import React from 'react'

import { Props } from './props.type.js'

export const Beware: React.FC<Props> = ({ width = 152, height = 152 }) => (
  <svg width={width} height={height} viewBox="0 0 152 152" fill="none" xmlns="http://www.w3.org/2000/svg">
    <circle cx="76" cy="76" r="76" fill="white" />
    <circle cx="93.3162" cy="59.0974" r="16.2556" fill="#3040D6" />
    <path fillRule="evenodd" clipRule="evenodd" d="M72.5449 33.9231C74.0884 31.277 77.9116 31.277 79.4551 33.9231L119.491 102.556C121.047 105.223 119.123 108.571 116.036 108.571H35.9641C32.877 108.571 30.9535 105.223 32.509 102.556L72.5449 33.9231Z" fill="white" stroke="#3B3552" strokeWidth="1.5" />
    <path d="M42.2156 73.4053L41.8377 74.0531L42.4855 74.431L42.8634 73.7832L42.2156 73.4053ZM51.6085 57.3032L52.2563 57.6811L52.6342 57.0332L51.9864 56.6553L51.6085 57.3032ZM40.9199 72.6494L40.2721 72.2715L39.8942 72.9194L40.542 73.2973L40.9199 72.6494ZM50.3128 56.5474L50.6907 55.8995L50.0429 55.5216L49.665 56.1695L50.3128 56.5474ZM55.6883 50.3091L55.3104 50.957L55.9582 51.3349L56.3362 50.6871L55.6883 50.3091ZM60.1696 42.6269L60.8175 43.0048L61.1954 42.357L60.5475 41.9791L60.1696 42.6269ZM54.3926 49.5533L53.7448 49.1754L53.3669 49.8233L54.0147 50.2012L54.3926 49.5533ZM58.874 41.8711L59.2519 41.2233L58.604 40.8454L58.2261 41.4932L58.874 41.8711ZM42.8634 73.7832L52.2563 57.6811L50.9606 56.9253L41.5678 73.0274L42.8634 73.7832ZM40.542 73.2973L41.8377 74.0531L42.5935 72.7574L41.2978 72.0016L40.542 73.2973ZM49.665 56.1695L40.2721 72.2715L41.5678 73.0274L50.9606 56.9253L49.665 56.1695ZM51.9864 56.6553L50.6907 55.8995L49.9349 57.1952L51.2306 57.951L51.9864 56.6553ZM56.3362 50.6871L60.8175 43.0048L59.5218 42.249L55.0405 49.9312L56.3362 50.6871ZM54.0147 50.2012L55.3104 50.957L56.0662 49.6613L54.7706 48.9055L54.0147 50.2012ZM58.2261 41.4932L53.7448 49.1754L55.0405 49.9312L59.5218 42.249L58.2261 41.4932ZM60.5475 41.9791L59.2519 41.2233L58.4961 42.5189L59.7917 43.2747L60.5475 41.9791Z" fill="#3B3552" />
    <path d="M94.9824 80.8867L94.6045 80.2388L93.9567 80.6167L94.3346 81.2646L94.9824 80.8867ZM97.6411 85.4445L96.9933 85.8224L97.3712 86.4702L98.019 86.0923L97.6411 85.4445ZM96.2781 80.1309L96.9259 79.753L96.548 79.1051L95.9002 79.483L96.2781 80.1309ZM98.9368 84.6886L99.3147 85.3365L99.9625 84.9586L99.5846 84.3107L98.9368 84.6886ZM99.4615 88.5651L99.0836 87.9172L98.4358 88.2951L98.8137 88.943L99.4615 88.5651ZM101.602 92.2339L100.954 92.6118H100.954L101.602 92.2339ZM100.757 87.8093L101.405 87.4314L101.027 86.7835L100.379 87.1614L100.757 87.8093ZM102.897 91.4781L102.249 91.856L102.897 91.4781ZM105.894 96.6145L105.246 96.9924L105.894 96.6145ZM104.904 100.376L104.526 99.7277L104.526 99.7277L104.904 100.376ZM99.4257 100.75H98.6757V101.5H99.4257V100.75ZM99.4257 99.2502V98.5002H98.6757V99.2502H99.4257ZM104.148 99.0799L104.526 99.7277H104.526L104.148 99.0799ZM104.598 97.3703L105.246 96.9924L104.598 97.3703ZM94.3346 81.2646L96.9933 85.8224L98.289 85.0665L95.6303 80.5088L94.3346 81.2646ZM95.9002 79.483L94.6045 80.2388L95.3603 81.5345L96.656 80.7787L95.9002 79.483ZM99.5846 84.3107L96.9259 79.753L95.6303 80.5088L98.289 85.0665L99.5846 84.3107ZM98.019 86.0923L99.3147 85.3365L98.5589 84.0408L97.2632 84.7966L98.019 86.0923ZM98.8137 88.943L100.954 92.6118L102.249 91.856L100.109 88.1872L98.8137 88.943ZM100.379 87.1614L99.0836 87.9172L99.8394 89.2129L101.135 88.4571L100.379 87.1614ZM103.545 91.1002L101.405 87.4314L100.109 88.1872L102.249 91.856L103.545 91.1002ZM106.541 96.2366L103.545 91.1002L102.249 91.856L105.246 96.9924L106.541 96.2366ZM105.282 101.023C106.951 100.049 107.515 97.9063 106.541 96.2366L105.246 96.9924C105.802 97.9465 105.48 99.1712 104.526 99.7277L105.282 101.023ZM103.518 101.5C104.138 101.5 104.746 101.336 105.282 101.023L104.526 99.7277C104.22 99.9061 103.872 100 103.518 100V101.5ZM103.508 101.5H103.518V100H103.508V101.5ZM103.497 101.5H103.508V100H103.497V101.5ZM103.486 101.5H103.497V100H103.486V101.5ZM103.476 101.5H103.486V100H103.476V101.5ZM103.465 101.5H103.476V100H103.465V101.5ZM103.454 101.5H103.465V100H103.454V101.5ZM103.444 101.5H103.454V100H103.444V101.5ZM103.433 101.5H103.444V100H103.433V101.5ZM103.423 101.5H103.433V100H103.423V101.5ZM103.412 101.5H103.423V100H103.412V101.5ZM103.402 101.5H103.412V100H103.402V101.5ZM103.391 101.5H103.402V100H103.391V101.5ZM103.38 101.5H103.391V100H103.38V101.5ZM103.37 101.5H103.38V100H103.37V101.5ZM103.359 101.5H103.37V100H103.359V101.5ZM103.349 101.5H103.359V100H103.349V101.5ZM103.338 101.5H103.349V100H103.338V101.5ZM103.328 101.5H103.338V100H103.328V101.5ZM103.318 101.5H103.328V100H103.318V101.5ZM103.307 101.5H103.318V100H103.307V101.5ZM103.297 101.5H103.307V100H103.297V101.5ZM103.286 101.5H103.297V100H103.286V101.5ZM103.276 101.5H103.286V100H103.276V101.5ZM103.265 101.5H103.276V100H103.265V101.5ZM103.255 101.5H103.265V100H103.255V101.5ZM103.245 101.5H103.255V100H103.245V101.5ZM103.234 101.5H103.245V100H103.234V101.5ZM103.224 101.5H103.234V100H103.224V101.5ZM103.213 101.5H103.224V100H103.213V101.5ZM103.203 101.5H103.213V100H103.203V101.5ZM103.193 101.5H103.203V100H103.193V101.5ZM103.182 101.5H103.193V100H103.182V101.5ZM103.172 101.5H103.182V100H103.172V101.5ZM103.162 101.5H103.172V100H103.162V101.5ZM103.152 101.5H103.162V100H103.152V101.5ZM103.141 101.5H103.152V100H103.141V101.5ZM103.131 101.5H103.141V100H103.131V101.5ZM103.121 101.5H103.131V100H103.121V101.5ZM103.11 101.5H103.121V100H103.11V101.5ZM103.1 101.5H103.11V100H103.1V101.5ZM103.09 101.5H103.1V100H103.09V101.5ZM103.08 101.5H103.09V100H103.08V101.5ZM103.07 101.5H103.08V100H103.07V101.5ZM103.059 101.5H103.07V100H103.059V101.5ZM103.049 101.5H103.059V100H103.049V101.5ZM103.039 101.5H103.049V100H103.039V101.5ZM103.029 101.5H103.039V100H103.029V101.5ZM103.019 101.5H103.029V100H103.019V101.5ZM103.008 101.5H103.019V100H103.008V101.5ZM102.998 101.5H103.008V100H102.998V101.5ZM102.988 101.5H102.998V100H102.988V101.5ZM102.978 101.5H102.988V100H102.978V101.5ZM102.968 101.5H102.978V100H102.968V101.5ZM102.958 101.5H102.968V100H102.958V101.5ZM102.948 101.5H102.958V100H102.948V101.5ZM102.938 101.5H102.948V100H102.938V101.5ZM102.928 101.5H102.938V100H102.928V101.5ZM102.918 101.5H102.928V100H102.918V101.5ZM102.907 101.5H102.918V100H102.907V101.5ZM102.897 101.5H102.907V100H102.897V101.5ZM102.887 101.5H102.897V100H102.887V101.5ZM102.877 101.5H102.887V100H102.877V101.5ZM102.867 101.5H102.877V100H102.867V101.5ZM102.857 101.5H102.867V100H102.857V101.5ZM102.847 101.5H102.857V100H102.847V101.5ZM102.837 101.5H102.847V100H102.837V101.5ZM102.827 101.5H102.837V100H102.827V101.5ZM102.818 101.5H102.827V100H102.818V101.5ZM102.808 101.5H102.818V100H102.808V101.5ZM102.798 101.5H102.808V100H102.798V101.5ZM102.788 101.5H102.798V100H102.788V101.5ZM102.778 101.5H102.788V100H102.778V101.5ZM102.768 101.5H102.778V100H102.768V101.5ZM102.758 101.5H102.768V100H102.758V101.5ZM102.748 101.5H102.758V100H102.748V101.5ZM102.738 101.5H102.748V100H102.738V101.5ZM102.728 101.5H102.738V100H102.728V101.5ZM102.719 101.5H102.728V100H102.719V101.5ZM102.709 101.5H102.719V100H102.709V101.5ZM102.699 101.5H102.709V100H102.699V101.5ZM102.689 101.5H102.699V100H102.689V101.5ZM102.679 101.5H102.689V100H102.679V101.5ZM102.669 101.5H102.679V100H102.669V101.5ZM102.66 101.5H102.669V100H102.66V101.5ZM102.65 101.5H102.66V100H102.65V101.5ZM102.64 101.5H102.65V100H102.64V101.5ZM102.63 101.5H102.64V100H102.63V101.5ZM102.621 101.5H102.63V100H102.621V101.5ZM102.611 101.5H102.621V100H102.611V101.5ZM102.601 101.5H102.611V100H102.601V101.5ZM102.591 101.5H102.601V100H102.591V101.5ZM102.582 101.5H102.591V100H102.582V101.5ZM102.572 101.5H102.582V100H102.572V101.5ZM102.562 101.5H102.572V100H102.562V101.5ZM102.553 101.5H102.562V100H102.553V101.5ZM102.543 101.5H102.553V100H102.543V101.5ZM102.533 101.5H102.543V100H102.533V101.5ZM102.524 101.5H102.533V100H102.524V101.5ZM102.514 101.5H102.524V100H102.514V101.5ZM102.504 101.5H102.514V100H102.504V101.5ZM102.495 101.5H102.504V100H102.495V101.5ZM102.485 101.5H102.495V100H102.485V101.5ZM102.476 101.5H102.485V100H102.476V101.5ZM102.466 101.5H102.476V100H102.466V101.5ZM102.457 101.5H102.466V100H102.457V101.5ZM102.447 101.5H102.457V100H102.447V101.5ZM102.437 101.5H102.447V100H102.437V101.5ZM102.428 101.5H102.437V100H102.428V101.5ZM102.418 101.5H102.428V100H102.418V101.5ZM102.409 101.5H102.418V100H102.409V101.5ZM102.399 101.5H102.409V100H102.399V101.5ZM102.39 101.5H102.399V100H102.39V101.5ZM102.38 101.5H102.39V100H102.38V101.5ZM102.371 101.5H102.38V100H102.371V101.5ZM102.361 101.5H102.371V100H102.361V101.5ZM102.352 101.5H102.361V100H102.352V101.5ZM102.342 101.5H102.352V100H102.342V101.5ZM102.333 101.5H102.342V100H102.333V101.5ZM102.324 101.5H102.333V100H102.324V101.5ZM102.314 101.5H102.324V100H102.314V101.5ZM102.305 101.5H102.314V100H102.305V101.5ZM102.295 101.5H102.305V100H102.295V101.5ZM102.286 101.5H102.295V100H102.286V101.5ZM102.277 101.5H102.286V100H102.277V101.5ZM102.267 101.5H102.277V100H102.267V101.5ZM102.258 101.5H102.267V100H102.258V101.5ZM102.249 101.5H102.258V100H102.249V101.5ZM102.239 101.5H102.249V100H102.239V101.5ZM102.23 101.5H102.239V100H102.23V101.5ZM102.221 101.5H102.23V100H102.221V101.5ZM102.211 101.5H102.221V100H102.211V101.5ZM102.202 101.5H102.211V100H102.202V101.5ZM102.193 101.5H102.202V100H102.193V101.5ZM102.184 101.5H102.193V100H102.184V101.5ZM102.174 101.5H102.184V100H102.174V101.5ZM102.165 101.5H102.174V100H102.165V101.5ZM102.156 101.5H102.165V100H102.156V101.5ZM102.147 101.5H102.156V100H102.147V101.5ZM102.137 101.5H102.147V100H102.137V101.5ZM102.128 101.5H102.137V100H102.128V101.5ZM102.119 101.5H102.128V100H102.119V101.5ZM102.11 101.5H102.119V100H102.11V101.5ZM102.101 101.5H102.11V100H102.101V101.5ZM102.091 101.5H102.101V100H102.091V101.5ZM102.082 101.5H102.091V100H102.082V101.5ZM102.073 101.5H102.082V100H102.073V101.5ZM102.064 101.5H102.073V100H102.064V101.5ZM102.055 101.5H102.064V100H102.055V101.5ZM102.046 101.5H102.055V100H102.046V101.5ZM102.037 101.5H102.046V100H102.037V101.5ZM102.028 101.5H102.037V100H102.028V101.5ZM102.018 101.5H102.028V100H102.018V101.5ZM102.009 101.5H102.018V100H102.009V101.5ZM102 101.5H102.009V100H102V101.5ZM101.991 101.5H102V100H101.991V101.5ZM101.982 101.5H101.991V100H101.982V101.5ZM101.973 101.5H101.982V100H101.973V101.5ZM101.964 101.5H101.973V100H101.964V101.5ZM101.955 101.5H101.964V100H101.955V101.5ZM101.946 101.5H101.955V100H101.946V101.5ZM101.937 101.5H101.946V100H101.937V101.5ZM101.928 101.5H101.937V100H101.928V101.5ZM101.919 101.5H101.928V100H101.919V101.5ZM101.91 101.5H101.919V100H101.91V101.5ZM101.901 101.5H101.91V100H101.901V101.5ZM101.892 101.5H101.901V100H101.892V101.5ZM101.884 101.5H101.892V100H101.884V101.5ZM101.875 101.5H101.884V100H101.875V101.5ZM101.866 101.5H101.875V100H101.866V101.5ZM101.857 101.5H101.866V100H101.857V101.5ZM101.848 101.5H101.857V100H101.848V101.5ZM101.839 101.5H101.848V100H101.839V101.5ZM101.83 101.5H101.839V100H101.83V101.5ZM101.821 101.5H101.83V100H101.821V101.5ZM101.812 101.5H101.821V100H101.812V101.5ZM101.804 101.5H101.812V100H101.804V101.5ZM101.795 101.5H101.804V100H101.795V101.5ZM101.786 101.5H101.795V100H101.786V101.5ZM101.777 101.5H101.786V100H101.777V101.5ZM101.768 101.5H101.777V100H101.768V101.5ZM101.76 101.5H101.768V100H101.76V101.5ZM101.751 101.5H101.76V100H101.751V101.5ZM101.742 101.5H101.751V100H101.742V101.5ZM101.733 101.5H101.742V100H101.733V101.5ZM101.725 101.5H101.733V100H101.725V101.5ZM101.716 101.5H101.725V100H101.716V101.5ZM101.707 101.5H101.716V100H101.707V101.5ZM101.698 101.5H101.707V100H101.698V101.5ZM101.69 101.5H101.698V100H101.69V101.5ZM101.681 101.5H101.69V100H101.681V101.5ZM101.672 101.5H101.681V100H101.672V101.5ZM101.664 101.5H101.672V100H101.664V101.5ZM101.655 101.5H101.664V100H101.655V101.5ZM101.646 101.5H101.655V100H101.646V101.5ZM101.638 101.5H101.646V100H101.638V101.5ZM101.629 101.5H101.638V100H101.629V101.5ZM101.621 101.5H101.629V100H101.621V101.5ZM101.612 101.5H101.621V100H101.612V101.5ZM101.603 101.5H101.612V100H101.603V101.5ZM101.595 101.5H101.603V100H101.595V101.5ZM101.586 101.5H101.595V100H101.586V101.5ZM101.578 101.5H101.586V100H101.578V101.5ZM101.569 101.5H101.578V100H101.569V101.5ZM101.561 101.5H101.569V100H101.561V101.5ZM101.552 101.5H101.561V100H101.552V101.5ZM101.544 101.5H101.552V100H101.544V101.5ZM101.535 101.5H101.544V100H101.535V101.5ZM101.527 101.5H101.535V100H101.527V101.5ZM101.518 101.5H101.527V100H101.518V101.5ZM101.51 101.5H101.518V100H101.51V101.5ZM101.501 101.5H101.51V100H101.501V101.5ZM101.493 101.5H101.501V100H101.493V101.5ZM101.484 101.5H101.493V100H101.484V101.5ZM101.476 101.5H101.484V100H101.476V101.5ZM101.467 101.5H101.476V100H101.467V101.5ZM101.459 101.5H101.467V100H101.459V101.5ZM101.451 101.5H101.459V100H101.451V101.5ZM101.442 101.5H101.451V100H101.442V101.5ZM101.434 101.5H101.442V100H101.434V101.5ZM101.425 101.5H101.434V100H101.425V101.5ZM101.417 101.5H101.425V100H101.417V101.5ZM101.409 101.5H101.417V100H101.409V101.5ZM101.4 101.5H101.409V100H101.4V101.5ZM101.392 101.5H101.4V100H101.392V101.5ZM101.384 101.5H101.392V100H101.384V101.5ZM101.375 101.5H101.384V100H101.375V101.5ZM101.367 101.5H101.375V100H101.367V101.5ZM101.359 101.5H101.367V100H101.359V101.5ZM101.351 101.5H101.359V100H101.351V101.5ZM101.342 101.5H101.351V100H101.342V101.5ZM101.334 101.5H101.342V100H101.334V101.5ZM101.326 101.5H101.334V100H101.326V101.5ZM101.318 101.5H101.326V100H101.318V101.5ZM101.309 101.5H101.318V100H101.309V101.5ZM101.301 101.5H101.309V100H101.301V101.5ZM101.293 101.5H101.301V100H101.293V101.5ZM101.285 101.5H101.293V100H101.285V101.5ZM101.276 101.5H101.285V100H101.276V101.5ZM101.268 101.5H101.276V100H101.268V101.5ZM101.26 101.5H101.268V100H101.26V101.5ZM101.252 101.5H101.26V100H101.252V101.5ZM101.244 101.5H101.252V100H101.244V101.5ZM101.236 101.5H101.244V100H101.236V101.5ZM101.228 101.5H101.236V100H101.228V101.5ZM101.219 101.5H101.228V100H101.219V101.5ZM101.211 101.5H101.219V100H101.211V101.5ZM101.203 101.5H101.211V100H101.203V101.5ZM101.195 101.5H101.203V100H101.195V101.5ZM101.187 101.5H101.195V100H101.187V101.5ZM101.179 101.5H101.187V100H101.179V101.5ZM101.171 101.5H101.179V100H101.171V101.5ZM101.163 101.5H101.171V100H101.163V101.5ZM101.155 101.5H101.163V100H101.155V101.5ZM101.147 101.5H101.155V100H101.147V101.5ZM101.139 101.5H101.147V100H101.139V101.5ZM101.131 101.5H101.139V100H101.131V101.5ZM101.123 101.5H101.131V100H101.123V101.5ZM101.115 101.5H101.123V100H101.115V101.5ZM101.107 101.5H101.115V100H101.107V101.5ZM101.099 101.5H101.107V100H101.099V101.5ZM101.091 101.5H101.099V100H101.091V101.5ZM101.083 101.5H101.091V100H101.083V101.5ZM101.075 101.5H101.083V100H101.075V101.5ZM101.067 101.5H101.075V100H101.067V101.5ZM101.059 101.5H101.067V100H101.059V101.5ZM101.052 101.5H101.059V100H101.052V101.5ZM101.044 101.5H101.052V100H101.044V101.5ZM101.036 101.5H101.044V100H101.036V101.5ZM101.028 101.5H101.036V100H101.028V101.5ZM101.02 101.5H101.028V100H101.02V101.5ZM101.012 101.5H101.02V100H101.012V101.5ZM101.004 101.5H101.012V100H101.004V101.5ZM100.997 101.5H101.004V100H100.997V101.5ZM100.989 101.5H100.997V100H100.989V101.5ZM100.981 101.5H100.989V100H100.981V101.5ZM100.973 101.5H100.981V100H100.973V101.5ZM100.965 101.5H100.973V100H100.965V101.5ZM100.958 101.5H100.965V100H100.958V101.5ZM100.95 101.5H100.958V100H100.95V101.5ZM100.942 101.5H100.95V100H100.942V101.5ZM100.934 101.5H100.942V100H100.934V101.5ZM100.927 101.5H100.934V100H100.927V101.5ZM100.919 101.5H100.927V100H100.919V101.5ZM100.911 101.5H100.919V100H100.911V101.5ZM100.903 101.5H100.911V100H100.903V101.5ZM100.896 101.5H100.903V100H100.896V101.5ZM100.888 101.5H100.896V100H100.888V101.5ZM100.88 101.5H100.888V100H100.88V101.5ZM100.873 101.5H100.88V100H100.873V101.5ZM100.865 101.5H100.873V100H100.865V101.5ZM100.858 101.5H100.865V100H100.858V101.5ZM100.85 101.5H100.858V100H100.85V101.5ZM100.842 101.5H100.85V100H100.842V101.5ZM100.835 101.5H100.842V100H100.835V101.5ZM100.827 101.5H100.835V100H100.827V101.5ZM100.82 101.5H100.827V100H100.82V101.5ZM100.812 101.5H100.82V100H100.812V101.5ZM100.804 101.5H100.812V100H100.804V101.5ZM100.797 101.5H100.804V100H100.797V101.5ZM100.789 101.5H100.797V100H100.789V101.5ZM100.782 101.5H100.789V100H100.782V101.5ZM100.774 101.5H100.782V100H100.774V101.5ZM100.767 101.5H100.774V100H100.767V101.5ZM100.759 101.5H100.767V100H100.759V101.5ZM100.752 101.5H100.759V100H100.752V101.5ZM100.744 101.5H100.752V100H100.744V101.5ZM100.737 101.5H100.744V100H100.737V101.5ZM100.729 101.5H100.737V100H100.729V101.5ZM100.722 101.5H100.729V100H100.722V101.5ZM100.714 101.5H100.722V100H100.714V101.5ZM100.707 101.5H100.714V100H100.707V101.5ZM100.7 101.5H100.707V100H100.7V101.5ZM100.692 101.5H100.7V100H100.692V101.5ZM100.685 101.5H100.692V100H100.685V101.5ZM100.677 101.5H100.685V100H100.677V101.5ZM100.67 101.5H100.677V100H100.67V101.5ZM100.663 101.5H100.67V100H100.663V101.5ZM100.655 101.5H100.663V100H100.655V101.5ZM100.648 101.5H100.655V100H100.648V101.5ZM100.641 101.5H100.648V100H100.641V101.5ZM100.633 101.5H100.641V100H100.633V101.5ZM100.626 101.5H100.633V100H100.626V101.5ZM100.619 101.5H100.626V100H100.619V101.5ZM100.611 101.5H100.619V100H100.611V101.5ZM100.604 101.5H100.611V100H100.604V101.5ZM100.597 101.5H100.604V100H100.597V101.5ZM100.59 101.5H100.597V100H100.59V101.5ZM100.582 101.5H100.59V100H100.582V101.5ZM100.575 101.5H100.582V100H100.575V101.5ZM100.568 101.5H100.575V100H100.568V101.5ZM100.561 101.5H100.568V100H100.561V101.5ZM100.553 101.5H100.561V100H100.553V101.5ZM100.546 101.5H100.553V100H100.546V101.5ZM100.539 101.5H100.546V100H100.539V101.5ZM100.532 101.5H100.539V100H100.532V101.5ZM100.525 101.5H100.532V100H100.525V101.5ZM100.518 101.5H100.525V100H100.518V101.5ZM100.51 101.5H100.518V100H100.51V101.5ZM100.503 101.5H100.51V100H100.503V101.5ZM100.496 101.5H100.503V100H100.496V101.5ZM100.489 101.5H100.496V100H100.489V101.5ZM100.482 101.5H100.489V100H100.482V101.5ZM100.475 101.5H100.482V100H100.475V101.5ZM100.468 101.5H100.475V100H100.468V101.5ZM100.461 101.5H100.468V100H100.461V101.5ZM100.454 101.5H100.461V100H100.454V101.5ZM100.447 101.5H100.454V100H100.447V101.5ZM100.44 101.5H100.447V100H100.44V101.5ZM100.433 101.5H100.44V100H100.433V101.5ZM100.426 101.5H100.433V100H100.426V101.5ZM100.419 101.5H100.426V100H100.419V101.5ZM100.412 101.5H100.419V100H100.412V101.5ZM100.405 101.5H100.412V100H100.405V101.5ZM100.398 101.5H100.405V100H100.398V101.5ZM100.391 101.5H100.398V100H100.391V101.5ZM100.384 101.5H100.391V100H100.384V101.5ZM100.377 101.5H100.384V100H100.377V101.5ZM100.37 101.5H100.377V100H100.37V101.5ZM100.363 101.5H100.37V100H100.363V101.5ZM100.356 101.5H100.363V100H100.356V101.5ZM100.349 101.5H100.356V100H100.349V101.5ZM100.342 101.5H100.349V100H100.342V101.5ZM100.335 101.5H100.342V100H100.335V101.5ZM100.328 101.5H100.335V100H100.328V101.5ZM100.321 101.5H100.328V100H100.321V101.5ZM100.315 101.5H100.321V100H100.315V101.5ZM100.308 101.5H100.315V100H100.308V101.5ZM100.301 101.5H100.308V100H100.301V101.5ZM100.294 101.5H100.301V100H100.294V101.5ZM100.287 101.5H100.294V100H100.287V101.5ZM100.281 101.5H100.287V100H100.281V101.5ZM100.274 101.5H100.281V100H100.274V101.5ZM100.267 101.5H100.274V100H100.267V101.5ZM100.26 101.5H100.267V100H100.26V101.5ZM100.253 101.5H100.26V100H100.253V101.5ZM100.247 101.5H100.253V100H100.247V101.5ZM100.24 101.5H100.247V100H100.24V101.5ZM100.233 101.5H100.24V100H100.233V101.5ZM100.226 101.5H100.233V100H100.226V101.5ZM100.22 101.5H100.226V100H100.22V101.5ZM100.213 101.5H100.22V100H100.213V101.5ZM100.206 101.5H100.213V100H100.206V101.5ZM100.2 101.5H100.206V100H100.2V101.5ZM100.193 101.5H100.2V100H100.193V101.5ZM100.186 101.5H100.193V100H100.186V101.5ZM100.18 101.5H100.186V100H100.18V101.5ZM100.173 101.5H100.18V100H100.173V101.5ZM100.167 101.5H100.173V100H100.167V101.5ZM100.16 101.5H100.167V100H100.16V101.5ZM100.153 101.5H100.16V100H100.153V101.5ZM100.147 101.5H100.153V100H100.147V101.5ZM100.14 101.5H100.147V100H100.14V101.5ZM100.134 101.5H100.14V100H100.134V101.5ZM100.127 101.5H100.134V100H100.127V101.5ZM100.12 101.5H100.127V100H100.12V101.5ZM100.114 101.5H100.12V100H100.114V101.5ZM100.107 101.5H100.114V100H100.107V101.5ZM100.101 101.5H100.107V100H100.101V101.5ZM100.094 101.5H100.101V100H100.094V101.5ZM100.088 101.5H100.094V100H100.088V101.5ZM100.081 101.5H100.088V100H100.081V101.5ZM100.075 101.5H100.081V100H100.075V101.5ZM100.068 101.5H100.075V100H100.068V101.5ZM100.062 101.5H100.068V100H100.062V101.5ZM100.055 101.5H100.062V100H100.055V101.5ZM100.049 101.5H100.055V100H100.049V101.5ZM100.043 101.5H100.049V100H100.043V101.5ZM100.036 101.5H100.043V100H100.036V101.5ZM100.03 101.5H100.036V100H100.03V101.5ZM100.023 101.5H100.03V100H100.023V101.5ZM100.017 101.5H100.023V100H100.017V101.5ZM100.011 101.5H100.017V100H100.011V101.5ZM100.004 101.5H100.011V100H100.004V101.5ZM99.9979 101.5H100.004V100H99.9979V101.5ZM99.9916 101.5H99.9979V100H99.9916V101.5ZM99.9852 101.5H99.9916V100H99.9852V101.5ZM99.9789 101.5H99.9852V100H99.9789V101.5ZM99.9726 101.5H99.9789V100H99.9726V101.5ZM99.9663 101.5H99.9726V100H99.9663V101.5ZM99.96 101.5H99.9663V100H99.96V101.5ZM99.9537 101.5H99.96V100H99.9537V101.5ZM99.9475 101.5H99.9537V100H99.9475V101.5ZM99.9412 101.5H99.9475V100H99.9412V101.5ZM99.935 101.5H99.9412V100H99.935V101.5ZM99.9287 101.5H99.935V100H99.9287V101.5ZM99.9225 101.5H99.9287V100H99.9225V101.5ZM99.9163 101.5H99.9225V100H99.9163V101.5ZM99.9101 101.5H99.9163V100H99.9101V101.5ZM99.9039 101.5H99.9101V100H99.9039V101.5ZM99.8977 101.5H99.9039V100H99.8977V101.5ZM99.8915 101.5H99.8977V100H99.8915V101.5ZM99.8853 101.5H99.8915V100H99.8853V101.5ZM99.8792 101.5H99.8853V100H99.8792V101.5ZM99.873 101.5H99.8792V100H99.873V101.5ZM99.8669 101.5H99.873V100H99.8669V101.5ZM99.8608 101.5H99.8669V100H99.8608V101.5ZM99.8547 101.5H99.8608V100H99.8547V101.5ZM99.8486 101.5H99.8547V100H99.8486V101.5ZM99.8425 101.5H99.8486V100H99.8425V101.5ZM99.8364 101.5H99.8425V100H99.8364V101.5ZM99.8303 101.5H99.8364V100H99.8303V101.5ZM99.8242 101.5H99.8303V100H99.8242V101.5ZM99.8182 101.5H99.8242V100H99.8182V101.5ZM99.8121 101.5H99.8182V100H99.8121V101.5ZM99.8061 101.5H99.8121V100H99.8061V101.5ZM99.8001 101.5H99.8061V100H99.8001V101.5ZM99.7941 101.5H99.8001V100H99.7941V101.5ZM99.7881 101.5H99.7941V100H99.7881V101.5ZM99.7821 101.5H99.7881V100H99.7821V101.5ZM99.7761 101.5H99.7821V100H99.7761V101.5ZM99.7701 101.5H99.7761V100H99.7701V101.5ZM99.7642 101.5H99.7701V100H99.7642V101.5ZM99.7582 101.5H99.7642V100H99.7582V101.5ZM99.7523 101.5H99.7582V100H99.7523V101.5ZM99.7464 101.5H99.7523V100H99.7464V101.5ZM99.7405 101.5H99.7464V100H99.7405V101.5ZM99.7346 101.5H99.7405V100H99.7346V101.5ZM99.7287 101.5H99.7346V100H99.7287V101.5ZM99.7228 101.5H99.7287V100H99.7228V101.5ZM99.7169 101.5H99.7228V100H99.7169V101.5ZM99.711 101.5H99.7169V100H99.711V101.5ZM99.7052 101.5H99.711V100H99.7052V101.5ZM99.6993 101.5H99.7052V100H99.6993V101.5ZM99.6935 101.5H99.6993V100H99.6935V101.5ZM99.6877 101.5H99.6935V100H99.6877V101.5ZM99.6819 101.5H99.6877V100H99.6819V101.5ZM99.6761 101.5H99.6819V100H99.6761V101.5ZM99.6703 101.5H99.6761V100H99.6703V101.5ZM99.6645 101.5H99.6703V100H99.6645V101.5ZM99.6587 101.5H99.6645V100H99.6587V101.5ZM99.653 101.5H99.6587V100H99.653V101.5ZM99.6472 101.5H99.653V100H99.6472V101.5ZM99.6415 101.5H99.6472V100H99.6415V101.5ZM99.6357 101.5H99.6415V100H99.6357V101.5ZM99.63 101.5H99.6357V100H99.63V101.5ZM99.6243 101.5H99.63V100H99.6243V101.5ZM99.6186 101.5H99.6243V100H99.6186V101.5ZM99.6129 101.5H99.6186V100H99.6129V101.5ZM99.6072 101.5H99.6129V100H99.6072V101.5ZM99.6016 101.5H99.6072V100H99.6016V101.5ZM99.5959 101.5H99.6016V100H99.5959V101.5ZM99.5903 101.5H99.5959V100H99.5903V101.5ZM99.5846 101.5H99.5903V100H99.5846V101.5ZM99.579 101.5H99.5846V100H99.579V101.5ZM99.5734 101.5H99.579V100H99.5734V101.5ZM99.5678 101.5H99.5734V100H99.5678V101.5ZM99.5622 101.5H99.5678V100H99.5622V101.5ZM99.5566 101.5H99.5622V100H99.5566V101.5ZM99.551 101.5H99.5566V100H99.551V101.5ZM99.5455 101.5H99.551V100H99.5455V101.5ZM99.5399 101.5H99.5455V100H99.5399V101.5ZM99.5344 101.5H99.5399V100H99.5344V101.5ZM99.5289 101.5H99.5344V100H99.5289V101.5ZM99.5233 101.5H99.5289V100H99.5233V101.5ZM99.5178 101.5H99.5233V100H99.5178V101.5ZM99.5123 101.5H99.5178V100H99.5123V101.5ZM99.5068 101.5H99.5123V100H99.5068V101.5ZM99.5014 101.5H99.5068V100H99.5014V101.5ZM99.4959 101.5H99.5014V100H99.4959V101.5ZM99.4904 101.5H99.4959V100H99.4904V101.5ZM99.485 101.5H99.4904V100H99.485V101.5ZM99.4795 101.5H99.485V100H99.4795V101.5ZM99.4741 101.5H99.4795V100H99.4741V101.5ZM99.4687 101.5H99.4741V100H99.4687V101.5ZM99.4633 101.5H99.4687V100H99.4633V101.5ZM99.4579 101.5H99.4633V100H99.4579V101.5ZM99.4525 101.5H99.4579V100H99.4525V101.5ZM99.4471 101.5H99.4525V100H99.4471V101.5ZM99.4418 101.5H99.4471V100H99.4418V101.5ZM99.4364 101.5H99.4418V100H99.4364V101.5ZM99.4311 101.5H99.4364V100H99.4311V101.5ZM99.4257 101.5H99.4311V100H99.4257V101.5ZM98.6757 99.2502V100.75H100.176V99.2502H98.6757ZM99.4311 98.5002H99.4257V100H99.4311V98.5002ZM99.4364 98.5002H99.4311V100H99.4364V98.5002ZM99.4418 98.5002H99.4364V100H99.4418V98.5002ZM99.4471 98.5002H99.4418V100H99.4471V98.5002ZM99.4525 98.5002H99.4471V100H99.4525V98.5002ZM99.4579 98.5002H99.4525V100H99.4579V98.5002ZM99.4633 98.5002H99.4579V100H99.4633V98.5002ZM99.4687 98.5002H99.4633V100H99.4687V98.5002ZM99.4741 98.5002H99.4687V100H99.4741V98.5002ZM99.4795 98.5002H99.4741V100H99.4795V98.5002ZM99.485 98.5002H99.4795V100H99.485V98.5002ZM99.4904 98.5002H99.485V100H99.4904V98.5002ZM99.4959 98.5002H99.4904V100H99.4959V98.5002ZM99.5014 98.5002H99.4959V100H99.5014V98.5002ZM99.5068 98.5002H99.5014V100H99.5068V98.5002ZM99.5123 98.5002H99.5068V100H99.5123V98.5002ZM99.5178 98.5002H99.5123V100H99.5178V98.5002ZM99.5233 98.5002H99.5178V100H99.5233V98.5002ZM99.5289 98.5002H99.5233V100H99.5289V98.5002ZM99.5344 98.5002H99.5289V100H99.5344V98.5002ZM99.5399 98.5002H99.5344V100H99.5399V98.5002ZM99.5455 98.5002H99.5399V100H99.5455V98.5002ZM99.551 98.5002H99.5455V100H99.551V98.5002ZM99.5566 98.5002H99.551V100H99.5566V98.5002ZM99.5622 98.5002H99.5566V100H99.5622V98.5002ZM99.5678 98.5002H99.5622V100H99.5678V98.5002ZM99.5734 98.5002H99.5678V100H99.5734V98.5002ZM99.579 98.5002H99.5734V100H99.579V98.5002ZM99.5846 98.5002H99.579V100H99.5846V98.5002ZM99.5903 98.5002H99.5846V100H99.5903V98.5002ZM99.5959 98.5002H99.5903V100H99.5959V98.5002ZM99.6016 98.5002H99.5959V100H99.6016V98.5002ZM99.6072 98.5002H99.6016V100H99.6072V98.5002ZM99.6129 98.5002H99.6072V100H99.6129V98.5002ZM99.6186 98.5002H99.6129V100H99.6186V98.5002ZM99.6243 98.5002H99.6186V100H99.6243V98.5002ZM99.63 98.5002H99.6243V100H99.63V98.5002ZM99.6357 98.5002H99.63V100H99.6357V98.5002ZM99.6415 98.5002H99.6357V100H99.6415V98.5002ZM99.6472 98.5002H99.6415V100H99.6472V98.5002ZM99.653 98.5002H99.6472V100H99.653V98.5002ZM99.6587 98.5002H99.653V100H99.6587V98.5002ZM99.6645 98.5002H99.6587V100H99.6645V98.5002ZM99.6703 98.5002H99.6645V100H99.6703V98.5002ZM99.6761 98.5002H99.6703V100H99.6761V98.5002ZM99.6819 98.5002H99.6761V100H99.6819V98.5002ZM99.6877 98.5002H99.6819V100H99.6877V98.5002ZM99.6935 98.5002H99.6877V100H99.6935V98.5002ZM99.6993 98.5002H99.6935V100H99.6993V98.5002ZM99.7052 98.5002H99.6993V100H99.7052V98.5002ZM99.711 98.5002H99.7052V100H99.711V98.5002ZM99.7169 98.5002H99.711V100H99.7169V98.5002ZM99.7228 98.5002H99.7169V100H99.7228V98.5002ZM99.7287 98.5002H99.7228V100H99.7287V98.5002ZM99.7346 98.5002H99.7287V100H99.7346V98.5002ZM99.7405 98.5002H99.7346V100H99.7405V98.5002ZM99.7464 98.5002H99.7405V100H99.7464V98.5002ZM99.7523 98.5002H99.7464V100H99.7523V98.5002ZM99.7582 98.5002H99.7523V100H99.7582V98.5002ZM99.7642 98.5002H99.7582V100H99.7642V98.5002ZM99.7701 98.5002H99.7642V100H99.7701V98.5002ZM99.7761 98.5002H99.7701V100H99.7761V98.5002ZM99.7821 98.5002H99.7761V100H99.7821V98.5002ZM99.7881 98.5002H99.7821V100H99.7881V98.5002ZM99.7941 98.5002H99.7881V100H99.7941V98.5002ZM99.8001 98.5002H99.7941V100H99.8001V98.5002ZM99.8061 98.5002H99.8001V100H99.8061V98.5002ZM99.8121 98.5002H99.8061V100H99.8121V98.5002ZM99.8182 98.5002H99.8121V100H99.8182V98.5002ZM99.8242 98.5002H99.8182V100H99.8242V98.5002ZM99.8303 98.5002H99.8242V100H99.8303V98.5002ZM99.8364 98.5002H99.8303V100H99.8364V98.5002ZM99.8425 98.5002H99.8364V100H99.8425V98.5002ZM99.8486 98.5002H99.8425V100H99.8486V98.5002ZM99.8547 98.5002H99.8486V100H99.8547V98.5002ZM99.8608 98.5002H99.8547V100H99.8608V98.5002ZM99.8669 98.5002H99.8608V100H99.8669V98.5002ZM99.873 98.5002H99.8669V100H99.873V98.5002ZM99.8792 98.5002H99.873V100H99.8792V98.5002ZM99.8853 98.5002H99.8792V100H99.8853V98.5002ZM99.8915 98.5002H99.8853V100H99.8915V98.5002ZM99.8977 98.5002H99.8915V100H99.8977V98.5002ZM99.9039 98.5002H99.8977V100H99.9039V98.5002ZM99.9101 98.5002H99.9039V100H99.9101V98.5002ZM99.9163 98.5002H99.9101V100H99.9163V98.5002ZM99.9225 98.5002H99.9163V100H99.9225V98.5002ZM99.9287 98.5002H99.9225V100H99.9287V98.5002ZM99.935 98.5002H99.9287V100H99.935V98.5002ZM99.9412 98.5002H99.935V100H99.9412V98.5002ZM99.9475 98.5002H99.9412V100H99.9475V98.5002ZM99.9537 98.5002H99.9475V100H99.9537V98.5002ZM99.96 98.5002H99.9537V100H99.96V98.5002ZM99.9663 98.5002H99.96V100H99.9663V98.5002ZM99.9726 98.5002H99.9663V100H99.9726V98.5002ZM99.9789 98.5002H99.9726V100H99.9789V98.5002ZM99.9852 98.5002H99.9789V100H99.9852V98.5002ZM99.9916 98.5002H99.9852V100H99.9916V98.5002ZM99.9979 98.5002H99.9916V100H99.9979V98.5002ZM100.004 98.5002H99.9979V100H100.004V98.5002ZM100.011 98.5002H100.004V100H100.011V98.5002ZM100.017 98.5002H100.011V100H100.017V98.5002ZM100.023 98.5002H100.017V100H100.023V98.5002ZM100.03 98.5002H100.023V100H100.03V98.5002ZM100.036 98.5002H100.03V100H100.036V98.5002ZM100.043 98.5002H100.036V100H100.043V98.5002ZM100.049 98.5002H100.043V100H100.049V98.5002ZM100.055 98.5002H100.049V100H100.055V98.5002ZM100.062 98.5002H100.055V100H100.062V98.5002ZM100.068 98.5002H100.062V100H100.068V98.5002ZM100.075 98.5002H100.068V100H100.075V98.5002ZM100.081 98.5002H100.075V100H100.081V98.5002ZM100.088 98.5002H100.081V100H100.088V98.5002ZM100.094 98.5002H100.088V100H100.094V98.5002ZM100.101 98.5002H100.094V100H100.101V98.5002ZM100.107 98.5002H100.101V100H100.107V98.5002ZM100.114 98.5002H100.107V100H100.114V98.5002ZM100.12 98.5002H100.114V100H100.12V98.5002ZM100.127 98.5002H100.12V100H100.127V98.5002ZM100.134 98.5002H100.127V100H100.134V98.5002ZM100.14 98.5002H100.134V100H100.14V98.5002ZM100.147 98.5002H100.14V100H100.147V98.5002ZM100.153 98.5002H100.147V100H100.153V98.5002ZM100.16 98.5002H100.153V100H100.16V98.5002ZM100.167 98.5002H100.16V100H100.167V98.5002ZM100.173 98.5002H100.167V100H100.173V98.5002ZM100.18 98.5002H100.173V100H100.18V98.5002ZM100.186 98.5002H100.18V100H100.186V98.5002ZM100.193 98.5002H100.186V100H100.193V98.5002ZM100.2 98.5002H100.193V100H100.2V98.5002ZM100.206 98.5002H100.2V100H100.206V98.5002ZM100.213 98.5002H100.206V100H100.213V98.5002ZM100.22 98.5002H100.213V100H100.22V98.5002ZM100.226 98.5002H100.22V100H100.226V98.5002ZM100.233 98.5002H100.226V100H100.233V98.5002ZM100.24 98.5002H100.233V100H100.24V98.5002ZM100.247 98.5002H100.24V100H100.247V98.5002ZM100.253 98.5002H100.247V100H100.253V98.5002ZM100.26 98.5002H100.253V100H100.26V98.5002ZM100.267 98.5002H100.26V100H100.267V98.5002ZM100.274 98.5002H100.267V100H100.274V98.5002ZM100.281 98.5002H100.274V100H100.281V98.5002ZM100.287 98.5002H100.281V100H100.287V98.5002ZM100.294 98.5002H100.287V100H100.294V98.5002ZM100.301 98.5002H100.294V100H100.301V98.5002ZM100.308 98.5002H100.301V100H100.308V98.5002ZM100.315 98.5002H100.308V100H100.315V98.5002ZM100.321 98.5002H100.315V100H100.321V98.5002ZM100.328 98.5002H100.321V100H100.328V98.5002ZM100.335 98.5002H100.328V100H100.335V98.5002ZM100.342 98.5002H100.335V100H100.342V98.5002ZM100.349 98.5002H100.342V100H100.349V98.5002ZM100.356 98.5002H100.349V100H100.356V98.5002ZM100.363 98.5002H100.356V100H100.363V98.5002ZM100.37 98.5002H100.363V100H100.37V98.5002ZM100.377 98.5002H100.37V100H100.377V98.5002ZM100.384 98.5002H100.377V100H100.384V98.5002ZM100.391 98.5002H100.384V100H100.391V98.5002ZM100.398 98.5002H100.391V100H100.398V98.5002ZM100.405 98.5002H100.398V100H100.405V98.5002ZM100.412 98.5002H100.405V100H100.412V98.5002ZM100.419 98.5002H100.412V100H100.419V98.5002ZM100.426 98.5002H100.419V100H100.426V98.5002ZM100.433 98.5002H100.426V100H100.433V98.5002ZM100.44 98.5002H100.433V100H100.44V98.5002ZM100.447 98.5002H100.44V100H100.447V98.5002ZM100.454 98.5002H100.447V100H100.454V98.5002ZM100.461 98.5002H100.454V100H100.461V98.5002ZM100.468 98.5002H100.461V100H100.468V98.5002ZM100.475 98.5002H100.468V100H100.475V98.5002ZM100.482 98.5002H100.475V100H100.482V98.5002ZM100.489 98.5002H100.482V100H100.489V98.5002ZM100.496 98.5002H100.489V100H100.496V98.5002ZM100.503 98.5002H100.496V100H100.503V98.5002ZM100.51 98.5002H100.503V100H100.51V98.5002ZM100.518 98.5002H100.51V100H100.518V98.5002ZM100.525 98.5002H100.518V100H100.525V98.5002ZM100.532 98.5002H100.525V100H100.532V98.5002ZM100.539 98.5002H100.532V100H100.539V98.5002ZM100.546 98.5002H100.539V100H100.546V98.5002ZM100.553 98.5002H100.546V100H100.553V98.5002ZM100.561 98.5002H100.553V100H100.561V98.5002ZM100.568 98.5002H100.561V100H100.568V98.5002ZM100.575 98.5002H100.568V100H100.575V98.5002ZM100.582 98.5002H100.575V100H100.582V98.5002ZM100.59 98.5002H100.582V100H100.59V98.5002ZM100.597 98.5002H100.59V100H100.597V98.5002ZM100.604 98.5002H100.597V100H100.604V98.5002ZM100.611 98.5002H100.604V100H100.611V98.5002ZM100.619 98.5002H100.611V100H100.619V98.5002ZM100.626 98.5002H100.619V100H100.626V98.5002ZM100.633 98.5002H100.626V100H100.633V98.5002ZM100.641 98.5002H100.633V100H100.641V98.5002ZM100.648 98.5002H100.641V100H100.648V98.5002ZM100.655 98.5002H100.648V100H100.655V98.5002ZM100.663 98.5002H100.655V100H100.663V98.5002ZM100.67 98.5002H100.663V100H100.67V98.5002ZM100.677 98.5002H100.67V100H100.677V98.5002ZM100.685 98.5002H100.677V100H100.685V98.5002ZM100.692 98.5002H100.685V100H100.692V98.5002ZM100.7 98.5002H100.692V100H100.7V98.5002ZM100.707 98.5002H100.7V100H100.707V98.5002ZM100.714 98.5002H100.707V100H100.714V98.5002ZM100.722 98.5002H100.714V100H100.722V98.5002ZM100.729 98.5002H100.722V100H100.729V98.5002ZM100.737 98.5002H100.729V100H100.737V98.5002ZM100.744 98.5002H100.737V100H100.744V98.5002ZM100.752 98.5002H100.744V100H100.752V98.5002ZM100.759 98.5002H100.752V100H100.759V98.5002ZM100.767 98.5002H100.759V100H100.767V98.5002ZM100.774 98.5002H100.767V100H100.774V98.5002ZM100.782 98.5002H100.774V100H100.782V98.5002ZM100.789 98.5002H100.782V100H100.789V98.5002ZM100.797 98.5002H100.789V100H100.797V98.5002ZM100.804 98.5002H100.797V100H100.804V98.5002ZM100.812 98.5002H100.804V100H100.812V98.5002ZM100.82 98.5002H100.812V100H100.82V98.5002ZM100.827 98.5002H100.82V100H100.827V98.5002ZM100.835 98.5002H100.827V100H100.835V98.5002ZM100.842 98.5002H100.835V100H100.842V98.5002ZM100.85 98.5002H100.842V100H100.85V98.5002ZM100.858 98.5002H100.85V100H100.858V98.5002ZM100.865 98.5002H100.858V100H100.865V98.5002ZM100.873 98.5002H100.865V100H100.873V98.5002ZM100.88 98.5002H100.873V100H100.88V98.5002ZM100.888 98.5002H100.88V100H100.888V98.5002ZM100.896 98.5002H100.888V100H100.896V98.5002ZM100.903 98.5002H100.896V100H100.903V98.5002ZM100.911 98.5002H100.903V100H100.911V98.5002ZM100.919 98.5002H100.911V100H100.919V98.5002ZM100.927 98.5002H100.919V100H100.927V98.5002ZM100.934 98.5002H100.927V100H100.934V98.5002ZM100.942 98.5002H100.934V100H100.942V98.5002ZM100.95 98.5002H100.942V100H100.95V98.5002ZM100.958 98.5002H100.95V100H100.958V98.5002ZM100.965 98.5002H100.958V100H100.965V98.5002ZM100.973 98.5002H100.965V100H100.973V98.5002ZM100.981 98.5002H100.973V100H100.981V98.5002ZM100.989 98.5002H100.981V100H100.989V98.5002ZM100.997 98.5002H100.989V100H100.997V98.5002ZM101.004 98.5002H100.997V100H101.004V98.5002ZM101.012 98.5002H101.004V100H101.012V98.5002ZM101.02 98.5002H101.012V100H101.02V98.5002ZM101.028 98.5002H101.02V100H101.028V98.5002ZM101.036 98.5002H101.028V100H101.036V98.5002ZM101.044 98.5002H101.036V100H101.044V98.5002ZM101.052 98.5002H101.044V100H101.052V98.5002ZM101.059 98.5002H101.052V100H101.059V98.5002ZM101.067 98.5002H101.059V100H101.067V98.5002ZM101.075 98.5002H101.067V100H101.075V98.5002ZM101.083 98.5002H101.075V100H101.083V98.5002ZM101.091 98.5002H101.083V100H101.091V98.5002ZM101.099 98.5002H101.091V100H101.099V98.5002ZM101.107 98.5002H101.099V100H101.107V98.5002ZM101.115 98.5002H101.107V100H101.115V98.5002ZM101.123 98.5002H101.115V100H101.123V98.5002ZM101.131 98.5002H101.123V100H101.131V98.5002ZM101.139 98.5002H101.131V100H101.139V98.5002ZM101.147 98.5002H101.139V100H101.147V98.5002ZM101.155 98.5002H101.147V100H101.155V98.5002ZM101.163 98.5002H101.155V100H101.163V98.5002ZM101.171 98.5002H101.163V100H101.171V98.5002ZM101.179 98.5002H101.171V100H101.179V98.5002ZM101.187 98.5002H101.179V100H101.187V98.5002ZM101.195 98.5002H101.187V100H101.195V98.5002ZM101.203 98.5002H101.195V100H101.203V98.5002ZM101.211 98.5002H101.203V100H101.211V98.5002ZM101.219 98.5002H101.211V100H101.219V98.5002ZM101.228 98.5002H101.219V100H101.228V98.5002ZM101.236 98.5002H101.228V100H101.236V98.5002ZM101.244 98.5002H101.236V100H101.244V98.5002ZM101.252 98.5002H101.244V100H101.252V98.5002ZM101.26 98.5002H101.252V100H101.26V98.5002ZM101.268 98.5002H101.26V100H101.268V98.5002ZM101.276 98.5002H101.268V100H101.276V98.5002ZM101.285 98.5002H101.276V100H101.285V98.5002ZM101.293 98.5002H101.285V100H101.293V98.5002ZM101.301 98.5002H101.293V100H101.301V98.5002ZM101.309 98.5002H101.301V100H101.309V98.5002ZM101.318 98.5002H101.309V100H101.318V98.5002ZM101.326 98.5002H101.318V100H101.326V98.5002ZM101.334 98.5002H101.326V100H101.334V98.5002ZM101.342 98.5002H101.334V100H101.342V98.5002ZM101.351 98.5002H101.342V100H101.351V98.5002ZM101.359 98.5002H101.351V100H101.359V98.5002ZM101.367 98.5002H101.359V100H101.367V98.5002ZM101.375 98.5002H101.367V100H101.375V98.5002ZM101.384 98.5002H101.375V100H101.384V98.5002ZM101.392 98.5002H101.384V100H101.392V98.5002ZM101.4 98.5002H101.392V100H101.4V98.5002ZM101.409 98.5002H101.4V100H101.409V98.5002ZM101.417 98.5002H101.409V100H101.417V98.5002ZM101.425 98.5002H101.417V100H101.425V98.5002ZM101.434 98.5002H101.425V100H101.434V98.5002ZM101.442 98.5002H101.434V100H101.442V98.5002ZM101.451 98.5002H101.442V100H101.451V98.5002ZM101.459 98.5002H101.451V100H101.459V98.5002ZM101.467 98.5002H101.459V100H101.467V98.5002ZM101.476 98.5002H101.467V100H101.476V98.5002ZM101.484 98.5002H101.476V100H101.484V98.5002ZM101.493 98.5002H101.484V100H101.493V98.5002ZM101.501 98.5002H101.493V100H101.501V98.5002ZM101.51 98.5002H101.501V100H101.51V98.5002ZM101.518 98.5002H101.51V100H101.518V98.5002ZM101.527 98.5002H101.518V100H101.527V98.5002ZM101.535 98.5002H101.527V100H101.535V98.5002ZM101.544 98.5002H101.535V100H101.544V98.5002ZM101.552 98.5002H101.544V100H101.552V98.5002ZM101.561 98.5002H101.552V100H101.561V98.5002ZM101.569 98.5002H101.561V100H101.569V98.5002ZM101.578 98.5002H101.569V100H101.578V98.5002ZM101.586 98.5002H101.578V100H101.586V98.5002ZM101.595 98.5002H101.586V100H101.595V98.5002ZM101.603 98.5002H101.595V100H101.603V98.5002ZM101.612 98.5002H101.603V100H101.612V98.5002ZM101.621 98.5002H101.612V100H101.621V98.5002ZM101.629 98.5002H101.621V100H101.629V98.5002ZM101.638 98.5002H101.629V100H101.638V98.5002ZM101.646 98.5002H101.638V100H101.646V98.5002ZM101.655 98.5002H101.646V100H101.655V98.5002ZM101.664 98.5002H101.655V100H101.664V98.5002ZM101.672 98.5002H101.664V100H101.672V98.5002ZM101.681 98.5002H101.672V100H101.681V98.5002ZM101.69 98.5002H101.681V100H101.69V98.5002ZM101.698 98.5002H101.69V100H101.698V98.5002ZM101.707 98.5002H101.698V100H101.707V98.5002ZM101.716 98.5002H101.707V100H101.716V98.5002ZM101.725 98.5002H101.716V100H101.725V98.5002ZM101.733 98.5002H101.725V100H101.733V98.5002ZM101.742 98.5002H101.733V100H101.742V98.5002ZM101.751 98.5002H101.742V100H101.751V98.5002ZM101.76 98.5002H101.751V100H101.76V98.5002ZM101.768 98.5002H101.76V100H101.768V98.5002ZM101.777 98.5002H101.768V100H101.777V98.5002ZM101.786 98.5002H101.777V100H101.786V98.5002ZM101.795 98.5002H101.786V100H101.795V98.5002ZM101.804 98.5002H101.795V100H101.804V98.5002ZM101.812 98.5002H101.804V100H101.812V98.5002ZM101.821 98.5002H101.812V100H101.821V98.5002ZM101.83 98.5002H101.821V100H101.83V98.5002ZM101.839 98.5002H101.83V100H101.839V98.5002ZM101.848 98.5002H101.839V100H101.848V98.5002ZM101.857 98.5002H101.848V100H101.857V98.5002ZM101.866 98.5002H101.857V100H101.866V98.5002ZM101.875 98.5002H101.866V100H101.875V98.5002ZM101.884 98.5002H101.875V100H101.884V98.5002ZM101.892 98.5002H101.884V100H101.892V98.5002ZM101.901 98.5002H101.892V100H101.901V98.5002ZM101.91 98.5002H101.901V100H101.91V98.5002ZM101.919 98.5002H101.91V100H101.919V98.5002ZM101.928 98.5002H101.919V100H101.928V98.5002ZM101.937 98.5002H101.928V100H101.937V98.5002ZM101.946 98.5002H101.937V100H101.946V98.5002ZM101.955 98.5002H101.946V100H101.955V98.5002ZM101.964 98.5002H101.955V100H101.964V98.5002ZM101.973 98.5002H101.964V100H101.973V98.5002ZM101.982 98.5002H101.973V100H101.982V98.5002ZM101.991 98.5002H101.982V100H101.991V98.5002ZM102 98.5002H101.991V100H102V98.5002ZM102.009 98.5002H102V100H102.009V98.5002ZM102.018 98.5002H102.009V100H102.018V98.5002ZM102.028 98.5002H102.018V100H102.028V98.5002ZM102.037 98.5002H102.028V100H102.037V98.5002ZM102.046 98.5002H102.037V100H102.046V98.5002ZM102.055 98.5002H102.046V100H102.055V98.5002ZM102.064 98.5002H102.055V100H102.064V98.5002ZM102.073 98.5002H102.064V100H102.073V98.5002ZM102.082 98.5002H102.073V100H102.082V98.5002ZM102.091 98.5002H102.082V100H102.091V98.5002ZM102.101 98.5002H102.091V100H102.101V98.5002ZM102.11 98.5002H102.101V100H102.11V98.5002ZM102.119 98.5002H102.11V100H102.119V98.5002ZM102.128 98.5002H102.119V100H102.128V98.5002ZM102.137 98.5002H102.128V100H102.137V98.5002ZM102.147 98.5002H102.137V100H102.147V98.5002ZM102.156 98.5002H102.147V100H102.156V98.5002ZM102.165 98.5002H102.156V100H102.165V98.5002ZM102.174 98.5002H102.165V100H102.174V98.5002ZM102.184 98.5002H102.174V100H102.184V98.5002ZM102.193 98.5002H102.184V100H102.193V98.5002ZM102.202 98.5002H102.193V100H102.202V98.5002ZM102.211 98.5002H102.202V100H102.211V98.5002ZM102.221 98.5002H102.211V100H102.221V98.5002ZM102.23 98.5002H102.221V100H102.23V98.5002ZM102.239 98.5002H102.23V100H102.239V98.5002ZM102.249 98.5002H102.239V100H102.249V98.5002ZM102.258 98.5002H102.249V100H102.258V98.5002ZM102.267 98.5002H102.258V100H102.267V98.5002ZM102.277 98.5002H102.267V100H102.277V98.5002ZM102.286 98.5002H102.277V100H102.286V98.5002ZM102.295 98.5002H102.286V100H102.295V98.5002ZM102.305 98.5002H102.295V100H102.305V98.5002ZM102.314 98.5002H102.305V100H102.314V98.5002ZM102.324 98.5002H102.314V100H102.324V98.5002ZM102.333 98.5002H102.324V100H102.333V98.5002ZM102.342 98.5002H102.333V100H102.342V98.5002ZM102.352 98.5002H102.342V100H102.352V98.5002ZM102.361 98.5002H102.352V100H102.361V98.5002ZM102.371 98.5002H102.361V100H102.371V98.5002ZM102.38 98.5002H102.371V100H102.38V98.5002ZM102.39 98.5002H102.38V100H102.39V98.5002ZM102.399 98.5002H102.39V100H102.399V98.5002ZM102.409 98.5002H102.399V100H102.409V98.5002ZM102.418 98.5002H102.409V100H102.418V98.5002ZM102.428 98.5002H102.418V100H102.428V98.5002ZM102.437 98.5002H102.428V100H102.437V98.5002ZM102.447 98.5002H102.437V100H102.447V98.5002ZM102.457 98.5002H102.447V100H102.457V98.5002ZM102.466 98.5002H102.457V100H102.466V98.5002ZM102.476 98.5002H102.466V100H102.476V98.5002ZM102.485 98.5002H102.476V100H102.485V98.5002ZM102.495 98.5002H102.485V100H102.495V98.5002ZM102.504 98.5002H102.495V100H102.504V98.5002ZM102.514 98.5002H102.504V100H102.514V98.5002ZM102.524 98.5002H102.514V100H102.524V98.5002ZM102.533 98.5002H102.524V100H102.533V98.5002ZM102.543 98.5002H102.533V100H102.543V98.5002ZM102.553 98.5002H102.543V100H102.553V98.5002ZM102.562 98.5002H102.553V100H102.562V98.5002ZM102.572 98.5002H102.562V100H102.572V98.5002ZM102.582 98.5002H102.572V100H102.582V98.5002ZM102.591 98.5002H102.582V100H102.591V98.5002ZM102.601 98.5002H102.591V100H102.601V98.5002ZM102.611 98.5002H102.601V100H102.611V98.5002ZM102.621 98.5002H102.611V100H102.621V98.5002ZM102.63 98.5002H102.621V100H102.63V98.5002ZM102.64 98.5002H102.63V100H102.64V98.5002ZM102.65 98.5002H102.64V100H102.65V98.5002ZM102.66 98.5002H102.65V100H102.66V98.5002ZM102.669 98.5002H102.66V100H102.669V98.5002ZM102.679 98.5002H102.669V100H102.679V98.5002ZM102.689 98.5002H102.679V100H102.689V98.5002ZM102.699 98.5002H102.689V100H102.699V98.5002ZM102.709 98.5002H102.699V100H102.709V98.5002ZM102.719 98.5002H102.709V100H102.719V98.5002ZM102.728 98.5002H102.719V100H102.728V98.5002ZM102.738 98.5002H102.728V100H102.738V98.5002ZM102.748 98.5002H102.738V100H102.748V98.5002ZM102.758 98.5002H102.748V100H102.758V98.5002ZM102.768 98.5002H102.758V100H102.768V98.5002ZM102.778 98.5002H102.768V100H102.778V98.5002ZM102.788 98.5002H102.778V100H102.788V98.5002ZM102.798 98.5002H102.788V100H102.798V98.5002ZM102.808 98.5002H102.798V100H102.808V98.5002ZM102.818 98.5002H102.808V100H102.818V98.5002ZM102.827 98.5002H102.818V100H102.827V98.5002ZM102.837 98.5002H102.827V100H102.837V98.5002ZM102.847 98.5002H102.837V100H102.847V98.5002ZM102.857 98.5002H102.847V100H102.857V98.5002ZM102.867 98.5002H102.857V100H102.867V98.5002ZM102.877 98.5002H102.867V100H102.877V98.5002ZM102.887 98.5002H102.877V100H102.887V98.5002ZM102.897 98.5002H102.887V100H102.897V98.5002ZM102.907 98.5002H102.897V100H102.907V98.5002ZM102.918 98.5002H102.907V100H102.918V98.5002ZM102.928 98.5002H102.918V100H102.928V98.5002ZM102.938 98.5002H102.928V100H102.938V98.5002ZM102.948 98.5002H102.938V100H102.948V98.5002ZM102.958 98.5002H102.948V100H102.958V98.5002ZM102.968 98.5002H102.958V100H102.968V98.5002ZM102.978 98.5002H102.968V100H102.978V98.5002ZM102.988 98.5002H102.978V100H102.988V98.5002ZM102.998 98.5002H102.988V100H102.998V98.5002ZM103.008 98.5002H102.998V100H103.008V98.5002ZM103.019 98.5002H103.008V100H103.019V98.5002ZM103.029 98.5002H103.019V100H103.029V98.5002ZM103.039 98.5002H103.029V100H103.039V98.5002ZM103.049 98.5002H103.039V100H103.049V98.5002ZM103.059 98.5002H103.049V100H103.059V98.5002ZM103.07 98.5002H103.059V100H103.07V98.5002ZM103.08 98.5002H103.07V100H103.08V98.5002ZM103.09 98.5002H103.08V100H103.09V98.5002ZM103.1 98.5002H103.09V100H103.1V98.5002ZM103.11 98.5002H103.1V100H103.11V98.5002ZM103.121 98.5002H103.11V100H103.121V98.5002ZM103.131 98.5002H103.121V100H103.131V98.5002ZM103.141 98.5002H103.131V100H103.141V98.5002ZM103.152 98.5002H103.141V100H103.152V98.5002ZM103.162 98.5002H103.152V100H103.162V98.5002ZM103.172 98.5002H103.162V100H103.172V98.5002ZM103.182 98.5002H103.172V100H103.182V98.5002ZM103.193 98.5002H103.182V100H103.193V98.5002ZM103.203 98.5002H103.193V100H103.203V98.5002ZM103.213 98.5002H103.203V100H103.213V98.5002ZM103.224 98.5002H103.213V100H103.224V98.5002ZM103.234 98.5002H103.224V100H103.234V98.5002ZM103.245 98.5002H103.234V100H103.245V98.5002ZM103.255 98.5002H103.245V100H103.255V98.5002ZM103.265 98.5002H103.255V100H103.265V98.5002ZM103.276 98.5002H103.265V100H103.276V98.5002ZM103.286 98.5002H103.276V100H103.286V98.5002ZM103.297 98.5002H103.286V100H103.297V98.5002ZM103.307 98.5002H103.297V100H103.307V98.5002ZM103.318 98.5002H103.307V100H103.318V98.5002ZM103.328 98.5002H103.318V100H103.328V98.5002ZM103.338 98.5002H103.328V100H103.338V98.5002ZM103.349 98.5002H103.338V100H103.349V98.5002ZM103.359 98.5002H103.349V100H103.359V98.5002ZM103.37 98.5002H103.359V100H103.37V98.5002ZM103.38 98.5002H103.37V100H103.38V98.5002ZM103.391 98.5002H103.38V100H103.391V98.5002ZM103.402 98.5002H103.391V100H103.402V98.5002ZM103.412 98.5002H103.402V100H103.412V98.5002ZM103.423 98.5002H103.412V100H103.423V98.5002ZM103.433 98.5002H103.423V100H103.433V98.5002ZM103.444 98.5002H103.433V100H103.444V98.5002ZM103.454 98.5002H103.444V100H103.454V98.5002ZM103.465 98.5002H103.454V100H103.465V98.5002ZM103.476 98.5002H103.465V100H103.476V98.5002ZM103.486 98.5002H103.476V100H103.486V98.5002ZM103.497 98.5002H103.486V100H103.497V98.5002ZM103.508 98.5002H103.497V100H103.508V98.5002ZM103.518 98.5002H103.508V100H103.518V98.5002ZM103.77 98.432C103.694 98.4767 103.607 98.5002 103.518 98.5002V100C103.872 100 104.22 99.9061 104.526 99.7277L103.77 98.432ZM103.95 97.7482C104.089 97.9867 104.009 98.2929 103.77 98.432L104.526 99.7277C105.48 99.1712 105.802 97.9465 105.246 96.9924L103.95 97.7482ZM100.954 92.6118L103.95 97.7482L105.246 96.9924L102.249 91.856L100.954 92.6118Z" fill="#3B3552" />
    <path fillRule="evenodd" clipRule="evenodd" d="M86.4633 69.2641C88.3828 65.9393 93.1779 65.9286 95.1123 69.2447L114.693 102.811C115.086 103.485 114.858 104.35 114.184 104.744C113.968 104.87 113.722 104.936 113.472 104.936L74.5283 104.936C70.6794 104.936 68.2738 100.769 70.1982 97.4361L86.4633 69.2641Z" fill="#3040D6" fillOpacity="0.05" />
    <rect x="71.4062" y="54.1504" width="9.18797" height="29.6842" rx="4.59399" fill="white" stroke="#3B3552" strokeWidth="1.5" />
    <circle cx="76" cy="93.3759" r="5.30075" fill="white" stroke="#3B3552" strokeWidth="1.5" />
  </svg>
)

export default Beware
