/**
 * title: "翻页"
 * description: "设置showJunp为false，不显示跳转页码输入框。"
 */
import React from 'react';
import { Pagination } from '@alicloud/console-components';

const handlePageSizeChange = (size: number) => {
  console.log(size);
};

export default function App() {
  return (
    <Pagination
      defaultCurrent={2}
      onChange={handlePageSizeChange}
      showJump={false}
    />
  );
}


