import { FC } from 'react'

import { SvgIcon, SvgIconProps } from '@mui/material'

const ComingSoonImage: FC<SvgIconProps> = ({ sx, ...props }) => (
  <SvgIcon sx={{ fontSize: 200, color: 'primary.dark', ...sx }} {...props}>
    <svg
      width="200"
      height="200"
      viewBox="0 0 200 200"
      fill="none"
      xmlns="http://www.w3.org/2000/svg"
    >
      <path
        d="M102.2 83.7999C102 83.7999 101.8 83.8998 101.7 84.0998C101.6 84.1998 101.5 84.3998 101.5 84.5998C101.5 84.7998 101.6 84.9998 101.8 85.0998C102 85.1998 102.1 85.2999 102.3 85.2999C102.5 85.2999 102.7 85.1998 102.8 84.9998C102.9 84.8998 103 84.6998 103 84.4998C103 84.2998 102.9 84.0998 102.7 83.9998C102.6 83.7998 102.4 83.6999 102.2 83.7999Z"
        fill="currentColor"
      />
      <path
        d="M94 79.7999C94.1 79.8999 94.2 79.8998 94.2 79.9998C94.3 79.9998 94.4 80.0998 94.5 79.9998C94.6 79.9998 94.7 79.9998 94.8 79.8998C94.9 79.8998 95 79.7998 95 79.6998C95 79.5998 95.1 79.4998 95.2 79.4998C95.2 79.3998 95.3 79.2998 95.2 79.1998C95.2 78.9998 95.1 78.7998 95 78.6998C94.9 78.5998 94.7 78.4998 94.5 78.4998C94.3 78.4998 94.1 78.5998 94 78.6998C93.9 78.7998 93.8 78.9998 93.8 79.1998C93.8 79.2998 93.8 79.3998 93.9 79.4998C93.9 79.6998 94 79.6999 94 79.7999Z"
        fill="currentColor"
      />
      <path
        d="M102.1 73.6998C102.2 73.5998 102.3 73.3998 102.3 73.1998C102.3 72.9998 102.2 72.7998 102 72.6998C101.8 72.5998 101.7 72.4998 101.5 72.4998C101.3 72.4998 101.1 72.5999 101 72.7999C100.9 72.8999 100.8 73.0999 100.8 73.2999C100.8 73.4999 100.9 73.6999 101.1 73.7999C101.3 73.8999 101.4 73.9998 101.6 73.9998C101.8 73.9998 102 73.8998 102.1 73.6998Z"
        fill="currentColor"
      />
      <path
        d="M115.7 53.0998C115.8 53.0998 115.9 53.1998 115.9 53.1998C116.1 53.1998 116.2 53.0998 116.3 52.8998L118.6 48.6998C118.7 48.4998 118.6 48.1998 118.4 47.9998C118.2 47.8998 117.9 47.9998 117.7 48.1998L115.4 52.3998C115.3 52.5998 115.4 52.8998 115.7 53.0998Z"
        fill="currentColor"
      />
      <path
        d="M131.4 79.5998H136.2C136.5 79.5998 136.7 79.3998 136.7 79.0998C136.7 78.7998 136.5 78.5998 136.2 78.5998H131.4C131.1 78.5998 130.9 78.7998 130.9 79.0998C130.9 79.3998 131.1 79.5998 131.4 79.5998Z"
        fill="currentColor"
      />
      <path
        d="M127.2 94.4998L131.4 96.8998C131.5 96.8998 131.6 96.9998 131.6 96.9998C131.8 96.9998 131.9 96.8998 132 96.6998C132.1 96.4998 132.1 96.1998 131.8 95.9998L127.6 93.5998C127.4 93.4998 127.1 93.4999 126.9 93.7999C126.9 93.9999 127 94.2998 127.2 94.4998Z"
        fill="currentColor"
      />
      <path
        d="M86.3 105C86.1 104.9 85.8 105 85.6 105.2L83.2 109.4C83.1 109.6 83.2 109.9 83.4 110.1C83.5 110.1 83.6 110.2 83.6 110.2C83.8 110.2 83.9 110.1 84 109.9L86.4 105.7C86.6 105.5 86.6 105.2 86.3 105Z"
        fill="currentColor"
      />
      <path
        d="M71.2 79.0998C71.2 78.7998 71 78.5998 70.7 78.5998H65.9C65.6 78.5998 65.4 78.7998 65.4 79.0998C65.4 79.3998 65.6 79.5998 65.9 79.5998H70.7C70.9 79.5998 71.2 79.2998 71.2 79.0998Z"
        fill="currentColor"
      />
      <path
        d="M85 53.1998C85.1 53.3998 85.3 53.3998 85.4 53.3998C85.5 53.3998 85.6 53.3998 85.7 53.2998C85.9 53.1998 86 52.8998 85.9 52.5998L83.4 48.4998C83.3 48.2998 83 48.1998 82.7 48.2998C82.5 48.3998 82.4 48.6998 82.5 48.9998L85 53.1998Z"
        fill="currentColor"
      />
      <path
        d="M194.5 183.9H171.1V178.6C171.1 178.3 170.9 178.1 170.6 178.1H168L167.6 176.6L164.8 166L162.1 155.5L159.6 145.9C159.5 145.7 159.3 145.5 159.1 145.5H155.4C155.2 145.5 155 145.7 154.9 145.9L153.6 151.8L147.9 178.1H145.3C145 178.1 144.8 178.3 144.8 178.6V183.9H140.4L128.8 130.5C128.8 130.4 128.8 130.4 128.7 130.3L128.6 130.2C128.5 130.2 128.5 130.2 128.4 130.2H102.8L103.7 121.2C106.2 121 108.7 120.6 111.1 120L114.3 124.9C115.8 127.2 118.2 128.9 120.9 129.5C123.6 130.1 126.4 129.6 128.8 128.2L154.4 112.5C154.8 112.1 155.1 111.6 155.2 111C155.5 108.5 153 104.3 150.3 101C151.3 99.9998 152.6 99.2998 154 99.0998C157.6 98.4998 165.1 95.5999 170.5 92.2999C170.6 92.1999 170.7 92.0998 170.7 91.8998C170.7 91.6998 170.6 91.5998 170.5 91.4998C166.7 89.0998 156 88.2998 149.5 88.4998C148.7 88.4998 147.9 88.7998 147.3 89.3998L140.7 95.4998L138.9 97.0998C141.6 91.3998 142.9 85.0999 142.8 78.7999C142.7 71.6999 140.8 64.6998 137.2 58.4998C139.2 56.9998 141.3 55.3998 143.6 53.6998C144.2 53.2998 144.3 52.4998 144.2 51.5998C145.7 50.5998 147.2 49.7998 148.9 49.1998C150.8 48.2998 150.6 47.2998 150.5 46.8998C150.7 46.6998 150.9 46.3998 151 45.9998C151 45.6998 150.9 45.3998 150.7 45.0998C150.9 44.6998 150.8 44.1998 150.5 43.7998C150.3 43.4998 150 43.2998 149.6 43.0998C151.2 42.5998 153.1 41.9998 153.9 41.4998C154.3 41.2998 154.3 40.9998 154.2 40.7998C153.8 39.9998 149.8 40.1998 146.4 41.1998C147.6 39.1998 147.4 38.7998 147.3 38.5998C147.2 38.4998 147.1 38.3998 146.9 38.3998C146.5 38.2998 145.6 38.6998 139.3 42.9998L138.3 43.6998C137.5 43.2998 136.7 43.1998 136.1 43.5998C134.1 45.0998 131.8 46.8998 129.3 48.7998C125.2 44.9998 120.5 41.9998 115.2 39.9998C109.8 37.9998 104.2 37.0998 98.4 37.3998C92.7 37.6998 87.1 39.0998 81.9 41.5998C76.9 43.9998 72.5 47.3998 68.9 51.5998L65.6 48.0998C65.4 47.7998 65.1 47.6998 64.8 47.5998C63 47.3998 61.8 51.4998 61.4 53.5998C60 54.2998 59 55.2998 58.9 56.5998C58.7 57.8998 59.4 59.0998 60.6 60.0998C60.6 61.3998 60.6 63.3998 61 64.8998C59.1 70.0998 58.2 75.5998 58.5 81.1998C58.7 86.7998 60.1 92.2998 62.5 97.3998C64.9 102.5 68.2 107 72.4 110.8C76.5 114.5 81.2 117.3 86.3 119.1L83.5 130H69.6C69.6 130 69.6 130 69.5 130C69.5 130 69.5 130 69.4 130C69.4 130 69.3 130 69.3 130.1L69.2 130.2C69.2 130.3 69.1 130.3 69.1 130.4L67.8 136.4C67.8 136.4 67.8 136.4 67.8 136.5L65.4 148C65.4 148 65.4 148 65.4 148.1L57.8 183.8H53.7V178.5C53.7 178.2 53.5 178 53.2 178H50.5L50.1 176.5L44.7 155.5L42.2 145.9C42.1 145.7 41.9 145.5 41.7 145.5H38C37.8 145.5 37.6 145.7 37.5 145.9L36.2 151.8L34.4 160.1L32.6 168.5L30.5 178.2H27.9C27.6 178.2 27.4 178.4 27.4 178.7V184H5.5C5.2 184 5 184.2 5 184.5C5 184.8 5.2 185 5.5 185H194.6C194.9 185 195.1 184.8 195.1 184.5C195.1 184.2 194.8 183.9 194.5 183.9ZM166.3 175.8L151 168.2L152.6 160.9L163.8 166.5L166.3 175.8ZM155.8 146.6H158.7L160.8 154.7L154.6 151.7L155.8 146.6ZM154.4 152.7L157.7 154.3L161.1 156L163.5 165.2L152.8 159.9L154.4 152.7ZM150.8 169.3L166.6 177.1L166.8 178H148.8L150.8 169.3ZM49 175.8L33.7 168.2L35.3 160.9L46.5 166.5L49 175.8ZM38.4 146.6H41.3L43.4 154.7L39.1 152.6L37.2 151.7L38.4 146.6ZM37.1 152.7L38.2 153.2L43.8 156L46.2 165.2L35.5 159.9L37.1 152.7ZM33.5 169.3L49.3 177.2L49.5 178.1H31.5L33.5 169.3ZM90.5 183.9C91.1 183.3 91.5 182.5 91.6 181.7C91.7 179.9 92.3 178.1 93.4 176.7C93.5 176.6 93.6 176.5 93.7 176.3C94.5 175.4 95.5 174.3 94.9 171.8C94.7 170.9 94.7 169.9 95 169C97.1 168.5 98.8 167.8 98.8 166.5L99.4 160.9H121.2L116.3 183.9H90.5ZM77.8 153.5L66.4 147.9L68.6 137.3L80.2 143.1L77.8 153.5ZM76.7 162.4C77.3 162.7 78.4 163 79.9 163.2C82 163.5 84.7 163.6 87.7 163.6C91 163.6 96.1 163.4 98.3 162.5L97.9 166.4C97.9 166.4 97.9 166.4 97.9 166.5C97.9 167.1 96.5 167.7 94.2 168.2C92.8 168.4 91.5 168.6 90.1 168.7C89.9 168.7 89.7 168.7 89.5 168.7C89.2 168.7 88.8 168.7 88.5 168.7C88 168.7 87.5 168.7 86.9 168.7C86.4 168.7 85.9 168.7 85.5 168.7C79.7 168.6 75.8 167.5 75.7 166.5L76.7 162.4ZM100.3 153L114.2 159.9H99.6L100.3 153ZM128.2 132.9L139.3 183.9H117.5L128.2 132.9ZM107.9 131L125.7 139.8L123.4 150.5L101.6 139.7L102.5 131H107.9ZM103.6 120.1L104.6 110.3L110.3 119C108.1 119.5 105.9 119.9 103.6 120.1ZM128.1 127.2C125.9 128.5 123.4 128.9 120.9 128.4C118.4 127.8 116.3 126.4 114.9 124.3L104.6 108.6L101.3 103.6C101.2 103.4 100.9 103.3 100.7 103.4C100.5 103.5 100.4 103.8 100.4 104L103.3 112.6L102.5 120.4C102.5 120.5 102.5 120.5 102.5 120.6L101.5 130.4V130.5L100.6 139.8V139.9L99.4 151.9V152L98.5 161.2C98.2 161.7 94.5 162.5 87.7 162.5C81.1 162.5 77.4 161.8 77 161.2L84.2 131.3C84.2 131.3 84.2 131.3 84.2 131.2L93.9 90.8998C98.5 89.2998 103.5 88.8999 108.3 89.7999C119.4 94.0999 122.2 111.7 122.2 111.9C122.2 112.1 122.4 112.2 122.5 112.3C122.7 112.4 122.9 112.3 123 112.2L137.2 99.3998C137.9 98.7998 140.7 100.5 144.2 104.3C148.3 108.8 150.5 113 149.7 113.9L128.1 127.2ZM92.4 86.2999C89.9 78.6999 90.6 77.2998 91.6 75.1998C91.7 74.9998 91.8 74.7998 91.9 74.5998C92 74.3998 91.9 74.0998 91.7 73.8998C91.4 73.7998 91.2 73.8998 91 74.0998C90.9 74.2998 90.8 74.4998 90.7 74.6998C89.6 76.8998 88.8 78.4999 91.4 86.2999C88.8 89.6999 85.9 92.9998 82.7 95.9998C81.8 96.7998 80.8 97.3998 79.6 97.5998C78.4 97.7998 77.2 97.6998 76.1 97.1998C75 96.6998 74.1 95.9998 73.4 94.9998C72.7 93.9998 72.4 92.8998 72.3 91.6998C72.2 88.5998 72.1 84.4998 72.1 79.4998C73.6 80.4998 76.1 80.8998 78.5 80.8998C80.2 80.8998 81.8 80.6999 83.1 80.2999C82.6 83.6999 82 87.2998 81.7 88.5998C81.6 88.8998 81.8 89.0998 82.1 89.1998H82.2C82.4 89.1998 82.6 88.9999 82.7 88.7999C83 87.3999 83.7 83.1998 84.3 79.5998C84.4 79.0998 84.5 78.4998 84.6 77.9998C88.8 71.7998 93.3 69.7999 94.6 69.2999C95.1 69.0999 95.6 68.7998 96.1 68.4998C96.6 69.8998 97.2 70.6998 97.9 71.0998C96.8 76.0998 97 81.7999 98.4 88.7999C96.8 89.0999 95.2 89.3998 93.7 89.9998C93.3 88.7998 92.8 87.4999 92.4 86.2999ZM72.2 55.3998L78.8 56.1998C79 56.8998 79.2 57.6998 79.1 58.3998C79.1 59.0998 78.9 59.6998 78.6 60.3998C78 60.1998 77 60.0998 76.1 59.9998H76C75 59.8998 74.6 60.2998 74.4 60.7998C73.8 60.4998 73.2 60.3998 72.6 60.3998C72.5 60.3998 72.3 60.3998 72.2 60.4998L71.7 60.3998C72.4 58.9998 72.6 56.8998 72.2 55.3998ZM83.7 77.7999C83.7 77.8999 83.7 77.8998 83.7 77.9998C83.6 78.3998 83.6 78.8999 83.5 79.2999C80.3 80.4999 74 80.1999 72.3 78.2999C72.3 77.1999 72.3 75.9999 72.3 74.7999C73.6 75.4999 75.8 75.8998 78.1 75.9998C78.8 75.9998 79.4 75.9998 79.9 75.9998C82 75.9998 83.3 75.7998 84.1 75.4998C83.9 76.1998 83.8 76.9999 83.7 77.7999ZM72.2 65.4998C71.9 65.2998 71.8 64.9999 71.8 64.7999V64.6998C72.5 65.0998 73.2 65.3998 74 65.3998C74.5 65.7998 74.6 65.9998 74.6 66.0998C74.6 66.1998 74.3 66.2998 73.9 66.1998C73.3 66.0998 72.7 65.8998 72.2 65.4998ZM74 62.4998C73.5 62.3998 73 62.2998 72.6 62.0998C72.5 62.0998 72.5 61.9998 72.4 61.9998C72.2 61.8998 72.2 61.6998 72.2 61.4998C72.2 61.4998 72.2 61.2998 72.5 61.2998C73.1 61.2998 73.6 61.4998 74.2 61.7998C74.1 61.9998 74 62.2998 74 62.4998ZM72.2 62.9998C72.8 63.2998 73.4 63.3998 74 63.4998C74 63.6998 74 63.9998 74 64.1998C74 64.2998 74 64.2998 74 64.3998C73.4 64.3998 72.9 64.1998 72.4 63.7998C72.1 63.5998 72 63.2998 72 63.0998C72 62.9998 72 62.9998 72.1 62.8998C72.1 62.9998 72.1 62.9998 72.2 62.9998ZM73.6 67.1998C74.2 67.4998 74.3 67.7999 74.3 67.7999C74.3 67.7999 74.1 67.9998 73.8 67.8998C73.3 67.7998 72.7 67.5999 72.2 67.2999C72.2 67.2999 72.1 67.2998 72.1 67.1998C72 67.1998 72 67.0998 71.9 66.9998C71.9 66.8998 71.8 66.7998 71.8 66.6998C71.8 66.5998 71.8 66.4998 71.9 66.3998C72.5 66.7998 73 66.9998 73.6 67.1998ZM82 70.3998C82 71.5998 81.8 73.0998 81.7 74.1998C81.7 74.4998 81.6 74.7998 81.6 74.9998C80.7 75.0998 79.5 75.0998 77.9 74.9998C76.6 74.8998 75.6 74.7998 74.7 74.5998C74.8 74.1998 74.8 73.7999 74.9 73.2999C75.2 71.5999 75.4 70.4998 75.4 69.8998C75.9 68.9998 76.2 68.0998 76.4 67.0998C76.7 67.3998 76.9 67.6998 77.3 67.8998C77.5 68.0998 77.8 67.9999 78 67.7999C78.2 67.5999 78.1 67.2998 77.9 67.0998C76.6 66.1998 76.2 64.7998 76.7 62.5998C76.8 62.2998 76.6 62.0998 76.3 61.9998C76 61.8998 75.8 62.0998 75.7 62.3998C75.3 63.7998 75 64.2998 74.9 64.3998C74.9 64.2998 74.8 64.1998 74.8 64.0998C74.8 63.0998 74.8 62.0998 75 61.1998C75.1 60.8998 75.1 60.7998 75.7 60.8998H75.8C76.7 60.9998 78 61.0998 78.4 61.3998C79.4 62.4998 80.2 63.7998 81 65.0998C81.9 66.6998 82.1 67.3998 82 70.3998ZM79.5 61.0998C79.9 60.2998 80.1 59.4998 80.2 58.5998C80.2 57.8998 80.2 57.1998 80 56.4998C81.5 56.7998 82.1 57.9998 82 59.1998C81.9 60.2998 81.2 61.3998 79.7 61.3998C79.6 61.1998 79.6 61.0998 79.5 61.0998ZM98.2 65.9998C98.4 65.4998 98.4 64.8998 98.4 64.3998L99.1 63.3998C99.2 63.1998 99.2 62.9998 99.1 62.7998C98.9 62.5998 98.7 62.5998 98.5 62.6998C98.2 62.7998 97.9 62.9998 97.6 63.0998C97 63.2998 96.1 63.3998 95.6 62.8998C95.1 62.4998 94.7 61.2998 95.3 58.3998L95.4 57.8998C95.9 55.8998 96.6 54.7998 97.3 54.7998C98.2 54.7998 99.2 56.3998 99.4 57.6998C99.5 58.1998 99.8 58.2998 100 58.3998C100.5 58.4998 100.9 58.0998 101.2 57.7998C101.4 57.5998 101.5 57.4998 101.6 57.5998C101.7 57.5998 101.8 57.7998 101.8 57.8998C101.9 58.2998 101.7 58.9998 100.8 59.6998C100.7 59.7998 100.7 59.7998 100.6 59.8998C100.4 60.5998 100.3 61.2998 100.3 61.9998L100.4 62.8998C100.6 64.6998 101.3 65.9998 102.3 66.6998C100.4 70.1998 99.2 70.6998 98.7 70.6998C98.1 70.5998 97.4 69.7998 96.9 68.1998C97.5 67.3998 97.9 66.7998 98.2 65.9998ZM153.7 111.5L150.9 113.2C150.7 110.6 147.2 106.1 145 103.6C143.6 102 140.6 98.9998 138.4 98.3998L141.1 95.8998C142.7 94.5998 146.4 97.8998 149.1 101C152.2 104.7 154.3 108.7 154.1 110.6C154 111.1 153.9 111.4 153.7 111.5ZM141.6 78.4998C141.7 85.4998 140 92.4998 136.6 98.6998L123 111C122.3 107.3 119 93.3998 109 89.1998C109 85.9998 109.4 82.8998 110 79.6998H124.2L122.6 80.7999C122.4 80.9999 122.3 81.2998 122.5 81.4998C122.6 81.5998 122.8 81.6998 122.9 81.6998C123 81.6998 123.1 81.6998 123.2 81.5998L126.1 79.5998C126.2 79.5998 126.2 79.4998 126.2 79.4998C126.2 79.3998 126.2 79.3999 126.2 79.2999C126.2 79.1999 126.2 79.1998 126.1 79.0998C126.1 79.0998 126.1 79.0998 126.1 78.9998L126 78.8998L122.8 77.2999C122.6 77.1999 122.3 77.2998 122.1 77.4998C122 77.6998 122.1 77.9998 122.3 78.1998L123.5 78.7999H110C110 78.7999 110 78.7998 110 78.6998C111.1 77.7998 111.7 77.3998 112.3 76.8998C112.5 76.6998 112.8 76.4998 113.1 76.1998H113.2C113.4 76.1998 113.5 75.9999 113.6 75.7999C115.9 73.9999 120.7 70.1998 135.9 58.8998C139.6 64.7998 141.5 71.5998 141.6 78.4998ZM148.4 47.9998C148.3 48.0998 148.1 48.0998 148 48.1998C148 48.0998 148 47.9998 148 47.8998C148.1 47.8998 148.2 47.8998 148.3 47.8998C148.6 47.8998 148.8 47.6998 148.8 47.3998C148.8 47.0998 148.6 46.8998 148.3 46.8998C147.4 46.8998 147 46.6998 146.8 46.5998C148.3 46.1998 149.3 46.6998 149.4 46.9998C149.5 47.1998 149.2 47.5998 148.4 47.9998ZM149.6 45.2998C149.7 45.3998 149.8 45.4998 149.8 45.4998C149.8 45.5998 149.7 45.6998 149.6 45.7998C149 45.3998 148 45.1998 146.9 45.3998C146.5 45.2998 146.3 45.2998 146.2 45.1998C146.3 45.0998 146.4 44.9998 146.7 44.9998C148.1 44.5998 149.2 44.9998 149.6 45.2998ZM149.5 44.0998C148.9 43.7998 148 43.6998 147.1 43.8998C146.9 43.7998 146.7 43.7998 146.6 43.6998C146.7 43.6998 146.8 43.5998 146.9 43.5998C148.2 43.2998 149.2 43.5998 149.5 44.0998ZM139.8 43.4998C141.4 42.3998 144.5 40.2998 145.9 39.3998C145.6 39.9998 145.1 40.7998 144.6 41.5998C144.5 41.6998 144.5 41.7998 144.5 41.8998C144.5 41.8998 144.4 44.4998 143 44.4998C142.7 44.4998 142.5 44.6998 142.5 44.9998C142.5 45.2998 142.7 45.4998 143 45.4998C144.8 45.4998 145.4 43.4998 145.5 42.1998C147.8 41.3998 150 41.0998 151.5 40.9998C150.7 41.2998 149.7 41.5998 148.9 41.8998C148 42.1998 147.2 42.3998 146.6 42.6998C145.6 42.9998 145.4 43.4998 145.4 43.7998C145.4 43.9998 145.5 44.1998 145.7 44.4998C145.3 44.7998 145.1 45.0998 145.1 45.4998C145.1 45.6998 145.3 45.9998 145.7 46.2998C145.6 46.3998 145.6 46.5998 145.6 46.7998C145.7 47.1998 146 47.5998 146.8 47.8998C146.8 47.9998 146.9 48.0998 146.8 48.2998C146.8 48.4998 146.9 48.5998 147 48.6998C145.8 49.1998 144.7 49.7998 143.6 50.4998C143.2 49.2998 142.4 47.9998 141.6 46.8998C140.8 45.8998 139.9 44.7998 139 44.0998L139.8 43.4998ZM136.6 44.0998C136.9 43.8998 137.3 43.9998 137.9 44.3998C138.7 44.8998 139.8 45.8998 140.9 47.3998C142.8 49.9998 143.4 52.1998 142.8 52.6998C120.9 68.9998 115.3 73.3999 112.9 75.2999L110.1 75.9998C109.9 75.9998 109.8 76.1998 109.7 76.3998C109.6 76.7998 109.5 77.1998 109.4 77.4998C109.3 77.8998 109.2 78.0998 109.2 78.3998C108.4 81.8998 108 85.4998 107.9 89.0998C105.1 88.6998 102.2 88.5998 99.4 88.9998C98 82.2998 97.9 76.4998 98.9 71.6998C100.2 71.6998 101.6 70.1998 103.3 67.0998C104.3 67.3998 105.6 67.0999 107 66.2999C109.1 65.0999 135.5 44.8998 136.6 44.0998ZM82.4 42.1998C87.4 39.6998 92.8 38.2998 98.5 38.0998C104.1 37.7998 109.6 38.6998 114.9 40.5998C120 42.4998 124.6 45.2998 128.5 48.9998C119.1 56.0998 107.9 64.5998 106.6 65.1998C105.2 65.8998 104.1 66.0999 103.3 65.7999C102.3 65.2999 101.9 64.0998 101.7 62.9998C101.8 62.8998 101.9 62.7998 102.1 62.6998C102.2 62.7998 102.2 62.7998 102.3 62.8998C102.6 63.0998 102.9 63.2998 103.3 63.2998C103.4 63.2998 103.5 63.2998 103.6 63.2998C103.9 63.2998 104.1 63.2998 104.4 63.1998C104.7 63.0998 105.1 62.7998 105.3 62.5998C105.5 62.3998 105.6 62.1998 105.7 61.9998C105.9 62.0998 106.1 62.0998 106.4 62.0998C106.9 62.0998 107.3 61.8998 107.7 61.5998C108.1 61.2998 108.3 60.8998 108.4 60.3998C108.4 60.1998 108.5 59.8998 108.4 59.6998C108.5 59.6998 108.5 59.6998 108.6 59.6998C108.9 59.5998 109.2 59.4998 109.4 59.2998C109.6 59.0998 109.8 58.7998 109.9 58.5998C110 58.2998 110.1 57.9998 110.1 57.6998C110.1 57.2998 110 56.8998 109.8 56.5998C109.8 56.4998 109.7 56.4998 109.7 56.3998C109.8 56.2998 109.9 56.2998 109.9 56.1998C110.2 55.8998 110.4 55.4998 110.4 55.0998C110.5 54.6998 110.4 54.2998 110.3 53.8998C110.2 53.6998 110.1 53.4998 110 53.2998C110 53.1998 110.1 53.1998 110.1 53.0998C110.3 53.1998 110.6 53.1998 110.8 53.1998C111.3 53.1998 111.7 52.9998 112.1 52.5998C112.4 52.2998 112.6 51.7998 112.7 51.3998C112.7 51.1998 112.7 50.8998 112.6 50.6998C112.8 50.5998 113 50.3998 113.2 50.1998C113.5 49.7998 113.7 49.3998 113.7 48.8998C113.7 48.3998 113.5 47.9998 113.2 47.5998C113 47.3998 112.9 47.2998 112.7 47.1998C112.8 46.9998 112.8 46.6998 112.8 46.4998C112.8 45.9998 112.6 45.5998 112.3 45.1998C112 44.8998 111.5 44.5998 111.1 44.5998C110.8 44.5998 110.6 44.5998 110.4 44.6998C110.3 44.5998 110.3 44.4998 110.2 44.3998C110 44.0998 109.7 43.8998 109.3 43.7998C109 43.6998 108.6 43.5998 108.3 43.6998C107.9 43.7998 107.6 43.8998 107.3 44.0998C107.1 44.2998 106.9 44.4998 106.8 44.6998C106.6 44.5998 106.3 44.5998 106.1 44.5998C105.6 44.5998 105.2 44.7998 104.8 45.1998C104.5 45.4998 104.3 45.9998 104.2 46.4998C104.2 46.6998 104.2 46.9998 104.3 47.1998C104.2 47.2998 104.1 47.2998 104 47.3998C103.9 47.4998 103.9 47.4998 103.8 47.5998C103.7 47.4998 103.7 47.4998 103.6 47.3998C103.3 47.1998 103 47.0998 102.7 47.0998C102.4 47.0998 102 47.0998 101.7 47.1998C101.7 47.1998 101.7 47.1998 101.6 47.1998V43.9998C101.6 43.6998 101.3 43.4998 101.1 43.4998C100.8 43.4998 100.6 43.6998 100.6 43.9998V47.8998C100.5 47.9998 100.5 47.9998 100.4 48.0998C100.3 47.9998 100.2 47.9998 100.1 47.9998C99.8 47.8998 99.4 47.7998 99 47.8998C98.6 47.8998 98.3 48.0998 98 48.2998C97.7 48.4998 97.5 48.7998 97.3 49.0998C97.2 49.2998 97.1 49.5998 97.1 49.7998C96.9 49.7998 96.6 49.7998 96.4 49.8998C96 50.0998 95.6 50.3998 95.3 50.6998C95 51.0998 94.9 51.5998 94.9 51.9998C94.9 52.1998 95 52.3998 95.1 52.5998C94.9 52.6998 94.7 52.7998 94.5 52.9998C94.2 53.2998 93.9 53.7998 93.9 54.2998C93.9 54.7998 94 55.2998 94.3 55.6998C94.4 55.8998 94.6 55.9998 94.7 56.1998C94.5 56.3998 94.4 56.6998 94.3 56.9998C94.2 57.2998 94.2 57.5998 94.3 57.7998C94.3 57.9998 94.4 58.1998 94.5 58.3998C93.8 60.9998 94 62.6998 95 63.5998C95.6 64.0998 96.4 64.2998 97.4 64.0998C97.4 64.5998 97.4 65.1998 97.2 65.6998C97 66.3998 96.6 66.9998 96.1 67.3998C95.6 67.7998 95 68.1998 94.4 68.3998C93.1 68.8998 89.1 70.6999 85.1 75.7999C85.2 75.2999 85.2 74.8998 85.3 74.5998C85.3 74.4998 85.3 74.4998 85.3 74.3998C85.4 73.4998 84.3 72.8998 83 72.5998C83.1 71.8998 83.1 71.0998 83.1 70.3998C83.2 67.1998 82.9 66.3999 82.1 64.7999C81.6 63.8999 81.1 62.9998 80.4 62.1998C82 61.8998 82.8 60.4998 82.9 59.1998C83 57.4998 82 55.6998 79.9 55.3998L71.7 54.3998L69.6 52.0998C73.2 47.8998 77.5 44.5998 82.4 42.1998ZM68.5 52.3998C68.6 52.4998 68.6 52.4998 68.5 52.3998L71 55.0998C71.7 56.3998 71.3 59.2998 70.4 60.2998L64.8 63.9998C65.6 62.1998 66.1 59.6998 66.5 57.1998C66.8 54.6998 66.9 52.0998 66.6 50.1998L68.5 52.3998ZM64.7 48.2998C64.8 48.2998 64.8 48.3998 64.9 48.3998C64.9 48.3998 64.9 48.3998 64.9 48.4998L65 48.5998C65.3 49.0998 65.7 50.4998 65.7 52.4998C64.5 52.3998 63.4 52.5998 62.5 52.7998C63.3 49.4998 64.3 48.1998 64.7 48.2998ZM59.8 56.3998C60 54.5998 62.6 53.2998 65.7 53.4998C65.7 54.5998 65.6 55.7998 65.4 57.0998C65.2 58.4998 65 59.6998 64.8 60.6998C61.8 60.0998 59.6 58.1998 59.8 56.3998ZM64.6 61.5998C64 63.5998 63.4 64.7998 63 65.1998L62.9 65.2999C62.9 65.2999 62.9 65.2998 62.8 65.3998C62.7 65.3998 62.7 65.4998 62.6 65.4998C62.2 65.4998 61.6 63.8998 61.6 60.5998C62.4 60.9998 63.4 61.3998 64.6 61.5998ZM73 109.7C68.9 106 65.7 101.6 63.3 96.6998C61 91.6998 59.7 86.3998 59.4 80.8998C59.2 75.7998 59.9 70.7998 61.5 65.9998C61.7 66.2998 62 66.4998 62.4 66.4998H62.5C62.8 66.4998 63 66.3998 63.3 66.1998L70.8 61.2998H71.1C71 61.5998 71.1 61.9998 71.2 62.2998C71 62.4998 70.9 62.7998 70.9 63.0998C70.9 63.3998 70.9 63.6998 71.1 63.9998C70.9 64.1998 70.8 64.3998 70.8 64.6998C70.7 65.0998 70.9 65.4998 71.1 65.8998L71 65.9998C70.9 66.1998 70.8 66.4999 70.8 66.7999C70.8 67.0999 70.9 67.2998 71 67.5998C71.1 67.6998 71.1 67.7998 71.2 67.8998C71.1 68.0998 71 68.2998 70.9 68.4998C70.8 68.6998 70.9 68.9998 71.1 69.1998C72.2 69.7998 73.3 70.2998 74.5 70.4998C74.5 70.8998 74.4 71.4998 74.3 72.0998C72.3 72.2998 71.3 72.7998 71.2 73.5998C71.2 73.5998 71.2 73.5998 71.2 73.6998C71.1 81.4998 71.2 87.5998 71.3 91.8998C71.3 93.1998 71.7 94.4998 72.5 95.5998L70.5 96.7999C70.3 96.8999 70.2 97.1998 70.3 97.4998C70.4 97.6998 70.6 97.6998 70.7 97.6998C70.8 97.6998 70.9 97.6998 71 97.5998L73 96.3998C73.7 97.1998 74.6 97.8999 75.6 98.2999C76.5 98.6999 77.4 98.7999 78.3 98.7999C78.7 98.7999 79.2 98.7998 79.6 98.6998C81 98.3998 82.2 97.7999 83.2 96.7999C86.2 93.8999 89 90.7998 91.6 87.4998C92 88.4998 92.4 89.5999 92.8 90.7999L86.3 117.8C81.5 115.9 77 113.2 73 109.7ZM63.7 160.8H76L75.9 161.2L74.7 166.3V166.4C74.7 168.9 81.1 169.5 84.7 169.6C84.4 171.2 83.8 173.9 83.2 176.2C82.9 177.4 82.7 178.5 82.5 179.2C81.1 179.3 79.7 179.8 78.5 180.6C77.3 181.4 76.3 182.5 75.7 183.8H58.7L63.7 160.8Z"
        fill="currentColor"
      />
      <path
        d="M113.2 96.4998C110.7 96.2998 108.4 95.2998 106.6 93.5998C106.4 93.3998 106.1 93.3998 105.9 93.5998C105.7 93.7998 105.7 94.0999 105.9 94.2999C107.9 96.1999 110.4 97.3998 113.2 97.4998C113.5 97.4998 113.7 97.2998 113.7 96.9998C113.7 96.6998 113.4 96.4998 113.2 96.4998Z"
        fill="currentColor"
      />
      <path
        d="M51.4 118.9H55.3V122.8C55.3 123.1 55.5 123.3 55.8 123.3C56.1 123.3 56.3 123.1 56.3 122.8V118.9H60.2C60.5 118.9 60.7 118.7 60.7 118.4C60.7 118.1 60.5 117.9 60.2 117.9H56.3V114C56.3 113.7 56.1 113.5 55.8 113.5C55.5 113.5 55.3 113.7 55.3 114V117.9H51.4C51.1 117.9 50.9 118.1 50.9 118.4C50.9 118.7 51.1 118.9 51.4 118.9Z"
        fill="currentColor"
      />
      <path
        d="M164.6 79.3998L164.2 81.5998C164.2 81.7998 164.2 81.9998 164.4 82.0998C164.6 82.1998 164.8 82.1998 164.9 82.0998L166.8 81.0998L168.7 82.0998C168.8 82.0998 168.9 82.1998 168.9 82.1998C169 82.1998 169.1 82.1998 169.2 82.0998C169.4 81.9998 169.4 81.7998 169.4 81.5998L169 79.3998L170.6 77.8998C170.7 77.7998 170.8 77.5998 170.7 77.3998C170.6 77.1998 170.5 77.0998 170.3 77.0998L168.1 76.7999L167.1 74.7999C166.9 74.4999 166.4 74.4999 166.2 74.7999L165.2 76.7999L163 77.0998C162.8 77.0998 162.7 77.2998 162.6 77.3998C162.5 77.4998 162.6 77.7998 162.7 77.8998L164.6 79.3998ZM165.9 77.5998C166.1 77.5998 166.2 77.4999 166.3 77.2999L166.9 75.9998L167.5 77.2999C167.6 77.3999 167.7 77.5998 167.9 77.5998L169.3 77.7999L168.3 78.7999C168.2 78.8999 168.1 79.0998 168.2 79.1998L168.4 80.5998L167.1 79.8998C167 79.7998 166.8 79.7998 166.6 79.8998L165.3 80.5998L165.5 79.1998C165.5 78.9998 165.5 78.8999 165.4 78.7999L164.4 77.7999L165.9 77.5998Z"
        fill="currentColor"
      />
      <path
        d="M31.1 50.9998H32.8C33.1 50.9998 33.4 51.0998 33.6 51.2998C33.8 51.4998 33.9 51.7998 33.9 52.0998V53.7998C33.9 54.0998 34.1 54.2998 34.4 54.2998C34.7 54.2998 34.9 54.0998 34.9 53.7998V52.0998C34.9 51.7998 35 51.4998 35.2 51.2998C35.4 51.0998 35.7 50.9998 36 50.9998H37.7C38 50.9998 38.2 50.7998 38.2 50.4998C38.2 50.1998 37.9 49.9998 37.7 49.9998H36C35.7 49.9998 35.4 49.8998 35.2 49.6998C35 49.4998 34.9 49.1998 34.9 48.8998V47.1998C34.9 46.8998 34.7 46.6998 34.4 46.6998C34.1 46.6998 33.9 46.8998 33.9 47.1998V48.8998C33.9 49.1998 33.8 49.4998 33.6 49.6998C33.4 49.8998 33.1 49.9998 32.8 49.9998H31.1C30.8 49.9998 30.6 50.1998 30.6 50.4998C30.6 50.7998 30.8 50.9998 31.1 50.9998ZM34.5 50.5998L34.4 50.6998L34.2 50.4998L34.4 50.2998L34.6 50.4998C34.6 50.5998 34.5 50.5998 34.5 50.5998Z"
        fill="currentColor"
      />
      <path
        d="M117.6 21.4998C117.7 21.5998 117.8 21.6998 118 21.6998C118.2 21.6998 118.3 21.5998 118.4 21.3998L121.6 15.7998C121.7 15.5998 121.7 15.2998 121.4 15.0998C121.2 14.9998 120.9 14.9998 120.7 15.2998L117.9 20.1998L115.6 16.9998C115.4 16.7998 115.1 16.6998 114.9 16.8998C114.7 17.0998 114.6 17.3998 114.8 17.5998L117.6 21.4998Z"
        fill="currentColor"
      />
    </svg>
  </SvgIcon>
)

export default ComingSoonImage
