<template>
  <v-tooltip location="bottom" open-delay="1000">
    <template #activator="{ props }">
      <v-btn
        v-bind="mergeProps($attrs, props)"
        data-testid="visibility"
        :icon="true"
        size="24"
        variant="text"
        @click.stop="toggle"
        color="rgba(146, 147, 158, 1)"
      >
        <v-icon :icon="icon" size="16" />
      </v-btn>
    </template>
    <span>{{ t('labels.toggleVisibility') }}</span>
  </v-tooltip>
</template>

<script setup lang="ts">
import { computed, mergeProps } from 'vue';
import { useViewer3cr } from '@/composables/useViewer3cr';
import { ObjectVisibility } from '@3cr/types-ts';
import { useI18n } from 'vue-i18n';
import { DataOverlayMcad } from '@3cr/viewer-types-ts';

interface Props {
  mcad: DataOverlayMcad;
}

const props = defineProps<Props>();

const { t } = useI18n();
const viewer3cr = useViewer3cr();

const icon = computed(() => {
  return props.mcad.Visibility ? 'visibility' : 'visibility_off';
});

async function toggle(): Promise<void> {
  const message: ObjectVisibility = { Version: '0.0.0', Id: props.mcad.Id, Visibility: !props.mcad.Visibility };
  await viewer3cr.setMcadObjectVisibility({ message });
}

defineOptions({ inheritAttrs: false });
</script>
