59.2997 79.3999 58.8997C80.6999 58.5997 82.0999 58.4996 83.4999 58.6996L93.9999 60.0996C93.2999 61.3996 93.0999 62.3996 93.3999 63.2996C93.7999 64.2996 94.7999 64.9996 96.3999 65.1996C96.2999 65.5996 96.0999 65.9997 95.9999 66.2997C95.1999 67.9997 93.9999 68.8997 92.4999 68.7997C90.9999 68.7997 89.4999 68.6996 87.8999 68.6996C87.7999 68.6996 87.7999 68.5996 87.6999 68.5996C87.5999 68.5996 87.4999 68.5996 87.3999 68.6996C86.0999 68.8996 84.8999 68.8996 83.6999 68.9996ZM100.3 54.8997C101.6 53.9997 102.7 53.7996 103.3 54.2996C104 54.8996 104.1 56.5996 103.5 57.9996C103.3 58.3996 103.3 58.7996 103.6 58.9996C104 59.4996 104.9 59.2996 105.1 59.1996C105.4 59.0996 105.7 59.1996 105.9 59.2996C106 59.4996 106 59.7996 105.9 59.9996C105.8 60.2996 105.3 61.0996 103.5 61.0996C103.4 61.0996 103.4 61.0996 103.3 61.0996C102.9 61.2996 102.6 61.4997 102.3 61.8997C102.3 61.8997 102.3 61.9996 102.2 61.9996C102 62.4996 101.7 63.0996 101.5 63.4996C100.8 65.0996 100.2 66.3997 99.9999 67.3997H96.2999C96.3999 67.2997 96.4999 67.0997 96.4999 66.8997L99.1999 65.1996C99.3999 65.0996 99.4999 64.7996 99.3999 64.5996C99.2999 64.3996 99.0999 64.1997 98.8999 64.2997C98.1999 64.2997 97.4999 64.2997 96.7999 64.2997C95.8999 64.1997 94.3999 63.8996 94.0999 62.9996C93.7999 62.2996 94.0999 60.3996 98.3999 56.2996C99.0999 55.7996 99.6999 55.2997 100.3 54.8997ZM87.9999 69.8997C89.3999 69.8997 90.8999 69.8996 92.2999 69.9996C93.6999 70.0996 94.7999 69.4996 95.6999 68.4996H100.1C100.3 69.4996 101.2 69.9996 102.6 69.9996C103.7 69.9996 104.8 70.0996 105.9 70.0996C103.2 74.2996 101 78.6997 99.3999 83.3997L87.2999 83.0996C86.9999 78.9996 87.6999 71.8997 87.9999 69.8997ZM52.2999 61.9996C53.5999 50.0996 59.4999 39.4996 68.8999 32.0996C78.6999 24.4996 90.9999 21.1996 103.6 22.9996C112.6 24.1996 121.1 27.8996 128.1 33.7996C134.9 39.3996 140 46.7996 142.9 55.0996C139.7 54.6996 134.8 55.1996 127.5 57.7996C128.4 55.1996 128.4 53.4996 127.2 52.3996C124.3 49.5996 115 53.6997 111.5 55.3997C112.1 53.5997 111.5 52.6996 110.9 52.0996C108.8 50.2996 102.8 51.6996 99.6999 54.0996C98.9999 54.5996 98.3999 55.0996 97.7999 55.6996C96.2999 57.0996 95.1999 58.2997 94.4999 59.3997L83.5999 57.8997C82.0999 57.6997 80.5999 57.6996 79.0999 58.0996C77.5999 58.4996 76.2999 59.0996 75.0999 59.9996C73.8999 60.8996 72.8999 61.9997 72.1999 63.3997C71.4999 64.7997 70.9999 66.0996 70.7999 67.6996C70.6999 68.3996 70.6999 68.9996 70.7999 69.6996C64.5999 70.1996 58.4999 70.9996 52.3999 72.0996C51.9999 68.5996 51.8999 65.2996 52.2999 61.9996ZM30.7999 83.0996C32.6999 82.0996 34.6999 81.1997 36.7999 80.3997C36.4999 80.8997 36.1999 81.3996 35.8999 81.9996C34.7999 82.3996 33.7999 82.8996 32.7999 83.4996C32.7999 83.4996 32.7999 83.4996 32.6999 83.4996C29.5999 84.9996 27.8999 85.3996 27.1999 85.4996C27.5999 85.1996 28.5999 84.3996 30.7999 83.0996ZM30.9999 86.6996L30.6999 86.7997C30.1999 86.9997 29.7999 87.0996 29.5999 87.1996C29.6999 86.9996 29.9999 86.7996 30.2999 86.4996C31.7999 85.1996 33.4999 84.1997 35.3999 83.2997C35.2999 83.6997 35.0999 84.1996 34.9999 84.5996C34.5999 84.8996 34.1999 85.0997 33.7999 85.3997C32.9999 85.8997 31.9999 86.2996 30.9999 86.6996ZM39.2999 86.0996C37.3999 86.6996 35.0999 87.4997 33.1999 88.2997C32.3999 88.5997 31.8999 88.6997 31.6999 88.7997C31.7999 88.5997 32.0999 88.2996 32.6999 87.6996C33.3999 87.0996 34.0999 86.5996 34.7999 86.0996C34.7999 86.1996 34.7999 86.3996 34.7999 86.4996C34.7999 86.7996 34.9999 86.9996 35.2999 86.9996C35.5999 86.9996 35.7999 86.7996 35.7999 86.4996C35.8999 85.1996 36.1999 83.8996 36.6999 82.6996C36.7999 82.5996 36.7999 82.4997 36.8999 82.3997C37.3999 81.3997 37.8999 80.4996 38.6999 79.6996C38.6999 79.6996 38.6999 79.6996 38.6999 79.5996C38.6999 79.5996 38.6999 79.4996 38.7999 79.4996V79.1996C38.7999 79.1996 38.7999 79.1996 38.7999 79.0996V78.9996C38.7999 78.9996 38.7999 78.8997 38.6999 78.8997C38.6999 78.8997 38.6999 78.8997 38.5999 78.8997C38.5999 78.8997 38.4999 78.8997 38.4999 78.7997H38.1999C38.1999 78.7997 38.1999 78.7997 38.0999 78.7997C36.7999 79.1997 35.4999 79.6996 34.1999 80.1996C33.1999 80.5996 31.8999 80.7997 31.0999 80.8997C31.6999 80.4997 32.7999 79.8997 35.1999 78.8997C36.4999 78.2997 37.8999 77.7997 39.2999 77.3997C39.2999 77.5997 39.3999 77.6997 39.3999 77.8997C40.0999 79.8997 41.3999 80.9996 43.0999 80.9996C43.3999 80.9996 43.5999 80.9997 43.8999 80.8997C44.1999 80.7997 44.2999 80.5997 44.2999 80.2997C44.1999 79.9997 43.9999 79.8997 43.6999 79.8997C41.6999 80.2997 40.6999 78.8996 40.2999 77.5996C40.1999 77.1996 40.0999 76.7996 40.0999 76.4996C40.0999 75.9996 40.0999 75.3996 39.5999 74.6996C39.1999 74.1996 39.0999 73.8996 38.9999 73.6996C39.0999 73.6996 39.3999 73.7996 39.7999 73.9996C40.7999 74.4996 44.9999 75.5997 47.4999 75.3997C47.0999 78.1997 47.2999 81.0997 48.1999 83.7997C46.8999 84.0997 43.9999 84.4996 39.2999 86.0996ZM49.3999 84.4996C49.3999 84.3996 49.3999 84.2996 49.2999 84.1996C48.2999 81.2996 48.0999 78.1996 48.5999 75.0996C48.6999 74.5996 48.7999 74.0996 48.9999 73.5996C60.0999 71.3996 71.4999 70.1996 82.7999 69.9996C82.4999 71.8996 81.7999 77.5996 81.9999 83.9996H81.1999C72.9999 83.8996 64.4999 83.7997 55.4999 84.7997C55.3999 84.7997 55.3999 84.7997 55.2999 84.7997C53.4999 84.9997 51.6999 85.1996 49.7999 85.4996C49.5999 85.1996 49.4999 84.8996 49.3999 84.4996ZM56.0999 85.6996C64.8999 84.7996 73.0999 84.8996 81.0999 84.9996H81.9999C82.1999 88.5996 82.6999 92.3997 83.6999 95.8997C83.1999 97.0997 82.8999 98.3996 82.5999 99.6996C76.1999 99.2996 68.7999 99.4997 61.1999 100.3C60.9999 100.3 60.7999 100.4 60.5999 100.4C59.5999 96.2997 58.0999 91.8996 56.0999 85.6996ZM51.7999 112C51.7999 110.2 52.1999 108.5 52.9999 106.9C53.7999 105.3 54.9999 104 56.4999 103C57.9999 102 59.5999 101.4 61.3999 101.2C68.9999 100.4 76.5999 100.2 82.9999 100.6H83.0999C85.6999 100.8 88.0999 101 90.2999 101.4C90.5999 101.4 90.7999 101.3 90.8999 101C90.8999 100.7 90.7999 100.5 90.4999 100.4C88.3999 99.9997 86.0999 99.7996 83.6999 99.5996C83.8999 98.3996 84.2999 97.0996 84.6999 95.9996C84.6999 95.8996 84.6999 95.7996 84.6999 95.6996C81.5999 85.5996 83.2999 72.5997 83.6999 69.8997C84.7999 69.8997 85.7999 69.8997 86.8999 69.8997C86.6999 72.0997 85.8999 79.4996 86.3999 83.6996C86.3999 83.8996 86.5999 84.0996 86.8999 84.0996L99.7999 84.3997C99.9999 84.3997 100.2 84.2996 100.3 84.0996C101.9 79.1996 104.2 74.4996 107.1 70.1996C108 70.1996 108.9 70.2997 109.8 70.3997C107.3 74.5997 101.4 86.3997 104.2 89.3997L102.5 95.3997C102.5 95.4997 102.5 95.6997 102.6 95.7997C102.7 95.8997 108.4 104 106.8 110.9C106.1 113.8 104.3 116 101.3 117.6C100.7 117.9 99.9999 118.2 99.2999 118.5H99.1999C96.1999 119.6 92.6999 120.1 88.6999 120C83.3999 119.7 78.1999 118.6 73.1999 116.7C72.1999 114.9 71.3999 113.1 71.3999 113.1C71.2999 112.8 70.9999 112.7 70.6999 112.8C70.3999 112.9 70.2999 113.2 70.3999 113.5C70.3999 113.5 71.2999 115.4 72.2999 117.3C76.3999 125.1 80.9999 132.7 86.0999 140C85.4999 141.1 84.8999 142 84.0999 143C83.9999 143 83.9999 143.1 83.9999 143.2C82.8999 144.5 81.4999 145.6 79.9999 146.5C77.6999 147.8 74.9999 148.6 72.3999 148.9C65.3999 138.7 58.8999 128 53.0999 117.1C52.1999 115.5 51.7999 113.8 51.7999 112ZM89.2999 150C88.2999 148.2 87.1999 146.4 85.9999 144.7L85.0999 143.5C85.8999 142.5 86.5999 141.4 87.1999 140.3C87.2999 140.1 87.2999 139.9 87.1999 139.8C82.2999 132.9 77.7999 125.6 73.8999 118.2C76.8999 119.3 79.9999 120.1 83.1999 120.6C84.5999 126.3 87.2999 131.6 90.9999 136.1L89.2999 150ZM63.6999 145.7C63.8999 142.9 64.1999 140.2 64.2999 138.4C66.6999 142.2 69.1999 146 71.7999 149.7C71.8999 149.8 71.9999 149.9 72.1999 149.9C73.3999 149.8 74.4999 149.6 75.5999 149.3C76.4999 151.2 76.9999 153.5 77.4999 155.8L63.0999 153.9C63.1999 152.2 63.3999 148.9 63.6999 145.7ZM110 173.2C111.2 173.3 112.1 173.9 112.5 174.9C113 176 112.8 177.4 112.1 178.3C111.5 179.1 110.5 179.5 109.4 179.4C109.4 179.4 109.4 179.4 109.3 179.4C109 179.4 108.8 179.6 108.7 179.8C108.6 180 108.9 180.3 109.1 180.4C109.1 180.4 109.1 180.4 109.2 180.4C111.3 180.7 112 182.3 111.9 183.8C111.7 185.3 110.6 186.9 108.5 186.7C108.2 186.7 108 186.9 108 187.1C108 187.4 108.2 187.6 108.4 187.7C110.5 188 111.3 189.6 111.1 191.2C110.9 192.7 109.8 194.2 107.7 194L62.3999 187.7C61.7999 187.6 61.1999 187.4 60.6999 187C60.1999 186.6 59.8999 186.1 59.6999 185.5C59.5999 185.1 59.4999 184.7 59.5999 184.3C59.5999 183.9 59.7999 183.5 59.9999 183.1C60.1999 182.7 60.4999 182.4 60.7999 182.2C61.0999 181.9 61.4999 181.8 61.8999 181.6C62.2999 181.5 62.6999 181.5 63.0999 181.5C63.0999 181.5 63.0999 181.5 63.1999 181.5C63.4999 181.5 63.6999 181.3 63.6999 181.1C63.6999 180.8 63.4999 180.6 63.2999 180.5C63.2999 180.5 63.2999 180.5 63.1999 180.5C62.6999 180.4 62.1999 180.3 61.7999 180C61.3999 179.7 60.9999 179.3 60.7999 178.8C60.5999 178.3 60.3999 177.8 60.3999 177.3C60.3999 176.8 60.4999 176.3 60.7999 175.8C60.9999 175.4 61.2999 175.1 61.5999 174.9C61.8999 174.6 62.2999 174.4 62.6999 174.3C63.0999 174.2 63.4999 174.2 63.8999 174.2C64.1999 174.2 64.3999 174 64.4999 173.8C64.4999 173.5 64.2999 173.3 64.0999 173.2C63.6999 173.1 63.2999 173 62.8999 172.8C62.4999 172.6 62.1999 172.3 61.9999 172C61.6999 171.7 61.5999 171.3 61.4999 170.9C61.3999 170.5 61.3999 170.1 61.4999 169.6C61.5999 169.2 61.6999 168.8 61.9999 168.4C62.1999 168 62.4999 167.7 62.8999 167.5C63.2999 167.3 63.5999 167.1 64.0999 167C64.4999 166.9 64.8999 166.9 65.3999 167L81.1999 169.2C81.6999 170.8 82.2999 172.4 82.9999 174C83.0999 174.2 83.2999 174.3 83.4999 174.3C83.6999 174.3 83.8999 174.2 83.9999 174C84.5999 172.6 85.1999 171.2 85.6999 169.8L110 173.2ZM88.3999 157.2V157.4C88.3999 157.3 88.3999 157.3 88.3999 157.2ZM116.1 152C115.5 155.6 115 158.9 114.7 160.9L89.3999 157.4L91.7999 136.9C93.4999 138.7 95.2999 140.4 97.2999 141.9C99.2999 143.4 101.6 144.4 104.1 144.9C105 145 105.9 145.1 106.7 145.1C108.3 145.1 109.9 144.9 111.5 144.4C113.6 143.7 115.7 143 117.8 142.1C117.3 144.3 116.7 148.2 116.1 152ZM133.3 114.5L134.2 114C138.8 117.5 141.3 121.5 142.3 127.5C132.9 134.5 122.4 139.9 111.3 143.5C109.1 144.2 106.7 144.4 104.4 144C102.1 143.6 99.8999 142.6 97.9999 141.2C95.7999 139.6 93.7999 137.7 91.9999 135.6L91.8999 135.5C88.9999 132.1 86.6999 128.1 85.2999 123.9C90.2999 123 95.0999 121.5 99.7999 119.5C100.4 119.3 101.1 119 101.6 118.7C103.1 121.9 105.2 124.8 107.6 127.3L110.4 129.8C110.5 129.9 110.6 129.9 110.7 129.9C110.8 129.9 110.9 129.9 111 129.8L119.4 122.8C124.2 120.3 128.9 117.3 133.3 114.5ZM140.9 89.3997C132.4 103.3 127.8 111 124.5 118.8C119.1 122 113.5 124.9 108 126.3C105.7 123.9 103.8 121.2 102.3 118.2C105.2 116.5 107 114.1 107.7 111.1C109.3 104.3 104.4 96.6997 103.5 95.3997L105.3 89.2997L106.5 85.0996C106.7 85.0996 106.9 85.0996 107 85.0996C118.8 85.0996 128.7 85.9997 141.4 88.3997C141.3 88.6997 141.1 89.0997 140.9 89.3997ZM147.6 88.4996C131.8 85.2996 120.7 84.0996 107.1 84.0996C106.8 84.0996 106.5 84.0996 106.2 84.0996C106 84.0996 105.8 84.1996 105.7 84.4996L104.6 88.0996C103.6 85.0996 107.9 75.5996 110.9 70.4996C115 70.7996 120.9 71.2996 127 71.9996C131.1 72.4996 135.2 73.0997 139.2 73.7997C142.9 74.4997 146.1 75.2996 148.5 76.1996C149.3 79.7996 149.1 83.5996 148 87.0996C148 87.1996 147.9 87.1997 147.9 87.2997C147.9 87.6997 147.7 88.0996 147.6 88.4996ZM163.7 91.6996C162.1 90.8996 160.2 90.0996 157.8 89.1996C155.1 88.0996 152.2 87.2997 149.3 86.8997C150.1 84.0997 150.4 81.0996 150.1 78.1996C150.6 78.2996 151.1 78.4996 151.7 78.5996C153.7 79.1996 156.2 78.0996 157.6 77.4996L158 77.2997C158.4 77.0997 158.7 77.0996 158.8 76.9996C158.7 77.1996 158.6 77.4997 158.2 77.8997C157.7 78.4997 157.6 79.0996 157.6 79.5996C157.5 79.9996 157.5 80.3996 157.2 81.0996C156.9 81.8996 156.2 82.5996 155.4 82.9996C154.6 83.3996 153.7 83.4997 152.8 83.2997C152.5 83.1997 152.3 83.3996 152.2 83.6996C152.1 83.9996 152.3 84.1997 152.6 84.2997C153 84.3997 153.3 84.3997 153.7 84.3997C154.5 84.3997 155.2 84.1997 155.9 83.8997C156.9 83.3997 157.7 82.4996 158.1 81.4996C158.3 81.1996 158.4 80.8996 158.4 80.5996C159.8 81.0996 161.1 81.6997 162.5 82.2997C164.8 83.3997 165.9 84.0996 166.5 84.4996C165.7 84.3996 164.4 84.0996 163.4 83.6996H163.3C162.1 83.0996 160.9 82.5996 159.7 82.1996C159.5 82.0996 159.3 82.0996 159.1 82.1996C159 82.2996 159 82.2997 159 82.3997V82.5996C159 82.5996 159 82.5996 159 82.6996C159 82.7996 159.1 82.8997 159.1 82.8997C159.8 83.6997 160.3 84.5996 160.7 85.5996C160.7 85.6996 160.7 85.6997 160.8 85.7997C161.3 86.9997 161.6 88.2996 161.6 89.6996C161.6 89.9996 161.8 90.1996 162.1 90.1996C162.4 90.1996 162.6 89.9996 162.6 89.6996C162.6 89.5996 162.6 89.3997 162.6 89.2997C163.3 89.7997 164 90.3996 164.6 90.9996C165.2 91.5996 165.4 91.9996 165.5 92.1996C164.9 92.1996 164.4 92.0996 163.7 91.6996ZM166.3 90.2997L165.4 89.8997C164.6 89.4997 163.9 89.1997 163.3 88.8997C162.9 88.5997 162.5 88.2996 162.1 87.9996C162 87.4996 161.9 87.0996 161.8 86.6996C163.6 87.5996 165.2 88.6996 166.7 90.0996C167 90.3996 167.3 90.5997 167.4 90.7997C167.1 90.6997 166.7 90.4997 166.3 90.2997ZM164.3 86.9996C163.3 86.3996 162.3 85.7997 161.2 85.2997C161 84.7997 160.7 84.1996 160.4 83.6996C162.4 84.4996 164.4 85.4996 166.2 86.5996C168.4 87.9996 169.3 88.7996 169.6 89.1996C169 89.0996 167.4 88.5996 164.3 86.9996Z"
        fill="currentColor"
      />
      <path
        d="M38.3999 124.1L43.2999 125.2C43.5999 125.3 43.7999 125.1 43.8999 124.8C43.9999 124.5 43.7999 124.3 43.4999 124.2L37.3999 122.8C37.2999 122.8 37.2999 122.8 37.1999 122.8C37.0999 122.8 36.9999 122.9 36.8999 123C36.8999 123 36.8999 123.1 36.7999 123.1L35.3999 129.2C35.2999 129.5 35.4999 129.7 35.7999 129.8H35.8999C36.0999 129.8 36.2999 129.6 36.3999 129.4L37.4999 124.5L49.1999 143.2C49.2999 143.4 49.4999 143.4 49.5999 143.4C49.6999 143.4 49.7999 143.4 49.8999 143.3C50.0999 143.2 50.1999 142.8 50.0999 142.6L38.3999 124.1Z"
        fill="currentColor"
      />
      <path
        d="M178.7 69.4996C178.4 68.8996 177.9 68.4996 177.3 68.1996C176.7 67.8996 176.1 67.7996 175.5 67.7996C174.9 67.7996 174.2 67.9996 173.7 68.3996C173.3 68.6996 172.9 69.0996 172.6 69.4996C172.3 69.8996 172.2 70.4996 172.1 70.9996C172 71.4996 172.1 72.0996 172.3 72.4996C172.5 72.9996 172.8 73.3997 173.1 73.7997C173.6 74.2997 174.2 74.5997 174.9 74.7997C175.1 74.7997 175.4 74.8997 175.6 74.8997C176.1 74.8997 176.5 74.7996 177 74.5996C177.7 74.2996 178.2 73.8997 178.6 73.2997C179 72.6997 179.2 71.9997 179.2 71.2997C179.2 70.5997 179.1 69.9996 178.7 69.4996ZM178.2 71.2997C178.2 71.7997 178.1 72.2996 177.8 72.6996C177.5 73.0996 177.1 73.3996 176.7 73.5996C176.2 73.7996 175.7 73.7996 175.2 73.6996C174.7 73.5996 174.3 73.3996 173.9 72.9996C173.6 72.6996 173.4 72.3996 173.3 72.0996C173.2 71.6996 173.1 71.3996 173.2 70.9996C173.2 70.5996 173.4 70.2997 173.5 69.8997C173.7 69.5997 174 69.2996 174.3 69.0996C174.7 68.7996 175.1 68.6996 175.6 68.6996H175.7C176.1 68.6996 176.5 68.7996 176.9 68.9996C177.3 69.1996 177.6 69.4997 177.9 69.8997C178.1 70.3997 178.2 70.7997 178.2 71.2997Z"
        fill="currentColor"
      />
      <path
        d="M131 178.7C130.8 178.5 130.5 178.3 130.2 178.2C129.9 178.1 129.6 178 129.3 178C128.8 178 128.3 178.1 127.9 178.4C127.5 178.7 127.2 179.1 127 179.5C126.8 180 126.8 180.5 126.9 180.9C127 181.4 127.2 181.8 127.6 182.2C128 182.5 128.4 182.8 128.9 182.9C129.1 182.9 129.2 182.9 129.4 182.9C129.7 182.9 130.1 182.8 130.4 182.7C130.9 182.5 131.2 182.2 131.5 181.8C131.8 181.4 131.9 180.9 131.9 180.4C131.9 180.1 131.8 179.7 131.7 179.4C131.4 179.2 131.2 178.9 131 178.7ZM130.7 180.5C130.7 180.8 130.6 181.1 130.4 181.3C130.2 181.5 130 181.7 129.7 181.9C129.4 182 129.1 182 128.8 182C128.5 181.9 128.2 181.8 128 181.6C127.8 181.4 127.6 181.1 127.6 180.8C127.5 180.5 127.6 180.2 127.7 179.9C127.8 179.6 128 179.4 128.3 179.2C128.6 179 128.8 178.9 129.2 178.9C129.4 178.9 129.6 178.9 129.8 179C130 179.1 130.1 179.2 130.3 179.3C130.4 179.4 130.5 179.6 130.6 179.8C130.6 180.1 130.7 180.3 130.7 180.5Z"
        fill="currentColor"
      />
      <path
        d="M46.6999 33.3996L53.4999 37.3996C53.5999 37.3996 53.6999 37.4996 53.7999 37.4996C53.9999 37.4996 54.0999 37.3996 54.1999 37.2996C54.2999 37.0996 54.2999 36.7996 53.9999 36.5996L47.1999 32.5996C46.9999 32.4996 46.6999 32.4996 46.4999 32.7996C46.3999 32.8996 46.4999 33.1996 46.6999 33.3996Z"
        fill="currentColor"
      />
      <path
        d="M83.6999 13.0996C83.7999 13.2996 83.9999 13.3996 84.1999 13.3996C84.1999 13.3996 84.2999 13.3996 84.3999 13.3996C84.6999 13.2996 84.7999 12.9996 84.6999 12.7996L82.2999 5.39965C82.2999 5.09965 81.9999 4.89965 81.6999 4.99965C81.3999 5.09965 81.2999 5.39965 81.3999 5.59965L83.6999 13.0996Z"
        fill="currentColor"
      />
      <path
        d="M124.8 15.6996C124.9 15.6996 125 15.7996 125 15.7996C125.2 15.7996 125.3 15.6996 125.4 15.4996L129.2 8.69965C129.3 8.49965 129.2 8.19965 129 7.99965C128.8 7.89965 128.5 7.99965 128.3 8.19965L124.5 14.9996C124.5 15.2996 124.6 15.5996 124.8 15.6996Z"
        fill="currentColor"
      />
      <path
        d="M154.1 43.0996C154.2 43.0996 154.2 43.0996 154.3 43.0996L161.4 39.6996C161.6 39.5996 161.8 39.2996 161.6 38.9996C161.5 38.7996 161.2 38.5996 160.9 38.7996L153.8 42.1996C153.6 42.2996 153.4 42.5996 153.6 42.8996C153.7 42.9996 153.9 43.0996 154.1 43.0996Z"
        fill="currentColor"
      />
      <path
        d="M28.4999 54.3996C28.7999 54.3996 28.9999 54.1996 29.0999 53.9996C29.0999 53.6996 28.8999 53.4996 28.6999 53.3996L25.4999 52.9996L25.7999 49.7996C25.7999 49.4996 25.5999 49.2996 25.3999 49.1996C25.0999 49.1996 24.8999 49.3996 24.7999 49.5996L24.4999 52.7996L21.3999 52.4996C21.0999 52.4996 20.8999 52.6996 20.7999 52.8996C20.6999 53.0996 20.9999 53.3996 21.1999 53.4996L24.2999 53.7996L23.9999 56.9996C23.9999 57.2996 24.1999 57.4996 24.3999 57.5996C24.3999 57.5996 24.3999 57.5996 24.4999 57.5996C24.7999 57.5996 24.9999 57.3996 24.9999 57.1996L25.2999 54.0996L28.4999 54.3996Z"
        fill="currentColor"
      />
      <path
        d="M92.5999 98.0996C92.6999 98.0996 92.7999 98.0996 92.8999 97.9996L97.6999 94.7997C97.7999 94.6997 97.8999 94.5996 97.8999 94.4996L99.5999 87.1996C99.5999 87.0996 99.5999 86.8997 99.4999 86.7997C99.3999 86.6997 99.2999 86.5996 99.0999 86.5996L87.3999 86.3997C87.2999 86.3997 87.0999 86.4996 86.9999 86.5996C86.8999 86.6996 86.8999 86.7996 86.8999 86.9996L87.5999 94.5996C87.5999 94.6996 87.6999 94.8996 87.7999 94.9996L92.2999 98.0996C92.3999 98.0996 92.4999 98.0996 92.5999 98.0996ZM87.9999 87.4996L98.4999 87.6996L96.9999 94.1996L92.5999 96.9996L88.5999 94.1996L87.9999 87.4996Z"
        fill="currentColor"
      />
    </svg>
  </SvgIcon>
)

export default GetInspiredImage
