import { FC } from 'react'

import { SvgIcon, SvgIconProps } from '@mui/material'

const BringSolutionsImage: FC<SvgIconProps> = ({ sx, ...props }) => (
  <SvgIcon sx={{ fontSize: 200, color: 'primary.dark', ...sx }} {...props}>
    <svg
      width="200"
      height="200"
      viewBox="0 0 200 200"
      fill="none"
      xmlns="http://www.w3.org/2000/svg"
    >
      <path
        d="M6.4 109C6.6 109 6.8 108.9 7 108.8C7.2 108.6 7.2 108.4 7.2 108.2C7.2 108 7.1 107.8 6.9 107.6C6.7 107.4 6.5 107.4 6.3 107.4C6.1 107.4 5.9 107.5 5.7 107.6C5.5 107.8 5.5 108 5.5 108.2C5.5 108.4 5.6 108.6 5.8 108.8C5.9 108.9 6.2 109 6.4 109Z"
        fill="currentColor"
      />
      <path
        d="M90.8 79.3002C90.9 79.4002 91 79.5002 91.2 79.5002C91.3 79.5002 91.5 79.6002 91.6 79.5002C91.7 79.5002 91.9 79.4002 92 79.4002C92.1 79.3002 92.2 79.2002 92.3 79.1002C92.4 79.0002 92.5 78.9002 92.5 78.7002C92.5 78.6002 92.6 78.4002 92.5 78.3002C92.5 78.0002 92.3 77.8002 92.1 77.6002C91.9 77.4002 91.6 77.3002 91.4 77.4002C91.1 77.4002 90.9 77.6002 90.7 77.8002C90.5 78.0002 90.4 78.3002 90.5 78.5002C90.5 78.6002 90.5 78.8002 90.6 78.9002C90.7 79.0002 90.7 79.2002 90.8 79.3002Z"
        fill="currentColor"
      />
      <path
        d="M89.2 86.2002C89.3 86.3002 89.4 86.4002 89.6 86.4002C89.7 86.4002 89.9 86.5002 90 86.4002C90.1 86.4002 90.3 86.3002 90.4 86.3002C90.5 86.2002 90.6 86.2002 90.7 86.0002C90.8 85.9002 90.9 85.8002 90.9 85.6002C90.9 85.5002 91 85.3002 90.9 85.2002C90.9 84.9002 90.7 84.7002 90.5 84.5002C90.3 84.3002 90 84.2002 89.8 84.3002C89.5 84.3002 89.3 84.5002 89.1 84.7002C88.9 84.9002 88.8 85.2002 88.9 85.4002C88.9 85.5002 89 85.7002 89 85.8002C89 86.0002 89.1 86.1002 89.2 86.2002Z"
        fill="currentColor"
      />
      <path
        d="M89.2 93.9002C89.3 94.0002 89.4 94.1002 89.6 94.1002C89.7 94.1002 89.9 94.2002 90 94.1002C90.1 94.1002 90.3 94.0002 90.4 94.0002C90.5 93.9002 90.6 93.9002 90.7 93.7002C90.8 93.6002 90.9 93.5002 90.9 93.3002C90.9 93.2002 91 93.0002 90.9 92.9002C90.9 92.6002 90.7 92.4002 90.5 92.2002C90.3 92.0002 90 91.9002 89.8 92.0002C89.5 92.0002 89.3 92.2002 89.1 92.4002C88.9 92.6002 88.8 92.9002 88.9 93.1002C88.9 93.2002 89 93.4002 89 93.5002C89 93.7002 89.1 93.8002 89.2 93.9002Z"
        fill="currentColor"
      />
      <path
        d="M153.8 78.8002C156.8 78.2002 158.5 76.1002 158.8 72.6002C158.8 72.3002 158.6 72.1002 158.3 72.1002C158 72.1002 157.8 72.3002 157.8 72.6002C157.6 75.7002 156.2 77.4002 153.7 77.9002C153.4 78.0002 153.3 78.2002 153.3 78.5002C153.3 78.7002 153.5 78.8002 153.8 78.8002Z"
        fill="currentColor"
      />
      <path
        d="M175 127.9C173.9 127.6 172.7 127.2 171.6 126.8L186 89.5002C186.3 88.8002 186.4 88.0002 186.4 87.2002C186.4 86.0002 186 84.9002 185.3 83.9002C184.6 82.9002 183.7 82.2002 182.6 81.7002L170.1 76.9002C169.9 76.8002 169.7 76.7002 169.6 76.6002C170.5 76.2002 171.3 75.6002 171.1 75.0002C170.9 74.2002 169.8 74.0002 167.5 74.3002C167.5 74.3002 167.5 74.3002 167.4 74.3002C167.3 74.1002 167.3 74.0002 167.2 73.8002C168 73.4002 168.9 73.0002 169.7 72.5002C171.4 71.6002 172.1 70.7002 171.8 70.0002C171.4 69.1002 169.6 69.4002 168.2 69.9002C168.1 69.9002 167.7 70.0002 167.2 70.2002C167.4 69.8002 167.6 69.4002 167.8 69.0002C168.2 68.4002 168.8 67.9002 169.5 67.6002C171.2 66.7002 172.6 65.5002 173.8 63.9002C174.9 62.4002 175.7 60.7002 176.2 58.8002C176.6 56.9002 176.6 55.1002 176.2 53.2002C175.8 51.3002 175 49.6002 173.9 48.1002C172.4 46.1002 170.4 44.5002 168 43.6002C165.6 42.7002 163.1 42.5002 160.6 42.9002C158.1 43.4002 155.8 44.6002 154 46.3002C152.2 48.1002 150.9 50.3002 150.3 52.7002C149.7 55.2002 149.8 57.7002 150.6 60.1002C150.9 61.0002 151 62.0002 150.7 63.0002C150.5 63.9002 150 64.8002 149.3 65.5002C148.6 66.2002 147.7 66.6002 146.8 66.8002C145.9 67.0002 144.9 66.9002 144 66.6002L124.9 59.2002C124.6 59.1002 124.4 59.2002 124.3 59.5002L119.4 72.0002C117.3 72.1002 115.4 72.2002 113.6 72.3002L119.5 57.2002C119.5 57.1002 119.5 56.9002 119.5 56.8002C119.4 56.7002 119.3 56.6002 119.2 56.5002L107.9 52.1002C108.5 51.1002 108.9 50.0002 108.9 48.9002C109 47.3002 108.4 45.8002 107.3 44.7002C105 42.5002 101.2 42.8002 98.8 45.3002C98.1 46.1002 97.5 46.9002 97.2 47.9002L68.6 36.9002L63.5 13.0002C63.5 12.9002 63.4 12.8002 63.3 12.7002C63.2 12.6002 63.1 12.6002 62.9 12.6002L54.1 14.5002C53.6 14.6002 53.1 14.9002 52.7 15.3002C52.3 15.7002 52 16.2002 51.9 16.8002C51.8 17.3002 51.8 17.9002 52 18.4002C52.2 18.9002 52.5 19.4002 53 19.7002C53.8 20.3002 54.3 21.1002 54.7 22.0002C55 22.9002 55.1 23.9002 54.9 24.9002C54.7 25.9002 54.2 26.7002 53.5 27.4002C52.8 28.1002 51.9 28.6002 51 28.8002C50 29.0002 49.1 28.9002 48.1 28.6002C47.2 28.3002 46.4 27.7002 45.8 26.9002C45.2 26.1002 44.9 25.2002 44.8 24.2002C44.7 23.2002 44.9 22.3002 45.4 21.4002C45.7 20.9002 45.8 20.3002 45.8 19.8002C45.8 19.2002 45.6 18.7002 45.2 18.2002C44.9 17.7002 44.4 17.4002 43.9 17.2002C43.4 17.0002 42.8 17.0002 42.2 17.1002L34 18.9002C33.9 18.9002 33.8 19.0002 33.7 19.1002C33.6 19.2002 33.6 19.3002 33.6 19.5002L39.3 46.0002C39.5 46.8002 39.9 47.4002 40.6 47.8002C41.1 48.1002 41.6 48.3002 42.2 48.3002C42.4 48.3002 42.6 48.3002 42.8 48.2002L49.1 46.9002C49.2 47.2002 49.2 47.6002 49.3 47.9002L48.6 49.8002C47.9 51.6002 46.3 52.8002 44.3 53.0002C42.2 53.1002 40.3 52.1002 39.4 50.3002C38.2 48.1002 36.4 46.3002 34.2 45.1002C32 43.9002 29.5 43.3002 27 43.5002C24.5 43.7002 22.1 44.5002 20 46.0002C18 47.5002 16.4 49.5002 15.5 51.9002C14.6 54.3002 14.4 56.8002 14.8 59.3002C15.3 61.8002 16.5 64.1002 18.2 65.9002C19.9 67.7002 22.2 69.0002 24.6 69.6002C27.1 70.2002 29.6 70.1002 32 69.3002C32.9 69.0002 33.9 69.0002 34.8 69.2002C35.7 69.4002 36.6 69.9002 37.3 70.6002C38 71.3002 38.4 72.2002 38.6 73.1002C38.8 74.0002 38.7 75.0002 38.4 75.9002L32.9 90.2002C32.3 91.7002 32.4 93.3002 33 94.8002C33.6 96.3002 34.8 97.4002 36.3 98.0002L77 113.8C75.6 115.6 74.3 117.4 73 119.1L33.7 103.8C33 103.5 32.2 103.4 31.4 103.4C30.6 103.4 29.8 103.6 29.1 103.9C28.4 104.2 27.7 104.7 27.2 105.2C26.7 105.8 26.2 106.4 25.9 107.2L5.4 160C5.1 160.7 5 161.5 5 162.3C5 163.1 5.2 163.9 5.5 164.6C6.1 166.1 7.3 167.2 8.8 167.8L25.6 174.3C23.1 176.3 19.9 178.7 17.6 180.2C10 185.3 9.4 186.4 9.5 187.1C9.6 187.5 9.8 187.9 10.1 188.2C10.5 188.5 11.1 188.6 11.9 188.6C13.5 188.6 15.7 188.1 18.7 187.4C21.9 186.6 25.6 185.8 28.1 186C29.6 186.2 31.1 186 32.5 185.6C34 185.1 35.2 184 36.5 182.6L36.6 182.5C37.2 182.7 37.8 182.8 38.3 182.8C39.1 182.8 39.8 182.6 40.4 182L41.9 180.7L66.8 190.4C66.9 190.4 66.9 190.4 67 190.4C67.1 190.4 67.1 190.4 67.2 190.4C67.3 190.3 67.4 190.2 67.5 190.1L74.4 172.2C74.8 171.3 75.4 170.5 76.2 170C77 169.4 77.9 169.1 78.9 169.1C79.9 169.1 80.8 169.3 81.7 169.7C82.5 170.2 83.2 170.9 83.7 171.7C84.9 173.9 86.7 175.8 88.9 177C91.1 178.2 93.6 178.8 96.2 178.6C98.7 178.4 101.1 177.6 103.2 176.1C105.2 174.6 106.8 172.6 107.7 170.2C108.6 167.8 108.8 165.3 108.4 162.8C107.9 160.3 106.7 158 105 156.2C103.2 154.4 101 153.1 98.6 152.5C96.1 151.9 93.6 152 91.2 152.8C90.3 153.1 89.3 153.2 88.3 152.9C87.4 152.7 86.5 152.2 85.8 151.5C85.1 150.8 84.7 149.9 84.5 149C84.3 148.1 84.4 147.1 84.7 146.2L89.4 134.2C90.3 133.1 91.2 132.1 92.1 131C92.3 130.8 96.3 125.8 97.8 124L107.2 140.1C108.3 142.1 110 143.6 112.1 144.5C114.2 145.5 116.4 145.7 118.6 145.3L145 140.6L157.7 145.5C158.4 145.8 159.1 145.9 159.9 145.9H160C160.8 145.9 161.6 145.7 162.3 145.4C163 145.1 163.7 144.6 164.2 144.1C164.7 143.5 165.2 142.9 165.5 142.1L168.2 135C169.8 134.8 171.2 134.7 172.3 134.7C181.4 134.2 182.5 133.5 182.8 132.8C183 132.4 183 132 182.8 131.6C182.2 130.2 179.4 129.3 175 127.9ZM85.6 103.5C82.3 97.1002 80.4 92.3002 79.9 88.7002C79.6 86.3002 79.9 83.9002 80.7 81.7002L80.8 81.5002C80.9 81.2002 80.8 81.0002 80.5 80.8002C80.2 80.6002 80 80.8002 79.8 81.1002C79.8 81.2002 79.8 81.2002 79.7 81.3002L77 88.1002C70.7 87.5002 64.7 85.8002 59.1 82.9002L50.5 56.3002C50.5 56.1002 51 55.7002 52 55.2002C52.9 54.7002 54.3 54.1002 56.2 53.5002C60.2 52.3002 62.3 52.3002 62.6 52.6002L68 69.6002C68 69.8002 68.2 69.9002 68.3 69.9002C74.2 71.9002 79 72.9002 82.8 73.1002C89 75.1002 95.9 75.1002 103.9 73.1002C106.3 73.3002 109.3 73.3002 112.9 73.2002C115 73.1002 117.3 73.0002 119.8 72.9002C126.9 72.5002 135.4 71.6002 144.8 70.5002C144.7 70.6002 144.6 70.8002 144.6 71.0002C143.2 74.0002 143.7 80.6002 145.6 83.5002C145.6 83.5002 145.6 83.6002 145.7 83.6002C145.9 83.9002 146.1 84.1002 146.3 84.3002C134.2 87.0002 121.7 88.4002 109.3 88.3002L106.2 83.7002C106.1 83.5002 105.9 83.5002 105.7 83.5002C105.5 83.5002 105.4 83.6002 105.3 83.8002C104.7 85.3002 104.2 87.0002 103.9 88.6002C103.5 90.5002 103 92.5002 102.6 94.7002C102.4 95.8002 102.1 97.0002 101.9 98.1002C97.7 102.4 89.4 105.7 85.6 103.5ZM55.8 52.0002C55.2 51.3002 54.9 50.0002 55.1 48.9002C55.2 48.2002 55.4 47.3002 56.2 46.7002C56.3 46.6002 56.4 46.5002 56.4 46.3002C56.4 45.9002 56.5 45.4002 56.5 44.8002C56.5 44.8002 56.5 44.8002 56.5 44.7002C56.7 43.0002 56.9 41.0002 57.3 40.2002C57.6 41.0002 57.9 42.9002 58.1 43.9002C58.1 44.0002 58.1 44.1002 58.2 44.2002C58.3 44.7002 58.4 45.1002 58.4 45.5002C58.7 46.7002 59.3 49.3002 59.9 51.5002C58.7 51.7002 57.2 52.0002 55.8 52.5002C56 52.4002 56 52.2002 55.8 52.0002ZM87.9 56.6002L88.5 55.1002C89.3 53.6002 90.3 52.8002 91.4 52.9002C92.5 53.1002 93.5 54.5002 93.8 56.5002C93.9 56.9002 94 57.2002 94.3 57.3002C94.8 57.5002 95.3 57.2002 95.8 56.8002C96 56.7002 96.3 56.5002 96.6 56.7002C96.8 56.8002 97 57.2002 96.9 57.5002C96.8 58.0002 96.4 58.5002 95.7 58.7002C95.5 58.8002 95.4 58.9002 95.4 59.1002C95.1 61.0002 94.9 63.0002 94.8 65.0002C94.7 69.6002 96.1 71.0002 97.5 71.8002C98.6 72.3002 99.7 72.6002 100.8 72.8002C95.5 73.8002 90.8 73.9002 86.4 73.0002C87.8 72.8002 89 72.5002 89.9 72.0002C90.6 71.6002 91 69.9002 91.1 68.8002C91.1 68.8002 91.1 68.8002 91.1 68.7002C91.1 68.6002 91.1 68.5002 91.1 68.4002L92.8 66.5002C93 66.3002 93 66.1002 92.8 65.9002C92.7 65.7002 92.4 65.6002 92.2 65.7002C91.5 66.0002 90.8 66.2002 90.1 66.4002C89 66.6002 88.2 66.3002 87.7 65.6002C86.4 63.8002 86.8 59.6002 87.9 56.6002ZM89.4 71.1002C87.9 71.9002 85.8 72.3002 82.9 72.2002H82.8C84.8 70.5002 87.3 69.5002 90 69.3002C89.9 70.1002 89.6 70.9002 89.4 71.1002ZM149.3 71.8002H149.5C150.3 71.7002 151.1 71.4002 151.8 71.0002C152.5 70.5002 153.1 69.9002 153.2 69.2002C153.3 68.7002 153.4 68.1002 153.4 67.5002C153.5 67.0002 153.6 66.4002 153.7 65.9002C153.8 65.4002 153.9 65.0002 154.1 64.8002C154.2 64.5002 154.3 64.6002 154.3 64.6002C154.5 64.6002 154.7 64.8002 154.9 65.2002C155.1 65.6002 155.2 66.2002 155.3 66.9002C155.4 67.6002 155.5 68.3002 155.6 68.9002C155.7 69.5002 155.9 70.2002 156.2 70.6002C156.4 70.9002 156.7 70.9002 157 71.0002C157.3 71.0002 157.6 71.0002 157.9 70.9002C158.4 70.8002 159 70.6002 159.5 70.4002C161.2 69.7002 163 68.9002 164.7 68.1002C165.5 67.7002 166.1 67.5002 166.6 67.5002C166.7 67.5002 166.9 67.5002 167 67.5002C166.9 67.6002 166.9 67.7002 166.8 67.8002C166.6 68.1002 166.1 68.5002 165.5 68.9002C164.3 69.7002 163.1 70.6002 162.1 71.6002C161.7 71.7002 161.4 71.8002 161.1 71.9002C160.9 71.5002 160.8 71.2002 160.6 70.8002C160.5 70.6002 160.2 70.5002 159.9 70.6002C159.7 70.7002 159.6 71.0002 159.7 71.3002C160.7 73.3002 161.1 75.5002 160.9 77.7002C160.9 77.8002 160.9 77.8002 160.9 77.9002C160.9 78.2002 160.8 78.4002 160.8 78.7002C160.7 79.0002 160.9 79.2002 161.2 79.3002H161.3C161.5 79.3002 161.7 79.1002 161.8 78.9002C161.8 78.7002 161.9 78.6002 161.9 78.4002C162.2 78.5002 162.5 78.5002 162.7 78.6002C162.7 78.6002 162.7 78.6002 162.8 78.6002C164.3 78.9002 165.8 79.1002 167.4 79.0002C168.6 79.0002 169.2 79.1002 169.5 79.2002C169.2 79.4002 168.6 79.6002 167.6 79.8002C166.8 80.0002 166 80.1002 165.3 80.2002C163.5 80.5002 162.1 80.7002 160.7 80.9002C156.9 81.5002 154 82.0002 146.6 82.7002C145.2 80.2002 144.6 75.0002 145.5 72.1002C146.2 72.0002 146.8 72.0002 147.5 71.9002L148.9 71.8002C149 71.9002 149.1 71.9002 149.2 71.9002C149.3 71.9002 149.4 71.9002 149.4 71.8002L149.5 71.7002L149.3 71.8002ZM103.1 96.6002C104.1 96.8002 105.1 97.2002 105.8 97.9002C106.3 98.4002 106.8 99.0002 107.1 99.7002C105.8 98.9002 104.3 98.3002 102.9 97.8002C103 97.4002 103.1 97.0002 103.1 96.6002ZM102.6 98.9002C102.6 98.8002 102.6 98.8002 102.6 98.9002C106 99.9002 109 101.8 111.4 104.3C113.9 107 115.6 110.3 116.4 113.8C116.8 115.8 119.5 127.5 119.5 127.5C119.6 127.8 119.8 127.9 120.1 127.9L147.1 123.9C147.2 123.9 147.4 124 147.6 124.2C148.5 125.3 149.4 128.1 149.9 130.9L118.1 135.1C117.4 135.2 116.6 135 116 134.6C115.4 134.2 114.9 133.6 114.6 132.9C112.9 127.9 110 118.8 109.5 114.4C108.7 107.4 101.5 103.1 99 101.8C100.3 100.9 101.6 99.9002 102.6 98.9002ZM151 131.3C150.5 128.1 149.5 125 148.4 123.6L154 122.8C154.3 122.7 154.7 123 155.1 123.4C157.1 125.8 158.6 133.8 157.5 136.7C157.3 137.2 157 137.5 156.7 137.6L151.1 138.6C151.6 137.1 151.5 134.2 151 131.3ZM169.8 77.8002L182.3 82.6002C183.2 83.0002 184 83.6002 184.6 84.4002C185.2 85.2002 185.5 86.2002 185.5 87.2002C185.5 87.9002 185.4 88.5002 185.2 89.1002L170.7 126.5C169 125.9 167.4 125.2 166.3 124.4C165.1 123.5 163.8 122.9 162.3 122.5C160.7 122.1 159.1 122.6 157.2 123.1C156.9 123.2 156.7 123.2 156.4 123.3C156.3 123.1 156.1 122.9 156 122.7C155.2 121.7 154.4 121.6 154 121.7L120.5 126.7C120 124.5 117.9 115.3 117.5 113.5C116.7 109.8 114.9 106.3 112.3 103.5C111.2 102.3 110 101.3 108.7 100.4C108.4 99.1002 107.8 97.9002 106.8 97.1002C105.9 96.3002 104.8 95.8002 103.6 95.6002C103.6 95.4002 103.7 95.2002 103.7 95.0002C104.1 93.0002 104.5 91.1002 104.9 89.3002C106.3 89.3002 107.7 89.4002 109.1 89.4002C109.2 89.4002 109.2 89.4002 109.3 89.4002H109.4C122.5 89.5002 135.6 88.0002 148.3 85.0002C149 84.9002 149.6 84.4002 150.1 83.5002C155.1 83.0002 157.8 82.6002 160.8 82.1002C162.2 81.9002 163.6 81.6002 165.4 81.4002C166.2 81.3002 167 81.1002 167.8 81.0002C170.6 80.4002 170.8 79.7002 170.8 79.3002C170.7 78.8002 170.3 78.3002 167.4 78.3002C166.8 78.3002 166.1 78.3002 165.5 78.2002C166.3 78.0002 167.3 77.7002 168.6 77.2002C168.7 77.2002 168.7 77.2002 168.8 77.1002C168.9 77.3002 169.3 77.6002 169.8 77.8002ZM170 75.2002C169.7 75.4002 169.1 75.8002 168 76.1002C166.4 76.6002 163.3 77.6002 162.7 77.7002C162.4 77.6002 162.1 77.6002 161.8 77.5002C161.9 76.8002 161.9 76.1002 161.8 75.5002C162.3 75.6002 162.7 75.6002 163.2 75.6002C163.2 75.6002 163.2 75.6002 163.3 75.6002C163.3 75.6002 163.3 75.6002 163.4 75.6002C164.9 75.7002 166.4 75.6002 167.8 75.3002C169.1 75.1002 169.7 75.1002 170 75.2002ZM166.4 74.5002C166.2 74.5002 165.9 74.6002 165.7 74.6002C165.9 74.5002 166.1 74.4002 166.3 74.3002C166.4 74.3002 166.4 74.4002 166.4 74.5002ZM168.7 70.9002C170 70.5002 170.7 70.5002 171 70.5002C170.9 70.7002 170.4 71.1002 169.4 71.7002C167 73.0002 163.9 74.3002 163.2 74.6002C162.7 74.6002 162.2 74.5002 161.7 74.5002C161.6 74.0002 161.5 73.5002 161.4 73.0002C163 72.5002 168.3 71.0002 168.7 70.9002ZM163.5 71.3002C164.2 70.7002 164.9 70.1002 165.7 69.7002C166.2 69.4002 166.7 69.0002 167 68.7002C166.6 69.3002 166.3 69.9002 166.1 70.6002C165.4 70.7002 164.5 71.0002 163.5 71.3002ZM125.1 60.4002L143.8 67.6002C144.9 68.0002 146.1 68.1002 147.2 67.9002C148.3 67.7002 149.4 67.1002 150.2 66.3002C151 65.5002 151.6 64.5002 151.9 63.3002C152.2 62.2002 152.1 61.0002 151.7 59.9002C150.9 57.7002 150.8 55.3002 151.4 53.0002C152 50.7002 153.1 48.7002 154.8 47.0002C156.5 45.4002 158.6 44.3002 160.9 43.8002C163.2 43.3002 165.6 43.6002 167.8 44.4002C170 45.3002 171.9 46.7002 173.3 48.6002C174.3 50.0002 175 51.6002 175.4 53.3002C175.8 55.0002 175.7 56.8002 175.4 58.5002C175 60.2002 174.3 61.8002 173.2 63.2002C172.1 64.6002 170.8 65.7002 169.3 66.6002C168.7 66.9002 168.1 67.4002 167.7 67.9002C167.7 67.8002 167.8 67.7002 167.8 67.7002C167.9 67.5002 167.9 67.3002 167.8 67.1002C167.7 66.9002 167.5 66.8002 167.3 66.7002C167.1 66.7002 166.8 66.6002 166.6 66.7002C166.1 66.8002 165.4 67.0002 164.5 67.4002C164.1 67.6002 160.4 69.2002 159.3 69.6002C158.8 69.8002 158.3 69.9002 157.9 70.0002C157.7 70.0002 157.4 70.1002 157.2 70.1002C157 70.1002 157 70.0002 157 70.0002C156.8 69.7002 156.6 69.2002 156.5 68.6002C156.4 68.0002 156.3 67.3002 156.2 66.6002C156.1 65.9002 156 65.3002 155.8 64.7002C155.6 64.2002 155.3 63.7002 154.7 63.6002C154.2 63.5002 153.9 63.9002 153.7 64.2002C153.5 64.5002 153.4 65.0002 153.3 65.5002C153.2 66.1002 153.1 66.6002 153 67.2002C152.9 67.8002 152.8 68.4002 152.8 68.9002C152.7 69.4002 152.3 69.8002 151.7 70.3002C151.1 70.7002 150.4 71.0002 149.8 71.0002H149.5C148.8 69.8002 147.9 69.2002 147 69.2002C146.9 69.2002 146.9 69.2002 146.8 69.2002C137.1 70.5002 128.3 71.3002 120.9 71.8002L125.1 60.4002ZM118.4 57.3002L112.5 72.3002C109.1 72.4002 106.2 72.3002 103.9 72.1002C101.8 72.1002 99.8 71.6002 98 70.8002C96.9 70.2002 95.8 69.1002 95.8 65.3002C97.1 64.9002 101.2 63.3002 102.1 60.2002C102.6 58.6002 102.1 56.9002 100.8 55.1002C101.3 55.2002 101.8 55.3002 102.3 55.3002C104 55.3002 105.7 54.6002 107.1 53.2002C107.2 53.1002 107.3 53.0002 107.4 52.9002L118.4 57.3002ZM97 49.0002C97 49.3002 96.9 49.5002 96.9 49.8002C96.9 50.4002 97 51.0002 97.1 51.6002C95.6 50.5002 94.1 50.0002 92.7 50.2002C90.7 50.4002 89 52.0002 87.6 54.7002L86.9 56.3002C85.7 59.7002 85.4 64.2002 87.1 66.3002C87.8 67.2002 88.8 67.5002 90 67.5002C90.1 67.8002 90.2 68.1002 90.2 68.3002C86.9 68.4002 83.8 69.8002 81.4 72.1002C78 71.8002 73.7 70.8002 68.8 69.1002L63.5 52.3002C63.4 52.0002 63.2 51.7002 62.5 51.6002C62.1 51.5002 61.5 51.5002 60.8 51.6002C60.2 49.3002 59.5 46.7002 59.3 45.5002C59.3 45.3002 59.2 45.0002 59.2 44.7002L66.9 43.0002C67.7 42.8002 68.3 42.4002 68.7 41.7002C69.1 41.0002 69.3 40.3002 69.1 39.5002L68.9 38.0002L97 49.0002ZM42.4 47.2002C41.9 47.3002 41.4 47.2002 41 46.9002C40.6 46.6002 40.3 46.2002 40.2 45.7002L34.6 19.7002L42.3 18.0002C42.7 17.9002 43 18.0002 43.4 18.1002C43.7 18.2002 44 18.5002 44.3 18.8002C44.5 19.1002 44.7 19.5002 44.7 19.8002C44.7 20.2002 44.6 20.5002 44.5 20.9002C44 21.9002 43.7 23.1002 43.8 24.2002C43.9 25.4002 44.3 26.5002 45 27.4002C45.7 28.3002 46.6 29.0002 47.7 29.4002C48.8 29.8002 50 29.9002 51.1 29.6002C52.2 29.4002 53.3 28.8002 54.1 28.0002C54.9 27.2002 55.5 26.2002 55.8 25.0002C56.1 23.9002 56 22.7002 55.6 21.6002C55.2 20.5002 54.5 19.5002 53.6 18.8002C53.3 18.6002 53.1 18.3002 53 17.9002C52.9 17.5002 52.8 17.2002 52.9 16.8002C53 16.4002 53.2 16.1002 53.4 15.8002C53.7 15.5002 54 15.4002 54.3 15.3002L62.6 13.5002L68.2 39.5002C68.3 40.0002 68.2 40.5002 67.9 40.9002C67.6 41.3002 67.2 41.6002 66.7 41.7002L59.1 43.3002C58.6 40.3002 58.3 39.0002 57.5 38.8002C57.3 38.8002 57 38.7002 56.7 39.2002C56.1 40.0002 55.7 42.4002 55.6 44.1002L42.4 47.2002ZM55.5 45.4002C55.5 45.7002 55.5 45.9002 55.5 46.1002C54.8 46.7002 54.3 47.7002 54.2 48.8002C54 50.2002 54.4 51.7002 55.2 52.7002C55.3 52.8002 55.3 52.8002 55.4 52.9002C54.2 53.3002 53.1 53.7002 52.2 54.2002C51.2 51.8002 50.5 49.3002 50 46.8002L55.5 45.4002ZM36.5 97.0002C35.3 96.5002 34.3 95.6002 33.7 94.3002C33.2 93.1002 33.1 91.7002 33.6 90.5002L39.1 76.2002C39.5 75.1002 39.6 73.9002 39.3 72.8002C39.1 71.7002 38.5 70.6002 37.7 69.8002C36.9 69.0002 35.9 68.4002 34.8 68.1002C33.7 67.8002 32.5 67.9002 31.4 68.2002C29.2 68.9002 26.8 69.0002 24.5 68.5002C22.2 67.9002 20.2 66.8002 18.6 65.1002C17 63.4002 15.9 61.3002 15.4 59.0002C14.9 56.7002 15.2 54.3002 16 52.2002C16.8 50.0002 18.3 48.1002 20.2 46.8002C22.1 45.4002 24.3 44.6002 26.6 44.5002C28.9 44.4002 31.2 44.9002 33.3 46.0002C35.3 47.1002 37 48.8002 38.1 50.9002C39.2 53.0002 41.5 54.2002 44 54.1002C46.4 53.9002 48.3 52.5002 49.2 50.3002L49.4 49.8002C49.8 51.5002 50.4 53.1002 51 54.7002C50.4 55.0002 50 55.3002 49.7 55.6002C49.3 56.1002 49.2 56.5002 49.3 56.8002L58 83.7002C58 83.8002 58.1 83.9002 58.2 84.0002C64.6 87.3002 71.5 89.1002 78.7 89.5002C79.3 93.1002 81.1 97.9002 84.3 104.1C82 107.2 79.7 110.1 77.6 112.9C77.5 113 77.4 113.1 77.3 113.2L36.5 97.0002ZM9.2 166.9C8 166.4 7 165.5 6.4 164.2C6.1 163.6 6 163 6 162.3C6 161.6 6.1 161 6.3 160.4L26.8 107.6C27 107 27.4 106.4 27.9 105.9C28.4 105.4 28.9 105 29.5 104.8C30.1 104.5 30.8 104.4 31.4 104.4C32 104.4 32.7 104.5 33.3 104.7L72.3 119.9C60.4 135.4 50.1 148.1 33.2 164.4C33.2 164.4 33.1 164.4 33.1 164.5C33 164.6 32.9 164.7 32.8 164.8C31.4 166.1 30 167.5 28.5 168.9C27.5 169.8 27.4 171.2 27.7 172.7C27.3 173 26.9 173.3 26.4 173.7L9.2 166.9ZM39.9 181.3C38.2 182.8 34.7 180.7 32 177.8C29.3 174.9 27.5 171.1 29.2 169.5C30.3 168.4 31.4 167.4 32.5 166.4C32.7 168.4 34.5 171.2 36.5 173.4C37.1 174.1 37.8 174.8 38.5 175.5C38.5 175.5 38.5 175.5 38.6 175.5C40.2 177 41.8 178 43.2 178.3L39.9 181.3ZM83.8 145.9C83.4 147 83.3 148.2 83.6 149.3C83.8 150.4 84.4 151.5 85.2 152.3C86 153.1 87 153.7 88.2 154C89.3 154.3 90.5 154.2 91.6 153.8C93.8 153 96.2 152.9 98.5 153.5C100.8 154.1 102.8 155.2 104.5 156.9C106.2 158.6 107.2 160.7 107.7 163C108.2 165.3 107.9 167.7 107.1 169.9C106.2 172.1 104.8 174 102.9 175.4C101 176.8 98.8 177.6 96.4 177.7C94.1 177.8 91.7 177.3 89.7 176.2C87.6 175.1 86 173.4 84.8 171.3C84.2 170.3 83.4 169.4 82.4 168.9C81.4 168.3 80.2 168.1 79.1 168.1C77.9 168.2 76.8 168.6 75.9 169.2C75 169.8 74.2 170.8 73.8 171.9L67 189.3L43 180L45 178.2C45.1 178.2 45.1 178.1 45.2 178.1L45.3 178L47.5 176C63.7 161.4 75.1 150.8 87.6 136.5L83.8 145.9ZM91.4 130.3C77 147.6 64.9 158.8 46.7 175.2L44.3 177.3C43.5 177.8 41.7 176.9 39.6 175.1C58.4 157.4 76.6 138.6 93.5 119.1L95.4 125.3C93.6 127.6 91.4 130.3 91.4 130.3ZM118.5 144.5C116.5 144.9 114.4 144.6 112.5 143.7C110.6 142.8 109.1 141.4 108.1 139.7L98.3 122.9L92.8 113.5C92.7 113.3 92.4 113.2 92.2 113.3C92 113.4 91.8 113.7 91.9 113.9L93.2 118.1C76.1 137.7 57.9 156.7 38.9 174.5C38.4 174 37.8 173.4 37.3 172.8C34.6 169.6 33.1 166.5 33.7 165.4C53.4 146.5 64.2 132.3 78.7 113.2C80.8 110.4 83 107.5 85.3 104.5C86.2 104.9 87.3 105.2 88.5 105.2C91.4 105.2 94.8 104.1 97.8 102.4C99.2 103.1 107.5 107.4 108.3 114.5C108.8 119 111.7 128.2 113.4 133.2C113.7 134.1 114.3 134.9 115.2 135.5C115.9 135.9 116.7 136.1 117.5 136.1C117.7 136.1 117.9 136.1 118.1 136.1L150 131.9C150.4 134.6 150.5 137.2 150.1 138.4C150 138.7 149.9 138.8 149.8 138.9L118.5 144.5ZM164.6 141.9C164.4 142.5 164 143.1 163.5 143.6C163 144.1 162.5 144.5 161.9 144.7C161.3 145 160.7 145.1 160 145.1C159.3 145.1 158.7 145 158.1 144.8L146.9 140.5L149.9 140H150C150 140 150 140 150.1 140L156.9 138.8C157.4 138.7 158 138.4 158.4 137.3C158.5 137.1 158.5 136.8 158.6 136.6C161.7 136.2 164.6 135.8 167.2 135.5L164.6 141.9Z"
        fill="currentColor"
      />
      <path
        d="M116.2 21.0002C117.2 21.7002 118.3 22.1002 119.5 22.1002C119.6 22.1002 119.7 22.1002 119.8 22.1002C120.1 22.1002 120.3 22.1002 120.6 22.0002L121.2 25.1002C121.1 25.2002 121 25.3002 120.9 25.4002C120.7 25.7002 120.7 26.0002 120.7 26.3002L122.3 34.2002C122.4 34.5002 122.6 34.7002 122.8 34.9002C123 35.0002 123.2 35.1002 123.4 35.1002C123.6 35.1002 123.8 35.0002 124 34.9002C124.2 34.8002 124.3 34.6002 124.4 34.4002C124.5 34.2002 124.5 34.0002 124.5 33.8002L122.9 25.9002C122.8 25.6002 122.7 25.3002 122.4 25.2002C122.3 25.1002 122.2 25.1002 122.1 25.1002L121.5 22.0002C122 21.9002 122.4 21.7002 122.9 21.4002C123.9 20.8002 124.8 19.9002 125.3 18.9002C125.9 17.8002 126.1 16.7002 126 15.5002C125.9 14.3002 125.5 13.2002 124.8 12.2002C124.1 11.2002 123.1 10.5002 122 10.1002C120.9 9.7002 119.7 9.6002 118.5 9.8002C117.6 10.0002 116.7 10.4002 116 10.9002C115.3 11.5002 114.6 12.2002 114.2 13.0002C113.8 13.8002 113.5 14.7002 113.5 15.7002C113.5 16.6002 113.6 17.6002 114 18.4002C114.4 19.4002 115.2 20.3002 116.2 21.0002ZM115.1 13.4002C115.5 12.7002 116 12.1002 116.6 11.6002C117.2 11.1002 118 10.8002 118.7 10.6002C119.7 10.4002 120.7 10.5002 121.6 10.8002C122.5 11.2002 123.4 11.8002 124 12.6002C124.6 13.4002 125 14.4002 125 15.4002C125.1 16.4002 124.9 17.4002 124.4 18.3002C123.9 19.2002 123.2 19.9002 122.4 20.4002C121.5 20.9002 120.5 21.1002 119.5 21.1002C118.5 21.1002 117.5 20.7002 116.7 20.2002C115.9 19.6002 115.2 18.8002 114.8 17.9002C114.5 17.2002 114.4 16.4002 114.4 15.6002C114.5 14.8002 114.7 14.0002 115.1 13.4002Z"
        fill="currentColor"
      />
      <path
        d="M194.7 117.6L192.5 117C192.1 116.9 191.7 116.6 191.5 116.2C191.3 115.8 191.2 115.4 191.4 114.9L192 112.7C192.1 112.4 191.9 112.2 191.7 112.1C191.4 112 191.2 112.2 191.1 112.4L190.5 114.6C190.4 115 190.1 115.4 189.7 115.6C189.3 115.8 188.9 115.9 188.4 115.7L186.2 115C185.9 114.9 185.7 115.1 185.6 115.3C185.5 115.6 185.7 115.8 185.9 115.9L188.1 116.6C188.5 116.7 188.9 117 189.1 117.4C189.3 117.8 189.4 118.2 189.2 118.7L188.5 120.9C188.4 121.2 188.6 121.4 188.8 121.5H188.9C189.1 121.5 189.3 121.4 189.4 121.1L190.1 118.9C190.2 118.5 190.5 118.1 190.9 117.9C191.3 117.7 191.7 117.6 192.2 117.8L194.4 118.4H194.5C194.7 118.4 194.9 118.3 195 118C195.1 118 194.9 117.7 194.7 117.6ZM190.4 117.2C190.3 117.3 190.1 117.4 190 117.4C190 117.3 189.9 117.1 189.8 117C189.7 116.9 189.6 116.8 189.6 116.6C189.7 116.6 189.9 116.5 190 116.4C190.1 116.3 190.2 116.2 190.4 116.2C190.4 116.3 190.5 116.5 190.6 116.6C190.7 116.7 190.8 116.8 190.8 117C190.7 117.1 190.6 117.1 190.4 117.2Z"
        fill="currentColor"
      />
      <path
        d="M141.3 180.5L132.6 177.1L136 168.4C136.1 168.1 136 167.9 135.7 167.8C135.4 167.7 135.2 167.8 135.1 168.1L131.7 176.8L123 173.4C122.7 173.3 122.5 173.4 122.4 173.7C122.3 174 122.4 174.2 122.7 174.3L131.4 177.7L128 186.4C127.9 186.7 128 186.9 128.3 187C128.4 187 128.4 187 128.5 187C128.7 187 128.9 186.9 129 186.7L132.4 178L141.1 181.4C141.2 181.4 141.2 181.4 141.3 181.4C141.5 181.4 141.7 181.3 141.8 181.1C141.7 180.9 141.5 180.6 141.3 180.5Z"
        fill="currentColor"
      />
      <path
        d="M7.2 97.3002C7.5 97.4002 7.7 97.2002 7.8 96.9002C7.9 96.5002 8 96.1002 8.3 95.8002C8.5 95.5002 8.8 95.2002 9.2 95.0002C9.5 94.8002 9.9 94.7002 10.3 94.7002C10.7 94.7002 11.1 94.7002 11.4 94.9002C12.4 95.3002 13 96.0002 13.1 97.0002C13.3 98.4002 12.3 99.9002 10.4 101.1C8.5 102.4 7.6 103.1 7.2 104.4C7.1 104.7 7.2 104.9 7.5 105C7.6 105 7.6 105 7.7 105C7.9 105 8.1 104.9 8.2 104.7C8.5 103.8 9.1 103.2 11 101.9C14 99.9002 14.3 97.8002 14.1 96.8002C14 95.5002 13.1 94.4002 11.8 93.9002C11.3 93.7002 10.8 93.6002 10.2 93.7002C9.7 93.7002 9.1 93.9002 8.7 94.2002C8.2 94.5002 7.8 94.8002 7.5 95.3002C7.2 95.7002 7 96.2002 6.9 96.8002C6.7 97.0002 6.9 97.2002 7.2 97.3002Z"
        fill="currentColor"
      />
    </svg>
  </SvgIcon>
)

export default BringSolutionsImage
