import { FC } from 'react'

import { SvgIcon, SvgIconProps } from '@mui/material'

const BusinessDealImage: FC<SvgIconProps> = ({ sx, ...props }) => (
  <SvgIcon sx={{ fontSize: 200, color: 'primary.dark', ...sx }} {...props}>
    <svg
      width="200"
      height="200"
      viewBox="0 0 200 200"
      fill="none"
      xmlns="http://www.w3.org/2000/svg"
    >
      <path
        d="M30.1 98.3002C29.6 98.5002 29.6 100 30.2 99.8002C30.8 99.6002 30.8 98.0002 30.1 98.3002Z"
        fill="currentColor"
      />
      <path
        d="M91.6 99.2002C91.9 98.5002 90.4 98.4002 90 99.1002C89.5 100 91.2 99.9002 91.6 99.2002Z"
        fill="currentColor"
      />
      <path
        d="M118 91.0002C117.8 90.4002 116.5 91.1002 116.7 91.9002C116.8 92.7002 118.2 91.6002 118 91.0002Z"
        fill="currentColor"
      />
      <path
        d="M172 76.3002C171.2 76.3002 171.4 77.9002 172.3 78.0002C173.2 78.0002 172.7 76.3002 172 76.3002Z"
        fill="currentColor"
      />
      <path
        d="M194.9 49.8002C195.1 49.6002 195 49.3002 194.8 49.1002L159.1 24.1002C158.9 23.9002 158.6 24.0002 158.4 24.2002L141.6 48.2002L140.5 48.1002C139.3 47.9002 136.2 45.9002 133.8 43.8002C133 37.5002 132.8 36.7002 129.6 36.4002C129.3 35.0002 128.2 34.8002 124.9 34.5002C122.4 34.3002 121.3 34.5002 120.7 35.2002C120.1 35.8002 120.3 36.8002 120.4 37.7002C120.7 39.3002 121.6 39.9002 123 40.0002C124.2 47.1002 124.7 48.5002 126.2 48.7002C127.1 48.8002 127.7 48.6002 128.6 47.8002C128.6 49.3002 128.2 50.3002 127.5 50.7002C123.9 52.8002 122.4 53.6002 121.1 55.5002C118.9 58.6002 118.8 60.7002 118.5 72.4002L118.4 75.7002C116.1 77.7002 113.6 79.7002 111.4 81.5002C111.3 81.6002 111.2 81.6002 111.2 81.7002L111.1 81.8002C109.3 83.3002 107.7 84.6002 106.8 85.4002C106.8 85.4002 106.8 85.4002 106.8 85.5002C106.6 85.7002 106.4 85.9002 106.4 86.2002C106.3 86.6002 106.5 87.1002 106.8 87.6002C106.7 87.7002 106.6 87.7002 106.4 87.7002C105.7 87.7002 105.1 87.7002 104.6 87.6002C103.5 87.5002 102.6 87.4002 102 88.1002C101.9 88.2002 101.8 88.3002 101.7 88.4002C101.4 88.3002 101.1 88.2002 100.8 88.1002C100 87.9002 99.3 88.4002 98.6 88.9002C98.2 89.2002 97.7 89.6002 97.2 89.9002C96.7 90.2002 96.4 90.1002 94.5 89.9002H94.2C93.9 89.3002 93.6 88.9002 93.2 88.5002C93.1 88.4002 93 88.4002 93 88.4002C91.4 88.1002 84 87.2002 79.5 86.7002C78.9 67.9002 78.3 65.4002 76.2 63.5002C74.7 62.2002 72.3 61.6002 68.8 61.7002L68.7 61.6002C68.2 61.4002 67.9 61.0002 67.5 60.6002C69.6 60.8002 70 60.3002 70.2 60.1002C71.1 59.2002 71.4 57.5002 70.8 50.7002C71.9 50.2002 72.8 49.3002 73.5 48.3002C74.2 47.2002 73.8 46.0002 73 45.5002C72.5 45.1002 71.7 45.0002 70.9 45.4002C70.6 44.8002 70.1 44.5002 69.6 44.4002C69 44.3002 68.2 44.6002 67.8 45.0002C67.7 44.9002 67.5 44.8002 67.4 44.8002C67 44.6002 66.6 44.6002 66.2 44.7002C65.8 44.8002 65.4 45.0002 65.2 45.4002C65.1 45.5002 65.1 45.6002 65 45.7002C64.4 45.4002 63.7 45.4002 63.2 45.6002C62.8 45.8002 62.5 46.2002 62.3 46.6002C61.8 46.4002 61.3 46.5002 60.8 46.8002C59.9 47.5002 59 49.7002 62.8 57.0002C57.9 61.2002 53.4 64.1002 49.2 65.7002C49.2 65.7002 49.2 65.7002 49.1 65.7002C44 67.5002 39.3 69.9002 35.7 72.4002L30.8 68.9002C30.7 68.8002 30.6 68.8002 30.4 68.8002C30.3 68.8002 30.2 68.9002 30.1 69.0002L5.09998 104.7C4.89998 104.9 4.99998 105.2 5.19998 105.4L23.2 118L20.9 118.3C20.6 118.3 20.4 118.6 20.5 118.9L23.2 140.9C23.2 141 23.3 141.2 23.4 141.2C23.5 141.3 23.6 141.3 23.7 141.3C23.7 141.3 23.7 141.3 23.8 141.3L37 139.6C33.2 143.4 30.3 146.4 29.6 147.2C28.9 148.1 29.4 149.6 30.8 150.8C30.4 151.2 30 151.7 29.7 152.1C28.8 153.1 28 154.1 27.6 154.5C27.6 154.5 27.6 154.6 27.5 154.6V154.7C26.1 157.8 38.1 165.4 39.5 166.2C44.5 169.3 46.7 170 47.6 170C48.1 170 48.3 169.8 48.4 169.6V169.5C48.5 169.3 48.5 169.1 48.5 168.8C48.7 166.1 47.1 163.6 45.6 161.3C44.9 160.2 44.1 159 43.6 157.9C44.2 158.1 44.8 158.2 45.1 158.2C45.9 158.2 46.3 157.8 46.4 157.5C52.2 151.2 56.4 146.6 59.4 143.2L106 175.8C106.1 175.9 106.2 175.9 106.3 175.9C106.5 175.9 106.6 175.8 106.7 175.7L126.4 147.6C125.1 149.9 124 152.3 123.1 154.8C123 155 123.1 155.1 123.2 155.3C123.3 155.4 123.4 155.5 123.6 155.5C123.6 155.5 123.6 155.5 123.7 155.5C128.7 154.9 139.7 150 143.5 146.2C143.6 146.1 143.7 145.9 143.6 145.7C142.9 143.9 142.1 142.1 141.1 140.4C141.4 140.2 141.7 139.9 141.9 139.7C142 139.6 142 139.4 142 139.3L141.5 137C140.9 134.4 140.3 131.7 139.7 129L147.7 117.5C150.2 119.8 155 122.6 175.6 134.3C175.7 134.3 175.8 134.4 175.8 134.4H175.9C176.2 134.3 176.5 134.2 176.8 134.1C177.2 138.2 178.8 146.2 180.3 148.6C180.4 148.7 180.5 148.8 180.7 148.8C180.8 148.8 181 148.7 181.1 148.6C184.3 144.7 188.3 131.2 188.5 126.3C188.5 126.1 188.4 125.9 188.2 125.8C186.7 125.2 185.1 124.7 183.6 124.2C183.7 123.7 183.7 123.1 183.6 122.7C183.6 122.6 183.5 122.4 183.4 122.4C182.4 121.7 180.2 120.4 177.2 118.5L193.9 115C194 115 194.1 114.9 194.2 114.8C194.3 114.7 194.3 114.6 194.3 114.4L189.5 91.9002C189.4 91.6002 189.2 91.5002 188.9 91.5002L179.8 93.4002L178.9 89.3002C178.7 88.5002 178.3 87.8002 177.6 87.2002C177.1 86.8002 176.4 86.6002 175.7 86.5002C175.3 84.9002 174.8 83.8002 174.4 82.8002C174.6 82.7002 174.8 82.5002 175 82.3002C175.3 81.9002 175.4 81.5002 175.5 81.0002C175.5 80.9002 175.5 80.8002 175.4 80.7002C175.3 80.0002 175.1 79.3002 175 78.6002L194.9 49.8002ZM159 25.2002L193.9 49.6002L174.6 77.1002C171.7 63.1002 169.7 59.2002 166.2 55.9002C160.3 50.4002 153.7 49.6002 142.8 48.3002L159 25.2002ZM174.8 87.0002C174.9 87.5002 175 88.1002 175.1 88.7002C175.1 88.8002 175.1 88.8002 175.1 88.9002C175.1 89.2002 175.1 89.6002 175.1 89.9002C175.1 90.4002 175.1 90.9002 175 91.4002C174.9 91.6002 174.8 91.7002 174.6 91.8002C174.4 91.9002 174.2 92.0002 174 91.9002H173.9C174 91.1002 174 90.3002 173.9 89.5002C173.9 89.2002 173.6 89.0002 173.4 89.0002C173.1 89.0002 172.9 89.3002 172.9 89.5002C173 90.3002 173 91.1002 172.9 91.9002C172.9 92.2002 172.7 92.4002 172.4 92.5002C172.1 92.6002 171.8 92.6002 171.5 92.5002C171.5 92.5002 171.5 92.5002 171.5 92.4002C171.5 91.6002 171.5 90.9002 171.5 90.1002C171.5 89.8002 171.2 89.6002 171 89.6002C170.7 89.6002 170.5 89.9002 170.5 90.1002C170.6 90.8002 170.6 91.6002 170.5 92.3002C170.5 92.5002 170.4 92.7002 170.3 92.8002C170.2 93.0002 170 93.1002 169.9 93.1002C169.7 93.2002 169.5 93.2002 169.4 93.1002C169.3 93.1002 169.2 93.0002 169.1 93.0002V92.9002C169.1 92.1002 169.1 91.3002 169 90.6002C169 90.3002 168.7 90.1002 168.4 90.2002C168.1 90.2002 167.9 90.5002 168 90.8002C168.1 91.5002 168.1 92.2002 168.1 92.9002C168.1 93.1002 168 93.3002 167.9 93.4002C167.8 93.5002 167.6 93.6002 167.4 93.6002C167.2 93.6002 167 93.5002 166.9 93.4002C166.9 93.4002 166.9 93.4002 166.9 93.3002C166.3 90.1002 166.1 88.8002 166 88.6002V88.5002C165.9 88.1002 165.8 87.8002 165.7 87.4002C165.6 87.1002 165.4 87.0002 165.1 87.0002C164.8 87.1002 164.7 87.3002 164.7 87.6002C164.8 87.8002 164.8 88.1002 164.9 88.3002C164.6 88.4002 164.3 88.5002 164 88.7002C163.7 88.1002 163.5 87.5002 163.5 86.8002C163.5 86.5002 164 85.7002 164.3 85.2002C164.6 84.8002 164.8 84.4002 165 84.1002C165.1 84.0002 165.1 83.9002 165.1 83.8002C165.1 83.7002 165.2 83.6002 165.2 83.4002C165.2 82.8002 165.1 82.2002 165 81.6002C165.8 81.3002 166.9 80.9002 168.5 80.6002C170.4 80.2002 171.7 80.1002 172.6 80.1002C172.8 80.9002 173.1 81.6002 173.5 82.4002C173.7 83.9002 174.3 85.1002 174.8 87.0002C174.8 86.9002 174.7 87.0002 174.8 87.0002ZM161.9 83.6002C161.9 83.7002 161.9 83.7002 162 83.7002C162.1 83.9002 162.2 84.2002 162.4 84.3002C162.7 84.5002 163.1 84.6002 163.6 84.7002C163.5 84.8002 163.4 84.9002 163.4 85.1002C162.9 85.9002 162.4 86.6002 162.4 87.2002C162.4 88.1002 162.7 89.0002 163.2 89.7002C163.1 89.8002 163.1 89.8002 163 89.9002C162.7 90.3002 162.6 90.7002 162.5 91.2002C162.4 91.7002 162.4 92.1002 162.5 92.6002L162.8 93.9002L160.3 97.4002L157.9 97.9002L157.5 95.5002C157 92.0002 156.4 88.3002 155.9 85.4002C154.8 78.8002 152.5 69.7002 151.5 65.8002C155.3 66.4002 156.2 66.9002 157.3 67.7002C158.5 68.5002 158.9 70.2002 161.9 83.6002ZM166.9 110.3L167.4 112.8L165.6 113.2L164.5 108.3L166.3 107.9L166.9 110.3ZM184.3 106.6L184.8 109.1L183 109.5L181.9 104.6L183.7 104.2L184.3 106.6ZM161.8 97.1002L163.1 95.3002L163.4 96.8002L161.8 97.1002ZM152.9 75.8002C153.7 79.1002 154.4 82.6002 154.9 85.6002C155.4 88.5002 155.9 92.1002 156.5 95.7002L156.9 98.2002L154.7 98.7002C154.6 98.7002 154.5 98.8002 154.4 98.9002C154.3 99.0002 154.3 99.1002 154.3 99.3002L156.4 109C156 108.8 155.7 108.5 155.3 108.3C154.5 99.7002 152 87.2002 149.8 78.2002C151 77.3002 152.1 76.6002 152.9 75.8002ZM164.3 96.5002L166.2 96.0002C166.2 96.0002 166.2 96.0002 166.2 96.1002L164.5 96.5002H164.3ZM172.9 79.5002C172.8 79.5002 172.8 79.5002 172.7 79.5002C171.5 79.5002 170 79.6002 168.1 80.1002C165.4 80.7002 163.6 81.4002 162.6 82.2002C162.3 80.8002 162 79.5002 161.7 78.4002C162.3 77.3002 164.4 76.2002 167.1 75.6002C169.7 75.0002 172.3 75.0002 173.2 75.5002C173.5 76.8002 173.8 78.2002 174.1 79.7002C173.7 79.6002 173.3 79.5002 172.9 79.5002ZM129.1 52.6002C129.1 51.8002 129.1 50.9002 129.3 50.1002C129.5 50.3002 129.7 50.5002 130 50.6002C129.6 51.3002 129.3 51.9002 129.1 52.6002ZM131.2 50.6002C133.2 49.7002 135 48.6002 136.7 47.3002C136.9 47.4002 137 47.5002 137.2 47.6002C136.4 49.8002 134.5 52.7002 133.5 54.0002C132.7 53.0002 131.9 51.9002 131.2 50.6002ZM126.3 47.6002C125.5 47.5002 125.1 46.2002 124 39.9002C124.7 39.9002 125.5 39.8002 126.4 39.7002L127 39.6002C128.2 41.1002 128.7 41.5002 129.2 41.3002C129.4 41.2002 129.7 41.0002 129.7 40.4002C129.7 39.9002 129.9 39.7002 129.9 39.7002C130 39.7002 130.5 40.1002 130.5 41.5002C130.5 41.6002 130.5 41.7002 130.6 41.8002C131.3 42.7002 132 43.6002 132.9 44.4002C133.8 45.2002 134.8 46.0002 135.8 46.8002C134.1 48.0002 132.4 49.1002 130.5 49.9002C130.1 49.7002 129.8 49.4002 129.5 49.0002V48.9002C130.3 47.8002 130.8 46.5002 131.1 45.2002C131.1 45.0002 131 44.8002 130.8 44.7002C130.6 44.6002 130.4 44.6002 130.2 44.8002C127.8 47.3002 127.2 47.7002 126.3 47.6002ZM119.3 76.1002C119.4 76.0002 119.5 75.9002 119.5 75.7002L119.6 72.2002C119.9 60.8002 120 58.7002 122 55.8002C123.2 54.2002 124.6 53.3002 128.1 51.3002C128 52.5002 128.1 53.8002 128.4 55.0002C128.4 55.2002 128.6 55.4002 128.9 55.4002C129.1 55.4002 129.3 55.2002 129.4 55.0002C129.5 54.8002 129.5 54.6002 129.6 54.4002C129.7 54.6002 129.8 54.9002 129.9 55.1002C129.7 57.6002 128.5 72.4002 128.5 73.4002C128.5 73.5002 128.5 73.5002 128.5 73.6002C129.1 75.0002 130 76.3002 130.9 77.4002C131 77.5002 131.1 77.6002 131.3 77.6002C131.4 77.6002 131.6 77.5002 131.7 77.4002C132.7 76.3002 133.7 75.0002 134.5 73.7002C134.6 73.6002 134.6 73.5002 134.6 73.4002C134.2 70.7002 132.1 57.2002 131.7 55.0002C132 54.6002 132.2 54.2002 132.4 53.7002C132.7 54.1002 133.1 54.6002 133.5 55.0002C133.6 55.1002 133.7 55.2002 133.9 55.2002C134 55.2002 134.2 55.1002 134.3 55.0002C135.1 53.9002 137.4 50.6002 138.4 48.0002C139.3 48.5002 140 48.8002 140.6 48.9002L142.6 49.1002C153.5 50.4002 160 51.2002 165.7 56.5002C168.8 59.4002 170.7 62.8002 173.2 74.1002C171.7 73.7002 169.2 73.9002 167.2 74.4002C166.2 74.6002 163.2 75.4002 161.7 76.9002C159.8 68.6002 159.4 67.6002 158.2 66.7002C156.8 65.7002 155.8 65.2002 151.2 64.5002C151.2 64.5002 151.2 64.5002 151.1 64.5002C149.4 64.3002 147.3 64.1002 144.6 63.8002C144.4 63.8002 144.1 63.9002 144.1 64.2002C144.1 64.5002 144.1 64.7002 144.3 64.8002C146.9 66.1002 149.3 67.6002 151.7 69.3002C151.9 70.0002 152.1 70.8002 152.3 71.6002C147.8 76.5002 135 79.8002 129.9 78.3002C127.9 72.9002 125.2 65.0002 125.1 64.1002C124.9 62.0002 124.9 59.9002 125.1 57.9002C125.1 57.6002 124.9 57.4002 124.7 57.4002C124.4 57.4002 124.2 57.6002 124.2 57.8002C124 59.9002 124 62.1002 124.2 64.2002C124.3 65.0002 125.7 69.1002 127.2 73.4002C127.7 77.0002 127.9 80.7002 127.8 84.4002C125.7 86.2002 123 88.5002 120.5 90.6002C120.2 88.8002 118.9 86.7002 117.7 85.2002C116.2 83.3002 114.5 82.0002 113 81.5002C114.8 79.9002 117.2 78.0002 119.3 76.1002ZM116.2 94.0002C115.8 92.5002 114.2 90.4002 112.7 88.7002C111.5 87.4002 110.5 86.4002 109.5 85.8002C109.5 85.8002 109.4 85.7002 109.3 85.7002C109 85.5002 108.6 85.3002 108.3 85.2002C109.2 84.5002 110.3 83.6002 111.5 82.5002C112.9 82.7002 114.7 84.0002 116.4 86.0002C118.1 88.0002 119.1 90.2002 119 91.5002C118.1 92.5002 117.1 93.3002 116.2 94.0002ZM104.5 88.4002C105.1 88.5002 105.8 88.5002 106.5 88.5002C107.3 88.5002 107.6 88.2002 108.5 87.4002C108.7 87.2002 109 87.0002 109.3 86.7002C110 87.2002 110.9 88.0002 112.1 89.3002C113.4 90.7002 114.2 91.9002 114.7 92.7002C114 93.4002 112.7 94.5002 111.8 95.3002C111.3 94.4002 110.1 93.5002 108.2 92.4002C108.4 92.4002 108.5 92.3002 108.7 92.2002C109 92.1002 109.1 91.8002 109 91.6002C108.9 91.3002 108.6 91.2002 108.4 91.3002C107.6 91.6002 106.8 91.7002 105.9 91.7002C105.1 91.6002 104.2 91.4002 103.5 91.0002C103.3 90.9002 103 90.9002 102.9 91.1002C101.5 92.7002 100.3 93.2002 99.7 93.1002C99.5 93.1002 99.5 93.0002 99.5 93.0002C99.5 93.0002 99.5 92.9002 99.6 92.8002C100.6 91.3002 101.7 89.8002 102.9 88.4002C102.9 88.3002 103.6 88.3002 104.5 88.4002ZM96.5 91.0002C97 91.0002 97.3 90.9002 97.7 90.7002C98.3 90.3002 98.8 89.9002 99.3 89.6002C99.9 89.1002 100.3 88.8002 100.6 88.9002C100.8 88.9002 100.9 89.0002 101.1 89.1002C100.2 90.2002 99.4 91.3002 98.7 92.4002C98.2 93.1002 98.4 93.7002 98.8 94.0002C99 94.2002 99.4 94.3002 99.7 94.3002C100.6 94.3002 102 93.7002 103.3 92.2002C104.1 92.5002 104.9 92.8002 105.8 92.8002C106.1 92.8002 106.3 92.8002 106.6 92.8002C109.4 94.2002 110.9 95.4002 111.1 96.3002V96.4002C111.1 96.6002 111.1 96.8002 110.9 97.1002C110.3 96.5002 109.4 96.0002 108.1 95.3002C107.9 95.2002 107.6 95.3002 107.4 95.5002C107.3 95.7002 107.4 96.0002 107.6 96.2002C108.9 96.9002 110.3 97.6002 110.4 98.3002C110.4 98.4002 110.4 98.6002 110.2 99.0002C110.1 99.1002 110 99.3002 109.7 99.2002H109.6C109.2 99.1002 108.4 98.7002 107.1 97.8002C106.9 97.6002 106.6 97.7002 106.4 97.9002C106.2 98.1002 106.3 98.4002 106.5 98.6002C107.4 99.3002 108.2 99.7002 108.9 100C108.7 100.3 108.5 100.5 108.3 100.6C107.7 100.8 106.9 100.2 106.3 99.7002C106.2 99.6002 106 99.5002 105.9 99.4002C105.7 99.2002 105.4 99.3002 105.2 99.5002C105 99.7002 105.1 100 105.3 100.2C105.4 100.3 105.5 100.4 105.6 100.4C105.9 100.6 106.2 100.8 106.5 101C106.2 101.4 105.7 101.4 104.8 101.2C104.8 100.9 104.9 100.5 104.9 100.2C104.9 99.1002 104.2 98.4002 103.5 98.3002C103.2 98.3002 102.9 98.3002 102.6 98.6002C102.4 98.3002 102 98.1002 101.7 98.0002C101.4 97.9002 101 98.0002 100.7 98.2002C100.5 97.9002 100.2 97.6002 99.8 97.5002C99.4 97.4002 99 97.4002 98.6 97.7002C98.4 97.4002 98.2 97.2002 97.9 97.1002C97.3 96.9002 96.4 97.0002 95.9 98.0002C95.7 98.3002 95.5 98.8002 95.3 99.3002C95 99.3002 94.6 99.2002 94.3 99.2002C94.9 97.9002 95.2 96.3002 95.1 94.5002C95.1 93.1002 94.8 91.8002 94.5 90.7002C95.5 90.9002 96 91.0002 96.5 91.0002ZM81.2 154.1C81.3 153.6 81.4 153.1 81.6 152.7C82 151.4 82.4 150 82.5 147.1C83.7 147 85.5 146.9 87.9 147.1C88.4 147.1 88.9 147.2 89.3 147.2H89.4C90.1 147.3 90.8 147.4 91.3 147.5C91.3 148.7 91.8 149.7 92.4 150.5C92.4 150.6 92.5 150.6 92.5 150.7C93.6 152.1 95.4 153 97.1 154C99.2 155.2 101.1 156.3 102.1 157.9C98 155.7 84.9 153.4 81.2 154.1ZM64.8 113.4C56.8 108.6 53.1 106.5 52.4 103.1C52.3 102.8 52.1 102.7 51.8 102.7C51.5 102.8 51.4 103 51.4 103.3C52 106.1 54.2 108.1 58.7 110.9C61.7 117 64.3 123.4 66.6 129.8C66.6 130.3 66.5 130.6 66.5 131C66.1 134.3 65.4 135.5 46.3 156.3C45.6 154.8 43.3 152.6 39.7 150.2C37.8 148.9 36.1 148 34.6 147.3C34.5 147.3 34.5 147.2 34.4 147.2C33.4 146.8 32.5 146.5 31.7 146.5C33.2 144.9 35.9 142.2 38.8 139.3C38.8 139.3 38.8 139.3 38.9 139.2C40.1 138 41.2 136.8 42.4 135.6C45.5 132.4 48.7 129.2 51 126.9C51.1 126.8 51.2 126.6 51.1 126.4C50.3 123.8 49.2 119.8 48.1 115.4C48.1 115.4 48.1 115.4 48.1 115.3C48.1 115.2 48.1 115.2 48 115.1C47 111.4 46.1 107.4 45.4 104.1C44.9 101.8 44.7 99.6002 44.5 97.1002C47.8 94.9002 54.2 93.5002 62.7 93.1002C62.9 96.8002 63.7 98.4002 66.2 99.9002L68.5 101.3C81.2 108.8 84.2 110.6 86.7 114.2C88.1 116.4 88.2 119.5 88.6 134.6C88.7 137.8 88.8 141.6 88.9 146.1C88.6 146.1 88.3 146.1 87.9 146C83.7 145.8 80.9 146 79.6 146.7C79.7 139.7 79 124.9 78.7 122.2C78.7 122 78.6 121.9 78.5 121.8C73 118.2 68.5 115.5 64.8 113.4ZM43.9 84.3002C43.6 87.8002 43.4 90.9002 43.5 93.9002C43.5 94.0002 43.5 94.0002 43.5 94.1002C43.5 95.1002 43.5 96.0002 43.6 96.9002C43.6 97.0002 43.6 97.0002 43.6 97.1002C43.7 99.6002 44 102 44.5 104.4C45.2 107.6 46.1 111.4 47 115L45 115.2L44.5 111.6C44.4 110.8 44 110 43.5 109.4C43.9 108.4 43.5 105.6 43.1 105C42.8 104.6 42.1 103.9 41.2 103C41 102.9 40.9 102.7 40.8 102.6C41.4 102.4 41.9 102.2 42.1 101.9C42.2 101.8 42.2 101.7 42.3 101.5C42.3 101.4 42.3 101.4 42.3 101.3C42 97.6002 41.7 89.5002 41.7 85.0002C42.4 84.8002 43.2 84.5002 43.9 84.3002ZM34.2 110C34.2 109.4 34.4 109.1 34.7 109.1C34.9 109.1 35.2 109.3 35.3 109.8C35.4 110.9 35.5 111.7 35.6 112.5V112.9C35.6 113.1 35.6 113.2 35.5 113.4C35.4 113.5 35.3 113.6 35.1 113.7C34.9 113.7 34.8 113.7 34.6 113.6C34.5 113.5 34.4 113.4 34.3 113.2C34.3 112.1 34.2 111 34.2 110ZM34.7 108.1C34.3 108.1 33.9 108.3 33.7 108.6C33.4 108.3 33 108.2 32.6 108.2C32.3 108.2 31.9 108.4 31.7 108.6C31.5 106.3 31.5 104.1 31.6 101.8C32.5 101.6 33.6 101.4 35.2 101.2C36.8 101 38 101 38.9 101.1C38.9 101.6 39.1 102 39.3 102.4C39.3 102.5 39.4 102.7 39.5 102.7C39.5 102.7 39.5 102.7 39.5 102.8C39.6 103 39.9 103.3 40.5 103.8C41.1 104.4 42 105.2 42.2 105.6C42.5 106.1 42.8 108.5 42.6 109C42.5 109 42.4 109.1 42.3 109.1C42.3 109.1 42.3 109.1 42.2 109.1C41.4 109.3 39.7 109.5 38.5 109.6C38.4 109.6 38.4 109.6 38.3 109.6C38.2 109.6 38.2 109.6 38.2 109.7C38.1 109.7 38 109.7 38 109.7C38 109.6 38.4 108.7 40.5 108.2C40.7 108.1 40.9 107.9 40.9 107.6C40.9 107.3 40.6 107.2 40.4 107.2C37.1 107.4 36.4 105.9 36.2 104.7C36.1 104.4 35.9 104.2 35.6 104.3C35.3 104.4 35.2 104.6 35.2 104.9C35.5 106.3 36.3 107.3 37.5 107.8C37.2 107.8 37 107.8 36.7 107.9C36.4 108 36.2 108.2 36 108.5C35.5 108.2 35.1 108 34.7 108.1ZM32 113.1C32 112.8 32 112.6 32 112.3V111.6C32 111.5 32 111.5 32 111.4C32 111 32 110.6 32 110C32 109.5 32.3 109.2 32.6 109.2C32.9 109.2 33.1 109.5 33.1 109.9C33.2 110.9 33.2 111.6 33.2 112.4V112.9C33.2 113 33.2 113.1 33.2 113.1C33.2 113.2 33.1 113.3 33.1 113.3C33.1 113.4 33 113.4 32.9 113.5C32.8 113.5 32.8 113.6 32.7 113.6C32.6 113.6 32.5 113.6 32.5 113.6C32.4 113.6 32.3 113.5 32.3 113.5C32.2 113.5 32.2 113.4 32.1 113.3C32.1 113.2 32.1 113.1 32 113.1ZM41.4 111.6C41.3 111.2 41.2 110.8 41.1 110.4C41.6 110.3 42.1 110.2 42.6 110C43.1 110.5 43.3 111.1 43.4 111.7L43.9 115.3L41.9 115.6C41.8 114.8 41.7 114.2 41.7 113.7C41.6 112.3 41.5 111.8 41.4 111.6ZM37.9 108.1C37.8 108 37.7 108 37.7 108C37.8 108 37.9 108 37.9 108.1C38 108.1 38 108.1 37.9 108.1ZM36.5 109.7C36.5 109.2 36.6 108.9 36.9 108.8C37 108.8 37.1 108.8 37.2 108.8C36.9 109.1 36.8 109.5 36.9 109.8C37 110.3 37.4 110.6 37.9 110.6C38 111.2 38.1 111.8 38.2 112.4V112.6C38.2 112.8 38.2 112.9 38.1 113.1C38 113.3 37.9 113.4 37.7 113.4C37.5 113.4 37.4 113.4 37.2 113.3C37 113.2 36.9 113.1 36.9 113C36.7 111.9 36.5 110.8 36.5 109.7ZM38.9 110.5C39.3 110.5 39.7 110.4 40.1 110.4C40.2 110.8 40.3 111.1 40.4 111.8C40.4 111.9 40.4 111.9 40.4 111.9C40.4 112 40.4 112 40.4 112.1C40.4 112.2 40.4 112.3 40.4 112.5C40.4 112.6 40.3 112.7 40.2 112.8C40.1 112.9 40 112.9 39.9 112.9C39.8 112.9 39.7 112.9 39.5 112.8C39.4 112.7 39.2 112.6 39.2 112.5C39.1 111.9 39 111.2 38.9 110.5ZM41.1 100.4C40.6 100.2 40 100.1 39.3 100.1C37.7 100 35.8 100.1 35 100.2C32.4 100.4 30.4 100.9 29.4 101.5C29.3 100.2 29.2 98.9002 29.1 97.7002C29.9 96.8002 32.5 96.0002 35.6 95.7002C38.4 95.5002 40.4 95.8002 41 96.2002C41 97.7002 41.1 99.2002 41.1 100.4ZM31 110.3V111.5C31 111.7 31 111.9 31 112.1V113.1C31 113.1 31 113.1 31 113.2L31.5 116.8L29.5 117.1L29 113.5C28.9 112.7 29.1 111.9 29.6 111.3C30 110.8 30.5 110.5 31 110.3ZM32.2 114.5H32.3C32.4 114.5 32.6 114.5 32.7 114.5C32.8 114.5 32.9 114.5 33 114.5C33.2 114.5 33.4 114.4 33.6 114.3C33.7 114.2 33.8 114.1 33.9 114C34 114.1 34.1 114.2 34.3 114.3C34.6 114.5 34.9 114.6 35.2 114.6C35.3 114.6 35.4 114.6 35.5 114.6C35.9 114.5 36.2 114.3 36.5 114C36.6 114.1 36.7 114.2 36.8 114.2C37.1 114.3 37.3 114.4 37.6 114.4C37.7 114.4 37.9 114.4 38 114.3C38.4 114.2 38.8 113.9 39 113.6C39.1 113.7 39.2 113.7 39.2 113.8C39.4 113.9 39.7 114 39.9 114C40 114 40 114 40.1 114C40.3 114 40.6 113.9 40.8 113.7C40.8 113.8 40.8 113.8 40.8 113.8C40.9 114.3 40.9 114.9 41 115.7L32.5 116.8L32.2 114.5ZM47.2 116C48.2 120.1 49.3 123.9 50 126.4C48.5 128 46.6 129.8 44.7 131.8L25.9 118.6L47.2 116ZM92.1 146.5H92C91.4 146.4 90.8 146.3 90 146.2C89.9 141.7 89.8 137.9 89.7 134.6C89.3 119.3 89.2 116.1 87.6 113.7C85 109.9 82 108.1 69.1 100.5L66.8 99.1002C64.7 97.8002 64 96.4002 63.8 93.1002C64.5 93.1002 65.2 93.1002 65.9 93.0002C66.9 96.5002 68.2 97.9002 70.5 99.3002C71.8 100.1 73.9 100.6 77.3 100.9C87.4 107.1 89.2 108.5 91.5 111.9C93.7 115.3 94.1 118.7 95.2 147.5C94.5 147.2 93.6 146.8 92.1 146.5ZM92.2 111.4C90 108.1 88.1 106.6 79.3 101.1C81.2 101.2 83.5 101.2 86.3 101.3C88.2 101.3 90.4 101.3 92.8 101.3C92.9 101.3 93.1 101.3 93.1 101.2C93.4 100.9 93.6 100.6 93.9 100.2C94.3 100.2 94.8 100.3 95.1 100.3C95.1 100.5 95.1 100.7 95.2 100.9C95.3 101.3 95.6 101.6 96 101.8C96.2 101.9 96.5 102 96.7 102C96.9 102 97 102 97.2 101.9C97.3 101.9 97.4 101.8 97.5 101.7C97.7 102.1 98.1 102.4 98.5 102.5C98.7 102.5 98.8 102.6 99 102.6C99.3 102.6 99.5 102.5 99.7 102.4C99.9 102.7 100.2 103 100.6 103.1C100.7 103.1 100.9 103.2 101 103.2C101.3 103.2 101.5 103.1 101.8 103C101.9 102.9 102 102.9 102.1 102.8C102.1 102.8 102.1 102.9 102.2 102.9C102.4 103.1 102.7 103.3 103 103.3L95.5 114L92.8 112.1C92.6 112 92.4 111.7 92.2 111.4ZM103.7 102.1C103.7 102.2 103.6 102.3 103.5 102.4C103.4 102.5 103.3 102.5 103.1 102.5C103 102.5 102.9 102.4 102.8 102.3C102.7 102.2 102.7 102.1 102.7 102C102.7 101.7 102.9 100.5 103 99.9002C103.1 99.6002 103.2 99.4002 103.4 99.4002C103.6 99.4002 103.9 99.7002 103.9 100.2C103.9 100.9 103.8 101.5 103.7 102.1ZM101.9 99.9002C101.8 100.6 101.7 101.2 101.5 101.8C101.5 101.9 101.4 102.1 101.2 102.1C101.1 102.2 100.9 102.2 100.8 102.1C100.7 102.1 100.5 102 100.5 101.8C100.4 101.7 100.4 101.5 100.4 101.4C100.5 100.8 100.7 100 100.9 99.4002C101 99.1002 101.2 98.9002 101.4 98.9002C101.4 98.9002 101.4 98.9002 101.5 98.9002C101.8 99.1002 102 99.4002 101.9 99.9002ZM99.9 99.4002L99.8 99.9002C99.7 100.3 99.6 100.9 99.4 101.4C99.3 101.8 98.9 101.8 98.8 101.7C98.5 101.6 98.2 101.3 98.4 100.8C98.6 100.2 98.8 99.6002 99 99.0002C99.1 98.6002 99.3 98.5002 99.5 98.5002H99.6C99.9 98.6002 100.1 98.9002 99.9 99.4002ZM97.9 98.9002C97.7 99.4002 97.4 100.4 97.2 100.8C97.1 100.9 97 101 96.9 101.1C96.8 101.1 96.6 101.1 96.5 101.1C96.4 101 96.3 100.9 96.2 100.8C96.2 100.7 96.2 100.5 96.2 100.3C96.2 100.2 96.3 100.2 96.3 100.1C96.5 99.5002 96.8 99.0002 96.9 98.6002C97.1 98.3002 97.3 98.1002 97.5 98.1002H97.6C97.9 98.2002 98 98.5002 97.9 98.9002ZM94.3 94.6002C94.3 97.1002 93.7 99.2002 92.6 100.4C90.7 100.4 89 100.4 87.5 100.4C88.8 98.7002 89.3 96.1002 89.3 94.0002C89.4 92.2002 89.1 90.1002 88.3 88.6002C90.2 88.8002 91.9 89.1002 92.6 89.2002C93.6 90.1002 94.3 92.2002 94.3 94.6002ZM75.4 64.0002C77.2 65.7002 77.8 68.7002 78.4 86.4002L77.9 86.3002C77.6 86.3002 77.4 86.5002 77.3 86.7002C77.3 87.0002 77.5 87.2002 77.7 87.3002L78.8 87.4002C81 87.7002 84.1 88.0002 86.9 88.4002C87.8 89.3002 88.3 91.4002 88.3 93.9002C88.2 96.7002 87.4 99.2002 86.1 100.3C77.4 100.2 73 99.9002 70.9 98.6002C66.9 96.1002 66.2 93.6002 64.3 76.5002C64.3 76.2002 64.1 76.0002 63.8 76.1002C63.5 76.1002 63.3 76.3002 63.3 76.6002C62.9 81.4002 62.7 86.5002 62.6 89.3002V89.6002C54.4 89.7002 47.9 91.0002 44.5 93.0002C44.5 90.1002 44.7 87.0002 45 83.6002C45.3 80.2002 45.8 76.4002 46.3 72.3002C46.3 72.0002 46.1 71.8002 45.9 71.7002C45.6 71.7002 45.4 71.9002 45.3 72.1002C44.9 75.1002 44.6 77.8002 44.3 80.4002C42.2 82.1002 40 83.7002 37.7 85.1002C37.5 85.2002 37.4 85.5002 37.5 85.7002C37.6 85.9002 37.8 86.0002 38 86.0002H38.1C39 85.8002 39.9 85.5002 40.7 85.2002C40.7 87.8002 40.8 91.5002 40.9 94.9002C39.3 94.3002 36.4 94.4002 35.5 94.5002C33.2 94.7002 30.5 95.3002 29 96.3002C28.4 86.3002 28.7 81.2002 30.7 78.2002C31.8 76.6002 33.6 74.9002 35.9 73.3002C36 73.3002 36 73.2002 36 73.2002C40.7 69.9002 47.5 66.8002 54.6 64.9002C66.2 61.9002 72.8 61.6002 75.4 64.0002ZM54.8 63.9002C57.6 62.2002 60.5 60.1002 63.6 57.5002C63.7 57.5002 63.7 57.4002 63.8 57.4002C64.8 56.6002 65.8 55.7002 66.8 54.8002C67 54.6002 67 54.4002 66.9 54.2002C66.3 53.3002 66.3 52.7002 66.5 52.4002C66.5 52.3002 66.6 52.3002 66.6 52.3002C66.7 52.3002 66.9 52.4002 67 52.7002C67.3 53.4002 67.8 53.5002 68.2 53.4002C68.8 53.2002 69.1 52.5002 69.1 51.3002C69.4 51.2002 69.6 51.1002 69.9 51.0002C70.3 55.9002 70.3 58.3002 69.6 59.1002C69.4 59.2002 68.7 59.2002 66.5 57.0002C66.4 56.9002 66.1 56.8002 66 56.9002C65.8 57.0002 65.7 57.2002 65.7 57.4002C65.7 58.3002 65.9 59.2002 66.2 60.0002C66.4 60.6002 66.8 61.1002 67.3 61.6002C64 61.8002 59.9 62.6002 54.8 63.9002ZM6.19998 104.8L30.6 69.9002L34.8 72.9002C32.7 74.5002 30.9 76.1002 29.9 77.7002C27.3 81.5002 27.3 87.5002 28.4 102.5C28.4 102.6 28.4 102.6 28.4 102.7C28.5 103.5 29.5 103.7 30.5 103.7C30.5 105.6 30.5 107.5 30.7 109.4C30 109.7 29.4 110.1 28.9 110.7C28.3 111.5 28 112.6 28.1 113.6L28.6 117.3L24.8 117.8L6.19998 104.8ZM24.2 140.2L21.6 119.2L24.5 118.8L44 132.5C43.2 133.3 42.4 134.1 41.6 134.9C40.4 136.1 39.3 137.3 38.1 138.4L24.2 140.2ZM47.2 167C43.6 162.9 32.8 155.3 29.1 154.2C29.5 153.8 29.9 153.2 30.4 152.7C30.8 152.2 31.3 151.7 31.8 151.1C32.7 150.1 33.5 149.1 34.3 148.3C35.5 148.8 37.1 149.7 39 151C40.3 151.9 41.4 152.7 42.3 153.4C41.7 154.7 41.7 156 42.1 157.2V157.3C42.6 158.8 43.6 160.4 44.5 161.9C45.7 163.6 46.8 165.3 47.2 167ZM106.2 174.8L60.1 142.5C66.5 135.2 67.2 133.6 67.5 131C67.6 130.6 67.6 130.2 67.6 129.7C67.6 129.7 67.6 129.7 67.6 129.6C67.7 127.7 67.4 124.3 66.3 115.4C69.5 117.3 73.3 119.6 77.8 122.5C78.1 125.9 78.8 141.9 78.6 147.9V148C78.5 149 79.4 149.7 81.2 150.1C81 151 80.8 151.7 80.7 152.4C80.5 153.2 80.3 153.9 80.1 155C79.8 158.3 93.4 159.9 95 160.1C97.4 160.4 99.1 160.5 100.4 160.5C103.4 160.5 103.9 159.9 103.9 159.6C103.9 159.5 104 159.4 103.9 159.3C103.9 159.2 103.9 159.2 103.9 159.2C103.4 156.2 100.6 154.6 97.9 153C96.5 152.2 95.2 151.5 94.2 150.6C95 150.5 95.6 150.3 96 149.9C96.2 149.7 96.3 149.5 96.3 149.2C96.3 149.1 96.3 149.1 96.3 149C95.4 124.9 95 117.7 93.7 114L95.4 115.2C95.5 115.3 95.6 115.3 95.7 115.3C95.9 115.3 96 115.2 96.1 115.1L105 102.3C105.2 102.4 105.5 102.4 105.8 102.4C106.4 102.4 107.1 102.2 107.5 101.4C107.7 101.4 107.8 101.5 108 101.5C108.2 101.5 108.3 101.5 108.5 101.4C109 101.2 109.5 100.8 109.8 100.1C110.3 100.1 110.6 99.9002 111 99.5002C111.4 99.0002 111.5 98.5002 111.4 98.0002C111.9 97.5002 112.1 96.9002 112.1 96.4002C112.5 96.1002 113 95.6002 113.5 95.1002C114.1 95.6002 114.7 95.8002 115.2 95.8002C115.3 95.8002 115.4 95.8002 115.4 95.8002C115.6 95.8002 115.8 95.6002 116 95.5002C117.1 94.7002 118.5 93.5002 120 92.3002C122.7 90.0002 125.8 87.4002 128.2 85.4002C128.2 85.4002 128.2 85.4002 128.3 85.4002C129.1 84.7002 129.8 84.1002 130.4 83.6002C130.4 83.6002 130.4 83.6002 130.4 83.7002C121.9 102.3 120.3 106.1 120.1 109.4C119.8 113.2 120.3 116 127.2 143C127.2 143.2 127.4 143.3 127.5 143.4C127.7 143.5 128 143.5 128.2 143.5L106.2 174.8ZM135.8 111.4C136.2 110.2 137 108.8 138.2 106.5C139 105 140 103.2 141.3 100.7C143.6 111 144.5 114.2 146.5 116.4C146.6 116.5 146.7 116.6 146.8 116.7L139.2 127.6C138.1 122.7 137 117.4 135.8 111.4ZM175.8 133.2C154.2 121 150.2 118.6 147.8 116.3C147.8 116.3 147.8 116.2 147.7 116.2C147.5 116 147.4 115.8 147.2 115.7C145.1 113.4 144.2 109.5 141 94.9002L140.3 91.9002C140.3 91.7002 140.1 91.5002 139.9 91.5002C139.8 91.5002 139.8 91.5002 139.7 91.5002C139 91.4002 138.2 91.3002 137.6 91.0002C137.3 90.9002 137.1 91.0002 136.9 91.3002C136.8 91.6002 136.9 91.8002 137.2 92.0002C137.9 92.3002 138.6 92.4002 139.3 92.5002C138.7 98.1002 137.5 103.7 135.7 109C135.3 109.8 135 110.5 134.8 111.1C134.8 111.2 134.8 111.3 134.8 111.4C136.8 121.4 138.6 129.4 140.4 137.1L140.9 139.1C138.9 141.1 132.2 143.2 128.1 142.1C121.3 115.5 120.8 112.7 121.1 109.1C121.3 106.1 122.6 102.8 131.4 83.5002C131.5 83.4002 131.5 83.2002 131.4 83.1002C131.3 82.9002 131.2 82.6002 131.1 82.3002V82.2002C131.9 82.3002 132.8 82.4002 133.8 82.4002C134.3 82.4002 134.8 82.4002 135.4 82.3002C136.4 86.3002 136.6 87.2002 138.2 87.2002C138.3 87.2002 138.4 87.2002 138.5 87.2002C138.8 87.2002 139 86.9002 139 86.7002C139 86.5002 138.7 86.2002 138.5 86.2002C137.4 86.3002 137.4 86.3002 136.4 82.2002C140.5 81.8002 145.3 80.4002 149.1 78.4002C151.2 87.5002 153.7 99.9002 154.5 108.3C154.5 108.4 154.6 108.6 154.7 108.7C155.4 109.2 156.1 109.7 156.8 110.1L159.2 121.5C159.3 121.7 159.5 121.9 159.7 121.9H159.8L171.4 119.4L176.1 122.4C178.8 124.1 180.9 125.5 182.1 126.2C180.7 129.5 177.8 132.7 175.8 133.2ZM176.2 118.9C179.1 120.7 181.5 122.1 182.6 122.9C182.7 123.7 182.6 124.5 182.3 125.4C181.1 124.7 179.1 123.3 176.5 121.7L172.7 119.3L175.7 118.7L176.2 118.9ZM167.3 95.9002C167.3 95.7002 167.2 95.5002 167.2 95.2002C167.2 95.0002 167.1 94.8002 167.1 94.7002C167.2 94.7002 167.3 94.7002 167.5 94.7002C168 94.7002 168.4 94.5002 168.7 94.2002L168.8 94.1002C168.9 94.2002 169.1 94.2002 169.3 94.3002C169.5 94.3002 169.6 94.4002 169.8 94.4002C170 94.4002 170.2 94.4002 170.5 94.3002C170.9 94.2002 171.2 93.9002 171.4 93.6002C171.4 93.6002 171.4 93.6002 171.4 93.5002C171.7 93.6002 172 93.7002 172.3 93.7002C172.6 93.7002 172.9 93.6002 173.1 93.5002C173.4 93.4002 173.6 93.1002 173.8 92.9002C173.9 92.9002 174 93.0002 174.1 93.0002C174.2 93.0002 174.2 93.0002 174.3 93.0002C174.7 93.0002 175 92.9002 175.3 92.7002C175.4 92.6002 175.5 92.5002 175.6 92.4002L176 94.1002L167.3 95.9002Z"
        fill="currentColor"
      />
      <path
        d="M80.9 56.1002C81.1 56.1002 81.2 56.0002 81.3 55.9002L91.5 41.3002L101 48.0002C101.2 48.2002 101.5 48.1002 101.7 47.9002L112.7 32.2002L113.8 38.4002C113.8 38.6002 114.1 38.8002 114.3 38.8002H114.4C114.7 38.8002 114.9 38.5002 114.8 38.2002L113.5 30.8002C113.5 30.7002 113.5 30.7002 113.4 30.6002L113.3 30.5002C113.2 30.4002 113.1 30.4002 112.9 30.4002L105.5 31.7002C105.2 31.7002 105 32.0002 105.1 32.3002C105.1 32.6002 105.4 32.8002 105.7 32.7002L111.9 31.6002L101.2 46.9002L91.7 40.2002C91.5 40.0002 91.2 40.0002 91 40.3002L80.5 55.3002C80.3 55.5002 80.4 55.8002 80.6 56.0002C80.7 56.1002 80.8 56.1002 80.9 56.1002Z"
        fill="currentColor"
      />
      <path
        d="M36.9 46.8002L38.3 46.6002L39.2 51.6002L34.8 52.4002C34.5 52.4002 34.3 52.7002 34.4 53.0002C34.4 53.2002 34.7 53.4002 34.9 53.4002H35L39.4 52.6002L39.7 54.3002C39.7 54.5002 40 54.7002 40.2 54.7002H40.3C40.6 54.7002 40.8 54.4002 40.7 54.1002L40.4 52.4002L41.8 52.2002C43.1 52.0002 44.1 51.2002 44.5 50.0002C44.9 48.8002 44.7 47.3002 43.8 46.3002C43 45.3002 41.8 45.0002 40.5 45.2002L39.1 45.4002L38.2 40.4002L42.6 39.6002C42.9 39.6002 43.1 39.3002 43 39.0002C43 38.7002 42.7 38.5002 42.4 38.6002L38 39.4002L37.7 37.7002C37.7 37.4002 37.4 37.2002 37.1 37.3002C36.8 37.3002 36.6 37.6002 36.7 37.9002L37 39.6002L35.6 39.8002C33.3 40.2002 32.4 42.2002 32.7 43.9002C33.1 45.6002 34.6 47.2002 36.9 46.8002ZM40.7 46.1002C41.6 45.9002 42.5 46.2002 43 46.9002C43.6 47.6002 43.8 48.7002 43.5 49.6002C43.2 50.4002 42.5 51.0002 41.5 51.1002L40.1 51.3002L39.2 46.3002L40.7 46.1002ZM35.9 40.8002L37.3 40.6002L38.2 45.6002L36.8 45.8002C35.1 46.1002 34.1 45.0002 33.8 43.7002C33.6 42.5002 34.2 41.1002 35.9 40.8002Z"
        fill="currentColor"
      />
      <path
        d="M110.6 125.7L107 126.3L106.4 122.7C106.4 122.4 106.1 122.2 105.8 122.3C105.5 122.3 105.3 122.6 105.4 122.9L106 126.5L102.4 127.1C102.1 127.1 101.9 127.4 102 127.7C102 127.9 102.3 128.1 102.5 128.1H102.6L106.2 127.5L106.8 131.1C106.8 131.3 107.1 131.5 107.3 131.5H107.4C107.7 131.5 107.9 131.2 107.8 130.9L107.2 127.3L110.8 126.7C111.1 126.7 111.3 126.4 111.2 126.1C111.1 125.8 110.9 125.6 110.6 125.7Z"
        fill="currentColor"
      />
      <path
        d="M165.1 140.7L159.9 141.6L159 136.4C159 136.1 158.7 135.9 158.4 136C158.1 136 157.9 136.3 158 136.6L158.9 141.8L153.7 142.7C153.4 142.7 153.2 143 153.3 143.3C153.3 143.5 153.6 143.7 153.8 143.7H153.9L159.1 142.8L160 148.1C160 148.3 160.3 148.5 160.5 148.5H160.6C160.9 148.5 161.1 148.2 161 147.9L160.1 142.6L165.3 141.7C165.6 141.7 165.8 141.4 165.7 141.1C165.6 140.8 165.3 140.6 165.1 140.7Z"
        fill="currentColor"
      />
      <path
        d="M65.5 162.5C65.2 162.2 64.8 162 64.5 161.8C64.1 161.6 63.7 161.6 63.3 161.6C62.5 161.6 61.7 162 61.1 162.5C60.5 163.1 60.2 163.9 60.2 164.7C60.2 165.5 60.5 166.3 61.1 166.9C61.7 167.5 62.5 167.8 63.3 167.8C63.3 167.8 63.3 167.8 63.4 167.8C63.8 167.8 64.2 167.7 64.6 167.6C65 167.4 65.3 167.2 65.6 166.9C65.9 166.6 66.1 166.3 66.3 165.9C66.5 165.5 66.5 165.1 66.5 164.7C66.5 164.3 66.4 163.9 66.3 163.5C66 163.2 65.8 162.8 65.5 162.5ZM65.3 165.6C65.2 165.9 65 166.1 64.8 166.3C64.6 166.5 64.4 166.7 64.1 166.8C63.8 166.9 63.6 167 63.3 167C62.7 167 62.2 166.8 61.8 166.4C61.4 166 61.2 165.5 61.2 164.9C61.2 164.3 61.4 163.8 61.8 163.4C62.2 163 62.7 162.8 63.3 162.8C63.6 162.8 63.8 162.9 64.1 163C64.4 163.1 64.6 163.3 64.8 163.5C65 163.7 65.2 163.9 65.3 164.2C65.4 164.5 65.5 164.7 65.5 165C65.4 165.1 65.4 165.3 65.3 165.6Z"
        fill="currentColor"
      />
      <path
        d="M166.9 89.8002C167 90.0002 167.2 90.2002 167.4 90.2002H167.5C168.7 89.8002 172.7 88.8002 174 88.6002C174.3 88.6002 174.5 88.3002 174.4 88.0002C174.3 87.7002 174.1 87.5002 173.8 87.6002C172.5 87.8002 168.4 88.9002 167.2 89.3002C166.9 89.3002 166.8 89.5002 166.9 89.8002Z"
        fill="currentColor"
      />
    </svg>
  </SvgIcon>
)

export default BusinessDealImage
