import { FC } from 'react'

import { SvgIcon, SvgIconProps } from '@mui/material'

const DigitalAdsPerformanceImage: FC<SvgIconProps> = ({ sx, ...props }) => (
  <SvgIcon sx={{ fontSize: 200, color: 'primary.dark', ...sx }} {...props}>
    <svg
      width="200"
      height="200"
      viewBox="0 0 200 200"
      fill="none"
      xmlns="http://www.w3.org/2000/svg"
    >
      <path
        d="M56.2001 56.1996C57.4001 56.1996 58.6001 55.6996 59.4001 54.8996C60.3001 53.9996 60.7001 52.8996 60.7001 51.6996C60.7001 50.4996 60.2001 49.2996 59.4001 48.4996C58.5001 47.5996 57.4001 47.1996 56.2001 47.1996C55.0001 47.1996 53.8001 47.6996 53.0001 48.4996C52.1001 49.3996 51.7001 50.4996 51.7001 51.6996C51.7001 52.8996 52.2001 54.0996 53.0001 54.8996C53.9001 55.6996 55.0001 56.1996 56.2001 56.1996Z"
        fill="currentColor"
      />
      <path
        d="M149.7 24.9996C148.7 23.4996 147.5 22.1996 146 21.1996C144.5 20.1996 142.9 19.4996 141.2 19.0996C139.5 18.6996 137.7 18.6996 135.9 18.9996L112.8 22.9996C112.7 21.9996 112.3 21.1996 111.6 20.6996C110.7 19.9996 109.6 19.8996 108.3 20.2996C108.1 18.9996 107.2 17.7996 105.9 17.3996C104.8 16.9996 103.6 17.0996 102.8 17.7996C102.3 16.5996 101.3 15.6996 100.1 15.3996C98.7001 15.0996 97.3001 15.4996 96.1001 16.5996C95.4001 15.1996 93.9001 14.5996 92.5001 14.5996C91.1001 14.6996 90.0001 15.3996 89.5001 16.3996C88.2001 15.2996 86.4001 15.2996 85.1001 15.7996C83.9001 16.2996 83.1001 17.1996 82.9001 18.2996C81.8001 17.5996 80.5001 17.4996 79.2001 17.9996C77.6001 18.6996 76.5001 20.2996 76.3001 21.9996C75.2001 21.6996 74.0001 21.9996 73.1001 22.7996C71.8001 23.9996 71.3001 25.8996 71.7001 27.3996C70.1001 27.7996 68.9001 28.7996 68.5001 30.1996C68.4001 30.3996 68.4001 30.5996 68.4001 30.7996L52.2001 33.6996C50.4001 33.9996 48.8001 34.6996 47.3001 35.5996C45.8001 36.5996 44.5001 37.7996 43.5001 39.2996C42.5001 40.7996 41.8001 42.3996 41.4001 44.0996C41.0001 45.7996 41.0001 47.5996 41.3001 49.2996V49.3996L52.7001 115C47.5001 118.7 42.6001 123 41.1001 125.8C41.0001 125.9 41.0001 126.1 41.1001 126.3C41.2001 126.5 41.3001 126.5 41.5001 126.6C42.8001 126.8 44.1001 126.9 45.3001 126.9C48.8001 126.9 51.8001 126.2 54.6001 125.5L65.2001 185.2C65.2001 185.4 65.5001 185.6 65.7001 185.6H65.8001C66.1001 185.6 66.3001 185.3 66.2001 185L55.6001 125.2C55.9001 125.1 56.1001 125.1 56.4001 125C58.1001 124.5 59.6001 124.1 61.2001 123.9C61.1001 124.8 61.0001 125.8 61.0001 126.7C61.0001 126.9 61.1001 127 61.2001 127.1C61.6001 127.4 63.0001 128.5 65.0001 129.9L69.2001 153.6C69.2001 153.8 69.5001 154 69.7001 154H69.8001L93.4001 149.8C96.9001 152 100.2 153.1 103.1 153.1C104.5 153.1 105.9 152.8 107.1 152.3C109.3 151.3 110.9 149.3 111.9 146.6L127.6 143.8C127.2 147.3 126.9 150.3 126.7 152C126.7 152.2 126.7 152.3 126.9 152.4C127.4 152.8 127.9 153.2 128.5 153.5C127.9 155.2 127 156.7 126.2 157.8C125.7 158.5 125.3 159.1 125.1 159.7C125 159.8 125 160 125.1 160.1C128.1 166.5 140.1 177 146.7 181C146.8 181 146.9 181.1 147 181.1C147.1 181.1 147.2 181.1 147.3 181C147.5 180.9 147.6 180.7 147.5 180.5C147.3 174.5 145.2 170.1 143.4 166.3C141.8 162.9 140.5 160 140.6 156.8H140.7C142.9 156.8 144.8 156.5 146.2 155.8C146.3 155.7 146.5 155.6 146.5 155.4C146.7 154.1 147.1 151.8 147.4 148.9C147.4 148.9 147.4 148.9 147.4 148.8C147.7 146.2 148.1 143.1 148.5 139.9L160.8 137.7C161.1 137.7 161.3 137.4 161.2 137.1L147 56.4996C147.1 56.4996 147.2 56.4996 147.2 56.4996C147.3 56.4996 147.3 56.4996 147.4 56.4996C149.8 56.1996 149.9 49.9996 149.8 47.6996C151.4 46.3996 152.3 44.6996 152.1 42.9996C151.9 41.2996 150.6 39.8996 148.8 38.9996C148.3 36.7996 146.8 30.6996 144.3 30.9996C143.9 30.9996 143.6 31.1996 143.3 31.5996C143.3 31.5996 143.2 31.5996 143.2 31.6996L135 40.5996L123.9 41.9996C121.1 42.2996 119.8 44.6996 120 46.7996C120 47.4996 120.3 48.1996 120.6 48.7996L116.9 49.4996L116.8 49.3996C117.8 48.9996 118.4 48.1996 118.6 47.2996C118.7 46.3996 118.4 45.4996 117.7 44.7996C118 44.6996 118.2 44.4996 118.4 44.2996C118.7 43.9996 119 43.4996 119.1 43.0996C119.2 42.6996 119.3 42.1996 119.2 41.6996C119.1 41.1996 118.9 40.7996 118.7 40.3996C118.6 40.2996 118.5 40.0996 118.4 39.9996C119.3 39.3996 119.8 38.4996 119.8 37.3996C119.8 36.0996 119 34.6996 117.9 33.9996C118.7 33.1996 119 31.9996 118.7 30.7996C118.4 29.5996 117.6 28.7996 116.5 28.5996C117 27.4996 117 26.2996 116.4 25.2996C115.9 24.4996 115.2 23.9996 114.3 23.7996L136 19.9996C137.6 19.6996 139.3 19.6996 140.9 20.0996C142.5 20.4996 144 21.0996 145.4 22.0996C146.8 23.0996 147.9 24.1996 148.8 25.5996C149.7 26.9996 150.3 28.4996 150.6 30.1996L177.9 185.1C177.9 185.3 178.2 185.5 178.4 185.5H178.5C178.8 185.5 179 185.2 178.9 184.9L151.6 29.9996C151.3 28.1996 150.6 26.4996 149.7 24.9996ZM124.8 42.9996L134.1 41.8996C133.5 43.8996 133.8 46.9996 134.9 48.7996L134.1 48.8996C133.9 48.7996 133.7 48.7996 133.5 48.7996C132.6 48.8996 131.8 49.0996 131 49.4996C130.7 48.6996 130.2 48.2996 128.9 48.3996C127.6 48.4996 126.1 48.6996 125.1 49.0996C124.3 47.2996 124.1 44.3996 124.8 42.9996ZM141.9 34.3996C141.7 35.5996 141.5 36.9996 141.5 38.5996V38.6996C141.5 40.3996 141.6 42.2996 141.8 44.2996C142 46.1996 142.4 48.0996 142.8 49.7996V49.8996C142.8 49.9996 142.8 49.9996 142.9 50.0996C143.3 51.5996 143.8 52.9996 144.3 54.0996L136.2 48.6996C134.8 47.2996 134.3 43.2996 135.3 41.4996L141.9 34.3996ZM118.7 74.1996C118.6 73.4996 118.5 72.7996 118.4 72.1996C118.2 70.9996 118 69.7996 117.8 68.7996C118.4 69.0996 119.3 69.2996 120.4 69.3996H120.5C121.4 69.4996 122.4 69.4996 123.6 69.4996C124.4 69.4996 125.2 69.4996 126.1 69.3996C129.3 69.2996 132.5 68.5996 134.1 67.5996C134.1 69.3996 134.1 71.0996 134.1 72.6996C131.8 75.4996 123.1 75.8996 118.7 74.1996ZM133.6 49.7996C134 49.7996 134.1 49.9996 134.2 50.1996C134.3 50.4996 134.1 50.9996 133.6 51.1996C132.9 51.4996 132.2 51.6996 131.5 51.7996C131.5 51.3996 131.4 50.8996 131.3 50.4996C132 49.9996 132.8 49.7996 133.6 49.7996ZM134.4 52.3996C134.4 52.6996 134.3 53.1996 133.8 53.4996C133.4 53.7996 132.3 54.2996 131.4 54.2996C131.4 54.0996 131.5 53.9996 131.5 53.7996C131.5 53.3996 131.5 53.0996 131.5 52.6996C132.3 52.5996 133.2 52.2996 133.9 51.9996C134 51.9996 134.1 51.8996 134.2 51.8996C134.4 52.0996 134.4 52.1996 134.4 52.3996ZM134.6 54.6996C134.6 54.9996 134.5 55.3996 134 55.6996C133.2 56.1996 132.4 56.4996 131.5 56.6996C130.9 56.7996 130.4 56.5996 130.4 56.3996C130.3 56.1996 130.6 55.7996 131.3 55.2996C132.5 55.2996 133.9 54.5996 134.4 54.2996C134.5 54.3996 134.6 54.5996 134.6 54.6996ZM134.5 56.8996C134.6 56.9996 134.6 57.1996 134.6 57.2996C134.6 57.4996 134.6 57.5996 134.5 57.6996C134.4 57.7996 134.3 57.8996 134.1 57.9996C133.4 58.3996 132.7 58.6996 131.9 58.7996C131.4 58.8996 131 58.6996 131 58.5996C130.9 58.3996 131.1 58.0996 131.9 57.5996C132.8 57.3996 133.6 57.0996 134.3 56.6996C134.3 56.7996 134.4 56.7996 134.5 56.8996ZM125.2 50.0996C125.8 49.5996 127.8 49.3996 129.1 49.2996C130 49.1996 130.1 49.3996 130.2 49.8996C130.5 51.1996 130.6 52.4996 130.5 53.7996C130.5 54.0996 130.4 54.2996 130.3 54.3996C130.2 54.3996 129.7 54.0996 129 51.4996C128.9 51.1996 128.7 51.0996 128.4 51.0996C128.1 51.1996 128 51.3996 128 51.6996C128.7 54.6996 128.1 56.6996 126.3 57.8996C126.1 58.0996 126 58.3996 126.2 58.5996C126.4 58.7996 126.7 58.8996 126.9 58.6996C127.4 58.2996 127.9 57.8996 128.2 57.3996C128.5 58.7996 128.9 60.0996 129.6 61.3996C129.5 61.9996 129.7 63.2996 130.1 64.9996C130.2 65.2996 130.2 65.5996 130.3 65.8996C130.4 66.5996 130.6 67.2996 130.7 67.7996C129.5 68.0996 128 68.2996 126.2 68.3996C124 68.4996 122.3 68.4996 121.1 68.3996C121.1 68.0996 121 67.5996 121 67.1996C120.9 65.7996 120.7 63.7996 120.7 62.1996C120.6 57.9996 120.9 57.0996 121.9 55.1996C122.7 53.2996 123.9 51.5996 125.2 50.0996ZM117.9 75.2996C118.7 80.1996 119.5 85.1996 119.9 86.9996C120 87.1996 120.2 87.3996 120.4 87.3996H120.5C120.8 87.2996 120.9 87.0996 120.9 86.7996C120.5 84.9996 119.7 79.8996 119 75.3996C120.8 75.9996 123.1 76.2996 125.4 76.2996C128.8 76.2996 132.3 75.6996 134.2 74.1996C134.3 93.4996 133.8 96.9996 132.2 98.2996C128.3 95.8996 123.5 93.1996 117.7 89.9996C116.6 87.4996 115.5 84.8996 114.7 82.2996C113.8 70.4996 111 67.8996 108.3 65.3996L108 64.9996C107.8 64.7996 107.5 64.7996 107.3 64.9996C107.1 65.1996 107.1 65.4996 107.3 65.6996L107.6 65.9996C110.6 68.7996 113.7 71.5996 113.9 88.5996C111.7 91.9996 104.4 93.2996 98.6001 92.3996C97.7001 92.2996 96.9001 92.0996 96.1001 91.7996C93.4001 88.6996 89.8001 84.7996 86.9001 81.7996C87.9001 80.0996 88.8001 78.3996 89.7001 76.6996C89.8001 76.4996 89.8001 76.2996 89.6001 76.1996C89.5001 75.9996 89.3001 75.9996 89.1001 75.9996C85.8001 76.9996 76.6001 79.7996 74.0001 80.6996C72.9001 79.4996 72.0001 78.3996 71.3001 77.6996C71.1001 77.4996 70.8001 77.4996 70.6001 77.6996C70.4001 77.8996 70.4001 78.1996 70.6001 78.3996C71.3001 79.0996 72.3001 80.2996 73.4001 81.4996L73.5001 81.5996C74.9001 83.0996 76.4001 84.8996 77.9001 86.5996C74.6001 86.3996 71.2001 88.1996 68.9001 90.0996C66.9001 91.7996 65.6001 93.7996 65.2001 95.4996C62.2001 92.0996 60.1001 89.4996 58.1001 87.0996L57.0001 85.7996C55.0001 83.2996 54.2001 80.8996 54.5001 78.5996C55.0001 75.6996 57.3001 72.8996 61.6001 70.0996C66.6001 66.8996 73.1001 64.3996 79.4001 62.0996C79.8001 61.8996 80.3001 61.7996 80.7001 61.5996C82.4001 60.9996 84.1001 60.2996 85.7001 59.6996C91.1001 61.4996 98.7001 66.1996 103 69.5996C103.1 69.6996 103.2 69.6996 103.3 69.6996H103.4C103.6 69.6996 103.7 69.4996 103.7 69.3996C104.5 66.8996 105 64.2996 105.2 61.5996C105.5 61.7996 105.8 61.8996 106.1 62.0996C109.4 64.0996 113.6 67.0996 117.2 72.3996C117.6 73.3996 117.7 74.2996 117.9 75.2996ZM69.2001 111C68.6001 110.5 68.0001 110 67.5001 109.5C66.9001 108.9 66.3001 108.4 65.8001 108.1C65.7001 108 65.5001 108 65.4001 108C64.5001 108.3 63.4001 108.7 62.2001 109.2L58.8001 89.5996C60.5001 91.7996 62.5001 94.1996 65.1001 97.0996C65.1001 97.1996 65.2001 97.1996 65.2001 97.1996C66.5001 98.5996 67.9001 100.1 69.5001 101.8C69.5001 101.8 69.5001 101.9 69.6001 101.9C70.1001 102.5 70.8001 102.8 71.7001 102.8C72.3001 102.8 72.9001 102.7 73.7001 102.5L73.8001 102.6C74.4001 103 75.1001 103.4 75.8001 103.7C75.7001 104.9 75.9001 107.1 77.7001 108.3C78.2001 108.6 78.8001 108.9 79.4001 108.9C79.6001 108.9 79.7001 108.9 79.9001 108.8C80.0001 108.8 80.2001 108.7 80.3001 108.6C80.8001 108.9 81.4001 109.1 82.0001 109.1C82.2001 109.1 82.4001 109.1 82.6001 109C82.7001 109 82.8001 108.9 82.9001 108.9C83.4001 109.2 83.9001 109.4 84.5001 109.4C84.7001 109.4 84.9001 109.4 85.2001 109.3C85.5001 109.2 85.8001 109 86.1001 108.7C86.1001 118.3 87.5001 118.5 88.0001 118.5C88.0001 118.5 88.0001 118.5 88.1001 118.5C88.4001 118.5 88.7001 118.3 88.9001 117.9C89.1001 119 89.4001 120.1 89.7001 121.3C87.3001 120 83.5001 117.7 79.8001 115.5C76.6001 113.6 73.4001 111.7 70.9001 110.3C70.7001 110.2 70.6001 110.2 70.4001 110.3C70.0001 110.5 69.6001 110.7 69.2001 111ZM82.6001 79.0996C85.3001 81.3996 91.2001 87.6996 95.2001 92.2996C92.6001 94.3996 90.6001 97.1996 89.4001 100.3C89.3001 100.2 89.2001 100.1 89.1001 99.9996L87.0001 97.9996C86.0001 97.0996 85.1001 96.1996 84.2001 95.2996C84.4001 94.9996 84.6001 94.6996 84.6001 94.3996C84.7001 93.8996 84.6001 93.3996 84.4001 92.9996C84.4001 92.8996 84.4001 92.7996 84.3001 92.7996L83.8001 92.1996C82.1001 90.1996 78.0001 85.3996 74.7001 81.6996C76.3001 80.9996 79.5001 79.9996 82.6001 79.0996ZM88.2001 117C88.2001 117.2 88.1001 117.3 88.1001 117.4C87.8001 117 87.1001 115 87.2001 107.4C87.6001 106.8 87.9001 106 88.3001 105.1C88.4001 104.8 88.3001 104.6 88.0001 104.4C87.7001 104.3 87.5001 104.4 87.3001 104.7C86.4001 107 85.6001 108.2 84.9001 108.4C84.6001 108.5 84.3001 108.5 83.8001 108.3C84.4001 107.6 84.9001 106.6 85.6001 105C85.7001 104.7 85.6001 104.5 85.3001 104.3C85.0001 104.2 84.8001 104.3 84.6001 104.6C83.6001 106.9 82.9001 108 82.2001 108.2C81.9001 108.3 81.5001 108.2 81.0001 108C81.6001 107.3 82.2001 106.2 82.8001 104.7C82.9001 104.4 82.8001 104.2 82.6001 104C82.4001 103.9 82.1001 104 81.9001 104.2C81.0001 106.2 80.2001 107.6 79.5001 107.8C79.2001 107.9 78.8001 107.7 78.2001 107.4C77.0001 106.6 76.8001 105.1 76.8001 104.1C77.4001 104.3 77.9001 104.5 78.5001 104.6C78.4001 104.9 78.3001 105.1 78.3001 105.2C78.2001 105.5 78.3001 105.7 78.6001 105.8C78.7001 105.8 78.7001 105.8 78.8001 105.8C79.0001 105.8 79.2001 105.7 79.3001 105.5C79.3001 105.4 79.4001 105.2 79.5001 104.9C79.7001 104.4 80.0001 103.7 80.1001 103.5C80.2001 103.2 80.0001 103 79.8001 102.9C79.5001 102.8 79.3001 103 79.2001 103.2C79.2001 103.3 79.1001 103.5 79.0001 103.7C77.4001 103.3 75.9001 102.7 74.5001 101.8C73.1001 100.8 72.0001 99.5996 71.1001 98.1996C72.0001 96.8996 73.4001 95.2996 75.6001 94.0996C77.4001 93.0996 78.9001 92.5996 80.1001 92.3996C81.0001 93.3996 82.1001 94.3996 83.2001 95.4996C84.2001 96.4996 85.3001 97.4996 86.4001 98.5996L88.4001 100.5C88.9001 101 89.2001 101.6 89.4001 102.2C89.6001 102.8 89.7001 103.5 89.6001 104.2C89.4001 106.1 88.3001 115.8 88.2001 117ZM81.9001 91.3996C81.4001 91.2996 80.8001 91.2996 80.2001 91.3996C80.1001 91.3996 80.0001 91.3996 79.9001 91.3996C78.5001 91.5996 76.9001 92.1996 75.0001 93.1996C72.9001 94.3996 71.1001 96.0996 70.1001 97.7996C70.0001 97.8996 70.0001 97.9996 69.9001 98.0996C69.6001 98.6996 69.3001 99.2996 69.2001 99.7996C69.2001 99.8996 69.2001 99.8996 69.2001 99.9996C68.1001 98.7996 67.0001 97.5996 66.0001 96.5996C66.0001 94.9996 67.4001 92.7996 69.5001 90.9996C71.8001 88.9996 75.5001 87.0996 78.8001 87.8996C80.0001 89.1996 81.1001 90.4996 81.9001 91.3996ZM79.3001 116.3C80.6001 117.1 81.8001 117.8 83.0001 118.5C85.2001 120.7 88.6001 124.2 91.9001 127.9C92.1001 128.4 92.3001 129 92.5001 129.5C92.6001 129.7 92.8001 129.8 93.0001 129.8C93.1001 129.8 93.1001 129.8 93.2001 129.8C93.5001 129.7 93.6001 129.4 93.5001 129.1C91.7001 124.7 90.4001 120 89.5001 115.3C89.9001 112.1 90.5001 105.8 90.6001 104.5C90.7001 103.7 90.6001 102.8 90.4001 102C90.3001 101.7 90.2001 101.5 90.1001 101.3C91.3001 97.9996 93.3001 95.0996 96.1001 92.8996C96.7001 93.0996 97.2001 93.1996 97.8001 93.2996C91.1001 104.1 93.4001 120.4 96.6001 136.4C91.6001 133.2 86.2001 129.9 81.3001 126.9C76.0001 123.6 71.8001 121 70.0001 119.8C71.6001 117.4 73.8001 115.4 76.2001 114.5C77.2001 115.1 78.3001 115.7 79.3001 116.3ZM96.2001 46.9996C96.3001 46.6996 96.1001 46.4996 95.9001 46.3996C94.5001 45.8996 94.2001 45.0996 94.2001 44.7996C94.2001 44.3996 94.3001 44.0996 94.6001 43.8996C94.8001 43.7996 95.1001 43.8996 95.3001 43.9996C95.8001 44.3996 96.3001 44.6996 96.8001 44.3996C97.4001 44.0996 97.3001 43.2996 97.1001 42.1996C97.1001 41.9996 97.1001 41.8996 97.0001 41.6996C98.9001 41.1996 100.9 40.7996 102.9 40.6996C105.4 48.4996 104.5 50.8996 103.7 51.5996C103 52.2996 101.6 52.1996 99.7001 51.3996C99.0001 51.0996 98.4001 50.7996 97.8001 50.3996C97.6001 50.2996 97.4001 50.2996 97.2001 50.4996C97.0001 50.5996 97.0001 50.8996 97.1001 51.0996C97.6001 52.2996 98.3001 53.3996 99.1001 54.2996C99.6001 57.8996 101.8 59.5996 103.7 60.5996L103.9 60.6996C104.1 60.7996 104.3 60.8996 104.5 60.9996C104.4 63.4996 104 65.9996 103.3 68.2996C99.1001 65.0996 92.5001 60.9996 87.3001 58.9996C93.3001 56.6996 94.9001 52.1996 96.2001 46.9996ZM74.7001 57.9996C75.4001 58.3996 76.2001 58.4996 77.1001 58.2996C77.0001 58.8996 77.1001 59.4996 77.4001 60.0996C77.6001 60.5996 77.9001 61.0996 78.4001 61.4996C72.3001 63.7996 66.1001 66.1996 61.2001 69.2996C59.0001 70.6996 57.4001 72.0996 56.1001 73.5996L54.0001 61.6996L74.7001 57.9996ZM42.1001 49.3996V49.2996C41.8001 47.6996 41.8001 45.9996 42.2001 44.3996C42.6001 42.7996 43.2001 41.2996 44.2001 39.8996C45.2001 38.4996 46.3001 37.3996 47.7001 36.4996C49.1001 35.5996 50.6001 34.9996 52.3001 34.6996L68.4001 31.8996C68.5001 32.6996 68.8001 33.3996 69.4001 33.9996C68.2001 34.5996 67.4001 35.5996 67.2001 36.7996C67.0001 38.0996 67.6001 39.4996 68.7001 40.4996C67.6001 41.4996 67.1001 42.8996 67.4001 44.1996C67.7001 45.3996 68.6001 46.3996 69.8001 46.7996C69.4001 47.3996 69.2001 48.0996 69.2001 48.8996L63.2001 49.9996C62.9001 49.9996 62.7001 50.2996 62.8001 50.5996C62.8001 50.7996 63.1001 50.9996 63.3001 50.9996H63.4001L69.3001 49.9996C69.4001 50.3996 69.5001 50.7996 69.8001 51.1996C70.5001 52.4996 71.8001 53.2996 73.1001 53.3996C72.6001 54.7996 72.8001 56.1996 73.7001 57.2996L53.3001 60.8996C53.0001 60.8996 52.8001 61.1996 52.9001 61.4996L55.2001 74.7996C54.3001 75.9996 53.8001 77.2996 53.6001 78.5996C53.2001 81.1996 54.1001 83.8996 56.3001 86.5996L57.4001 87.9996C57.5001 88.0996 57.5001 88.0996 57.6001 88.1996L61.4001 109.8C59.0001 111 56.3001 112.6 53.7001 114.5L42.1001 49.3996ZM64.2001 117.6C65.8001 115 68.0001 112.8 70.6001 111.3C71.9001 112.1 73.4001 113 75.1001 113.9C72.7001 115 70.5001 117.2 68.9001 119.7C67.0001 122.6 65.8001 126.1 65.6001 129.1C63.8001 127.8 62.4001 126.8 61.8001 126.3C61.9001 123.2 62.7001 120.2 64.2001 117.6ZM66.0001 130.6C72.9001 135.6 85.1001 144.4 91.9001 148.9L69.9001 152.8L66.0001 130.6ZM106.4 151.3C103.1 152.8 98.6001 152 93.6001 148.9C93.5001 148.9 93.5001 148.8 93.4001 148.8L93.3001 148.7C86.7001 144.4 73.8001 135.1 66.6001 129.9C66.6001 127 67.7001 123.6 69.5001 120.7C71.3001 121.9 75.5001 124.5 80.8001 127.8C86.0001 131 91.8001 134.6 97.0001 137.9C97.1001 138 97.2001 138 97.3001 138C97.4001 138 97.5001 138 97.6001 137.9C97.8001 137.8 97.8001 137.6 97.8001 137.4C94.5001 121.1 91.9001 104.3 98.8001 93.5996C99.9001 93.7996 101.1 93.7996 102.3 93.7996C107.4 93.7996 112.6 92.2996 114.6 89.4996C149.5 108.4 149.3 112.4 149 119.6C148.8 123.5 148 131.8 147.2 139.5C147.2 139.6 147.2 139.6 147.2 139.7C146.8 142.9 146.5 145.9 146.2 148.5C140.9 150.4 131.6 148.7 128.3 145.1C128.4 144.6 128.4 144 128.5 143.4C128.5 143.3 128.5 143.2 128.5 143.1V143C129.4 134.9 130.6 125 130.7 123.6C130.7 123.4 130.6 123.1 130.3 123.1C129.9 123 129.4 122.9 128.8 122.7C123.8 119.9 119.2 116.4 115.1 112.5C115.3 109.4 115.5 106.9 115.7 105.6C115.7 105.3 115.5 105.1 115.2 105.1C114.9 105.1 114.7 105.3 114.7 105.6C114.6 107.2 114.3 110.7 114 114.9C113.2 124.7 112.2 138 111.7 142.5C111.1 146.8 109.2 149.9 106.4 151.3ZM112.6 142.6C113 138.8 113.8 129 114.5 120.2C115.3 120.4 116.6 120.7 118.2 121.1C121.5 122 125.9 123.1 128.5 123.8H128.6C129 123.9 129.3 124 129.6 124C129.4 126.4 128.3 135.2 127.5 142.6L112.1 145.3C112.3 144.5 112.4 143.6 112.6 142.6ZM145.2 155C141 156.7 132.3 155.6 127.4 151.7C127.5 150.4 127.8 148.6 128 146.4C130.8 148.8 136.1 150.3 140.9 150.3C142.7 150.3 144.5 150.1 146 149.6C145.7 151.9 145.4 153.7 145.2 155ZM148.2 139C149 131.4 149.8 123.4 150 119.6C150.3 113.1 149.6 109.1 133 98.7996C134.7 97.0996 135.2 92.9996 135.1 73.0996V72.9996C135.1 70.9996 135.1 68.8996 135.1 66.4996C135.1 65.4996 133.7 64.8996 131 64.5996C130.8 63.6996 130.7 62.7996 130.6 62.1996C132.2 61.7996 133.8 61.1996 135.2 60.3996C135.4 60.2996 135.5 59.9996 135.4 59.6996C135.2 59.3996 135.1 59.0996 135 58.6996C135.1 58.5996 135.3 58.3996 135.4 58.2996C135.6 57.9996 135.7 57.6996 135.6 57.2996C135.6 56.9996 135.5 56.5996 135.3 56.2996C135.2 56.1996 135.2 56.0996 135.1 56.0996C135.5 55.6996 135.7 55.0996 135.6 54.4996C135.6 54.0996 135.4 53.7996 135.1 53.4996C135.4 53.0996 135.5 52.6996 135.4 52.1996C135.4 51.7996 135.2 51.3996 134.9 51.1996C135.2 50.7996 135.2 50.2996 135.1 49.8996C135.1 49.7996 135 49.7996 135 49.6996L135.7 49.5996L145.5 56.0996L159.8 137L148.2 139ZM146.9 55.6996C146.2 55.7996 144.9 53.7996 144 50.2996C145.7 49.9996 147.2 49.3996 148.5 48.5996C148.5 53.2996 147.6 55.5996 146.9 55.6996ZM150.8 43.2996C151 44.6996 150.2 46.0996 148.8 47.0996C148.7 47.0996 148.6 47.1996 148.6 47.2996C147.4 48.1996 145.7 48.8996 143.8 49.2996C143.4 47.7996 143.1 46.1996 142.9 44.2996C142.7 42.3996 142.6 40.6996 142.6 39.1996C146.8 38.8996 150.4 40.6996 150.8 43.2996ZM144.1 32.1996C144.8 32.0996 146.2 34.0996 147.3 38.6996C145.9 38.1996 144.3 37.9996 142.5 38.1996C142.6 35.2996 143 33.2996 143.6 32.4996C143.8 32.2996 143.9 32.1996 144.1 32.1996ZM123.7 43.0996C123.1 44.9996 123.4 47.7996 124.3 49.5996C124.2 49.6996 124.1 49.8996 124 49.9996C121.9 49.9996 120.8 48.3996 120.7 46.8996C120.5 45.1996 121.4 43.3996 123.7 43.0996ZM120.9 49.7996C121.5 50.3996 122.2 50.7996 123.2 50.8996C122.3 52.0996 121.5 53.2996 120.8 54.5996C119.7 56.6996 119.4 57.8996 119.5 62.0996C119.5 63.0996 119.6 64.1996 119.7 65.1996C118.2 65.5996 116.7 66.2996 116.6 67.2996V67.3996C116.6 67.3996 116.6 67.3996 116.6 67.4996C116.7 68.1996 116.9 69.0996 117 70.0996C113.9 66.0996 110.5 63.3996 107.6 61.5996C108 61.2996 108.4 60.9996 108.6 60.5996C108.9 60.1996 109 59.6996 109.1 59.0996C109.6 59.2996 110.1 59.2996 110.6 59.2996C111.4 59.2996 112.2 58.9996 112.8 58.4996C113.4 57.9996 113.9 57.2996 114.1 56.4996C114.3 55.8996 114.3 55.2996 114.2 54.6996C115.4 54.4996 116.3 53.7996 116.8 52.6996C117.1 51.8996 117.1 50.9996 116.9 50.0996L120.9 49.7996Z"
        fill="currentColor"
      />
      <path
        d="M175.4 68.8996C176.8 68.8996 178.1 68.2996 179.1 67.2996C180.1 66.2996 180.7 64.9996 180.7 63.5996C180.7 62.1996 180.1 60.8996 179.1 59.8996C178.1 58.8996 176.8 58.2996 175.4 58.2996C174 58.2996 172.7 58.8996 171.7 59.8996C170.7 60.8996 170.1 62.1996 170.1 63.5996C170.1 64.9996 170.7 66.2996 171.7 67.2996C172.7 68.2996 174 68.8996 175.4 68.8996ZM172.3 60.5996C173.1 59.7996 174.2 59.2996 175.3 59.2996C176.4 59.2996 177.5 59.6996 178.3 60.5996C179.1 61.3996 179.6 62.4996 179.6 63.5996C179.6 64.6996 179.2 65.7996 178.3 66.5996C177.4 67.3996 176.4 67.8996 175.3 67.8996C174.2 67.8996 173.1 67.4996 172.3 66.5996C171.5 65.6996 171 64.6996 171 63.5996C171.1 62.4996 171.5 61.3996 172.3 60.5996Z"
        fill="currentColor"
      />
      <path
        d="M186 69.7996C185 70.7996 184.4 72.0996 184.4 73.4996C184.4 74.8996 185 76.1996 186 77.1996C187 78.1996 188.4 78.7996 189.7 78.7996C191.1 78.7996 192.4 78.1996 193.5 77.1996C194.5 76.1996 195.1 74.7996 195.1 73.4996C195.1 72.0996 194.5 70.7996 193.5 69.7996C192.5 68.7996 191.2 68.1996 189.7 68.1996C188.3 68.1996 187 68.7996 186 69.7996ZM194 73.4996C194 74.5996 193.5 75.6996 192.7 76.4996C191.9 77.2996 190.8 77.7996 189.7 77.7996C188.6 77.7996 187.5 77.2996 186.7 76.4996C185.9 75.6996 185.4 74.5996 185.4 73.4996C185.4 72.3996 185.8 71.2996 186.7 70.4996C187.5 69.6996 188.6 69.1996 189.7 69.1996C190.8 69.1996 191.9 69.5996 192.7 70.4996C193.6 71.2996 194 72.3996 194 73.4996Z"
        fill="currentColor"
      />
      <path
        d="M191.7 55.2996C191.5 55.0996 191.2 55.1996 191 55.3996L173.2 80.9996C173 81.1996 173.1 81.4996 173.3 81.6996C173.4 81.7996 173.5 81.7996 173.6 81.7996C173.8 81.7996 173.9 81.6996 174 81.5996L191.9 55.9996C192 55.7996 192 55.4996 191.7 55.2996Z"
        fill="currentColor"
      />
      <path
        d="M184.8 33.4996L189.1 36.4996C189.2 36.5996 189.3 36.5996 189.4 36.5996H189.5C189.6 36.5996 189.7 36.4996 189.8 36.3996L192.8 32.0996C193.2 31.4996 193.3 30.7996 193.2 30.0996C193.1 29.3996 192.7 28.7996 192.1 28.3996C191.5 27.9996 190.8 27.7996 190.1 27.8996C189.4 27.9996 188.8 28.3996 188.3 28.9996L188.1 29.1996C188 29.0996 187.8 28.9996 187.8 28.9996C187.4 28.6996 186.8 28.5996 186.3 28.5996C185.8 28.5996 185.2 28.7996 184.8 29.0996C184.4 29.3996 184 29.7996 183.8 30.2996C183.6 30.7996 183.5 31.2996 183.6 31.8996C183.8 32.4996 184.2 33.0996 184.8 33.4996ZM184.8 30.5996C184.9 30.2996 185.1 29.9996 185.4 29.7996C185.7 29.5996 186 29.4996 186.3 29.4996C186.6 29.4996 187 29.5996 187.2 29.6996L188 30.1996C188.2 30.3996 188.5 30.2996 188.7 30.0996L189.2 29.4996C189.5 29.0996 189.9 28.8996 190.3 28.7996C190.8 28.6996 191.2 28.7996 191.6 29.0996C192 29.3996 192.2 29.6996 192.3 30.1996C192.4 30.5996 192.3 31.0996 192 31.3996L189.3 35.2996L185.4 32.5996C185 32.2996 184.8 31.9996 184.7 31.4996C184.6 31.2996 184.6 30.8996 184.8 30.5996Z"
        fill="currentColor"
      />
      <path
        d="M97.9001 161C98.3001 160.1 98.4001 159.1 98.2001 158.2C98.1001 157.3 97.9001 156.4 97.4001 155.7C97.0001 154.9 96.3001 154.3 95.6001 153.8C94.9001 153.3 94.0001 153 93.1001 152.9C92.2001 152.8 91.3001 152.9 90.5001 153.1C89.7001 153.4 88.9001 153.8 88.2001 154.5C87.6001 155.1 87.1001 155.9 86.7001 156.7C86.4001 157.5 86.3001 158.4 86.4001 159.3C86.5001 160.2 86.8001 161.1 87.2001 161.8C87.8001 162.8 88.7001 163.6 89.8001 164.1C90.6001 164.5 91.4001 164.6 92.2001 164.6C92.5001 164.6 92.9001 164.6 93.2001 164.5C94.3001 164.3 95.3001 163.8 96.2001 163.1L98.3001 163.6C98.5001 163.6 98.7001 163.6 98.8001 163.4C98.9001 163.2 98.9001 163 98.8001 162.9L97.9001 161ZM96.3001 162.1C96.1001 162.1 96.0001 162.1 95.9001 162.2C95.2001 162.9 94.2001 163.4 93.2001 163.5C92.2001 163.7 91.2001 163.5 90.3001 163.1C89.4001 162.7 88.6001 162 88.1001 161.2C87.7001 160.6 87.5001 159.8 87.4001 159.1C87.3001 158.4 87.4001 157.6 87.7001 156.9C88.0001 156.2 88.4001 155.6 88.9001 155.1C89.4001 154.6 90.1001 154.2 90.8001 154C91.3001 153.8 91.8001 153.8 92.3001 153.8C92.5001 153.8 92.7001 153.8 93.0001 153.8C93.7001 153.9 94.4001 154.2 95.1001 154.6C95.7001 155 96.2001 155.6 96.6001 156.2C97.0001 156.8 97.2001 157.6 97.3001 158.3C97.5001 159.1 97.3001 160 97.0001 160.8C96.9001 161 96.9001 161.1 97.0001 161.3L97.6001 162.4L96.3001 162.1Z"
        fill="currentColor"
      />
      <path
        d="M161.3 142.4L151.7 144.1C151.6 144.1 151.5 144.2 151.4 144.3C151.3 144.4 151.3 144.5 151.3 144.7L153 154.4C153 154.6 153.2 154.7 153.4 154.8H153.5C153.6 154.8 153.8 154.7 153.9 154.6L157.8 150.1L162.9 153C163.1 153.1 163.3 153.1 163.4 153C163.6 152.9 163.6 152.7 163.6 152.5L161.9 142.8C161.8 142.6 161.5 142.4 161.3 142.4ZM157.8 149.1C157.6 149 157.3 149 157.2 149.2L153.8 153.2L152.4 145L161 143.5L162.4 151.7L157.8 149.1Z"
        fill="currentColor"
      />
      <path
        d="M36.7001 107.7C36.9001 107.6 37.0001 107.5 37.1001 107.3L39.1001 97.6996C39.1001 97.4996 39.1001 97.3996 39.0001 97.2996C38.9001 97.1996 38.7001 97.0996 38.6001 97.1996L14.3001 101.5L11.2001 95.1996C11.1001 94.9996 10.9001 94.8996 10.7001 94.8996L5.60009 95.7996C5.30009 95.7996 5.10009 96.0996 5.20009 96.3996C5.20009 96.6996 5.50009 96.8996 5.80009 96.7996L10.6001 95.9996L20.2001 115.5C20.1001 115.6 20.0001 115.7 19.9001 115.8C19.4001 116.3 19.1001 117.1 19.1001 117.8C19.1001 118.6 19.4001 119.3 19.9001 119.8C20.4001 120.3 21.2001 120.6 21.9001 120.6C22.6001 120.6 23.4001 120.3 23.9001 119.8C24.4001 119.3 24.7001 118.5 24.7001 117.8L33.3001 116.3C33.4001 116.7 33.7001 117 34.0001 117.3C34.5001 117.8 35.3001 118.1 36.0001 118.1C36.8001 118.1 37.5001 117.8 38.0001 117.3C38.5001 116.8 38.8001 116 38.8001 115.3C38.8001 114.5 38.5001 113.8 38.0001 113.3C36.9001 112.2 35.0001 112.2 34.0001 113.3C33.5001 113.8 33.2001 114.6 33.2001 115.3L24.6001 116.8C24.5001 116.4 24.2001 116.1 23.9001 115.8C23.2001 115.1 22.1001 114.8 21.1001 115.1L19.9001 112.6L36.7001 107.7ZM34.4001 114C34.8001 113.6 35.2001 113.5 35.7001 113.5C36.2001 113.5 36.7001 113.7 37.0001 114C37.4001 114.4 37.5001 114.8 37.5001 115.3C37.5001 115.8 37.3001 116.3 37.0001 116.6C36.3001 117.3 35.1001 117.3 34.4001 116.6C34.1001 116.3 33.9001 115.8 33.9001 115.3C33.9001 114.8 34.1001 114.3 34.4001 114ZM22.9001 116.5C23.2001 116.8 23.3001 117.1 23.4001 117.4C23.4001 117.4 23.4001 117.4 23.4001 117.5C23.4001 117.5 23.4001 117.5 23.4001 117.6C23.4001 117.7 23.4001 117.8 23.4001 117.9C23.4001 118.4 23.2001 118.9 22.9001 119.2C22.2001 119.9 21.0001 119.9 20.3001 119.2C20.0001 118.9 19.8001 118.4 19.8001 117.9C19.8001 117.4 20.0001 116.9 20.3001 116.6C20.7001 116.2 21.1001 116.1 21.6001 116.1C22.1001 116.1 22.6001 116.1 22.9001 116.5ZM37.9001 98.1996L36.1001 106.8L19.1001 111.6L14.5001 102.3L37.9001 98.1996Z"
        fill="currentColor"
      />
      <path
        d="M17.8001 63.3996L23.2001 62.4996L24.1001 67.7996C24.1001 67.9996 24.4001 68.1996 24.6001 68.1996H24.7001C25.0001 68.1996 25.2001 67.8996 25.1001 67.5996L24.2001 62.2996L29.5001 61.3996C29.8001 61.3996 30.0001 61.0996 29.9001 60.7996C29.9001 60.4996 29.6001 60.2996 29.3001 60.3996L24.0001 61.2996L23.0001 55.9996C23.0001 55.6996 22.7001 55.4996 22.4001 55.5996C22.1001 55.5996 21.9001 55.8996 22.0001 56.1996L22.9001 61.4996L17.6001 62.3996C17.3001 62.3996 17.1001 62.6996 17.2001 62.9996C17.3001 63.1996 17.5001 63.3996 17.8001 63.3996Z"
        fill="currentColor"
      />
      <path
        d="M194.2 108.3L184.5 110L182.8 100.3C182.8 99.9996 182.5 99.7996 182.2 99.8996C181.9 99.8996 181.7 100.2 181.8 100.5L183.5 110.2L173.8 111.9C173.5 111.9 173.3 112.2 173.4 112.5C173.4 112.7 173.7 112.9 173.9 112.9H174L183.7 111.2L185.4 120.9C185.4 121.1 185.7 121.3 185.9 121.3H186C186.3 121.3 186.5 121 186.4 120.7L184.7 111L194.4 109.3C194.7 109.3 194.9 109 194.8 108.7C194.7 108.4 194.5 108.2 194.2 108.3Z"
        fill="currentColor"
      />
      <path
        d="M88.0001 101.7C86.0001 101.5 83.9001 101.4 81.9001 101.4C81.6001 101.4 81.4001 101.6 81.4001 101.9C81.4001 102.2 81.6001 102.4 81.9001 102.4C83.9001 102.4 85.9001 102.5 87.9001 102.7C87.9001 102.7 87.9001 102.7 88.0001 102.7C88.3001 102.7 88.5001 102.5 88.5001 102.3C88.5001 102 88.3001 101.7 88.0001 101.7Z"
        fill="currentColor"
      />
      <path
        d="M81.2001 156.7C80.5001 156.2 79.6001 156 78.7001 156.1C77.8001 156.2 77.0001 156.7 76.5001 157.5L76.2001 158L75.7001 157.7C75.0001 157.2 74.1001 157 73.2001 157.2C72.3001 157.4 71.5001 157.9 71.0001 158.6C70.5001 159.3 70.3001 160.2 70.4001 161.1C70.5001 162 71.0001 162.8 71.8001 163.3L77.5001 167.3C77.6001 167.4 77.7001 167.4 77.8001 167.4H77.9001C78.0001 167.4 78.1001 167.3 78.2001 167.2L82.2001 161.5C82.7001 160.8 82.9001 159.9 82.7001 159C82.4001 158 81.9001 157.2 81.2001 156.7ZM81.3001 160.8L77.6001 166.1L72.4001 162.4C71.9001 162 71.5001 161.5 71.4001 160.8C71.3001 160.2 71.4001 159.5 71.8001 159C72.2001 158.5 72.7001 158.1 73.3001 158C73.4001 158 73.6001 158 73.7001 158C74.2001 158 74.6001 158.1 75.0001 158.4L76.0001 159C76.2001 159.2 76.5001 159.1 76.7001 158.9L77.3001 158C77.7001 157.5 78.2001 157.1 78.9001 157C79.5001 156.9 80.2001 157 80.7001 157.4C81.2001 157.8 81.6001 158.3 81.7001 158.9C81.7001 159.6 81.6001 160.3 81.3001 160.8Z"
        fill="currentColor"
      />
    </svg>
  </SvgIcon>
)

export default DigitalAdsPerformanceImage
