import { FC } from 'react'

import { SvgIcon, SvgIconProps } from '@mui/material'

const ChartsImage: FC<SvgIconProps> = ({ sx, ...props }) => (
  <SvgIcon sx={{ fontSize: 200, color: 'primary.dark', ...sx }} {...props}>
    <svg
      width="200"
      height="200"
      viewBox="0 0 200 200"
      fill="none"
      xmlns="http://www.w3.org/2000/svg"
    >
      <path
        d="M96.6999 73.6002C96.5999 73.6002 96.4999 73.5002 96.3999 73.5002C96.2999 73.5002 96.1999 73.5002 96.0999 73.5002C95.9999 73.5002 95.8999 73.6002 95.7999 73.6002C95.6999 73.7002 95.6999 73.7002 95.5999 73.8002C95.5999 73.9002 95.4999 74.0002 95.4999 74.1002C95.4999 74.2002 95.4999 74.3002 95.4999 74.4002C95.4999 74.5002 95.5999 74.6002 95.5999 74.7002C95.6999 74.9002 95.8999 74.9002 96.0999 75.0002C96.2999 75.0002 96.4999 75.0002 96.5999 74.8002C96.7999 74.7002 96.7999 74.5002 96.8999 74.3002C96.8999 74.1002 96.8999 73.9002 96.6999 73.8002C96.8999 73.7002 96.7999 73.7002 96.6999 73.6002Z"
        fill="currentColor"
      />
      <path
        d="M114.8 70.8002C114.7 70.6002 114.5 70.6002 114.3 70.5002C114.1 70.5002 113.9 70.5002 113.8 70.7002C113.6 70.8002 113.6 71.0002 113.5 71.2002C113.5 71.4002 113.5 71.6002 113.7 71.7002C113.8 71.8002 113.8 71.8002 113.9 71.9002C114 71.9002 114.1 72.0002 114.2 72.0002C114.3 72.0002 114.4 72.0002 114.5 72.0002C114.6 72.0002 114.7 71.9002 114.8 71.9002C114.9 71.8002 114.9 71.8002 115 71.7002C115 71.6002 115.1 71.5002 115.1 71.4002C115.1 71.3002 115.1 71.2002 115.1 71.1002C115 70.9002 114.9 70.8002 114.8 70.8002Z"
        fill="currentColor"
      />
      <path
        d="M129.1 79.5002C129 79.4002 129 79.4002 128.9 79.3002C128.8 79.3002 128.7 79.2002 128.6 79.2002C128.5 79.2002 128.4 79.2002 128.3 79.2002C128.2 79.2002 128.1 79.3002 128 79.3002C127.9 79.4002 127.8 79.5002 127.8 79.7002C127.8 79.8002 127.8 80.0002 127.8 80.1002C127.8 80.2002 127.9 80.3002 127.9 80.4002C128 80.5002 128.1 80.6002 128.3 80.6002C128.4 80.6002 128.6 80.6002 128.7 80.6002C128.8 80.6002 128.9 80.5002 129 80.5002C129.1 80.4002 129.1 80.4002 129.2 80.3002C129.2 80.2002 129.3 80.1002 129.3 80.0002C129.3 79.9002 129.3 79.8002 129.3 79.7002C129.2 79.7002 129.1 79.6002 129.1 79.5002Z"
        fill="currentColor"
      />
      <path
        d="M162.3 82.3002C162.2 82.2002 162.1 82.2002 162 82.1002C161.9 82.1002 161.8 82.0002 161.7 82.1002C161.6 82.1002 161.4 82.2002 161.3 82.2002C161.2 82.3002 161.1 82.4002 161.1 82.5002C161 82.6002 161 82.8002 161.1 82.9002C161.1 83.0002 161.2 83.2002 161.3 83.3002C161.4 83.4002 161.5 83.5002 161.7 83.5002C161.8 83.5002 162 83.5002 162.1 83.5002C162.2 83.5002 162.4 83.4002 162.5 83.3002C162.6 83.2002 162.6 83.0002 162.7 82.9002C162.7 82.8002 162.7 82.7002 162.7 82.6002C162.5 82.4002 162.4 82.3002 162.3 82.3002Z"
        fill="currentColor"
      />
      <path
        d="M184 77.9002C184.1 77.9002 184.3 77.9002 184.4 77.9002C184.5 77.9002 184.7 77.8002 184.8 77.7002C184.9 77.6002 185 77.4002 185 77.3002C185 77.2002 185 77.1002 185 77.0002C185 76.9002 184.9 76.8002 184.8 76.7002C184.7 76.6002 184.6 76.6002 184.5 76.5002C184.4 76.5002 184.3 76.4002 184.2 76.5002C184.1 76.5002 183.9 76.6002 183.8 76.6002C183.7 76.7002 183.6 76.8002 183.6 76.9002C183.6 77.0002 183.5 77.2002 183.6 77.3002C183.6 77.4002 183.7 77.6002 183.8 77.7002C183.7 77.8002 183.9 77.9002 184 77.9002Z"
        fill="currentColor"
      />
      <path
        d="M140.4 88.9002C140.5 89.0002 140.5 89.0002 140.6 89.1002C140.7 89.2002 140.8 89.2002 140.9 89.2002C141 89.2002 141.1 89.2002 141.2 89.2002C141.3 89.2002 141.4 89.1002 141.5 89.1002C141.6 89.0002 141.7 88.9002 141.7 88.7002C141.7 88.6002 141.7 88.4002 141.7 88.3002C141.7 88.2002 141.6 88.1002 141.6 88.0002C141.5 87.9002 141.5 87.9002 141.4 87.8002C141.3 87.8002 141.2 87.7002 141.1 87.7002C140.9 87.7002 140.7 87.7002 140.6 87.9002C140.5 88.0002 140.5 88.0002 140.4 88.1002C140.3 88.2002 140.3 88.3002 140.3 88.4002C140.3 88.5002 140.3 88.6002 140.3 88.7002C140.3 88.8002 140.3 88.9002 140.4 88.9002Z"
        fill="currentColor"
      />
      <path
        d="M146.7 88.5002C146.6 88.4002 146.5 88.4002 146.4 88.3002C146.3 88.3002 146.2 88.2002 146.1 88.3002C146 88.3002 145.8 88.4002 145.7 88.4002C145.6 88.5002 145.5 88.6002 145.5 88.7002C145.4 88.8002 145.4 89.0002 145.5 89.1002C145.5 89.2002 145.6 89.4002 145.7 89.5002C145.8 89.6002 145.9 89.7002 146.1 89.7002C146.2 89.7002 146.4 89.7002 146.5 89.7002C146.6 89.7002 146.8 89.6002 146.9 89.5002C147 89.4002 147 89.2002 147.1 89.1002C147.1 89.0002 147.1 88.9002 147.1 88.8002C146.8 88.6002 146.8 88.6002 146.7 88.5002Z"
        fill="currentColor"
      />
      <path
        d="M153.7 101.1C153.6 101 153.5 101 153.4 101C153.3 101 153.2 101 153.1 101C153 101 152.9 101.1 152.8 101.1C152.7 101.2 152.6 101.2 152.6 101.3C152.5 101.4 152.5 101.5 152.5 101.6C152.5 101.7 152.5 101.8 152.5 101.9C152.5 102 152.6 102.1 152.6 102.2C152.7 102.3 152.8 102.4 152.9 102.4C153 102.4 153.1 102.5 153.2 102.5C153.3 102.5 153.4 102.5 153.5 102.4C153.6 102.4 153.7 102.3 153.8 102.2C153.9 102.1 154 101.9 154 101.8C154 101.7 154 101.5 153.9 101.4C153.8 101.2 153.8 101.1 153.7 101.1Z"
        fill="currentColor"
      />
      <path
        d="M134.3 99.2002C134.2 99.1002 134.1 99.1002 133.9 99.1002C133.8 99.1002 133.7 99.1002 133.5 99.2002C133.4 99.3002 133.3 99.3002 133.2 99.4002C133.1 99.5002 133.1 99.6002 133.1 99.7002C133.1 99.9002 133.1 100.1 133.3 100.2C133.4 100.3 133.5 100.4 133.7 100.4C133.8 100.4 134 100.4 134.1 100.4C134.2 100.4 134.4 100.3 134.5 100.2C134.6 100.1 134.7 99.9002 134.7 99.8002C134.7 99.7002 134.7 99.5002 134.6 99.4002C134.5 99.3002 134.4 99.2002 134.3 99.2002Z"
        fill="currentColor"
      />
      <path
        d="M177.5 60.0002C177.6 60.1002 177.7 60.1002 177.8 60.2002C177.9 60.2002 178 60.3002 178.1 60.2002C178.2 60.2002 178.4 60.1002 178.5 60.1002C178.6 60.0002 178.7 59.9002 178.7 59.8002C178.8 59.7002 178.8 59.5002 178.7 59.4002C178.7 59.3002 178.6 59.1002 178.5 59.0002C178.4 58.9002 178.3 58.8002 178.1 58.8002C177.9 58.8002 177.8 58.8002 177.7 58.8002C177.6 58.8002 177.4 58.9002 177.3 59.0002C177.2 59.1002 177.2 59.3002 177.1 59.4002C177.1 59.5002 177.1 59.6002 177.1 59.7002C177.3 59.9002 177.4 60.0002 177.5 60.0002Z"
        fill="currentColor"
      />
      <path
        d="M20.2999 92.2002L9.7999 88.1002C9.6999 88.1002 9.4999 88.1002 9.3999 88.1002C9.3999 88.1002 9.3999 88.1002 9.2999 88.2002C9.2999 88.2002 9.1999 88.2002 9.1999 88.3002C9.1999 88.3002 9.0999 88.4002 9.0999 88.5002L4.9999 98.9002C4.8999 99.2002 4.9999 99.4002 5.2999 99.5002C5.3999 99.5002 5.3999 99.5002 5.4999 99.5002C5.6999 99.5002 5.8999 99.4002 5.9999 99.2002L9.6999 89.8002L18.3999 109.7C18.4999 109.9 18.6999 110 18.8999 110C18.9999 110 18.9999 110 19.0999 110C19.3999 109.9 19.4999 109.6 19.3999 109.3L10.6999 89.4002L20.0999 93.1002C20.3999 93.2002 20.5999 93.1002 20.6999 92.8002C20.6999 92.6002 20.5999 92.3002 20.2999 92.2002Z"
        fill="currentColor"
      />
      <path
        d="M186.3 151.4C186.5 151 186.6 150.6 186.6 150.1C186.6 149.7 186.5 149.2 186.4 148.8C186.1 148.1 185.5 147.5 184.8 147.2C184.2 146.9 183.4 146.9 182.8 147.1C182.1 147.3 181.6 147.7 181.2 148.3C180.9 148.8 180.7 149.4 180.7 150C180.7 150.6 180.9 151.2 181.2 151.6C181.5 152.1 182 152.5 182.6 152.7C183 152.8 183.3 152.9 183.7 152.9C183.9 152.9 184.1 152.9 184.3 152.8C184.7 152.7 185.1 152.5 185.5 152.2C185.8 152.1 186.1 151.8 186.3 151.4ZM184.9 151.6C184.7 151.8 184.4 151.9 184.1 152C183.7 152.1 183.3 152.1 183 151.9C182.6 151.8 182.3 151.5 182.1 151.2C181.9 150.9 181.8 150.5 181.7 150.1C181.7 149.7 181.8 149.3 182 149C182.2 148.6 182.6 148.3 183.1 148.2C183.3 148.1 183.5 148.1 183.7 148.1C183.9 148.1 184.2 148.1 184.4 148.2C184.9 148.4 185.3 148.8 185.5 149.2C185.6 149.5 185.7 149.8 185.7 150.1C185.7 150.4 185.6 150.7 185.5 150.9C185.3 151.2 185.1 151.4 184.9 151.6Z"
        fill="currentColor"
      />
      <path
        d="M194.8 152C194.5 151.3 193.9 150.7 193.2 150.4C192.5 150.1 191.7 150.1 190.9 150.4C190.4 150.6 189.9 151 189.6 151.5C189.3 152 189.1 152.6 189.1 153.2C189.1 153.8 189.3 154.4 189.6 154.8C189.9 155.3 190.4 155.7 191 155.9C191.4 156 191.7 156.1 192.1 156.1C192.3 156.1 192.5 156.1 192.7 156C193.1 155.9 193.5 155.7 193.9 155.4C194.3 155.1 194.5 154.8 194.7 154.4C194.9 154 195 153.6 195 153.1C195 152.9 195 152.4 194.8 152ZM193.8 154.1C193.7 154.4 193.5 154.6 193.2 154.8C193 155 192.7 155.1 192.4 155.2C192 155.3 191.6 155.2 191.2 155.1C190.8 155 190.5 154.7 190.3 154.4C190.1 154.1 190 153.7 189.9 153.3C189.9 152.9 190 152.5 190.2 152.2C190.4 151.9 190.7 151.6 191.1 151.5C191.4 151.4 191.6 151.3 191.9 151.3C192.1 151.3 192.4 151.3 192.6 151.4C193.1 151.6 193.5 152 193.7 152.5C193.8 152.8 193.9 153.1 193.9 153.4C194 153.6 193.9 153.9 193.8 154.1Z"
        fill="currentColor"
      />
      <path
        d="M191 143.6C190.7 143.5 190.5 143.6 190.4 143.9L184.5 158.9C184.4 159.2 184.5 159.4 184.8 159.5C184.9 159.5 184.9 159.5 185 159.5C185.2 159.5 185.4 159.4 185.5 159.2L191.4 144.2C191.4 144 191.2 143.7 191 143.6Z"
        fill="currentColor"
      />
      <path
        d="M161.9 23.9002L166.4 25.7002L164.7 30.1002C164.6 30.4002 164.7 30.6002 165 30.7002L169.5 32.5002L167.8 36.9002C167.8 37.0002 167.8 37.2002 167.8 37.3002C167.9 37.4002 168 37.5002 168.1 37.6002L172.5 39.3002L170.8 43.7002C170.7 44.0002 170.8 44.2002 171.1 44.3002C171.2 44.3002 171.2 44.3002 171.3 44.3002C171.5 44.3002 171.7 44.2002 171.8 44.0002L173.7 39.1002C173.7 39.0002 173.7 38.8002 173.7 38.7002C173.6 38.6002 173.5 38.5002 173.4 38.4002L169 36.7002L170.7 32.3002C170.8 32.0002 170.7 31.8002 170.4 31.7002L165.9 29.9002L167.6 25.5002C167.7 25.2002 167.6 25.0002 167.3 24.9002L162.3 22.9002C162 22.8002 161.8 22.9002 161.7 23.2002C161.5 23.5002 161.6 23.8002 161.9 23.9002Z"
        fill="currentColor"
      />
      <path
        d="M163.9 15.7002L168.5 17.5002L166.8 21.9002C166.7 22.2002 166.8 22.4002 167.1 22.5002L171.6 24.3002L169.9 28.7002C169.9 28.8002 169.9 29.0002 169.9 29.1002C170 29.2002 170.1 29.3002 170.2 29.4002L174.6 31.1002L172.9 35.5002C172.8 35.8002 172.9 36.0002 173.2 36.1002C173.3 36.1002 173.3 36.1002 173.4 36.1002C173.6 36.1002 173.8 36.0002 173.9 35.8002L175.8 30.9002C175.8 30.8002 175.8 30.6002 175.8 30.5002C175.7 30.4002 175.6 30.3002 175.5 30.2002L171.1 28.5002L172.8 24.1002C172.9 23.8002 172.8 23.6002 172.5 23.5002L168 21.7002L169.7 17.3002C169.7 17.2002 169.7 17.0002 169.7 16.9002C169.7 16.8002 169.5 16.7002 169.4 16.6002L164.4 14.7002C164.1 14.6002 163.9 14.7002 163.8 15.0002C163.5 15.3002 163.7 15.6002 163.9 15.7002Z"
        fill="currentColor"
      />
      <path
        d="M176.3 124.5L177.6 123.9C179.4 123.1 181.1 121.9 182.5 120.5C183.9 119 185 117.3 185.7 115.4C186.4 113.5 186.8 111.5 186.7 109.5C186.6 107.5 186.2 105.5 185.4 103.7L178 87.4002C178.5 87.4002 179 87.4002 179.6 87.3002C181.5 87.1002 183.4 86.3002 184.7 84.9002C186.1 83.5002 186.9 81.7002 187.1 79.7002L188.8 57.4002C188.8 57.2002 188.7 56.9002 188.4 56.9002C187.6 56.7002 186.9 56.5002 186.1 56.3002C186.1 55.7002 186.1 55.2002 186.2 54.6002C186.4 54.1002 186.6 53.6002 186.9 53.1002C187.7 51.6002 188.8 50.2002 190.1 49.0002C190.4 48.6002 190.8 48.2002 191.2 47.8002C192.1 46.8002 193.2 45.7002 193.9 44.7002C194.2 44.4002 194.2 43.9002 193.9 43.7002C193.6 43.4002 193.2 43.4002 192.6 43.6002C192.8 43.3002 193 43.0002 193.2 42.7002C193.4 42.4002 193.4 41.9002 193.1 41.7002C192.6 41.3002 191.7 41.6002 190.3 42.7002C190 43.0002 189.7 43.3002 189.4 43.6002C189.4 43.3002 189.4 43.1002 189.2 42.9002C188.7 42.5002 188.1 43.0002 186.8 44.1002C186 44.8002 185.2 45.7002 184.5 46.6002C183.9 47.3002 183.4 48.1002 182.8 48.9002L182.7 49.0002C182.4 48.8002 182 47.4002 181.8 46.6002C181.6 46.0002 181.5 45.4002 181.3 45.0002C180.8 43.8002 180.3 43.3002 179.7 43.4002C179 43.5002 178.8 44.5002 178.8 46.7002C178.7 49.7002 178.4 52.8002 178 55.8002C177.3 55.8002 176.5 55.9002 175.8 56.0002C175.6 56.0002 175.4 56.2002 175.4 56.5002L174 73.4002C173.2 73.4002 172.4 73.4002 171.6 73.4002L151.7 28.8002C150 25.1002 147 22.2002 143.2 20.7002C139.4 19.2002 135.2 19.3002 131.5 21.0002L70.5999 48.0002C69.0999 45.0002 66.8999 42.5002 63.9999 40.8002L63.8999 40.7002C63.7999 40.7002 63.7999 40.6002 63.6999 40.6002C62.8999 40.2002 62.0999 39.7002 61.2999 39.4002C56.9999 37.8002 52.3999 37.9002 48.1999 39.8002C43.9999 41.7002 40.7999 45.0002 39.1999 49.3002C38.8999 50.0002 38.6999 50.7002 38.4999 51.5002C38.4999 51.6002 38.3999 51.6002 38.3999 51.7002C38.3999 51.8002 38.3999 51.8002 38.3999 51.9002C37.6999 55.3002 37.8999 58.8002 39.2999 62.1002L30.8999 65.8002C27.1999 67.5002 24.2999 70.5002 22.7999 74.3002C21.2999 78.1002 21.3999 82.3002 23.0999 86.0002L56.5999 161C57.3999 162.8 58.5999 164.5 59.9999 165.9C61.4999 167.3 63.1999 168.4 65.0999 169.1C66.8999 169.8 68.6999 170.1 70.5999 170.1C70.6999 170.1 70.8999 170.1 70.9999 170.1C72.9999 170 74.9999 169.6 76.7999 168.8L104.4 156.5C103.8 159.8 103.3 163.1 102.9 166.4C102.9 166.6 103 166.9 103.2 166.9C103.9 167.1 104.6 167.4 105.4 167.6C105.1 169.7 104.4 172.7 103.7 175.4C103.5 176.1 103.3 176.9 103.1 177.7C102 181.9 100.7 187.1 100.4 189.7C100.3 190.8 100.4 191.4 100.9 191.6C101 191.7 101.2 191.7 101.4 191.7C102.6 191.7 104.4 189.9 107.5 186.8C109.2 185.1 110.9 183.3 112.4 182.1C113.6 181.2 114.6 180.1 115.4 178.9C115.8 178 116 177 116 176C116 176 116 176 116 175.9C116 175.3 116.1 174.6 116.1 173.9C116.1 173.1 116.2 172.3 116.2 171.5C116.2 170.9 116.3 170.3 116.4 169.8C117.4 169.9 118.3 169.9 119.3 170C119.6 170 119.8 169.8 119.8 169.6C120.6 162.3 122.1 155 124.1 147.9L128 146.2C129 148.3 130.3 150.2 131.8 152C131.8 152 131.8 152.1 131.9 152.1L132 152.2C134.2 154.7 136.9 156.8 139.9 158.3C143.6 160.2 147.8 161.2 152 161.2C153 161.2 154 161.1 154.9 161C154.9 161 154.9 161 155 161C155 161 155 161 155.1 161H155.2C155.8 160.9 156.5 160.8 157.1 160.7C162.9 159.5 168.2 156.4 172.1 151.9C173 150.8 173.8 149.7 174.6 148.5C174.7 148.5 174.8 148.4 174.9 148.3C175 148.2 175 148.1 175 148C177.1 144.3 178.4 140.1 178.6 135.8C178.5 131.8 177.8 128 176.3 124.5ZM177.4 135.5C177.2 139.6 176.1 143.6 174.1 147.1L153 134.9L175.3 125C176.8 128.2 177.5 131.9 177.4 135.5ZM190.6 47.1002C190.2 47.6002 189.8 48.0002 189.5 48.3002C189.6 48.1002 189.8 47.8002 189.9 47.6002C190.2 47.1002 190.7 46.4002 191.2 45.7002C191.4 45.6002 191.5 45.5002 191.6 45.4002L191.7 45.3002C192.2 45.0002 192.5 44.8002 192.8 44.7002C192.1 45.4002 191.3 46.3002 190.6 47.1002ZM191 43.5002C191.4 43.2002 191.7 42.9002 192 42.8002C191.6 43.3002 191.2 43.9002 190.8 44.4002C190.7 44.6002 190.5 44.8002 190.4 45.0002C189.9 45.7002 189.4 46.4002 189 47.0002C188.2 48.4002 187.4 49.8002 186.7 51.2002C186.8 50.9002 186.8 50.6002 186.9 50.3002C187.2 48.9002 187.7 47.5002 188.3 46.2002C189.1 45.3002 190 44.4002 191 43.5002ZM185.3 47.2002C185.9 46.4002 186.6 45.6002 187.4 44.9002C187.7 44.6002 188 44.4002 188.2 44.3002C188.1 44.5002 188 44.8002 187.8 45.2002C187.7 45.4002 187.6 45.7002 187.5 45.9002C187.5 46.0002 187.4 46.0002 187.4 46.1002C186.8 47.5002 186.3 48.9002 185.9 50.3002C185.5 52.2002 185.3 54.2002 185.2 56.2002C183.5 55.9002 181.8 55.7002 180.1 55.7002C181.1 53.6002 182.3 51.5002 183.6 49.5002C183.6 49.5002 183.6 49.4002 183.7 49.4002C184.3 48.6002 184.8 47.9002 185.3 47.2002ZM179.9 46.5002C179.9 45.3002 180 44.7002 180 44.4002C180.1 44.6002 180.3 44.8002 180.4 45.2002C180.6 45.6002 180.7 46.2002 180.9 46.7002C181.3 48.1002 181.6 49.2002 182.2 49.7002C181 51.5002 180 53.3002 179.1 55.3002C179.6 52.4002 179.8 49.5002 179.9 46.5002ZM174.5 74.1002C174.8 74.1002 175 73.9002 175 73.6002L176.4 56.7002C180.3 56.3002 184.1 56.7002 187.8 57.7002L186.1 79.6002C186 81.3002 185.2 82.9002 184 84.2002C182.8 85.4002 181.2 86.2002 179.5 86.3002C172.8 86.7002 166.1 86.6002 159.5 86.0002L156.3 85.7002C156.1 85.7002 155.9 85.8002 155.8 85.9002C155.7 86.1002 155.7 86.3002 155.8 86.4002L158 89.7002C156.9 94.5002 156.3 99.7002 156 106C154.4 105.6 152.8 105.3 151.3 105H151.1C148.2 104.5 145.4 104.1 142.7 103.8C142.6 100.1 143.2 93.8002 143.9 87.7002L155.5 73.3002C158.8 73.7002 163.7 74.0002 171.2 73.9002C171.3 73.9002 171.3 73.9002 171.4 73.9002C172.5 74.1002 173.5 74.1002 174.5 74.1002ZM157 106.7C157.4 99.8002 158 94.3002 159.2 89.2002L166.7 106.2C166.9 106.6 167 107 167 107.5C167 108.2 166.8 108.8 166.5 109.4C166.1 110 165.6 110.4 165 110.7L158.3 113.7C158.1 110.1 157.2 107.3 157 106.7ZM114.9 102.9L110.3 92.5002C110.1 92.1002 110 91.7002 110 91.2002C110 90.7002 110.1 90.3002 110.2 89.9002C110.4 89.5002 110.6 89.1002 110.9 88.8002C111.2 88.5002 111.6 88.2002 112 88.1002L120.7 84.2002C121.1 84.0002 121.5 83.9002 122 83.9002C122.7 83.9002 123.3 84.1002 123.9 84.4002C124.5 84.8002 124.9 85.3002 125.2 85.9002L130.4 97.6002C130.6 100.4 130.8 103.1 131.1 105.9C125.7 104.7 120.3 103.7 114.9 102.9ZM131.2 97.5002C130.9 92.6002 131 87.7002 131.3 82.8002C131.3 82.7002 131.3 82.5002 131.2 82.4002C131.1 82.3002 131 82.2002 130.9 82.2002C130.9 81.7002 131 81.2002 131 80.7002L126.8 82.0002C115.6 81.1002 107.1 79.2002 94.1999 76.0002C94.0999 75.7002 94.0999 75.4002 93.9999 75.0002C93.9999 75.0002 93.9999 75.0002 93.9999 74.9002C93.4999 71.6002 94.1999 68.2002 95.8999 65.4002C95.8999 65.3002 95.9999 65.3002 95.9999 65.2002C95.9999 65.1002 96.0999 65.1002 96.0999 65.0002C110.7 68.6002 121.6 71.0002 136.9 71.2002L143 87.7002C142.2 93.8002 141.7 100.1 141.8 103.9C138.2 103.6 134.9 103.6 131.8 103.9C131.5 101.8 131.4 99.6002 131.2 97.5002ZM82.3999 71.7002C83.8999 72.0002 85.2999 72.4002 86.5999 73.1002C86.6999 73.1002 86.7999 73.2002 86.7999 73.2002C86.9999 73.2002 87.1999 73.1002 87.1999 72.9002C87.2999 72.7002 87.1999 72.4002 86.9999 72.2002C86.4999 71.9002 85.8999 71.7002 85.3999 71.5002C85.3999 71.5002 85.2999 71.5002 85.2999 71.4002C85.1999 71.3002 84.9999 71.3002 84.8999 71.3002C84.8999 71.3002 84.8999 71.3002 84.7999 71.3002C84.0999 71.1002 83.3999 70.9002 82.5999 70.7002H82.4999C80.9999 70.4002 79.3999 70.3002 77.8999 70.1002L76.9999 70.0002C75.1999 69.8002 74.5999 69.5002 74.3999 69.4002C74.5999 69.3002 75.0999 69.0002 76.0999 69.0002C78.4999 68.9002 80.9999 68.9002 83.3999 69.1002C83.6999 69.1002 83.8999 68.9002 83.8999 68.6002C83.8999 68.3002 83.6999 68.1002 83.3999 68.1002C82.4999 68.0002 81.5999 68.0002 80.6999 68.0002C81.0999 67.3002 81.7999 67.1002 84.1999 67.3002C84.4999 67.3002 84.6999 67.1002 84.6999 66.8002C84.6999 66.5002 84.4999 66.3002 84.1999 66.3002C83.2999 66.2002 82.4999 66.2002 81.8999 66.3002C82.2999 65.8002 83.0999 65.5002 85.4999 65.7002C85.7999 65.7002 85.9999 65.5002 85.9999 65.2002C85.9999 64.9002 85.7999 64.7002 85.4999 64.7002C84.5999 64.6002 83.8999 64.6002 83.2999 64.7002C83.7999 64.2002 84.5999 64.1002 86.6999 64.3002C89.3999 64.6002 91.9999 65.1002 94.6999 65.7002C93.8999 67.1002 93.3999 68.7002 93.0999 70.3002C92.7999 71.8002 92.7999 73.3002 92.9999 74.8002C90.7999 75.2002 88.3999 75.1002 86.1999 74.4002C84.0999 73.7002 82.5999 72.3002 82.3999 71.7002ZM144.3 69.5002C144.5 68.6002 144.8 67.5002 145.1 66.7002L146.9 65.0002C147.1 64.8002 147.1 64.6002 147 64.4002C146.9 64.2002 146.7 64.1002 146.5 64.1002C146.1 64.2002 145.7 64.2002 145.3 64.2002C144.3 64.2002 143.1 64.0002 142.6 63.1002C142 62.0002 142.5 60.1002 144 57.5002C145.2 55.4002 146.4 54.3002 147.3 54.6002C148.3 54.9002 148.9 57.0002 148.7 58.5002C148.6 59.1002 148.9 59.4002 149.1 59.5002C149.6 59.8002 150.1 59.5002 150.6 59.2002C150.9 59.0002 151.1 59.0002 151.3 59.1002C151.5 59.2002 151.5 59.4002 151.5 59.7002C151.5 60.2002 151 60.9002 149.7 61.4002C149.5 61.5002 149.3 61.7002 149.1 62.2002C148.8 62.9002 148.4 64.2002 148.3 65.8002C148.3 66.0002 148.3 66.2002 148.3 66.4002C148.3 67.7002 148.4 69.2002 148.9 70.5002V70.6002C148.1 71.0002 147.3 71.1002 146.4 71.1002C145.6 71.0002 144.8 70.8002 144.1 70.3002C144.1 70.0002 144.3 69.8002 144.3 69.5002ZM152.1 72.8002L149.5 75.9002L147.1 72.0002C147.9 72.0002 148.6 71.8002 149.3 71.4002C149.8 71.9002 150.6 72.4002 152.1 72.8002ZM143.2 70.9002C143.8 71.3002 144.5 71.7002 145.2 71.8002L141.9 75.4002L140.3 71.3002C141.5 71.3002 142.5 71.2002 143.2 70.9002ZM139.2 71.3002L141.2 76.5002C141.3 76.7002 141.4 76.8002 141.6 76.8002C141.8 76.8002 141.9 76.8002 142.1 76.6002L145.3 73.2002C144.7 76.1002 144 80.7002 143.3 85.6002L138 71.3002C138.1 71.3002 138.1 71.3002 138.2 71.3002H138.6C138.8 71.3002 139 71.3002 139.2 71.3002ZM146.4 72.8002L149 77.0002C149.1 77.1002 149.2 77.2002 149.4 77.2002C149.5 77.2002 149.7 77.1002 149.8 77.0002L153.1 73.0002C153.5 73.1002 154 73.2002 154.4 73.3002L144.2 86.0002C144.9 80.7002 145.8 75.6002 146.4 72.8002ZM149.7 70.1002C149.3 69.0002 149.1 67.7002 149.1 66.6002L151.3 71.5002C150 71.0002 149.8 70.5002 149.7 70.1002ZM143 57.0002C141.3 60.0002 140.8 62.2002 141.6 63.6002C142.1 64.5002 143.1 65.0002 144.5 65.2002C144.2 66.1002 143.7 67.8002 143.3 69.3002C143.1 70.3002 141.8 70.4002 138.6 70.3002H138.2C136.4 70.3002 134.6 70.2002 132.9 70.2002L123.1 48.2002C122.9 47.8002 122.8 47.4002 122.8 46.9002C122.8 46.5002 122.9 46.0002 123 45.6002C123.2 45.2002 123.4 44.8002 123.7 44.5002C124 44.2002 124.4 43.9002 124.8 43.7002L133.5 39.8002C133.9 39.6002 134.3 39.5002 134.8 39.5002C135.5 39.5002 136.1 39.7002 136.7 40.0002C137.3 40.4002 137.7 40.9002 138 41.5002L144.1 55.1002C143.7 55.8002 143.3 56.4002 143 57.0002ZM69.6999 48.4002L56.2999 54.3002L63.7999 41.7002C66.3999 43.4002 68.3999 45.6002 69.6999 48.4002ZM48.5999 40.7002C52.4999 39.0002 56.8999 38.8002 60.8999 40.4002C61.5999 40.7002 62.2999 41.0002 62.8999 41.4002L54.8999 54.9002L39.4999 51.4002C39.6999 50.8002 39.7999 50.2002 40.0999 49.7002C41.6999 45.6002 44.6999 42.4002 48.5999 40.7002ZM39.2999 52.3002L53.5999 55.6002L40.1999 61.6002C38.9999 58.6002 38.6999 55.4002 39.2999 52.3002ZM76.3999 167.9C74.6999 168.7 72.7999 169.1 70.9999 169.1C69.0999 169.2 67.2999 168.8 65.4999 168.2C63.6999 167.5 62.0999 166.5 60.7999 165.2C59.3999 163.9 58.2999 162.4 57.5999 160.6L24.0999 85.5002C22.4999 82.0002 22.3999 78.1002 23.7999 74.6002C25.1999 71.1002 27.7999 68.2002 31.2999 66.7002L132 21.7002C135.5 20.1002 139.4 20.0002 142.9 21.4002C146.5 22.8002 149.3 25.4002 150.8 28.9002L170.5 73.1002C160.3 73.1002 155.1 72.6002 152.5 71.9002L149.3 64.8002C150.2 62.7002 152.7 60.4002 154.2 59.3002C154.4 59.2002 154.4 59.0002 154.4 58.8002L154.3 58.4002C153.6 54.9002 152.9 51.3002 150.1 48.9002C149.9 48.7002 149.6 48.7002 149.5 48.9002C147.6 50.5002 146 52.3002 144.6 54.3002L138.8 41.3002C138.5 40.5002 137.9 39.9002 137.2 39.4002C136.5 38.9002 135.6 38.7002 134.8 38.7002C134.2 38.7002 133.7 38.8002 133.1 39.1002L124.4 43.0002C123.9 43.2002 123.4 43.6002 123 44.0002C122.6 44.4002 122.3 44.9002 122.1 45.4002C121.9 45.9002 121.8 46.5002 121.8 47.1002C121.8 47.7002 121.9 48.2002 122.2 48.7002L131.8 70.2002C119.1 69.5002 109 67.2002 95.9999 64.0002C95.7999 63.9002 95.5999 64.0002 95.4999 64.2002C95.3999 64.3002 95.2999 64.5002 95.2999 64.6002C92.4999 64.0002 89.6999 63.5002 86.8999 63.2002C84.0999 63.0002 82.6999 63.2002 82.0999 65.0002C81.4999 65.3002 80.9999 65.8002 80.7999 66.6002C80.2999 66.9002 79.8999 67.3002 79.6999 68.0002C78.4999 68.0002 77.2999 68.0002 76.0999 68.0002C74.7999 68.1002 73.3999 68.5002 73.3999 69.4002C73.3999 69.7002 73.4999 69.9002 73.6999 70.1002L42.3999 68.1002C42.2999 68.1002 42.2999 68.1002 42.1999 68.2002C42.1999 68.2002 42.0999 68.3002 42.0999 68.4002C42.0999 68.5002 42.0999 68.5002 42.1999 68.6002C42.1999 68.7002 42.2999 68.7002 42.3999 68.7002L81.4999 72.2002C81.9999 73.3002 83.9999 74.8002 85.9999 75.3002C87.4999 75.7002 88.9999 76.0002 90.4999 76.0002C91.3999 76.0002 92.2999 75.9002 93.1999 75.7002C93.2999 76.0002 93.2999 76.3002 93.3999 76.6002C93.3999 76.8002 93.5999 76.9002 93.7999 77.0002C108.3 80.6002 117.2 82.6002 130.4 83.3002C130.1 87.2002 130.1 91.1002 130.2 94.9002L126.1 85.6002C125.8 84.8002 125.2 84.2002 124.5 83.7002C123.8 83.2002 122.9 83.0002 122.1 83.0002C121.5 83.0002 121 83.1002 120.4 83.4002L111.7 87.3002C111.2 87.5002 110.7 87.9002 110.3 88.3002C109.9 88.7002 109.6 89.2002 109.4 89.7002C109.2 90.2002 109.1 90.8002 109.1 91.4002C109.1 92.0002 109.2 92.5002 109.5 93.0002L113.9 102.8C110.9 102.4 107.9 102 104.9 101.8C103.5 101.7 102.2 101.8 100.9 102.2L94.3999 88.0002C94.1999 87.5002 93.7999 87.0002 93.3999 86.6002C92.9999 86.2002 92.4999 85.9002 91.9999 85.7002C91.4999 85.5002 90.8999 85.4002 90.2999 85.4002C89.6999 85.4002 89.1999 85.5002 88.5999 85.8002L79.8999 89.7002C79.3999 89.9002 78.8999 90.3002 78.4999 90.7002C78.0999 91.1002 77.7999 91.6002 77.5999 92.1002C77.3999 92.6002 77.2999 93.2002 77.2999 93.8002C77.2999 94.4002 77.3999 94.9002 77.6999 95.4002L85.5999 113.1C82.4999 115.6 79.2999 118.2 76.2999 120.8L57.0999 77.6002C56.8999 77.1002 56.4999 76.6002 56.0999 76.2002C55.6999 75.8002 55.1999 75.5002 54.6999 75.3002C54.0999 75.1002 53.5999 75.0002 52.9999 75.0002C52.3999 75.0002 51.8999 75.1002 51.2999 75.4002L42.5999 79.3002C42.0999 79.5002 41.5999 79.9002 41.1999 80.3002C40.7999 80.7002 40.4999 81.2002 40.2999 81.7002C40.0999 82.2002 39.9999 82.8002 39.9999 83.4002C39.9999 84.0002 40.0999 84.5002 40.3999 85.1002L62.3999 134.6C59.0999 137.1 54.6999 140.5 52.8999 142.4C52.1999 143.1 51.8999 143.7 52.0999 144.2C52.2999 144.8 53.0999 145 54.3999 145C55.7999 145 57.6999 144.8 60.1999 144.4C62.3999 144.1 64.5999 143.8 66.3999 143.8L69.0999 149.8C69.2999 150.3 69.6999 150.8 70.0999 151.2C70.4999 151.6 70.9999 151.9 71.4999 152.1C71.9999 152.3 72.4999 152.4 73.0999 152.4H73.1999C73.7999 152.4 74.2999 152.3 74.8999 152L83.5999 148.1C84.0999 147.9 84.5999 147.5 84.9999 147.1C85.3999 146.7 85.6999 146.2 85.8999 145.7C86.0999 145.2 86.1999 144.6 86.1999 144C86.1999 143.4 86.0999 142.9 85.7999 142.4L82.8999 135.9C85.9999 133.3 89.0999 130.8 92.2999 128.4L96.3999 137.6C96.5999 138.1 96.9999 138.6 97.3999 139C97.7999 139.4 98.2999 139.7 98.7999 139.9C99.2999 140.1 99.7999 140.2 100.3 140.2H100.4C101 140.2 101.5 140.1 102.1 139.8L108.9 136.8C107.2 142.9 105.7 149.2 104.5 155.5L76.3999 167.9ZM86.3999 112.4L78.5999 95.0002C78.3999 94.6002 78.2999 94.2002 78.2999 93.7002C78.2999 93.3002 78.3999 92.8002 78.4999 92.4002C78.6999 92.0002 78.8999 91.6002 79.1999 91.3002C79.4999 91.0002 79.8999 90.7002 80.2999 90.6002L88.9999 86.7002C89.3999 86.5002 89.7999 86.4002 90.2999 86.4002C90.6999 86.4002 91.1999 86.5002 91.5999 86.6002C91.9999 86.8002 92.3999 87.0002 92.6999 87.3002C92.9999 87.6002 93.2999 88.0002 93.4999 88.4002L99.7999 102.6C99.0999 102.9 98.3999 103.3 97.6999 103.8C93.8999 106.5 90.0999 109.4 86.3999 112.4ZM72.2999 130.5C72.3999 130.6 72.4999 130.7 72.5999 130.9C73.9999 132.7 75.4999 134.3 77.0999 135.9C76.7999 136.2 76.4999 136.5 76.1999 136.8C74.8999 136.6 73.6999 136.4 72.3999 136C72.0999 135.9 71.7999 135.8 71.4999 135.7C70.9999 135.6 70.5999 135.4 70.0999 135.3C69.5999 135.1 69.0999 134.9 68.5999 134.8C68.2999 134.7 67.9999 134.6 67.6999 134.4C67.0999 134.2 66.5999 133.9 65.9999 133.6C65.7999 133.5 65.6999 133.4 65.4999 133.4C67.4999 131.9 69.5999 130.2 70.9999 128.9C70.9999 129 71.0999 129 71.1999 129.1C71.5999 129.5 71.9999 130 72.2999 130.5ZM122.4 121.9C117.7 120.5 112.9 119.5 108 118.9C107.9 118.9 107.8 118.9 107.8 118.9C106.9 118.8 106.1 118.7 105.2 118.6C105.1 118.6 105 118.6 104.9 118.7C96.1999 124.1 87.7999 130.3 79.9999 137.1C79.3999 136.6 78.7999 136.1 78.2999 135.6C77.7999 135.1 77.1999 134.6 76.6999 134.1C76.5999 134 76.5999 134 76.4999 133.9C84.0999 127.3 92.1999 121.1 100.6 115.6C102.5 114.3 104.9 113.8 107.2 114.1C114.1 115.1 120.9 116.6 127.6 118.5C125.8 119.5 124.1 120.6 122.4 121.9ZM109.5 135.4L101.9 138.8C101.5 139 101.1 139.1 100.6 139.1C100.2 139.1 99.6999 139 99.2999 138.9C98.8999 138.7 98.4999 138.5 98.1999 138.2C97.8999 137.9 97.5999 137.5 97.4999 137.1L93.2999 127.7C97.1999 124.8 101.2 122.1 105.3 119.6C106.1 119.7 106.8 119.8 107.5 119.9L112.2 130.5C111 131.9 110.1 133.6 109.5 135.4ZM112.9 129.6L108.6 119.9C112.9 120.5 117.2 121.4 121.3 122.6C118.9 124.3 116.6 126.2 114.5 128C113.9 128.5 113.4 129 112.9 129.6ZM53.5999 143.1C53.6999 143.1 53.6999 143.1 53.7999 143.1C53.8999 143.1 53.9999 143.1 54.1999 143.1C54.2999 143.1 54.4999 143.1 54.6999 143.1C54.7999 143.1 54.7999 143.1 54.8999 143.1H54.9999C55.0999 143.1 55.2999 143.1 55.3999 143.1C55.4999 143.1 55.5999 143.1 55.5999 143.1C57.1999 143 59.2999 142.8 61.3999 142.5C62.2999 142.4 63.0999 142.3 63.9999 142.2C65.7999 142 67.5999 141.8 68.9999 141.8C69.8999 141.8 70.8999 141.7 71.7999 141.6C71.7999 141.6 71.7999 141.6 71.8999 141.6C71.5999 141.8 71.3999 142 71.0999 142.1C69.7999 142.5 68.4999 142.7 67.0999 142.7C65.1999 142.7 62.6999 143 60.2999 143.4C57.6999 143.8 53.7999 144.3 53.1999 143.8C53.1999 143.6 53.2999 143.4 53.5999 143.1ZM71.3999 143C72.3999 142.5 73.1999 141.8 73.7999 141C73.7999 141 73.7999 141 73.8999 141C74.3999 140.5 74.7999 139.9 75.2999 139.4C75.7999 138.9 76.2999 138.3 76.6999 137.7C76.6999 137.7 76.7999 137.7 76.7999 137.6C77.0999 137.2 77.4999 136.8 77.8999 136.5C78.4999 137 79.0999 137.5 79.6999 138C79.8999 138.2 80.1999 138.1 80.2999 138C80.8999 137.5 81.5999 136.9 82.1999 136.4L84.9999 142.6C85.1999 143 85.2999 143.4 85.2999 143.9C85.2999 144.3 85.1999 144.8 85.0999 145.2C84.8999 145.6 84.6999 146 84.3999 146.3C84.0999 146.6 83.6999 146.9 83.2999 147.1L74.5999 151C74.1999 151.2 73.7999 151.3 73.2999 151.3C72.8999 151.3 72.3999 151.2 71.9999 151.1C71.5999 150.9 71.1999 150.7 70.8999 150.4C70.5999 150.1 70.2999 149.7 70.1999 149.3L67.6999 143.7C68.8999 143.6 70.1999 143.4 71.3999 143ZM69.8999 126.9C70.0999 127.2 70.2999 127.6 70.5999 127.9C68.9999 129.4 66.6999 131.3 64.4999 133C64.1999 133.3 63.7999 133.5 63.3999 133.8L41.3999 84.6002C41.1999 84.2002 41.0999 83.8002 41.0999 83.3002C41.0999 82.9002 41.1999 82.4002 41.2999 82.0002C41.4999 81.6002 41.6999 81.2002 41.9999 80.9002C42.2999 80.6002 42.6999 80.3002 43.0999 80.1002L51.7999 76.2002C52.1999 76.0002 52.5999 75.9002 53.0999 75.9002C53.4999 75.9002 53.9999 76.0002 54.3999 76.1002C54.7999 76.3002 55.1999 76.5002 55.4999 76.8002C55.7999 77.1002 56.0999 77.5002 56.2999 77.9002L75.5999 121.3C73.6999 122.9 71.8999 124.5 70.0999 126.2C69.7999 126.5 69.7999 126.7 69.8999 126.9ZM110.1 136.6C111 133.6 112.7 130.9 115.1 128.8C117.5 126.7 120.1 124.7 122.7 122.8C124.7 121.3 126.8 119.9 129 118.6C131.5 117 134.1 115.5 136.7 114.1C136.9 114 137 113.7 136.9 113.4C136.8 113.2 136.5 113.1 136.2 113.2C133.6 114.6 131.1 116 128.6 117.6C121.6 115.6 114.4 114.1 107.2 113C104.7 112.6 102.1 113.2 99.8999 114.6C91.4999 120.2 83.2999 126.4 75.6999 133C75.3999 132.6 74.9999 132.3 74.6999 131.9C74.0999 131.2 73.4999 130.4 72.8999 129.7C72.6999 129.5 72.5999 129.3 72.4999 129.1C71.9999 128.3 71.3999 127.6 70.8999 126.8C79.5999 119 88.7999 111.5 98.1999 104.6C98.8999 104.1 99.6999 103.7 100.5 103.4C100.5 103.4 100.5 103.4 100.6 103.4C101.9 103 103.2 102.8 104.5 102.9C107.8 103.2 111.1 103.6 114.5 104C120.2 104.8 125.8 105.8 131.4 107.1L133 107.4H133.1C133.3 107.4 133.5 107.2 133.6 107C133.7 106.7 133.5 106.5 133.2 106.4L132 106.1C131.9 105.7 131.9 105.3 131.9 104.9C137.3 104.4 143.5 104.8 150.6 106.1C150.5 107.6 150.5 112.5 153.8 115.4C143.5 120.5 133.5 126.5 124.1 133.2C120.9 135.5 118.6 138.8 117.5 142.5C115.1 150.9 113.3 159.5 112.2 168.1C110.7 167.8 109.2 167.5 107.8 167.2C107.7 167.2 107.6 167.2 107.5 167.1C106.3 166.8 105.2 166.4 104 166.1C105.3 156.2 107.3 146.2 110.1 136.6ZM115.4 171C115.3 171 115.3 171 115.4 171C113.8 171.9 112.1 172.7 110.4 173.3H110.3C109.5 173.6 108.7 173.9 107.8 174.1C107.7 174.1 107.6 174.1 107.5 174.2C106.7 174.4 105.9 174.6 105 174.8H104.9C105.5 172.4 106.1 169.7 106.4 167.8C108.4 168.4 110.4 168.8 112.5 169.1C112.5 169.1 112.5 169.1 112.6 169.1C113.6 169.3 114.5 169.4 115.5 169.5C115.4 170 115.4 170.5 115.4 171ZM111.8 181.3C110.3 182.5 108.5 184.3 106.8 186.1C105 188 102.3 190.7 101.5 190.7C101.5 190.6 101.5 190.4 101.5 190C101.6 190 101.6 189.9 101.7 189.9C101.8 189.9 101.8 189.8 101.9 189.8C102 189.7 102.2 189.6 102.3 189.5C102.4 189.4 102.4 189.4 102.5 189.3C102.7 189.2 102.8 189 103 188.9C103.1 188.8 103.1 188.8 103.2 188.7C103.3 188.6 103.5 188.5 103.6 188.3C103.7 188.2 103.9 188.1 104 187.9L104.1 187.8C105.1 186.9 106.1 185.8 107.2 184.7C109.1 182.7 111.1 180.7 112.7 179.4C113.5 178.8 114.2 178.1 114.8 177.4C114.7 177.7 114.6 178 114.5 178.3C113.8 179.5 112.9 180.4 111.8 181.3ZM119 168.9C117.7 168.9 116.5 168.8 115.2 168.6H115.1C114.5 168.5 113.8 168.4 113.2 168.4C114.4 159.8 116.2 151.2 118.5 142.9C119.5 139.4 121.7 136.2 124.7 134.1C134.2 127.4 144.2 121.3 154.6 116.2C155.1 116.5 155.6 116.8 156.2 117.1C156.3 117.1 156.3 117.1 156.4 117.1C156.6 117.1 156.8 117 156.9 116.8C157 116.5 156.9 116.3 156.6 116.1C151.4 114 151.4 108.1 151.5 106.3C153 106.6 154.5 106.9 156 107.2C156.3 108 157.2 110.8 157.4 114.2C157.4 114.3 157.4 114.4 157.4 114.5C157.6 119.5 156.3 125.8 149.4 129.4L125.3 140.9C125.2 141 125.1 141.1 125 141.2C124.3 143.2 123.7 145.2 123.2 147.2C123.1 147.3 123.1 147.4 123.1 147.5C121.2 154.5 119.8 161.6 119 168.9ZM126 141.6L150 130.2C157.1 126.5 158.6 119.9 158.5 114.6L165.5 111.5C166.3 111.2 166.9 110.6 167.4 109.9C167.9 109.2 168.1 108.3 168.1 107.5C168.1 106.9 168 106.4 167.7 105.9L159.7 87.8002C159.8 87.6002 159.8 87.4002 159.9 87.2002C165.6 87.7002 171.3 87.8002 177.1 87.6002L184.5 104.3C185.3 106 185.7 107.9 185.7 109.7C185.8 111.6 185.4 113.4 184.8 115.2C184.1 117 183.1 118.6 181.8 119.9C180.5 121.3 179 122.4 177.2 123.1L124.6 146.5C125 144.9 125.5 143.2 126 141.6ZM149.1 136.6L132.3 150.8C131 149.2 129.8 147.4 128.9 145.6L149.1 136.6ZM140.3 157.2C137.5 155.8 135.1 153.9 133 151.6L151.6 135.9L154.4 159.9C149.6 160.3 144.7 159.4 140.3 157.2Z"
        fill="currentColor"
      />
      <path
        d="M92.8999 18.7002C92.9999 18.7002 92.9999 18.7002 93.0999 18.7002L99.0999 15.9002L101.9 21.9002C102 22.1002 102.2 22.2002 102.4 22.2002C102.5 22.2002 102.5 22.2002 102.6 22.2002C102.8 22.1002 103 21.8002 102.8 21.5002L99.9999 15.5002L106 12.7002C106.2 12.6002 106.4 12.3002 106.2 12.0002C106.1 11.7002 105.8 11.6002 105.5 11.8002L99.4999 14.6002L96.6999 8.60023C96.5999 8.40023 96.2999 8.20023 95.9999 8.40023C95.6999 8.50023 95.5999 8.80023 95.7999 9.10023L98.5999 15.1002L92.5999 17.9002C92.3999 18.0002 92.1999 18.3002 92.3999 18.6002C92.4999 18.6002 92.6999 18.7002 92.8999 18.7002Z"
        fill="currentColor"
      />
      <path
        d="M43.7999 149.7L37.4999 149.1C37.2999 149.1 37.0999 149.2 36.9999 149.3C36.8999 149.4 36.8999 149.6 36.9999 149.8L39.5999 155.6C39.6999 155.8 39.7999 155.9 39.9999 155.9C40.1999 155.9 40.2999 155.8 40.3999 155.7L44.0999 150.5C44.1999 150.4 44.1999 150.2 44.0999 150C44.0999 149.8 43.9999 149.7 43.7999 149.7ZM40.0999 154.4L38.1999 150.2L42.7999 150.7L40.0999 154.4Z"
        fill="currentColor"
      />
    </svg>
  </SvgIcon>
)

export default ChartsImage
