import { FC } from 'react'

import { SvgIcon, SvgIconProps } from '@mui/material'

const FixingBugsImage: FC<SvgIconProps> = ({ sx, ...props }) => (
  <SvgIcon sx={{ fontSize: 200, color: 'primary.dark', ...sx }} {...props}>
    <svg
      width="200"
      height="200"
      viewBox="0 0 200 200"
      fill="none"
      xmlns="http://www.w3.org/2000/svg"
    >
      <path
        d="M129.8 94.8004C129.6 94.8004 129.4 94.9004 129.2 95.0004C129 95.2004 128.9 95.4004 128.9 95.6004C128.9 95.8004 129 96.0004 129.2 96.2004C129.4 96.4004 129.6 96.4004 129.8 96.4004C130 96.4004 130.2 96.3004 130.4 96.2004C130.6 96.0004 130.7 95.8004 130.7 95.6004C130.7 95.4004 130.6 95.2004 130.4 95.0004C130.2 94.9004 130 94.8004 129.8 94.8004Z"
        fill="currentColor"
      />
      <path
        d="M138 84.9004C137.8 84.9004 137.6 85.0004 137.4 85.1004C137.2 85.3004 137.1 85.5004 137.1 85.7004C137.1 85.9004 137.2 86.1004 137.4 86.3004C137.6 86.5004 137.8 86.5004 138 86.5004C138.2 86.5004 138.4 86.4004 138.6 86.3004C138.8 86.1004 138.9 85.9004 138.9 85.7004C138.9 85.5004 138.8 85.3004 138.6 85.1004C138.4 85.0004 138.2 84.9004 138 84.9004Z"
        fill="currentColor"
      />
      <path
        d="M127.2 82.1004C127 82.1004 126.8 82.2004 126.6 82.3004C126.4 82.5004 126.3 82.7004 126.3 82.9004C126.3 83.1004 126.4 83.3004 126.6 83.5004C126.8 83.7004 127 83.7004 127.2 83.7004C127.4 83.7004 127.6 83.6004 127.8 83.5004C128 83.3004 128.1 83.1004 128.1 82.9004C128.1 82.7004 128 82.5004 127.8 82.3004C127.6 82.1004 127.4 82.1004 127.2 82.1004Z"
        fill="currentColor"
      />
      <path
        d="M119.2 73.2004C119 73.2004 118.8 73.3004 118.6 73.4004C118.4 73.6004 118.3 73.8004 118.3 74.0004C118.3 74.2004 118.4 74.4004 118.6 74.6004C118.8 74.8004 119 74.8004 119.2 74.8004C119.4 74.8004 119.6 74.7004 119.8 74.6004C120 74.4004 120.1 74.2004 120.1 74.0004C120.1 73.8004 120 73.6004 119.8 73.4004C119.7 73.3004 119.4 73.2004 119.2 73.2004Z"
        fill="currentColor"
      />
      <path
        d="M104.8 72.0004C104.6 72.0004 104.4 72.1004 104.2 72.2004C104 72.4004 103.9 72.6004 103.9 72.8004C103.9 73.0004 104 73.2004 104.2 73.4004C104.4 73.6004 104.6 73.6004 104.8 73.6004C105 73.6004 105.2 73.5004 105.4 73.4004C105.6 73.2004 105.7 73.0004 105.7 72.8004C105.7 72.6004 105.6 72.4004 105.4 72.2004C105.3 72.1004 105.1 72.0004 104.8 72.0004Z"
        fill="currentColor"
      />
      <path
        d="M112.7 60.0004C112.5 60.0004 112.3 60.1004 112.1 60.2004C111.9 60.4004 111.8 60.6004 111.8 60.8004C111.8 61.0004 111.9 61.2004 112.1 61.4004C112.3 61.6004 112.5 61.6004 112.7 61.6004C112.9 61.6004 113.1 61.5004 113.3 61.4004C113.5 61.2004 113.6 61.0004 113.6 60.8004C113.6 60.6004 113.5 60.4004 113.3 60.2004C113.2 60.1004 112.9 60.0004 112.7 60.0004Z"
        fill="currentColor"
      />
      <path
        d="M40.9 132.2C40.7 132.2 40.4 132.3 40.2 132.5C40 132.7 39.9 132.9 39.9 133.2C39.9 133.4 40 133.7 40.2 133.8C40.3 133.9 40.5 134 40.7 134C40.8 134 40.8 134 40.9 134C41 134 41.1 134 41.3 133.9C41.5 133.8 41.6 133.7 41.7 133.6C41.8 133.5 41.9 133.3 41.9 133.1C41.9 132.9 41.8 132.6 41.6 132.5C41.3 132.3 41.1 132.2 40.9 132.2Z"
        fill="currentColor"
      />
      <path
        d="M194.5 183.4H189.3C189.3 180.3 188.8 177.2 187.8 174.3C187.8 174.3 187.8 174.2 187.7 174.2L182.7 164.9C183.8 164.1 184.5 163.3 184.2 162.7C184.2 162.7 184.2 162.7 184.2 162.6L163.2 127.2C165.7 125.6 167.8 123.4 169.3 120.8C170.8 118.1 171.7 114.9 171.7 111.8V110.6H179C180.1 110.6 181.3 110.4 182.3 109.9C183.4 109.5 184.3 108.8 185.1 108C185.9 107.2 186.5 106.2 187 105.2C187.4 104.1 187.7 103 187.7 101.9V73.7004C187.7 72.0004 187.2 70.4004 186.3 69.0004C185.5 67.7004 184.4 66.7004 183.1 66.0004C183.1 65.9004 183.2 65.9004 183.2 65.8004C184.1 63.3004 178.6 59.9004 172.7 57.8004C172.4 57.7004 172 57.6004 171.7 57.5004V42.2004C171.7 40.4004 171.4 38.6004 170.9 36.9004C171.1 36.8004 171.3 36.7004 171.4 36.5004L172.4 35.5004C172.9 35.0004 173.2 34.4004 173.2 33.7004C173.2 33.0004 172.9 32.4004 172.4 31.9004C172.3 31.8004 172.3 31.8004 172.5 31.4004C172.5 31.3004 172.6 31.2004 172.6 31.1004C172.6 31.1004 172.6 31.0004 172.7 31.0004H172.8C173.1 31.0004 173.5 30.9004 173.8 30.8004C174.1 30.7004 174.4 30.5004 174.6 30.2004C174.8 30.0004 175 29.7004 175.2 29.4004C175.3 29.1004 175.4 28.7004 175.4 28.4004V27.0004C175.4 26.3004 175.1 25.7004 174.7 25.2004C174.2 24.7004 173.6 24.4004 172.9 24.4004C172.8 24.4004 172.7 24.4004 172.6 24.3004C172.6 24.2004 172.5 24.1004 172.5 24.0004C172.3 23.6004 172.3 23.6004 172.4 23.5004C172.9 23.0004 173.2 22.4004 173.2 21.7004C173.2 21.0004 172.9 20.4004 172.4 19.9004L171.4 18.9004C171.2 18.7004 170.9 18.5004 170.6 18.3004C170.3 18.2004 169.9 18.1004 169.6 18.1004C169.3 18.1004 168.9 18.2004 168.6 18.3004C168.3 18.4004 168 18.6004 167.8 18.9004C167.7 19.0004 167.7 19.0004 167.3 18.8004C167.2 18.8004 167.1 18.7004 167 18.7004C167 18.7004 166.9 18.7004 166.9 18.6004V18.5004C166.9 18.0004 166.8 17.5004 166.5 17.1004C166.2 16.7004 165.8 16.3004 165.3 16.1004C165 16.0004 164.7 15.9004 164.3 15.9004H162.9C162.4 15.9004 161.9 16.1004 161.5 16.3004C161.1 16.6004 160.7 17.0004 160.5 17.5004C160.4 17.8004 160.3 18.2004 160.3 18.5004C160.3 18.6004 160.3 18.6004 159.9 18.8004C159.8 18.8004 159.7 18.9004 159.6 18.9004H159.5L159.4 18.8004C159.2 18.6004 158.9 18.4004 158.6 18.2004C158.3 18.1004 157.9 18.0004 157.6 18.0004C157.3 18.0004 156.9 18.1004 156.6 18.2004C156.3 18.3004 156 18.5004 155.8 18.8004L154.8 19.8004C154.4 20.2004 154.2 20.6004 154.1 21.1004C154 21.6004 154 22.1004 154.2 22.6004C154.3 22.9004 154.5 23.2004 154.8 23.4004C154.9 23.5004 154.9 23.5004 154.7 23.9004V24.0004C154.4 24.0004 154 24.0004 153.7 24.0004H45.2C42.8 24.0004 40.4 24.5004 38.2 25.4004C36 26.3004 34 27.7004 32.2 29.4004C30.5 31.1004 29.1 33.1004 28.2 35.4004C27.3 37.6004 26.8 40.0004 26.8 42.4004V65.0004H19.2C18.1 65.0004 16.9 65.2004 15.9 65.7004C14.8 66.1004 13.9 66.8004 13.1 67.6004C12.3 68.4004 11.7 69.4004 11.2 70.4004C10.8 71.5004 10.5 72.6004 10.5 73.7004V101.8C10.5 104.1 11.4 106.3 13 107.9C14.6 109.5 16.8 110.4 19.1 110.4H26.6V111.6C26.6 114.8 27.4 118 29 120.8C30.5 123.4 32.7 125.7 35.3 127.2L30.9 134.8C30.7 135.1 30.6 135.4 30.6 135.7C30.6 136 30.7 136.4 30.8 136.6C31 136.9 31.2 137.1 31.5 137.3C31.8 137.5 32.1 137.5 32.4 137.5H49C49.3 137.5 49.7 137.4 49.9 137.2C50.2 137 50.4 136.8 50.6 136.5C50.8 136.2 50.9 135.9 50.9 135.6C50.9 135.3 50.8 134.9 50.6 134.7L47.8 129.8H92.9L91.1 142.2C91.1 142.3 91.1 142.5 91.2 142.6C91.3 142.7 91.4 142.8 91.6 142.8L93 142.9L92.3 147.8C86.6 148.8 81.1 151 76.4 154.3C76.3 154.4 76.2 154.6 76.2 154.7C76.2 154.9 76.3 155 76.5 155.1C81.3 157.5 91.9 160.5 98.8 160.5C100.6 160.5 102.2 160.3 103.3 159.8C103.5 159.7 103.6 159.6 103.6 159.4L103.7 158.8C103.8 157.5 104.2 154.4 104.6 151.2C104.9 148.3 105.3 145.4 105.5 143.7L106.6 143.8C106.8 143.8 107.1 143.6 107.1 143.4L109.6 129.8H143.6C154.6 147.2 168.4 168.8 168.7 169.5C168.8 169.7 169 170 169.4 170.1C169.6 170.2 169.9 170.2 170.2 170.2C170.6 170.2 171.2 170.1 171.7 170L174.1 173.9C169.1 175.5 163.4 179.8 159.8 183.1H5.5C5.2 183.1 5 183.3 5 183.6C5 183.9 5.2 184.1 5.5 184.1H194.6C194.9 184.1 195.1 183.9 195.1 183.6C195.1 183.3 194.8 183.4 194.5 183.4ZM170.7 111.7C170.7 114.7 169.9 117.6 168.5 120.2C167.1 122.7 165.1 124.7 162.8 126.3L156 114.9C155.8 113.3 155.5 111.9 155 110.5H170.7V111.7ZM185.5 69.5004C186.3 70.7004 186.7 72.2004 186.7 73.7004V101.8C186.7 102.8 186.5 103.8 186.1 104.7C185.7 105.6 185.2 106.5 184.4 107.2C183.7 107.9 182.8 108.5 181.9 108.9C181 109.3 180 109.5 179 109.5H154.7C153.8 107.2 152.6 105.1 151.3 103.4H179.6C179.9 103.4 180.1 103.2 180.1 102.9V96.3004C180.1 96.0004 179.9 95.8004 179.6 95.8004H144.1C143.3 94.3004 142.8 92.6004 142.4 90.9004H179.5C179.8 90.9004 180 90.7004 180 90.4004V83.8004C180 83.5004 179.8 83.3004 179.5 83.3004H140.6C140.1 81.7004 139.5 80.0004 138.7 78.4004H161.9C162 78.6004 162.1 78.8004 162.2 78.9004C162.7 79.5004 163.3 80.0004 164.1 80.3004C164.6 80.5004 165.1 80.6004 165.6 80.6004C165.9 80.6004 166.2 80.6004 166.4 80.5004C167.2 80.3004 167.9 80.0004 168.5 79.4004L169.6 78.4004H179.3C179.6 78.4004 179.8 78.2004 179.8 77.9004V71.3004C179.8 71.0004 179.6 70.8004 179.3 70.8004H178L182.1 66.9004C182.2 66.9004 182.3 66.8004 182.4 66.7004C183.6 67.4004 184.7 68.3004 185.5 69.5004ZM127.1 97.6004C126.9 97.1004 126.7 96.6004 126.4 96.1004C126.4 96.0004 126.4 96.0004 126.3 96.0004C125.7 94.7004 125.2 93.6004 124.9 92.5004L127.6 86.8004C127.7 86.7004 127.7 86.5004 127.6 86.4004C127.5 86.3004 127.4 86.2004 127.2 86.1004C126.1 85.9004 125 85.7004 123.9 85.4004C121.9 85.0004 119.9 84.4004 118 83.8004C113.7 82.4004 109.4 80.6004 105.5 78.4004C103.8 77.5004 102.5 76.0004 101.8 74.2004C101.1 72.4004 101 70.4004 101.5 68.6004C103.4 62.0004 105.9 55.5004 108.9 49.3004C111.1 49.5004 113.2 49.9004 115.3 50.6004C116.8 51.1004 118.2 51.8004 119.6 52.6004C117.4 57.8004 115.4 63.1004 113.8 68.5004C113.7 68.7004 113.8 69.0004 114.1 69.1004C118.8 71.4004 123.8 73.2004 128.9 74.3004C129.1 74.3004 129.4 74.4004 129.7 74.5004C131.4 74.8004 135.8 75.6004 136.9 77.1004C139.2 80.7004 140 84.5004 140.8 88.2004C141.4 91.2004 142 94.1004 143.5 96.7004C139.2 96.4004 133.7 96.6004 127.1 97.6004ZM96.8 109.4H89.3C87.3 109.4 85.3 108.6 83.9 107.2C82.5 105.8 81.7 103.8 81.7 101.8V73.7004C81.7 71.7004 82.5 69.7004 83.9 68.3004C85.3 66.9004 87.3 66.1004 89.3 66.1004H101.5C101.3 66.9004 101 67.6004 100.8 68.4004C100.6 69.2004 100.4 70.0004 100.4 70.8004H98.7C98.4 70.8004 98.2 71.0004 98.2 71.3004V77.9004C98.2 78.2004 98.4 78.4004 98.7 78.4004H103.9C104.3 78.8004 104.8 79.1004 105.3 79.4004C108 80.9004 110.8 82.2004 113.7 83.3004H98.7C98.4 83.3004 98.2 83.5004 98.2 83.8004V90.4004C98.2 90.7004 98.4 90.9004 98.7 90.9004H123.6C123.7 91.5004 123.9 92.2004 124.1 92.8004C124.4 93.8004 124.8 94.8004 125.3 95.8004H98.6C98.3 95.8004 98.1 96.0004 98.1 96.3004V102.9C98.1 103.2 98.3 103.4 98.6 103.4H102.9C101.4 104.2 100.1 105.3 98.9 106.6C98.1 107.4 97.4 108.4 96.8 109.4ZM101 74.6004C101.4 75.6004 102 76.5004 102.7 77.3004H99.1V71.7004H100.4C100.4 72.8004 100.7 73.7004 101 74.6004ZM123.4 89.9004H99.1V84.3004H116.4C116.9 84.5004 117.4 84.7004 117.9 84.8004C119.7 85.4004 121.5 85.9004 123.4 86.3004C123.2 87.5004 123.2 88.7004 123.4 89.9004ZM105 102.3H99.1V96.7004H125.7C125.8 97.0004 126 97.4004 126.2 97.7004C120.6 98.6004 114.1 99.9004 106.7 101.8C106.1 102 105.6 102.1 105 102.3ZM115 39.9004C115.2 39.4004 115.6 39.6004 115.7 39.6004C116 39.7004 116.3 40.0004 116.2 40.6004C116.1 40.9004 116.3 41.1004 116.5 41.2004C116.8 41.3004 117 41.1004 117.1 40.9004C117.2 40.7004 117.2 40.5004 117.3 40.3004C117.5 39.9004 117.8 39.9004 118.1 40.0004C118.4 40.1004 118.7 40.5004 118.6 41.1004C118.6 41.2004 118.5 41.5004 118.5 41.5004C118.4 41.8004 118.6 42.0004 118.8 42.1004C119 42.2004 119.3 42.0004 119.4 41.8004C119.5 41.6004 119.6 41.3004 119.7 41.1004C119.9 40.6004 120.5 40.8004 120.6 40.8004C120.9 40.9004 121.3 41.3004 121.1 41.9004V42.0004C121.1 42.1004 121.1 42.1004 121 42.2004C120.9 42.5004 121 42.7004 121.3 42.8004C121.6 42.9004 121.8 42.8004 121.9 42.5004L122 42.4004V42.3004C122 42.2004 122.1 42.2004 122.1 42.1004C122.3 41.6004 122.9 41.9004 122.9 41.9004C123 41.9004 123.3 42.1004 123.4 42.5004C123.4 42.6004 123.4 42.7004 123.3 42.8004C123.1 43.3004 122.9 43.7004 122.7 44.2004L122.5 44.8004L122.9 45.0004C123.4 45.2004 123.6 45.4004 123.6 45.6004V45.9004C123.6 46.0004 123.6 46.1004 123.5 46.2004C122.9 49.1004 122.3 49.2004 121.8 49.3004H121.6C120.1 49.6004 119.1 50.1004 118.5 50.8004C117.6 50.3004 116.7 49.9004 115.7 49.6004C114.3 49.1004 113 48.8004 111.6 48.6004C112.4 46.7004 115 40.0004 115 39.9004ZM125.2 43.1004C125.4 43.3004 125.7 43.5004 125.5 44.0004L124.2 43.5004C124.2 43.4004 124.3 43.4004 124.3 43.3004C124.4 43.2004 124.4 43.0004 124.4 42.9004C124.6 42.8004 124.9 42.9004 125.2 43.1004ZM176.9 71.8004H179.1V77.4004H170.9L176.9 71.8004ZM169.4 77.5004C169.3 77.5004 169.3 77.5004 169.4 77.5004L168.1 78.7004C167.7 79.1004 167.1 79.4004 166.5 79.5004C165.9 79.6004 165.3 79.6004 164.7 79.4004C164.1 79.2004 163.6 78.8004 163.2 78.3004C162.8 77.8004 162.6 77.2004 162.5 76.6004L161.9 71.3004L161.3 65.6004V65.5004L160.8 60.5004C163.2 62.8004 168.1 64.8004 170 65.5004C170.1 65.5004 175.6 67.4004 179.5 67.4004C179.7 67.4004 179.9 67.4004 180.1 67.4004L169.4 77.5004ZM124.6 46.5004L125.9 47.0004C125.9 47.3004 125.8 47.6004 125.6 48.2004C125 50.2004 125 50.2004 124 50.4004C122.5 50.7004 121.5 51.3004 120.8 52.2004C120.8 52.1004 120.7 52.1004 120.6 52.0004C120.2 51.8004 119.9 51.5004 119.5 51.3004C119.9 50.9004 120.6 50.6004 121.9 50.3004H122.1C123.1 50.2004 123.9 49.8004 124.6 46.5004ZM120.3 54.0004L120.5 54.1004L121.1 54.3004C119.6 57.9004 118.5 61.5004 117.5 65.3004C117.4 65.4004 117.4 65.5004 117.4 65.6004C117.4 65.6004 117.4 65.6004 117.4 65.7004C117.3 66.3004 117.1 66.8004 117 67.4004C116.9 67.6004 117.1 67.9004 117.3 68.0004L130.2 73.4004C130.1 73.5004 129.9 73.6004 129.6 73.7004C129.4 73.7004 129.2 73.6004 129.1 73.6004C124.2 72.5004 119.4 70.8004 114.9 68.6004C116.5 63.6004 118.2 58.7004 120.3 54.0004ZM126.7 68.9004C126.7 69.3004 126.7 69.6004 126.8 70.0004V70.1004C126.8 70.2004 126.8 70.2004 126.9 70.3004C127 70.5004 127.1 70.7004 127.2 70.9004L118.2 67.1004C118.3 66.7004 118.4 66.4004 118.5 66.0004H127.4C126.9 67.2004 126.7 68.2004 126.7 68.9004ZM131.5 72.9004C131.6 72.7004 131.6 72.5004 131.7 72.2004C132.4 71.3004 132.9 70.3004 133.3 69.3004C133.4 69.1004 133.3 68.9004 133.2 68.8004C133 68.7004 132.8 68.6004 132.6 68.7004C129.3 70.4004 128.2 70.2004 127.9 70.1004C127.8 70.0004 127.7 70.0004 127.7 69.8004C127.6 69.6004 127.6 69.3004 127.6 69.0004C127.6 68.2004 127.9 67.2004 128.4 65.8004C128.4 65.8004 128.4 65.8004 128.4 65.7004C128.9 64.1004 129.8 62.1004 130.9 59.6004C131.3 59.9004 131.6 60.2004 132 60.5004C131.9 60.9004 131.8 61.2004 131.7 61.5004C131.6 61.8004 131.6 62.1004 131.6 62.3004C131.6 62.5004 131.7 62.6004 131.7 62.7004C131.7 62.8004 131.7 62.8004 131.7 62.9004C131.8 63.1004 131.9 63.2004 132 63.3004C132.4 63.6004 133 63.5004 133.6 62.9004C134 62.5004 134.3 62.5004 134.5 62.5004C134.7 62.5004 134.7 62.7004 134.7 62.8004C134.8 63.2004 134.5 64.1004 133.4 64.9004C133.3 65.0004 133.3 65.1004 133.2 65.2004C133.2 65.3004 133.2 65.3004 133.2 65.4004C133.2 65.7004 133.3 65.9004 133.3 66.2004C133.3 66.4004 133.3 66.5004 133.4 66.7004C133.5 67.1004 133.5 67.4004 133.6 67.8004C133.6 67.9004 133.7 68.1004 133.7 68.2004C133.8 68.5004 133.8 68.8004 133.9 69.1004C134 69.4004 134 69.7004 134.1 70.0004C134.1 70.2004 134.2 70.4004 134.2 70.6004C134.3 70.9004 134.4 71.2004 134.4 71.5004C134.5 71.7004 134.5 71.9004 134.6 72.1004C134.9 73.1004 135.3 74.1004 135.7 75.1004C134.3 74.4004 132.4 74.0004 131 73.7004C131.4 73.5004 131.5 73.2004 131.5 72.9004ZM160.9 70.8004H135.7C135.9 69.6004 136.4 67.6004 138.4 66.1004H160.4L160.9 70.8004ZM137.9 76.7004C137.8 76.6004 137.8 76.5004 137.7 76.4004V76.3004C136.9 75.0004 136.3 73.5004 135.8 71.9004V71.8004H161L161.5 76.7004C161.5 76.9004 161.6 77.1004 161.6 77.4004H138.2C138.1 77.1004 138 76.9004 137.9 76.7004ZM159.7 58.9004L160.3 65.0004H140C140.6 64.7004 141.2 64.5004 141.9 64.3004C142.4 64.2004 142.8 63.9004 143.1 63.5004C143.4 63.1004 143.6 62.6004 143.6 62.2004C143.6 61.8004 143.5 61.5004 143.3 61.2004C143.1 60.9004 142.9 60.6004 142.6 60.4004C142.3 60.2004 142 60.1004 141.6 60.0004C141.6 60.0004 141.6 60.0004 141.5 60.0004C141.5 59.8004 141.6 59.7004 141.6 59.5004C141.6 59.1004 141.5 58.7004 141.2 58.3004C141 58.0004 140.7 57.7004 140.3 57.5004C139.9 57.3004 139.5 57.2004 139.1 57.2004C139 57.2004 139 57.2004 138.9 57.2004C138.9 57.0004 138.9 56.9004 138.9 56.7004C138.8 56.2004 138.5 55.8004 138.2 55.4004C137.8 55.1004 137.3 54.9004 136.8 54.9004C136.6 54.9004 136.5 54.9004 136.3 54.9004V54.8004C136.3 54.4004 136.1 54.1004 135.9 53.8004C135.7 53.5004 135.4 53.2004 135.1 53.1004C134.8 52.9004 134.4 52.8004 134 52.8004C133.6 52.8004 133.2 52.9004 132.9 53.1004C132.6 53.3004 132.3 53.6004 132 54.0004L130.3 58.5004C129.1 61.2004 128.2 63.3004 127.6 65.0004H118.6C119.5 61.3004 120.8 57.7004 122.2 54.1004C122.3 54.0004 122.3 53.8004 122.2 53.7004C122.1 53.6004 122 53.5004 121.9 53.4004L121.2 53.2004C121.5 52.5004 122.3 51.7004 124 51.3004C125.6 51.0004 125.7 50.5004 126.4 48.4004C126.5 47.9004 126.7 47.6004 126.7 47.2004L137.4 51.0004C137.5 51.1004 137.7 51.1004 137.8 51.1004C137.8 51.1004 137.8 51.1004 137.9 51.1004C138.1 51.1004 138.3 51.0004 138.4 51.0004C138.6 50.9004 138.7 50.8004 138.8 50.7004L159.3 58.0004C159.5 58.3004 159.5 58.6004 159.7 58.9004ZM141.9 88.1004C141.6 86.8004 141.4 85.6004 141 84.3004H179.1V89.9004H142.2C142.1 89.3004 142 88.7004 141.9 88.1004ZM144.8 97.0004C144.7 96.9004 144.7 96.8004 144.7 96.7004H179.1V102.3H150.5C147.9 99.2004 145.3 97.3004 144.8 97.0004ZM182.2 65.5004C182.1 65.7004 181.9 65.9004 181.7 66.0004C181.6 66.0004 181.5 66.0004 181.5 66.1004C179.4 66.9004 173.7 65.7004 170.4 64.5004C167.5 63.5004 161.7 60.7004 160.6 58.6004C160.5 58.3004 160.4 58.0004 160.5 57.8004C160.7 57.3004 161.7 56.9004 163.4 56.9004C165.2 56.9004 167.8 57.3004 170.9 58.2004C171 58.3004 171.1 58.3004 171.2 58.3004C171.6 58.4004 172 58.5004 172.4 58.7004C179.1 61.2004 182.6 64.3004 182.2 65.5004ZM159.8 57.1004L139.3 49.8004C139.3 49.6004 139.2 49.5004 139.2 49.3004C139.1 49.1004 139 49.0004 138.9 48.9004C138.8 48.8004 138.6 48.7004 138.4 48.6004L132.8 46.6004H170.7V57.2004C166 55.8004 161.2 55.4004 159.8 57.1004ZM166.9 31.0004C166.4 31.5004 165.9 31.8004 165.3 32.1004C164.7 32.3004 164.1 32.5004 163.5 32.5004C162.5 32.5004 161.6 32.2004 160.8 31.7004C160 31.2004 159.4 30.4004 159 29.5004C158.7 28.8004 158.6 28.1004 158.6 27.4004C158.6 26.7004 158.8 26.0004 159.2 25.3004C159.5 24.7004 160 24.1004 160.6 23.7004C161.2 23.3004 161.8 23.0004 162.6 22.8004C162.9 22.7004 163.2 22.7004 163.5 22.7004C163.9 22.7004 164.3 22.7004 164.7 22.8004C165.4 23.0004 166.1 23.3004 166.6 23.8004C167.2 24.3004 167.6 24.8004 167.9 25.5004C168.2 26.1004 168.4 26.9004 168.4 27.6004C168.4 28.2004 168.3 28.9004 168 29.5004C167.7 30.0004 167.4 30.6004 166.9 31.0004ZM155.2 22.6004C155.1 22.5004 154.9 22.3004 154.9 22.1004C154.8 21.8004 154.7 21.5004 154.8 21.2004C154.9 20.9004 155 20.6004 155.2 20.4004L156.2 19.4004C156.3 19.3004 156.5 19.1004 156.7 19.1004C156.9 19.0004 157.1 19.0004 157.3 19.0004C157.5 19.0004 157.7 19.0004 157.9 19.1004C158.1 19.2004 158.3 19.3004 158.4 19.4004C158.6 19.6004 158.8 19.7004 159 19.7004C159.2 19.7004 159.5 19.7004 159.7 19.6004C159.8 19.6004 159.9 19.5004 159.9 19.5004C160.3 19.3004 161 19.1004 161 18.3004C161 18.1004 161 17.9004 161.1 17.7004C161.2 17.4004 161.4 17.2004 161.7 17.0004C162 16.8004 162.3 16.7004 162.6 16.7004H164C164.2 16.7004 164.4 16.7004 164.6 16.8004C164.9 16.9004 165.1 17.1004 165.3 17.4004C165.5 17.7004 165.6 18.0004 165.6 18.3004C165.6 18.5004 165.7 18.8004 165.8 19.0004C165.9 19.2004 166.1 19.4004 166.4 19.4004C166.5 19.4004 166.6 19.5004 166.6 19.5004C167 19.7004 167.6 20.0004 168.2 19.4004C168.3 19.3004 168.5 19.1004 168.7 19.1004C168.9 19.1004 169.1 19.0004 169.3 19.0004C169.5 19.0004 169.7 19.0004 169.9 19.1004C170.1 19.2004 170.3 19.3004 170.4 19.5004L171.4 20.5004C171.7 20.8004 171.9 21.2004 171.9 21.6004C171.9 22.0004 171.7 22.4004 171.4 22.7004C170.8 23.3004 171.1 23.9004 171.3 24.3004C171.3 24.4004 171.4 24.5004 171.4 24.5004C171.6 25.2004 172.2 25.2004 172.5 25.3004C172.9 25.3004 173.3 25.5004 173.6 25.8004C173.9 26.1004 174 26.5004 174 26.9004V28.3004C174 28.5004 174 28.7004 173.9 28.9004C173.8 29.1004 173.7 29.3004 173.6 29.4004C173.5 29.5004 173.3 29.7004 173.1 29.7004C172.9 29.8004 172.7 29.8004 172.5 29.8004C172.3 29.8004 172 29.9004 171.8 30.0004C171.6 30.1004 171.4 30.3004 171.4 30.6004C171.4 30.7004 171.3 30.8004 171.3 30.9004C171.1 31.3004 170.8 31.9004 171.4 32.5004C171.7 32.8004 171.9 33.2004 171.9 33.6004C171.9 34.0004 171.7 34.4004 171.4 34.7004L170.3 35.8004C169.7 34.1004 168.8 32.5004 167.8 31.1004C168.1 30.7004 168.5 30.2004 168.7 29.7004C169 29.0004 169.1 28.2004 169.1 27.4004C169.1 26.5004 168.9 25.7004 168.5 24.9004C168.1 24.1004 167.6 23.4004 166.9 22.9004C166.2 22.4004 165.4 22.0004 164.6 21.7004C163.8 21.5004 162.9 21.5004 162 21.6004C161.2 21.8004 160.3 22.1004 159.6 22.6004C159 23.1004 158.4 23.7004 158 24.4004C157 24.1004 156 23.9004 155 23.8004C155.6 23.6004 155.7 23.1004 155.2 22.6004ZM29.1 35.6004C30 33.5004 31.2 31.6004 32.9 30.0004C34.5 28.4004 36.4 27.1004 38.5 26.2004C40.6 25.3004 42.8 24.9004 45.1 24.9004H152.4L152.3 25.0004C152.1 25.2004 151.9 25.5004 151.7 25.8004C151.6 26.1004 151.5 26.5004 151.5 26.8004V28.2004C151.5 28.7004 151.6 29.2004 151.9 29.7004C152.2 30.1004 152.6 30.5004 153.1 30.7004C153.4 30.8004 153.7 30.9004 154.1 30.9004C154.2 30.9004 154.2 30.9004 154.4 31.3004C154.4 31.4004 154.5 31.5004 154.5 31.6004V31.7004C154.5 31.7004 154.5 31.8004 154.4 31.8004C154 32.2004 153.8 32.6004 153.7 33.1004C153.6 33.6004 153.6 34.1004 153.8 34.6004C153.9 34.9004 154.1 35.2004 154.4 35.4004L155.4 36.4004C155.8 36.8004 156.2 37.0004 156.7 37.1004C157.2 37.2004 157.7 37.1004 158.2 37.0004C158.5 36.9004 158.8 36.7004 159 36.4004C159.1 36.3004 159.1 36.3004 159.5 36.5004C159.6 36.5004 159.7 36.6004 159.8 36.6004C159.8 36.6004 159.9 36.6004 159.9 36.7004V36.8004C159.9 37.1004 160 37.5004 160.1 37.8004C160.2 38.1004 160.4 38.4004 160.7 38.6004C160.9 38.8004 161.2 39.0004 161.5 39.2004C161.8 39.3004 162.2 39.4004 162.5 39.4004H163.9C164.4 39.4004 164.9 39.2004 165.3 39.0004C165.7 38.7004 166.1 38.3004 166.3 37.8004C166.4 37.5004 166.5 37.1004 166.5 36.8004C166.5 36.7004 166.5 36.7004 166.9 36.5004C167 36.5004 167.1 36.4004 167.2 36.4004H167.3C167.3 36.4004 167.4 36.4004 167.4 36.5004C167.6 36.7004 167.9 36.9004 168.2 37.1004C168.6 37.3004 169.1 37.3004 169.6 37.3004C170.1 38.9004 170.4 40.6004 170.4 42.3004V45.7004H130L126.4 44.4004C126.7 43.6004 126.5 42.8004 125.8 42.3004C125.3 42.0004 124.7 41.9004 124.2 42.0004C124 41.6004 123.7 41.3004 123.3 41.1004C122.8 40.9004 122.4 40.9004 122 41.0004C121.8 40.5004 121.4 40.1004 121 40.0004C120.5 39.8004 120 39.8004 119.5 40.1004C119.3 39.7004 118.9 39.4004 118.5 39.2004C117.9 39.0004 117.3 39.1004 116.9 39.4004C116.7 39.1004 116.4 38.9004 116 38.7004C115.2 38.4004 114.3 38.8004 114 39.6004C114 39.6004 113.9 39.8004 113.9 40.0004L104.3 36.6004C104 36.5004 103.6 36.5004 103.3 36.7004C103.1 36.8004 103 36.9004 102.9 37.0004C102.8 37.1004 102.7 37.3004 102.6 37.4004C102.5 37.6004 102.5 37.7004 102.5 37.9004C102.5 38.1004 102.6 38.2004 102.6 38.4004C102.8 38.7004 103 39.0004 103.4 39.1004L112.9 42.5004C112.5 43.5004 112.1 44.7004 111.7 45.7004H27.8V42.3004C27.8 40.0004 28.2 37.7004 29.1 35.6004ZM13.8 107.2C12.4 105.8 11.6 103.8 11.5 101.8V73.7004C11.5 72.7004 11.7 71.7004 12.1 70.8004C12.5 69.9004 13 69.0004 13.8 68.3004C14.5 67.6004 15.4 67.0004 16.3 66.6004C17.2 66.2004 18.2 66.0004 19.2 66.0004H62.4C64.4 66.0004 66.4 66.8004 67.8 68.2004C69.2 69.6004 70 71.6004 70.1 73.6004V101.7C70.1 102.7 69.9 103.7 69.5 104.6C69.1 105.5 68.6 106.4 67.8 107.1C67.1 107.8 66.2 108.4 65.3 108.8C64.4 109.2 63.4 109.4 62.4 109.4H19.3C17.2 109.4 15.3 108.6 13.8 107.2ZM49.9 135.9C49.9 136.1 49.9 136.2 49.8 136.3C49.7 136.4 49.6 136.5 49.5 136.6C49.4 136.7 49.2 136.7 49.1 136.7H32.8C32.6 136.7 32.5 136.7 32.4 136.6C32.3 136.5 32.2 136.4 32.1 136.3C32 136.2 32 136 32 135.9C32 135.7 32 135.6 32.1 135.5L40.2 121.5C40.3 121.4 40.4 121.3 40.5 121.2C40.6 121.1 40.8 121.1 40.9 121.1C41.1 121.1 41.2 121.1 41.3 121.2C41.4 121.3 41.5 121.4 41.6 121.5L49.7 135.5C49.8 135.5 49.9 135.7 49.9 135.9ZM47.2 129L42.5 120.8C42.3 120.5 42.1 120.3 41.8 120.1C41.2 119.8 40.5 119.8 39.9 120.1C39.6 120.3 39.4 120.5 39.2 120.8L36 126.4C33.6 124.9 31.5 122.8 30.1 120.3C28.6 117.7 27.8 114.7 27.8 111.6V110.4H62.5C63.6 110.4 64.8 110.2 65.8 109.7C66.9 109.3 67.8 108.6 68.6 107.8C69.4 107 70 106 70.5 105C70.9 103.9 71.2 102.8 71.2 101.7V73.7004C71.2 71.4004 70.3 69.2004 68.7 67.6004C67.1 66.0004 64.8 65.0004 62.5 65.0004H27.8V46.6004H111.4C111.1 47.4004 110.8 48.1004 110.7 48.5004C110.1 48.4004 109.5 48.4004 108.9 48.3004C108.7 48.3004 108.5 48.4004 108.4 48.6004C105.8 53.9004 103.6 59.4004 101.8 65.0004H89.3C87 65.0004 84.8 65.9004 83.2 67.5004C81.6 69.1004 80.7 71.3004 80.7 73.6004V101.7C80.7 104 81.6 106.2 83.2 107.8C84.8 109.4 87 110.3 89.3 110.3H96.3C95.7 111.6 95.3 113.1 95.1 114.6L93 129H47.2ZM96 114.9C96.4 112 97.6 109.4 99.6 107.2C101.5 105 104 103.5 106.9 102.8C114.5 100.9 121.1 99.5004 126.9 98.7004C129.2 98.4004 131.4 98.1004 133.4 97.9004C133.6 100 133.1 102 131.9 103.7C130.6 105.5 128.7 106.8 126.5 107.2L109.1 110.6C107.2 111 105.5 111.9 104.1 113.3C102.7 114.7 101.9 116.5 101.6 118.4L98.1 142.4L92.1 142L96 114.9ZM103.6 150.9C99.1 151 95.6 150.1 93.3 148.2L94 143.2L98.5 143.5C98.5 143.5 98.5 143.5 98.6 143.5L104.5 143.9C104.3 145.6 103.9 148.2 103.6 150.9ZM106.2 143L105.2 142.9C105.2 142.9 105.2 142.9 105.1 142.9H105L99.2 142.5L102.7 118.6C103 116.9 103.7 115.3 104.9 114.1C106.1 112.9 107.6 112 109.3 111.7L126.7 108.3C129.1 107.8 131.3 106.4 132.7 104.4C134 102.5 134.6 100.2 134.4 97.9004C138.2 97.6004 141.5 97.6004 144.3 97.9004C145.3 98.6004 154 105.1 155 115.2C155 115.3 155 115.3 155.1 115.4L183.4 163.1C183.3 163.4 182.7 163.8 182 164.4C180.7 165.3 178.8 166.4 177.1 167.3C176.7 167.5 176.3 167.7 175.9 167.9L143.6 117.4L145.5 114.1C146.5 112.6 147.1 110.9 147.2 109C147.2 108.7 147 108.5 146.7 108.5C146.4 108.5 146.2 108.7 146.2 109C146.1 110.6 145.5 112.2 144.6 113.6C144.4 114 144.1 114.3 143.8 114.6C141.9 116.7 139.1 118.1 136.9 118.1C134.8 118.1 128.8 118.2 112.1 118.6H109.4C109.1 118.6 108.9 118.8 108.9 119.1C108.9 119.4 109.1 119.6 109.4 119.6H110.6L106.2 143ZM109.7 129L111.5 119.4C111.6 119.4 111.8 119.4 112 119.4C128 119 134.2 119 136.5 118.9C138.4 121.9 140.6 125.3 142.9 129H109.7ZM169.7 169.5C169.6 169.5 169.6 169.4 169.6 169.4C169.4 168.9 153.9 144.5 144.3 129.4C144.3 129.3 144.2 129.3 144.2 129.2C142.7 126.8 141.4 124.7 140.2 123L142.9 118.3L174.8 168.2C173.7 168.7 172.7 169.1 171.8 169.3H171.7C170.8 169.5 170.1 169.6 169.7 169.5ZM177.4 168C178.8 167.3 180.5 166.4 182 165.4L186.6 174.1C182.8 175.1 178.9 175 175.1 174L172.6 170C174.4 169.5 176.4 168.5 177.4 168Z"
        fill="currentColor"
      />
      <path
        d="M94.4 70.8004C94.2 70.7004 93.9 70.7004 93.7 71.0004L90.3 76.9004L87.5 73.0004C87.3 72.8004 87 72.7004 86.8 72.9004C86.6 73.1004 86.5 73.4004 86.7 73.6004L89.9 78.1004C90 78.2004 90.1 78.3004 90.3 78.3004C90.5 78.3004 90.6 78.2004 90.7 78.0004L94.5 71.4004C94.7 71.3004 94.6 71.0004 94.4 70.8004Z"
        fill="currentColor"
      />
      <path
        d="M94.4 83.3004C94.2 83.2004 93.9 83.2004 93.7 83.5004L90.3 89.4004L87.5 85.5004C87.3 85.3004 87 85.2004 86.8 85.4004C86.6 85.6004 86.5 85.9004 86.7 86.1004L89.9 90.7004C90 90.8004 90.1 90.9004 90.3 90.9004C90.5 90.9004 90.6 90.8004 90.7 90.6004L94.5 84.0004C94.7 83.8004 94.6 83.5004 94.4 83.3004Z"
        fill="currentColor"
      />
      <path
        d="M40.9 39.5004C41.8 39.5004 42.6 39.2004 43.2 38.5004C43.8 37.9004 44.2 37.1004 44.2 36.2004C44.2 35.3004 43.9 34.5004 43.2 33.9004C42 32.7004 39.8 32.7004 38.6 33.9004C38 34.5004 37.6 35.3004 37.6 36.2004C37.6 37.1004 37.9 37.9004 38.6 38.5004C39.2 39.1004 40 39.5004 40.9 39.5004Z"
        fill="currentColor"
      />
      <path
        d="M49.2 39.5004C50.1 39.5004 50.9 39.2004 51.5 38.5004C52.1 37.8004 52.5 37.1004 52.5 36.2004C52.5 35.3004 52.2 34.5004 51.5 33.9004C50.3 32.7004 48.1 32.7004 46.9 33.9004C46.3 34.5004 45.9 35.3004 45.9 36.2004C45.9 37.1004 46.2 37.9004 46.9 38.5004C47.6 39.1004 48.4 39.5004 49.2 39.5004ZM47.6 34.6004C48 34.2004 48.6 33.9004 49.2 33.9004C49.8 33.9004 50.4 34.1004 50.8 34.6004C51.2 35.0004 51.5 35.6004 51.5 36.2004C51.5 36.8004 51.3 37.4004 50.8 37.8004C49.9 38.7004 48.5 38.7004 47.6 37.8004C47.2 37.4004 46.9 36.8004 46.9 36.2004C46.9 35.6004 47.2 35.0004 47.6 34.6004Z"
        fill="currentColor"
      />
      <path
        d="M57.6 39.5004C58.5 39.5004 59.3 39.2004 59.9 38.5004C60.5 37.8004 60.9 37.1004 60.9 36.2004C60.9 35.3004 60.6 34.5004 59.9 33.9004C58.7 32.7004 56.5 32.7004 55.3 33.9004C54.7 34.5004 54.3 35.3004 54.3 36.2004C54.3 37.1004 54.6 37.9004 55.3 38.5004C56 39.1004 56.7 39.5004 57.6 39.5004ZM56 34.6004C56.4 34.2004 57 33.9004 57.6 33.9004C58.2 33.9004 58.8 34.1004 59.2 34.6004C59.6 35.0004 59.9 35.6004 59.9 36.2004C59.9 36.8004 59.7 37.4004 59.2 37.8004C58.3 38.7004 56.9 38.7004 56 37.8004C55.6 37.4004 55.3 36.8004 55.3 36.2004C55.3 35.6004 55.6 35.0004 56 34.6004Z"
        fill="currentColor"
      />
      <path
        d="M29.7 96.0004C29.7 96.1004 29.7 96.1004 29.7 96.0004C30.1 98.2004 31.2 100.2 32.8 101.8C34.4 103.4 36.4 104.5 38.6 104.9C39.3 105 40.1 105.1 40.8 105.1C42.3 105.1 43.8 104.8 45.2 104.2C46.6 103.6 47.8 102.8 48.8 101.8C48.9 101.8 49 101.6 49.1 101.5C49.5 101 50 100.5 50.3 100C51.2 98.7004 51.7 97.3004 52 95.8004C53.3 95.6004 58.3 95.3004 59.8 99.2004C59.9 99.4004 60.1 99.5004 60.3 99.5004C60.4 99.5004 60.4 99.5004 60.5 99.5004C60.8 99.4004 60.9 99.1004 60.8 98.9004C59.1 94.7004 54.1 94.7004 52.2 94.9004C52.2 94.5004 52.3 94.1004 52.3 93.8004C52.3 92.4004 52 91.1004 51.6 89.8004C52.8 89.0004 57 86.6004 60 89.3004C60.2 89.5004 60.5 89.5004 60.7 89.3004C60.9 89.1004 60.9 88.8004 60.7 88.6004C57.2 85.6004 52.7 88.0004 51.2 89.0004C50.6 87.8004 49.9 86.8004 49 85.8004C48.7 85.5004 48.4 85.3004 48.2 85.0004C49 83.8004 51.8 79.9004 55.7 81.1004C56 81.2004 56.2 81.0004 56.3 80.8004C56.4 80.5004 56.2 80.3004 56 80.2004C51.5 78.8004 48.4 83.0004 47.4 84.4004C46.8 84.0004 46.1 83.6004 45.3 83.3004C44.7 83.0004 44 82.8004 43.4 82.7004C43.6 82.6004 43.8 82.4004 43.9 82.3004C44.3 81.9004 44.6 81.4004 44.8 80.9004C45 80.4004 45.1 79.8004 45.1 79.3004C45.1 78.2004 44.6 77.2004 43.9 76.4004C43.3 75.8004 42.5 75.4004 41.7 75.3004C42.1 74.3004 42.8 73.3004 43.7 72.6004C44.7 71.8004 46 71.3004 47.3 71.2004C47.6 71.2004 47.8 70.9004 47.8 70.7004C47.8 70.4004 47.5 70.2004 47.3 70.2004C45.8 70.3004 44.3 70.9004 43.1 71.8004C42.2 72.5004 41.5 73.4004 41 74.4004C40.5 73.4004 39.8 72.5004 38.9 71.8004C37.7 70.9004 36.3 70.3004 34.7 70.2004C34.4 70.2004 34.2 70.4004 34.2 70.7004C34.2 71.0004 34.4 71.2004 34.7 71.2004C36 71.3004 37.3 71.8004 38.3 72.6004C39.2 73.3004 39.9 74.2004 40.3 75.3004C39.5 75.4004 38.7 75.8004 38.1 76.4004C37.3 77.2004 36.9 78.2004 36.9 79.3004C36.9 79.9004 37 80.4004 37.2 80.9004C37.4 81.4004 37.7 81.9004 38.1 82.3004C38.3 82.5004 38.4 82.6004 38.6 82.7004C37.2 83.0004 35.9 83.6004 34.7 84.4004L34.6 84.5004C33.7 83.1004 30.5 78.8004 26 80.2004C25.7 80.3004 25.6 80.6004 25.7 80.8004C25.8 81.1004 26.1 81.2004 26.3 81.1004C30.2 79.9004 33.1 83.8004 33.8 85.0004C32.5 86.1004 31.5 87.4004 30.8 88.9004C29.3 87.9004 24.8 85.4004 21.3 88.5004C21.1 88.7004 21.1 89.0004 21.3 89.2004C21.5 89.4004 21.8 89.4004 22 89.2004C25.1 86.5004 29.3 89.0004 30.5 89.8004C29.9 91.4004 29.7 93.2004 29.8 94.9004C28 94.7004 22.9 94.6004 21.2 98.9004C21.1 99.2004 21.2 99.4004 21.5 99.5004C21.6 99.5004 21.6 99.5004 21.7 99.5004C21.9 99.5004 22.1 99.4004 22.2 99.2004C23.4 95.5004 28.4 95.9004 29.7 96.0004ZM44.9 103.5C43 104.3 40.9 104.5 38.9 104.1C37.1 103.7 35.5 102.9 34.2 101.8C38.4 100.6 40.2 97.6004 41 93.8004C41.7 97.6004 43.5 100.6 47.8 101.8C46.8 102.5 45.9 103.1 44.9 103.5ZM48.2 86.5004C49.1 87.4004 49.9 88.6004 50.4 89.8004C50.4 89.9004 50.4 90.0004 50.5 90.0004C51 91.2004 51.2 92.5004 51.2 93.9004C51.2 94.4004 51.2 95.0004 51.1 95.5004V95.6004C50.9 97.1004 50.3 98.5004 49.5 99.7004C49.2 100.2 48.8 100.6 48.5 101C42.4 99.6004 41.5 94.3004 41.4 88.3004C41.4 87.2004 41.4 86.0004 41.4 84.9004C41.4 84.5004 41.4 84.0004 41.4 83.6004C42.6 83.7004 43.8 83.9004 44.9 84.4004C46.1 84.8004 47.3 85.5004 48.2 86.5004ZM39.7 82.3004C39.3 82.1004 39 81.9004 38.7 81.6004C38.4 81.3004 38.2 80.9004 38 80.6004C37.8 80.3004 37.8 79.8004 37.8 79.4004C37.8 78.6004 38.1 77.8004 38.7 77.2004C39.3 76.6004 40.1 76.3004 40.9 76.3004C41.7 76.3004 42.5 76.6004 43.1 77.2004C43.7 77.8004 44 78.6004 44 79.4004C44 79.8004 43.9 80.2004 43.8 80.6004C43.7 81.0004 43.4 81.3004 43.1 81.6004C42.8 81.9004 42.5 82.1004 42.1 82.3004C41.8 82.4004 41.6 82.5004 41.3 82.5004C41.2 82.5004 41 82.5004 40.9 82.5004C40.8 82.5004 40.6 82.5004 40.5 82.5004C40.2 82.4004 39.9 82.4004 39.7 82.3004ZM35.1 85.2004C36.7 84.1004 38.5 83.6004 40.4 83.5004C40.4 83.9004 40.4 84.4004 40.4 84.8004C40.4 86.0004 40.4 87.1004 40.4 88.3004C40.3 94.4004 39.4 99.6004 33.3 101C32 99.6004 31.1 97.9004 30.7 96.0004C30.3 94.0004 30.5 91.9004 31.3 90.0004C32.1 88.0004 33.4 86.4004 35.1 85.2004Z"
        fill="currentColor"
      />
      <path
        d="M45 90.0004C45.2 90.1004 45.3 90.1004 45.5 90.1004C45.6 90.1004 45.8 90.1004 45.9 90.0004C46.2 89.9004 46.5 89.7004 46.7 89.5004C46.9 89.2004 47 88.9004 47 88.6004C47 88.3004 46.9 88.0004 46.8 87.8004C46.6 87.6004 46.4 87.4004 46.1 87.2004C45.8 87.1004 45.5 87.1004 45.2 87.1004C44.9 87.2004 44.6 87.4004 44.4 87.6004C44.2 87.8004 44.1 88.2004 44.1 88.5004C44.1 88.8004 44.2 89.1004 44.3 89.4004C44.5 89.7004 44.7 89.9004 45 90.0004ZM45.1 88.3004C45.2 88.2004 45.3 88.2004 45.4 88.1004H45.5C45.6 88.1004 45.6 88.1004 45.7 88.1004C45.8 88.1004 45.9 88.2004 45.9 88.3004C46 88.4004 46 88.5004 46 88.6004C46 88.7004 46 88.8004 45.9 88.9004C45.8 89.0004 45.7 89.1004 45.6 89.1004C45.5 89.1004 45.4 89.1004 45.3 89.1004C45.2 89.1004 45.1 89.0004 45.1 88.9004C45 88.8004 45 88.7004 45 88.6004C45 88.5004 45.1 88.4004 45.1 88.3004Z"
        fill="currentColor"
      />
      <path
        d="M47.9 96.7004C48.1 96.9004 48.4 97.1004 48.7 97.1004C48.8 97.1004 48.9 97.1004 49 97.1004C49.2 97.1004 49.4 97.1004 49.6 97.0004C49.9 96.9004 50.1 96.7004 50.3 96.4004C50.5 96.2004 50.6 95.9004 50.6 95.6004C50.6 95.4004 50.6 95.2004 50.5 95.0004C50.4 94.8004 50.3 94.7004 50.2 94.5004C50.1 94.4004 49.9 94.2004 49.7 94.2004C49.5 94.1004 49.4 94.1004 49.1 94.1004C48.8 94.1004 48.5 94.2004 48.3 94.4004C48.1 94.6004 47.9 94.8004 47.7 95.1004C47.6 95.4004 47.6 95.7004 47.6 96.0004C47.6 96.2004 47.7 96.5004 47.9 96.7004ZM48.5 95.4004C48.5 95.3004 48.6 95.2004 48.7 95.2004C48.8 95.1004 48.9 95.1004 49 95.1004C49.1 95.1004 49.1 95.1004 49.2 95.1004C49.3 95.1004 49.3 95.2004 49.4 95.2004C49.5 95.2004 49.5 95.3004 49.5 95.4004C49.5 95.5004 49.5 95.5004 49.5 95.6004C49.5 95.7004 49.5 95.8004 49.4 95.9004C49.3 96.0004 49.3 96.0004 49.2 96.1004C49.1 96.1004 49 96.1004 48.9 96.1004C48.8 96.1004 48.7 96.0004 48.6 96.0004C48.5 95.9004 48.5 95.8004 48.5 95.7004C48.5 95.6004 48.5 95.5004 48.5 95.4004Z"
        fill="currentColor"
      />
      <path
        d="M35.8 90.1004C35.9 90.1004 36.1 90.2004 36.2 90.2004C36.4 90.2004 36.5 90.2004 36.7 90.1004C37 90.0004 37.3 89.8004 37.4 89.5004C37.6 89.2004 37.7 88.9004 37.6 88.6004C37.6 88.3004 37.5 88.0004 37.3 87.7004C37.1 87.4004 36.8 87.3004 36.5 87.2004C36.2 87.1004 35.9 87.1004 35.6 87.3004C35.3 87.4004 35.1 87.6004 34.9 87.9004C34.7 88.1004 34.6 88.4004 34.6 88.7004C34.6 89.0004 34.7 89.3004 34.9 89.6004C35.3 89.8004 35.5 90.0004 35.8 90.1004ZM35.8 88.6004C35.8 88.5004 35.8 88.4004 35.9 88.3004C36 88.2004 36 88.2004 36.1 88.1004C36.2 88.1004 36.2 88.1004 36.3 88.1004H36.4C36.5 88.1004 36.6 88.2004 36.7 88.3004C36.8 88.4004 36.8 88.5004 36.8 88.6004C36.8 88.7004 36.8 88.8004 36.7 88.9004C36.6 89.0004 36.6 89.1004 36.5 89.1004C36.4 89.1004 36.3 89.1004 36.2 89.1004C36.1 89.1004 36 89.0004 35.9 88.9004C35.8 88.8004 35.8 88.7004 35.8 88.6004Z"
        fill="currentColor"
      />
      <path
        d="M32.2 97.0004C32.4 97.1004 32.6 97.1004 32.8 97.1004C32.9 97.1004 33 97.1004 33.1 97.1004C33.4 97.0004 33.7 96.9004 33.9 96.7004C34.1 96.5004 34.3 96.2004 34.3 95.9004C34.4 95.6004 34.3 95.3004 34.2 95.0004C34.1 94.7004 33.9 94.5004 33.6 94.3004C33.4 94.1004 33.1 94.0004 32.8 94.0004C32.6 94.0004 32.4 94.0004 32.2 94.1004C32 94.2004 31.9 94.3004 31.7 94.4004C31.6 94.5004 31.4 94.7004 31.4 94.9004C31.3 95.1004 31.3 95.3004 31.3 95.5004C31.3 95.8004 31.4 96.1004 31.6 96.3004C31.7 96.7004 32 96.9004 32.2 97.0004ZM32.3 95.6004C32.3 95.5004 32.3 95.5004 32.3 95.4004C32.3 95.3004 32.4 95.3004 32.4 95.2004C32.4 95.2004 32.5 95.1004 32.6 95.1004C32.7 95.1004 32.7 95.1004 32.8 95.1004C32.9 95.1004 33 95.1004 33.1 95.2004C33.2 95.3004 33.2 95.3004 33.3 95.4004C33.3 95.5004 33.3 95.6004 33.3 95.7004C33.3 95.8004 33.2 95.9004 33.2 96.0004C33.1 96.1004 33 96.1004 32.9 96.1004C32.8 96.1004 32.7 96.1004 32.6 96.1004C32.5 96.1004 32.4 96.0004 32.4 95.9004C32.3 95.8004 32.3 95.7004 32.3 95.6004Z"
        fill="currentColor"
      />
      <path
        d="M94.1 96.1004C93.9 95.9004 93.6 95.9004 93.4 96.1004L90.6 98.9004L87.8 96.1004C87.6 95.9004 87.3 95.9004 87.1 96.1004C86.9 96.3004 86.9 96.6004 87.1 96.8004L89.9 99.6004L87.1 102.3C86.9 102.5 86.9 102.8 87.1 103C87.2 103.1 87.3 103.1 87.5 103.1C87.6 103.1 87.8 103.1 87.9 103L90.7 100.3L93.5 103.1C93.6 103.2 93.7 103.2 93.9 103.2C94 103.2 94.2 103.2 94.3 103.1C94.5 102.9 94.5 102.6 94.3 102.4L91.5 99.6004L94.3 96.8004C94.3 96.6004 94.3 96.3004 94.1 96.1004Z"
        fill="currentColor"
      />
      <path
        d="M17.4 56.5004C17.8 56.8004 18.2 56.9004 18.7 56.9004C18.7 56.9004 18.7 56.9004 18.8 56.9004C19.3 56.9004 19.7 56.8004 20.1 56.5004C20.5 56.2004 20.8 55.9004 21 55.5004C21.2 55.1004 21.2 54.6004 21.2 54.1004C21.1 53.5004 20.7 52.9004 20.2 52.6004C19.7 52.3004 19.1 52.1004 18.4 52.2004C17.9 52.3004 17.5 52.5004 17.2 52.8004C16.9 53.1004 16.6 53.5004 16.5 54.0004C16.4 54.5004 16.4 54.9004 16.6 55.4004C16.7 55.8004 17 56.2004 17.4 56.5004ZM17.4 54.3004C17.5 54.0004 17.6 53.8004 17.8 53.6004C18 53.4004 18.2 53.3004 18.5 53.2004C18.6 53.2004 18.7 53.2004 18.7 53.2004C19 53.2004 19.3 53.3004 19.5 53.4004C19.8 53.6004 20 53.9004 20.1 54.3004C20.1 54.6004 20.1 54.8004 20 55.1004C19.9 55.3004 19.7 55.6004 19.5 55.7004C19.3 55.8004 19 55.9004 18.7 55.9004C18.4 55.9004 18.2 55.8004 17.9 55.7004C17.7 55.5004 17.5 55.3004 17.4 55.1004C17.4 54.8004 17.4 54.5004 17.4 54.3004Z"
        fill="currentColor"
      />
      <path
        d="M179.6 133.1C179.9 133.1 180.1 132.9 180.1 132.6V128H184.8C185.1 128 185.3 127.8 185.3 127.5C185.3 127.2 185.1 127 184.8 127H180.1V122.3C180.1 122 179.9 121.8 179.6 121.8C179.3 121.8 179.1 122 179.1 122.3V127H174.4C174.1 127 173.9 127.2 173.9 127.5C173.9 127.8 174.1 128 174.4 128H179.1V132.7C179.1 132.9 179.3 133.1 179.6 133.1Z"
        fill="currentColor"
      />
      <path
        d="M40.9 131.3C41.2 131.3 41.4 131.1 41.4 130.8V125.9C41.4 125.6 41.2 125.4 40.9 125.4C40.6 125.4 40.4 125.6 40.4 125.9V130.8C40.4 131.1 40.6 131.3 40.9 131.3Z"
        fill="currentColor"
      />
    </svg>
  </SvgIcon>
)

export default FixingBugsImage
