import { FC } from 'react'

import { SvgIcon, SvgIconProps } from '@mui/material'

const CodingImage: FC<SvgIconProps> = ({ sx, ...props }) => (
  <SvgIcon sx={{ fontSize: 200, color: 'primary.dark', ...sx }} {...props}>
    <svg
      width="200"
      height="200"
      viewBox="0 0 200 200"
      fill="none"
      xmlns="http://www.w3.org/2000/svg"
    >
      <path
        d="M194.4 37.6996C194.2 37.5996 194 37.5996 193.8 37.7996L172.2 60.4996C172.1 60.5996 172.1 60.5996 172.1 60.6996L169.4 72.7996L163.1 33.7996V33.6996C163.1 33.6996 163.1 33.6996 163.1 33.5996L162.4 29.1996C162 27.0996 161.3 24.9996 160.1 23.1996C158.9 21.3996 157.5 19.7996 155.7 18.4996C153.9 17.1996 152 16.3996 149.8 15.8996C147.7 15.3996 145.5 15.3996 143.4 15.6996L103.7 22.3996C103.7 22.1996 103.6 21.9996 103.5 21.7996C103.3 21.3996 103 20.9996 102.6 20.7996C102.2 20.4996 101.8 20.3996 101.3 20.3996C101 20.3996 100.8 20.3996 100.5 20.4996C100.4 20.3996 100.4 20.1996 100.3 20.0996C100.1 19.7996 99.8 19.5996 99.5 19.3996C99.2 19.1996 98.8 19.0996 98.5 19.0996C98.1 19.0996 97.8 19.0996 97.4 19.1996C97.2 19.2996 96.9 19.3996 96.7 19.5996C96.5 19.3996 96.3 19.1996 96.1 19.0996C95.7 18.7996 95.2 18.6996 94.7 18.7996C94.2 18.7996 93.7 18.9996 93.3 19.2996C93.1 19.4996 92.9 19.6996 92.7 19.8996C92.5 19.7996 92.4 19.6996 92.2 19.6996C91.8 19.5996 91.4 19.4996 91 19.5996C90.6 19.6996 90.3 19.7996 89.9 20.0996C89.9 19.9996 89.8 19.7996 89.7 19.6996C89.4 19.1996 89 18.7996 88.5 18.4996C88 18.1996 87.4 18.0996 86.9 18.0996C86.5 18.0996 86.2 18.1996 85.8 18.3996C85.6 17.9996 85.2 17.6996 84.9 17.4996C84.4 17.1996 83.8 16.9996 83.1 16.9996C82.5 16.9996 81.9 17.2996 81.4 17.5996C81.1 17.8996 80.8 18.1996 80.6 18.5996C80.2 18.4996 79.8 18.3996 79.4 18.3996C78.8 18.3996 78.2 18.6996 77.7 18.9996C77.2 19.3996 76.9 19.8996 76.7 20.4996C76.6 20.8996 76.5 21.2996 76.6 21.6996C76.2 21.7996 75.8 21.9996 75.5 22.2996C75 22.6996 74.7 23.1996 74.6 23.7996C74.5 24.3996 74.5 24.9996 74.7 25.5996C74.9 25.9996 75.1 26.2996 75.4 26.5996C75.2 26.7996 75.1 26.9996 75 27.1996L25.8 35.4996C23.7 35.8996 21.6 36.5996 19.8 37.7996C18 38.9996 16.4 40.3996 15.1 42.1996C13.8 43.9996 13 45.8996 12.5 48.0996C12 50.1996 12 52.3996 12.3 54.4996L17.1 83.8996C12.9 85.0996 9.3 86.3996 7 87.4996C6.8 87.5996 6.7 87.7996 6.7 87.9996C6.7 88.1996 6.8 88.3996 7 88.3996C10.6 89.7996 14.4 90.7996 18.3 91.2996L22.4 116.6L7.7 121.3L7.5 121.4C7.3 121.5 7.2 121.6 7.2 121.8C7.2 122 7.2 122.2 7.4 122.3L14 128.1L5.1 137.8C5 138.2 5 138.3 5 138.4C5 138.5 5.1 138.7 5.2 138.7L10.1 143.1C10.2 143.2 10.3 143.2 10.4 143.2C10.5 143.2 10.7 143.1 10.8 143L19.7 133.2L26.1 138.9L28.2 151.6C28.6 153.7 29.3 155.8 30.5 157.6C31.7 159.4 33.1 161 34.9 162.3C36.7 163.6 38.6 164.4 40.8 164.9C42 165.2 43.2 165.3 44.4 165.3C45.3 165.3 46.2 165.2 47.2 165.1L54.3 163.9C53.8 170.9 54.4 182.1 56.1 187.7C56.2 187.9 56.3 188 56.5 188.1C56.5 188.1 56.5 188.1 56.6 188.1C56.8 188.1 56.9 188 57 187.9C62.4 178.9 64.3 173 66.9 164.5L69.7 161.4L164.8 145.4C166.9 145 169 144.3 170.8 143.1C172.6 141.9 174.2 140.5 175.5 138.7C176.8 136.9 177.6 135 178.1 132.8C178.6 130.7 178.6 128.5 178.3 126.4L172.5 90.5996L186 76.0996C186.1 75.9996 186.1 75.9996 186.1 75.8996L194.6 38.2996C194.7 38.0996 194.6 37.7996 194.4 37.6996ZM141.5 88.7996C141.4 88.7996 141.2 88.7996 141.1 88.8996C133.8 87.9996 119.4 87.5996 118.7 87.4996C116.8 87.2996 114.9 86.5996 113.4 85.4996L104.6 78.7996C105.7 75.7996 108.9 71.0996 111.2 69.2996L120.2 77.1996C120.3 77.2996 120.4 77.2996 120.4 77.2996C120.6 77.2996 143.6 81.5996 145.3 82.0996L145.9 82.2996C147.2 82.6996 149.5 83.2996 151.1 84.0996H151C150 83.8996 148.7 83.5996 147.7 83.4996C146.5 82.9996 145.5 82.6996 145.3 82.6996C145 82.5996 144.8 82.7996 144.7 83.0996C144.6 83.3996 144.8 83.5996 145.1 83.6996C145.4 83.7996 146.3 84.0996 147.5 84.5996C149.2 85.3996 151.2 86.4996 152.3 87.4996C152.2 87.3996 152 87.3996 151.9 87.2996C150.5 86.6996 148.6 85.8996 147.1 85.7996C146 85.2996 145.1 84.8996 144.7 84.7996C144.4 84.6996 144.2 84.7996 144.1 85.0996C144 85.3996 144.1 85.5996 144.4 85.6996C145.1 85.9996 145.9 86.2996 146.6 86.5996C146.6 86.6996 146.7 86.6996 146.8 86.7996C148.5 87.5996 149.8 88.3996 150.5 89.1996C149.2 88.5996 147.1 87.5996 144.9 87.4996C144.7 87.3996 144.5 87.2996 144.3 87.1996C144.1 87.0996 143.8 87.0996 143.6 87.3996C143.5 87.5996 143.5 87.8996 143.8 88.0996C144 88.1996 144.2 88.2996 144.4 88.4996C144.4 88.4996 144.4 88.5996 144.5 88.5996C145.8 89.3996 146.8 90.0996 147.3 90.4996C146.8 90.2996 146.1 90.0996 145.1 89.5996C145 89.4996 144.8 89.4996 144.7 89.3996C143.6 89.1996 142.6 88.8996 141.5 88.7996ZM92.7 70.9996C92.5 70.7996 92.2 70.7996 92 70.9996C91.8 71.1996 91.8 71.3996 91.9 71.5996L98.5 81.7996C91.7 80.3996 89 78.7996 83.7 74.5996C84.5 72.0996 85 69.5996 85.3 67.0996C85.8 63.0996 86.9 59.1996 88.7 55.5996C89.6 53.6996 91 51.9996 92.6 50.0996C92.9 49.7996 93.1 49.3996 93.4 49.0996C95.4 50.8996 97 51.8996 98.3 51.8996C98.4 51.8996 98.5 51.8996 98.6 51.8996C99 51.8996 99.4 51.6996 99.7 51.4996C99.9 53.3996 100.3 55.2996 100.8 56.9996L95.1 51.8996C94.9 51.6996 94.6 51.6996 94.4 51.8996C94.2 52.0996 94.2 52.3996 94.4 52.5996L101.5 58.9996L111.4 67.8996C111.2 67.9996 111.1 68.0996 110.9 68.1996C110.9 68.1996 110.9 68.1996 110.8 68.1996C108.3 69.9996 104.5 75.3996 103.4 78.7996C103.4 78.7996 103.4 78.7996 103.4 78.8996C103.4 78.9996 103.3 79.1996 103.3 79.2996C103.3 79.3996 103.2 79.5996 103.2 79.7996L92.7 70.9996ZM66.3 163.5C63.7 161.6 61.4 159.3 59.5 156.8C61.9 154.2 64.1 151.7 66.5 148.8C68.5 151.3 71 153.5 73.7 155.3L66.3 163.5ZM82.3 151.6C76.9 149 72.3 145 69 140L77.1 131C77.2 130.9 77.2 130.8 77.2 130.7L78.7 120.5L94.8 94.1996C94.9 93.9996 94.9 93.6996 94.7 93.4996C94.5 93.2996 94.2 93.3996 94 93.5996L79.5 110L71.8 118.5C70.9 119.5 69.8 120.3 68.5 120.9C67.3 121.5 65.9 121.8 64.6 121.9C63.2 122 61.9 121.8 60.6 121.3C59.3 120.8 58.1 120.1 57.1 119.2L42.9 106.4C44.5 103.6 46.1 101.2 48 99.0996L64 111.8C64.1 111.9 64.2 111.9 64.3 111.9H64.4C64.5 111.9 64.7 111.8 64.7 111.7L81.5 86.9996C83.8 86.2996 86 85.1996 88 83.7996C88.2 83.5996 88.3 83.2996 88.1 83.0996C87.9 82.8996 87.6 82.7996 87.4 82.9996C83.9 85.6996 79.5 86.9996 75 86.8996C74.7 86.8996 74.5 87.0996 74.5 87.3996C74.5 87.6996 74.7 87.8996 75 87.8996C75.3 87.8996 75.6 87.8996 75.8 87.8996C77.2 87.8996 78.6 87.6996 80 87.3996L64.1 110.8L48.6 98.4996C50.4 96.4996 52.4 94.8996 54.5 93.4996L62.5 100.7C62.6 100.8 62.8 100.9 62.9 100.8C63.1 100.8 63.2 100.7 63.3 100.5C70.3 83.1996 77.2 79.0996 81.3 76.6996C82 76.2996 82.5 75.9996 83 75.5996C88.4 79.7996 91.2 81.5996 98.5 82.9996C97.8 90.4996 97.5 98.3996 97.2 106.1C96.8 117.1 96.5 127.4 94.8 134.5C94.1 137.3 92.8 139.9 90.9 142L82.3 151.6ZM38 84.9996C39.8 86.7996 41.2 87.7996 43.9 89.9996C44.5 90.4996 45.2 90.9996 45.9 91.5996C43.4 93.5996 41.3 95.9996 39.7 98.6996L32.2 91.9996C33.8 89.2996 35.8 86.9996 38 84.9996ZM96.1 45.3996C96.2 45.2996 96.2 45.2996 96.2 45.1996C96.3 44.9996 96.5 44.6996 96.6 44.4996C97.2 43.3996 97.7 42.0996 97.8 40.8996C97.8 40.8996 97.8 40.8996 97.8 40.7996C98 39.3996 97.8 37.8996 97 36.6996C96.9 36.5996 96.8 36.4996 96.7 36.4996C95.9 36.2996 95.5 35.7996 95.4 35.1996C95.4 35.0996 95.4 34.9996 95.4 34.8996C95.4 34.5996 95.6 34.3996 95.8 34.2996C96.1 34.0996 96.4 34.2996 96.7 34.3996C97.2 34.7996 97.8 35.0996 98.3 34.8996C98.5 34.7996 98.6 34.6996 98.7 34.5996C98.8 34.4996 98.8 34.2996 98.8 34.1996C99 34.3996 99.1 34.4996 99.3 34.5996C99.7 34.8996 100.2 34.9996 100.7 34.9996C101.2 34.9996 101.7 34.7996 102.1 34.4996C102.3 34.2996 102.5 34.1996 102.7 33.8996C102.8 33.9996 102.9 33.9996 103 33.9996C103.3 34.0996 103.6 34.1996 104 34.1996C104.4 34.1996 104.7 34.0996 105 33.9996C105.1 33.9996 105.2 33.8996 105.2 33.8996C105.4 34.2996 105.5 34.7996 105.6 35.1996V35.2996C105.7 35.6996 105.8 36.1996 105.9 36.5996C106.5 39.4996 106.4 42.4996 105.1 43.8996C104.2 44.7996 102.9 44.8996 101.1 44.2996C100.6 44.0996 100.1 43.8996 99.7 43.6996C99.5 43.5996 99.3 43.5996 99.1 43.7996C99 43.6996 99 43.9996 99.1 44.1996L100 46.0996C99.7 47.3996 99.6 48.7996 99.6 50.1996C99.3 50.5996 98.9 50.7996 98.5 50.8996C97.8 50.9996 96.4 50.5996 94 48.3996C94.8 47.3996 95.5 46.3996 96.1 45.3996ZM149.4 81.9996C149.5 82.0996 149.6 82.1996 149.7 82.1996C151.4 82.5996 153.1 83.0996 154.8 83.8996C155 83.9996 155.2 84.0996 155.4 84.1996C155.1 84.0996 154.7 84.0996 154.4 83.9996C153.5 83.7996 152.5 83.5996 151.8 83.4996C150.3 82.6996 148.2 81.9996 146.2 81.4996L145.6 81.2996C143.9 80.7996 122.8 76.8996 120.7 76.4996L114 70.4996C114.6 69.7996 115.3 69.0996 116 68.4996L124.8 75.8996C124.9 75.8996 124.9 75.9996 125 75.9996L147 81.2996C147.7 81.4996 148.4 81.6996 149.1 81.7996C149.1 81.8996 149.3 81.8996 149.4 81.9996ZM115.7 67.3996C115.6 67.3996 115.6 67.3996 115.7 67.3996C115.6 67.3996 115.6 67.4996 115.6 67.4996C114.7 68.1996 113.9 68.9996 113.2 69.7996C113.3 69.2996 113.5 68.3996 112.9 67.8996L102.2 58.2996C101.7 56.7996 101.2 55.0996 100.9 53.3996L116.1 67.0996C116 67.1996 115.8 67.2996 115.7 67.3996ZM168.7 75.9996L154.9 76.4996C154.8 76.4996 154.7 76.5996 154.6 76.5996L149.8 80.9996C149.6 80.9996 149.4 80.8996 149.3 80.8996C148.6 80.6996 147.9 80.5996 147.2 80.3996L125.3 74.9996L118 68.8996C118.1 68.3996 118.2 67.4996 117.7 67.0996L100.8 51.8996C100.5 49.4996 100.6 47.0996 101.3 45.1996C103.8 45.9996 105.2 45.1996 106 44.3996C106.2 44.1996 106.3 43.9996 106.5 43.7996L162.2 34.3996L168.9 75.3996L168.7 75.9996ZM143.5 16.8996C145.5 16.5996 147.5 16.5996 149.5 17.0996C151.5 17.5996 153.3 18.3996 155 19.5996C156.7 20.7996 158.1 22.1996 159.1 23.9996C160.2 25.6996 160.9 27.5996 161.2 29.5996L161.8 33.5996L106.8 42.8996C107.4 41.1996 107.3 38.8996 106.9 36.7996C107.3 36.4996 107.6 36.0996 107.7 35.5996C107.9 34.9996 107.9 34.3996 107.6 33.7996C107.5 33.5996 107.4 33.4996 107.3 33.2996C107.4 33.1996 107.6 33.0996 107.7 32.8996C107.9 32.5996 108.1 32.1996 108.2 31.7996C108.3 31.1996 108.2 30.5996 107.9 30.0996C107.7 29.7996 107.5 29.4996 107.2 29.2996C107.3 29.1996 107.3 29.0996 107.4 28.8996C107.5 28.5996 107.6 28.1996 107.6 27.7996C107.6 27.3996 107.5 27.0996 107.3 26.7996C107.1 26.4996 106.9 26.1996 106.6 25.9996C106.4 25.7996 106.1 25.6996 105.9 25.5996C105.9 25.4996 105.9 25.2996 105.9 25.1996C105.9 24.8996 105.8 24.4996 105.7 24.1996C105.6 23.8996 105.4 23.5996 105.1 23.3996C105.1 23.3996 105 23.3996 105 23.2996L143.5 16.8996ZM13.5 48.3996C14 46.3996 14.8 44.5996 16 42.8996C17.2 41.1996 18.6 39.7996 20.4 38.7996C22.1 37.6996 24 36.9996 26 36.6996L74.8 28.4996C74.8 28.8996 74.8 29.2996 75 29.6996C75.2 30.2996 75.6 30.7996 76.1 31.0996C76.5 31.2996 76.9 31.4996 77.3 31.5996C77.3 31.9996 77.4 32.3996 77.5 32.7996C77.7 33.3996 78.1 33.7996 78.6 34.1996C79.1 34.4996 79.7 34.6996 80.3 34.6996C80.7 34.6996 81.1 34.5996 81.5 34.3996C81.7 34.6996 81.9 34.8996 82.2 35.0996C82.5 35.2996 82.8 35.4996 83.1 35.5996C83.1 35.7996 83.1 35.9996 83.1 36.1996C83.2 36.5996 83.3 36.8996 83.5 37.1996C83.7 37.4996 84 37.7996 84.3 37.8996C84.4 37.9996 84.6 37.9996 84.7 38.0996C84.7 38.2996 84.6 38.5996 84.7 38.8996C84.8 39.3996 84.9 39.7996 85.2 40.1996C85.5 40.5996 85.9 40.7996 86.3 40.9996C86.5 41.0996 86.8 41.0996 87.1 41.0996C87.1 41.3996 87.2 41.5996 87.3 41.7996C87.5 42.1996 87.8 42.5996 88.2 42.7996C88.6 42.9996 89 43.1996 89.5 43.1996C89.8 43.1996 90 43.1996 90.3 43.0996C90.4 43.2996 90.6 43.5996 90.7 43.7996C91 44.1996 91.4 44.3996 91.9 44.4996C92.4 44.5996 92.9 44.5996 93.3 44.3996C93.6 44.2996 93.8 44.1996 94 43.9996C94.2 44.1996 94.4 44.3996 94.7 44.4996C94.8 44.5996 95 44.5996 95.2 44.6996L13.9 58.2996L13.3 54.3996C13 52.3996 13 50.3996 13.5 48.3996ZM14.1 59.2996L94.7 45.7996C93.8 47.0996 92.8 48.2996 91.8 49.4996C90.2 51.3996 88.7 53.2996 87.8 55.1996C85.9 58.8996 84.8 62.8996 84.3 66.9996C84 69.4996 83.5 72.0996 82.7 74.4996C82.2 74.8996 81.6 75.1996 80.9 75.6996C76.7 78.1996 69.7 82.2996 62.7 99.3996L50.8 88.7996C50.6 88.6996 50.4 88.5996 50.2 88.6996C48.9 89.2996 47.8 90.0996 46.6 90.8996C45.8 90.1996 45 89.6996 44.4 89.1996C41.6 86.9996 40.2 85.8996 38.3 83.9996C37.4 83.0996 36.3 81.9996 35 80.4996C34.9 80.3996 34.7 80.2996 34.6 80.2996C29.1 81.0996 23.2 82.3996 18.1 83.8996L14.1 59.2996ZM19.9 132.3C19.7 132.1 19.4 132.1 19.2 132.3L10.3 142.1L6.1 138.4L15 128.7C15.1 128.6 15.1 128.5 15.1 128.3C15.1 128.2 15 128 14.9 128L8.6 122.4L22.5 117.9L25.7 137.5L19.9 132.3ZM46.9 164.2C44.9 164.5 42.9 164.5 40.9 164C38.9 163.5 37.1 162.7 35.4 161.5C33.7 160.3 32.3 158.9 31.3 157.1C30.2 155.4 29.5 153.5 29.2 151.5L27 139L32.2 114.5C32.2 114.3 32.2 114.1 32 114C31.9 113.9 31.7 113.8 31.5 113.9L23.3 116.5L19.3 91.6996C23.1 92.1996 27 92.2996 30.9 92.0996L39.1 99.4996C38.5 100.6 38 101.6 37.6 102.8C37.5 103 37.6 103.2 37.7 103.3L56.3 120C57.4 121 58.7 121.8 60.1 122.3C61.5 122.8 63 123 64.5 122.9C66 122.8 67.5 122.4 68.8 121.8C70.2 121.1 71.4 120.2 72.4 119.1L79 111.8L76.2 130.3L63.7 144.2C63.6 144.4 63.5 144.6 63.6 144.8C64.2 145.9 64.9 146.9 65.7 147.9C62 152.4 58.7 156 54.5 160.4C54.4 160.5 54.4 160.6 54.4 160.7C54.3 161.4 54.2 162.1 54.1 162.9L46.9 164.2ZM177.1 126.6C177.4 128.6 177.4 130.6 176.9 132.6C176.4 134.6 175.6 136.4 174.4 138.1C173.2 139.8 171.8 141.2 170 142.2C168.3 143.3 166.4 144 164.4 144.3L70.6 160.1L74.6 155.7C75.7 156.3 76.8 156.9 77.9 157.4C78 157.4 78 157.4 78.1 157.4C78.2 157.4 78.4 157.3 78.5 157.2L91.8 142.4C93.8 140.2 95.3 137.4 96 134.5C97.7 127.3 98.1 116.9 98.5 105.9C98.8 98.0996 99.1 90.0996 99.8 82.4996L101.5 79.4996L103.7 81.3996H103.8C103.8 81.3996 103.8 81.3996 103.9 81.3996C104 81.4996 104.2 81.4996 104.3 81.4996C104.8 81.4996 105.4 81.1996 105.9 80.7996L112.9 86.0996C114.6 87.2996 116.6 88.0996 118.8 88.2996C124.6 88.4996 134.5 88.8996 140.3 89.4996L129.7 99.1996C129.5 99.2996 129.5 99.5996 129.6 99.7996C129.7 99.9996 129.9 100.1 130.1 100.1L164.2 98.7996C164.3 98.7996 164.4 98.6996 164.5 98.5996L171.5 91.1996L177.1 126.6Z"
        fill="currentColor"
      />
      <path
        d="M120.6 33.6996C121.1 34.1996 121.6 34.4996 122.3 34.6996C122.8 34.8996 123.2 34.8996 123.7 34.8996C123.9 34.8996 124 34.8996 124.2 34.8996C124.8 34.7996 125.5 34.5996 126 34.2996C126.7 33.7996 127.3 33.1996 127.7 32.3996C128.1 31.5996 128.2 30.6996 128 29.8996C127.8 28.6996 127.2 27.6996 126.2 26.9996C125.2 26.2996 124.1 25.9996 122.9 26.1996C122.3 26.2996 121.6 26.5996 121.1 26.8996C120.6 27.2996 120.1 27.7996 119.8 28.2996C119.5 28.8996 119.3 29.4996 119.2 30.1996C119.1 30.7996 119.2 31.4996 119.5 32.0996C119.8 32.6996 120.1 33.1996 120.6 33.6996ZM120.7 28.7996C121 28.3996 121.3 27.9996 121.7 27.6996C122.1 27.3996 122.6 27.1996 123.1 27.0996C123.3 27.0996 123.5 27.0996 123.7 27.0996C124.4 27.0996 125.1 27.2996 125.7 27.6996C126.4 28.1996 126.9 28.9996 127.1 29.8996C127.2 30.5996 127.1 31.2996 126.8 31.8996C126.5 32.4996 126.1 32.9996 125.5 33.3996C125.1 33.6996 124.6 33.7996 124.1 33.8996C123.6 33.9996 123.1 33.8996 122.6 33.6996C122.1 33.4996 121.7 33.2996 121.3 32.8996C120.9 32.4996 120.7 32.0996 120.5 31.5996C120.3 31.0996 120.3 30.5996 120.3 30.0996C120.3 29.5996 120.4 29.1996 120.7 28.7996Z"
        fill="currentColor"
      />
      <path
        d="M131.3 31.8996C131.8 32.3996 132.3 32.6996 133 32.8996C133.5 33.0996 133.9 33.0996 134.4 33.0996C134.6 33.0996 134.7 33.0996 134.9 33.0996C135.5 32.9996 136.2 32.7996 136.7 32.4996C137.4 31.9996 138 31.3996 138.4 30.5996C138.8 29.7996 138.9 28.8996 138.7 28.0996C138.5 26.8996 137.9 25.8996 136.9 25.1996C135.9 24.4996 134.8 24.1996 133.6 24.3996C133 24.4996 132.3 24.7996 131.8 25.0996C131.3 25.4996 130.8 25.9996 130.5 26.4996C130.2 27.0996 130 27.6996 129.9 28.3996C129.8 28.9996 129.9 29.6996 130.2 30.2996C130.5 30.8996 130.8 31.3996 131.3 31.8996ZM131.4 26.9996C131.7 26.5996 132 26.1996 132.4 25.8996C132.8 25.5996 133.3 25.3996 133.8 25.2996C134 25.2996 134.2 25.2996 134.4 25.2996C135.1 25.2996 135.8 25.4996 136.4 25.8996C137.1 26.3996 137.6 27.1996 137.8 28.0996C137.9 28.7996 137.8 29.4996 137.5 30.0996C137.2 30.6996 136.8 31.1996 136.2 31.5996C135.8 31.8996 135.3 31.9996 134.8 32.0996C134.3 32.1996 133.8 32.0996 133.3 31.8996C132.8 31.6996 132.4 31.4996 132 31.0996C131.6 30.7996 131.4 30.2996 131.2 29.7996C131 29.2996 131 28.7996 131 28.2996C131 27.8996 131.1 27.3996 131.4 26.9996Z"
        fill="currentColor"
      />
      <path
        d="M142.7 30.4996C143.4 30.9996 144.3 31.2996 145.1 31.2996H145.2C146 31.2996 146.8 31.0996 147.5 30.5996C148.2 30.0996 148.8 29.4996 149.2 28.6996C149.6 27.8996 149.7 26.9996 149.5 26.0996C149.4 25.4996 149.2 24.9996 148.9 24.4996C148.6 23.9996 148.2 23.5996 147.7 23.1996C147.1 22.7996 146.4 22.4996 145.7 22.3996C145 22.2996 144.2 22.3996 143.6 22.5996C142.9 22.8996 142.3 23.2996 141.8 23.7996C141.3 24.2996 141 24.9996 140.8 25.6996C140.6 26.5996 140.7 27.3996 141 28.2996C141.4 29.2996 142 29.9996 142.7 30.4996Z"
        fill="currentColor"
      />
      <path
        d="M32.3 17.5996L29 22.2996C28.8 22.4996 28.9 22.7996 29.1 22.9996C29.2 23.0996 29.3 23.0996 29.4 23.0996C29.6 23.0996 29.7 22.9996 29.8 22.8996L33.1 18.1996L37.8 21.4996C37.9 21.5996 38 21.5996 38.1 21.5996C38.3 21.5996 38.4 21.4996 38.5 21.3996C38.7 21.1996 38.6 20.8996 38.4 20.6996L33.7 17.3996L37 12.6996C37.2 12.4996 37.1 12.1996 36.9 11.9996C36.7 11.7996 36.4 11.8996 36.2 12.0996L32.9 16.7996L28.2 13.4996C28 13.2996 27.7 13.3996 27.5 13.5996C27.3 13.7996 27.4 14.0996 27.6 14.2996L32.3 17.5996Z"
        fill="currentColor"
      />
      <path
        d="M129.8 135.5L116.1 131.3L127.6 123.3C127.8 123.1 127.9 122.8 127.7 122.6C127.5 122.4 127.2 122.3 127 122.5L114.7 131C114.5 131.1 114.5 131.3 114.5 131.5C114.5 131.7 114.7 131.8 114.8 131.9L129.4 136.4H129.5C129.7 136.4 129.9 136.3 130 136C130.2 135.9 130.1 135.6 129.8 135.5Z"
        fill="currentColor"
      />
      <path
        d="M154.1 124.5L139.6 120.4C139.3 120.3 139.1 120.5 139 120.7C138.9 121 139.1 121.2 139.3 121.3L152.9 125.1L141.5 133.5C141.3 133.7 141.2 134 141.4 134.2C141.5 134.3 141.6 134.4 141.8 134.4C141.9 134.4 142 134.4 142.1 134.3L154.3 125.3C154.5 125.2 154.5 125 154.5 124.8C154.4 124.8 154.2 124.6 154.1 124.5Z"
        fill="currentColor"
      />
      <path
        d="M137.2 115.1C136.9 115 136.7 115.2 136.6 115.5L131.3 141.6C131.2 141.9 131.4 142.1 131.7 142.2H131.8C132 142.2 132.2 142 132.3 141.8L137.6 115.7C137.7 115.4 137.5 115.1 137.2 115.1Z"
        fill="currentColor"
      />
    </svg>
  </SvgIcon>
)

export default CodingImage
